
 GPS week: 1279   Day: 4   MJD: 53201                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  35219    574    -0.06    -0.28     0.04    15.56
 emr |   288     0  22432   1141    17.77    36.11     0.05    10.75
 esa |   288     0  20034   1155    16.79    36.35     0.04    12.36
 gfz |   288     0  29977    298    -0.12    -0.03     0.03    23.27
 igr |   288     0  25028     12    -8.72     2.32     0.03     0.00
 jpl |   288     0  27898    854    -8.59     1.43     0.03    24.68
 mit |   288     0  30211   1975    -0.38    -0.39     0.04    13.38
 ngs |    96     0   2779      0    -0.05    -0.16     2.79     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -22  -238    90   -33    22  -177   517 -2567     - |
    3 |  -124  -181   -95   -23   -81   -74   547 -4109     - |
    4 |    79  -184     0    -1   106    -8    72 -4743     - |
    5 |  -132   -76  -133   -59  -113  -134   688  1025     - |
    6 |   -26  -219  -151   -43  -135     6   411   395     - |
    7 |  -143  -221   -27   -31   100   -99   653  -185     - |
    8 |    12   -65     0    60    -7   -36     X  2531     - |
    9 |     X  -196     X  -100   -16   -30   384 -7602     - |
   10 |    89   -40   -10    -3    -7   -31     X  1467     - |
   11 |    77   -61   355   127   167   -48  -502  1739     - |
   13 |   287   -33   220   103   170   -19  -656  2827     - |
   14 |   142   -89    61   194   150   -17  -460  3142     - |
   15 |   -64  -154  -157   -81   -15   -93   737  -677     - |
   16 |   -57  -142    58    -7    28    22    98  3856     - |
   17 |    18     X  -254   -45   -47  -171   616   376     - |
   18 |    61    -9   143    56    73   -13  -270  1992     - |
   19 |   128   -69   -77   -67   130     -    85  5237     - |
   20 |   102  -166   -71    29   147   -24    74  3748     - |
   21 |    14   -38   167     1    14   -20  -103  5982     - |
   22 |    45   -45   -44   234   189    64  -504 -3077     - |
   23 |   131  -147   201   179   160     -  -532  4404     - |
   24 |    23  -146  -123   -36   -35   -33   326 -2073     - |
   25 |   -96  -204     9   -71    15   -45   458  -595     - |
   26 |     2  -184   232   -34    50   -93   164  -688     - |
   27 |   -38     X   -28    40    95     X     X -1767     - |
   28 |    61   -56    71   151    -3   -57  -250  -598     - |
   29 |   -38  -154   117   -25   -58  -114   383 -3025     - |
   30 |   -90   -62    46   -19   -33   -62   260  -509     - |
   31 |   -74  -190   -14    32   -28   -70   324 -6869     - |
 -----+-------------------------------------------------------+
 ALBH |    39    46     -     -     -     -   -82     -     - |
 ALGO |   -13   107     X   -71     -    13    27     -     - |
 ALIC |  -156     -     -     -     -   231  -245     -     - |
 ALRT |   -51     -     -     6     -    70   -81     -     - |
 AMC2 |  -103    66     -     -  -100   102  -120     -     - |
 ARTU |    84     -   184    35   -18  -179     X     -     - |
 ASC1 |   -95     -     -  -236  -202   281     -     -     - |
 AUCK |   -94     -     X     -   -74    81   -41     -     - |
 BILI |   129     -     -   -11    15    13  -154     -     - |
 BOGT |   105     -   -24   -57   131     X     X     -     - |
 BOR1 |  -116  -108     -     -     -     -   221     -     - |
 BRUS |    32    41     -     -    57     -   -71     -     - |
 CAS1 |    64     -    91   -19  -132   -58   -20     -     - |
 CEDU |  -257     -   316     -  -153   -31   249     -     - |
 CHAT |   -48     -     -   -40   -50   147  -162     -     - |
 CHUR |    21    45     -     -     -    31  -118     -     - |
 COCO |   -30     -    28   -19  -182     7    29     -     - |
 CRO1 |     -   181   -24     -    40   -66     X     -     - |
 DARW |     -   130     -     -     -    -4   -87     -     - |
 DAV1 |    73     -     -   -84   -20    33     -     -     - |
 DGAR |   -64     -    -2     2    -1    33    10     -     - |
 DRAO |     -    74     -   -84    19     -    87     -     - |
 DWH1 |   319   124     -     -   -42  -280    46     -     - |
 FAIR |   -23   -32   237   -35   -74     -  -105     -     - |
 GLPS |    91     -     -    29    27   -51   -62     -     - |
 GODE |  -112   -49   283     -  -170     -   -92     -     - |
 GOLD |    51     -    61   -64    55     -     -     -     - |
 GUAT |     9     -     -     -     -    -5     -     -     - |
 HARB |    83     -     -   -55     -     -     -     -     - |
 HERS |   -22     5     -     -     -     -    22     -     - |
 HOB2 |   -38   146    39  -125   -23   131  -133     -     - |
 HRAO |   -61     -   123     -   -23    18   -76     -     - |
 HYDE |    36     -     -     -     -   -31    15     -     - |
 IISC |    32     -    29    23  -117     -  -104     -     - |
 INVK |     0     -     -     0     -     -     -     -     - |
 IRKT |     -   -64     -     8     -    20     -     -     - |
 ISPA |   -23     -     -    21   -63    -5     -     -     - |
 JPLM |     -   163     -   -57     -     -   -32     -     - |
 KARR |   -71     -     -     -     -   129  -155     -     - |
 KERG |    -9    53  -235    15   -37    86     -     -     - |
 KIRU |    38     -     -     -     -     -   -44     -     - |
 KOKB |    59   112     -   -93   -20    68  -123     -     - |
 KOSG |   -74     -     -    50     -     -     -     -     - |
 KOUR |   143     -  -388   111   369     -     -     -     - |
 KSTU |     -     -  -176    94    58     -     -     -     - |
 LHAS |     -     -  -149     -     -   119   -82     -     - |
 LPGS |     -   322  -142  -244   -42   169     -     -     - |
 MAC1 |  -126     -   -18  -174   -39   262   -16     -     - |
 MADR |     -     -     -   184     -  -271   180     -     - |
 MAG0 |    79     -     -     -     -     -   -92     -     - |
 MAS1 |     6   104   -61   -40   151    19     -     -     - |
 MATE |   -24     -  -194   107   -39    59   -87     -     - |
 MAW1 |    81     -   -64     -   -82     -   -35     -     - |
 MBAR |   -24     -     -   -53   -47    65     -     -     - |
 MDO1 |     -    16     -  -117     -   119   -28     -     - |
 METS |     8    16     -   -13     -     -     -     -     - |
 MIZU |     -   140  -375   135     -     -     -     -     - |
 MKEA |    46     -    67     -    -7     -  -115     -     - |
 NICO |    65     -     -     -     -     -   -76     -     - |
 NKLG |     -     -     -   -15   124    14     -     -     - |
 NLIB |   -49   -36     -   -71    70   117    -6     -     - |
 NOUM |     -     -     -   256     -  -241     -     -     - |
 NPLD |   -34    72     -     -     -   -10     -     -     - |
 NRC1 |    32    93     -    27     -     -  -158     -     - |
 NRIL |     X     -     -     X   -94    27   -51     -     - |
 NSSP |   -15     -     -     -     -    10    -1     -     - |
 NTUS |  -178     -    25     3   -53    97     -     -     - |
 NYA1 |     -     -     -   -66  -273    62     -     -     - |
 OHI2 |   187     -    30   -76   -24   -51   -20     -     - |
 ONSA |    14     X    56   -72   219    30     -     -     - |
 OPMT |   -69    96     -     1   -41     -     -     -     - |
 PDEL |   -70     -     -   133   131   -81     -     -     - |
 PERT |   202     -  -254     -   367     -     -     -     - |
 PETP |   -17     -     -    41    45     -   -51     -     - |
 PIMO |     -     -     X    66     -   -58   -11     -     - |
 POL2 |     8     -    80     -     -     -   -84     -     - |
 POTS |   -80     -     -    54    39     -     -     -     - |
 PRDS |   -33   103     -     -     -     -   -45     -     - |
 PTBB |    17    37     -     -     -     -   -50     -     - |
 QAQ1 |    20   126     -   -71     -     -     -     -     - |
 RABT |   125     -     -     -     -     -  -145     -     - |
 RAMO |  -248     -     -     -     -   156     -     -     - |
 RESO |     2     -     -    23     -   -23     -     -     - |
 REYK |   -92     -     -    31     -    29     -     -     - |
 RIOG |   -64    48   173  -120     -    85   -64     -     - |
 SANT |  -306     -    24   119  -124     -   127     -     - |
 SCH2 |    12   135     -     -     -   -40   -49     -     - |
 SCUB |    69     -     -   -28   -43     4   -37     -     - |
 SELE |    33     -     -     -     -   -21     -     -     - |
 SEY1 |     -     -     -   -38     -     X    65     -     - |
 SPT0 |   -52     X     -     -     -     -    60     -     - |
 STJO |   118    64     -   -15     -   -63   -45     -     - |
 STR1 |     -   127     -     -     -     -  -102     -     - |
 SUTH |   -91     -     -   -63     -   157   -73     -     - |
 THTI |     -    30   150   -34    62   -56     -     -     - |
 THU3 |    58   -75     -    -4   -73     -     -     -     - |
 TIDB |     9    11   169     -   -59     -  -176     -     - |
 TIXI |   -23     -     -   113   -50   -24  -126     -     - |
 TLSE |     -    36     -     -     -     -   -29     -     - |
 TNML |     -    34     -     -     -     -   -27     -     - |
 TOW2 |   -12     -     -  -146   -70   165   -37     -     - |
 TRO1 |     -     -     -   -29     -    28     -     -     - |
 UNSA |     -     -    -8  -126  -105   126    -6     -     - |
 URUM |  -100     -     -    67     -     -     -     -     - |
 USNO |     9   -12     -     -     -     -     -     -     - |
 USUD |    91    52   169   -59    96   -33  -140     -     - |
 VILL |   162     -  -725   105     -     -   286     -     - |
 WES2 |     -   219     -  -125     -     -    42     -     - |
 WHIT |   117     -     -     -     -   -71    -5     -     - |
 WILL |    16    68     -     -     -     -   -75     -     - |
 WROC |     -    40     -     -     -     -   -32     -     - |
 WSRT |   -42   105     -   -20     -     -     -     -     - |
 WTZR |   -76   175  -128   -23  -541    57     -     -     - |
 YAKT |    88     -     -     -   -58    -1  -101     -     - |
 YAR2 |  -128    94     -    12     -    29     -     -     - |
 YELL |    -5    98   232   -32     -   -41  -155     -     - |
 YKRO |     -     -     -   310     9  -292     -     -     - |
 ZECK |    98     -     -   111     -     -  -389     -     - |
 ZWEN |  -128     -   -52   113     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    49    58    40    28    55    45    39  3099     - |  288   3.05
    3 |    44    56    33    16    18    32    32  3500     - |  288   1.60
    4 |    74    71    31    35    52    40    63  1837     - |  288   0.58
    5 |    15    62    39    13    22    24    36  3399     - |  288   1.57
    6 |    29    58    36    14    21    27    41  2097     - |  288   2.31
    7 |    30    60    27    35    44    37    49  1360     - |  288   0.53
    8 |    39    48    54    36    38    37     X  3808     - |  288   1.85
    9 |     X    57     X    27    83    22    58  6449     - |  276   2.02
   10 |    43    48    42    30    44    34     X  2520     - |  288   1.66
   11 |    69    53    27    17    51    38    22   824     - |  288   0.31
   13 |    55    58    62    33    21    32    47   590     - |  288   0.21
   14 |    58    69    38    17    42    31    42  1148     - |  288   0.17
   15 |    78    67    38    20    61    43    37  3043     - |  288   2.60
   16 |    26    32    38    52    28    44    60   770     - |  288   0.35
   17 |    79     X    33    29    59    50    69  3537     - |  288   0.84
   18 |    61    53    52    20    28    41    52   985     - |  288   0.37
   19 |    44    66    76    37    75     -    60  1965     - |  288   0.33
   20 |    42    58    30    28    33    49    23  1365     - |  288   0.23
   21 |    88    63    48    15    25    40    42  1837     - |  288   0.41
   22 |    38    61    47    26    35    30    38   730     - |  288   0.38
   23 |    43    70    22    18    35     -    29  3763     - |  288   0.70
   24 |    74    65    88    21    75    34    76  5397     - |  288   2.53
   25 |    64    55    46    35    52    23    40  1725     - |  288   2.08
   26 |    45    72    50    18    49    27    32  1628     - |  288   0.54
   27 |    43     X    61    29    44     X     X  1140     - |  280   0.60
   28 |    37    54    26    27    42    47    49  3395     - |  288   0.48
   29 |    53    54    52    24    66    33   106  1415     - |  288   0.71
   30 |    18    63    49    18    25    22    63  4607     - |  288   0.72
   31 |    32    64    32    20    26    33    48  1751     - |  288   0.48
 -----+-------------------------------------------------------+--------------
 ALBH |    51    54     -     -     -     -    27     -     - |  288   0.35
 ALGO |    19     8     X    12     -    20    23     -     - |  288   0.05
 ALIC |    28     -     -     -     -    15    16     -     - |  288   7.98
 ALRT |    11     -     -    14     -    18    52     -     - |  288  10.22
 AMC2 |    17    70     -     -    28    22    38     -     - |  288   0.03
 ARTU |    62     -    55    21    10    24     X     -     - |  284  12.18
 ASC1 |    27     -     -    22    29    28     -     -     - |  287    >>>
 AUCK |    67     -     X     -    93    35    25     -     - |  264  14.44
 BILI |    20     -     -    18    16    15    30     -     - |  287   8.97
 BOGT |    29     -    44    11    26     X     X     -     - |  288  15.53
 BOR1 |    22    24     -     -     -     -    26     -     - |  288   0.47
 BRUS |    23    27     -     -    19     -    41     -     - |  288   0.03
 CAS1 |    23     -    50    24    12    26    60     -     - |  288   7.63
 CEDU |    19     -    35     -    25    12    19     -     - |  288  51.88
 CHAT |    24     -     -    55    33    43    29     -     - |  275  12.64
 CHUR |     9    52     -     -     -    15    33     -     - |  288  26.19
 COCO |    32     -    44    31    18    25    33     -     - |  288   4.14
 CRO1 |     -    28    31     -    12    16     X     -     - |  277  23.62
 DARW |     -    28     -     -     -    14    39     -     - |  264  16.98
 DAV1 |    21     -     -    20    15    17     -     -     - |  288  20.35
 DGAR |    18     -    34    23    13    23    30     -     - |  288  16.71
 DRAO |     -    16     -    13    41     -    22     -     - |  286   0.11
 DWH1 |    16    57     -     -    14    19    18     -     - |  288   0.53
 FAIR |    20    20    27    25    10     -    31     -     - |  288   0.07
 GLPS |    21     -     -    18    10    22    43     -     - |  288   9.80
 GODE |    27    47    26     -    30     -    23     -     - |  288   0.04
 GOLD |    74     -    78    22    25     -     -     -     - |  288  13.92
 GUAT |    22     -     -     -     -    14     -     -     - |  288    >>>
 HARB |    92     -     -    62     -     -     -     -     - |  249  46.33
 HERS |    11    36     -     -     -     -    27     -     - |  264  14.27
 HOB2 |    32    28    24    38    36    29    36     -     - |  288   0.05
 HRAO |    31     -    37     -    19    14    22     -     - |  288   1.13
 HYDE |    20     -     -     -     -    14    40     -     - |  288  16.59
 IISC |    27     -    33    23    19     -    46     -     - |  288  16.76
 INVK |    32     -     -    21     -     -     -     -     - |  288   9.40
 IRKT |     -    32     -    28     -    19     -     -     - |  288   0.46
 ISPA |    39     -     -    21    17    31     -     -     - |  288   9.66
 JPLM |     -    43     -    16     -     -    25     -     - |  288   4.78
 KARR |    25     -     -     -     -    16    13     -     - |  288   8.64
 KERG |    20    25    34    24    19    21     -     -     - |  288   1.38
 KIRU |    76     -     -     -     -     -    89     -     - |  282   8.66
 KOKB |    32    55     -    30    13    27    28     -     - |  288   0.07
 KOSG |    23     -     -    16     -     -     -     -     - |  288 131.66
 KOUR |    35     -    37    30    13     -     -     -     - |  288   2.39
 KSTU |     -     -    29    15    14     -     -     -     - |  285  10.70
 LHAS |     -     -    18     -     -    18    41     -     - |  180  10.26
 LPGS |     -    45    31    24    17    19     -     -     - |  288 172.00
 MAC1 |    42     -    38    37     8    21    56     -     - |  288  12.17
 MADR |     -     -     -    16     -    23    33     -     - |  288  14.50
 MAG0 |    20     -     -     -     -     -    24     -     - |  287   9.05
 MAS1 |    42    16    17    26    24    16     -     -     - |  288   2.40
 MATE |    13     -    35    21    23    23    28     -     - |  288   0.08
 MAW1 |    21     -    48     -    32     -    52     -     - |  288  30.39
 MBAR |    29     -     -    35    11    24     -     -     - |  288  24.19
 MDO1 |     -    31     -    17     -    17    30     -     - |  285 162.22
 METS |    19    24     -    19     -     -     -     -     - |  287  11.99
 MIZU |     -    43    53    27     -     -     -     -     - |  288   0.34
 MKEA |    32     -    42     -    15     -    43     -     - |  288  22.65
 NICO |    15     -     -     -     -     -    18     -     - |  288  13.45
 NKLG |     -     -     -    20    33    19     -     -     - |  287 272.38
 NLIB |    22    27     -    23    15    15    21     -     - |  288   0.04
 NOUM |     -     -     -    43     -    40     -     -     - |  288    >>>
 NPLD |    21    26     -     -     -    14     -     -     - |  287   0.04
 NRC1 |    27    18     -    24     -     -    38     -     - |  288   0.04
 NRIL |     X     -     -     X    24    15    28     -     - |  288   9.48
 NSSP |    25     -     -     -     -    17    21     -     - |  288  40.02
 NTUS |    18     -    42    27    12    24     -     -     - |  288   8.83
 NYA1 |     -     -     -    18    15    17     -     -     - |  288   0.10
 OHI2 |    37     -    68    34    11    20    42     -     - |  288   6.98
 ONSA |    23     X    32    29    20    16     -     -     - |  288   0.04
 OPMT |    27    36     -    23    18     -     -     -     - |  287   0.03
 PDEL |    21     -     -    13     9    13     -     -     - |  288  52.59
 PERT |    33     -    41     -    14     -     -     -     - |  288   1.52
 PETP |    22     -     -    19    15     -    27     -     - |  287  10.60
 PIMO |     -     -     X    40     -    49    93     -     - |  248  16.98
 POL2 |    26     -    31     -     -     -    50     -     - |  288  13.94
 POTS |    24     -     -    16    15     -     -     -     - |  288  23.80
 PRDS |    18    37     -     -     -     -    22     -     - |  288   1.96
 PTBB |    16    83     -     -     -     -    77     -     - |  286   0.19
 QAQ1 |    16    25     -    12     -     -     -     -     - |  288  11.62
 RABT |    30     -     -     -     -     -    35     -     - |  288  10.85
 RAMO |    17     -     -     -     -    11     -     -     - |  288  20.39
 RESO |    18     -     -    11     -    11     -     -     - |  288   7.60
 REYK |    19     -     -    13     -    15     -     -     - |  287   9.33
 RIOG |    41    39    75    30     -    15    33     -     - |  286  10.89
 SANT |    18     -    35    31    16     -    39     -     - |  288   4.64
 SCH2 |    18    23     -     -     -    23    25     -     - |  288  18.11
 SCUB |    25     -     -    38    25    40    39     -     - |  288  15.36
 SELE |    12     -     -     -     -     7     -     -     - |  288  33.70
 SEY1 |     -     -     -    18     -     X    31     -     - |  288  13.40
 SPT0 |    18     X     -     -     -     -    21     -     - |  288   0.03
 STJO |    20    14     -    27     -    19    28     -     - |  288   0.06
 STR1 |     -    18     -     -     -     -    15     -     - |  288   2.11
 SUTH |    28     -     -    22     -    19    23     -     - |  288  10.01
 THTI |     -    22    41    30    26    34     -     -     - |  288   5.96
 THU3 |    12    18     -    11    11     -     -     -     - |  288   9.88
 TIDB |    20    18    25     -    16     -    19     -     - |  288   0.07
 TIXI |    22     -     -    16    15    10    42     -     - |  287  37.68
 TLSE |     -    16     -     -     -     -    13     -     - |  287   0.49
 TNML |     -    59     -     -     -     -    47     -     - |  288   1.43
 TOW2 |    33     -     -    25    26    26    46     -     - |  288  10.99
 TRO1 |     -     -     -    29     -    28     -     -     - |  288   7.10
 UNSA |     -     -    48    22    20    20    26     -     - |  288  20.80
 URUM |    33     -     -    22     -     -     -     -     - |  288  80.21
 USNO |    21    31     -     -     -     -     -     -     - |  282   0.04
 USUD |    33    34    56    47    21    20    32     -     - |  288  11.76
 VILL |    26     -    25    20     -     -    25     -     - |  288   8.10
 WES2 |     -    58     -    33     -     -    31     -     - |  288   0.06
 WHIT |    20     -     -     -     -     8    22     -     - |  288   2.65
 WILL |    66    52     -     -     -     -    92     -     - |  287  47.98
 WROC |     -    44     -     -     -     -    36     -     - |  288  15.31
 WSRT |    24    22     -    20     -     -     -     -     - |  288   0.03
 WTZR |    60    19    23    44    18    14     -     -     - |  276  25.26
 YAKT |    18     -     -     -    24    16    29     -     - |  288   0.51
 YAR2 |    27    17     -    22     -    15     -     -     - |  288 429.17
 YELL |    16    11    26    23     -    14    28     -     - |  288   0.07
 YKRO |     -     -     -    16    23    16     -     -     - |  288  40.36
 ZECK |    26     -     -    18     -     -    35     -     - |  260  31.24
 ZWEN |    41     -    65    53     -     -     -     -     - |  288  16.89
 -----+-------------------------------------------------------+--------------
 TOT  |    37    46    44    27    32    26    41  2786     - |


 BEST CLOCK FIT: OPMT   287   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     0     0   288   10.37   | 2.73e-14  7.09e-15  3.24e-15 |
 NPLD |   287     0     0   286    9.85   | 4.29e-14  1.01e-14  4.09e-15 |
 BRUS |   288     0     0   288    9.84   | 4.09e-14  8.72e-15  2.53e-15 |
 OPMT |   287     0     0   286    9.76   | 3.99e-14  9.09e-15  1.85e-15 |
 AMC2 |   288     0     0   288    9.41   | 3.57e-14  9.62e-15  1.89e-15 |
 SPT0 |   288     0     0   288    7.48   | 3.81e-14  1.16e-14  2.47e-15 |
 ONSA |   288     0     0   288    5.18   | 3.67e-14  1.13e-14  3.11e-15 |
 KOKB |   288     0     0   288    4.25   | 5.81e-14  1.93e-14  5.35e-15 |
 GODE |   288     0     0   288    4.16   | 5.71e-14  1.22e-14  2.67e-15 |
 USNO |   282     0     0   136    4.06   | 4.77e-14  8.65e-15  1.90e-15 |
 WSRT |   288     0     0   288    4.00   | 3.06e-14  9.31e-15  2.56e-15 |
 YELL |   288     0     0   288    3.62   | 3.53e-14  9.71e-15  2.74e-15 |
 NRC1 |   288     0     0   143    2.47   | 3.40e-14  1.30e-14  3.30e-15 |
 WTZR |   276     0     0   143    2.40   | 3.82e-14  1.77e-14  4.48e-15 |
 STJO |   288     0     0   288    2.01   | 3.49e-14  6.38e-15  4.06e-15 |
 HOB2 |   288     0     0   288    1.57   | 3.56e-14  9.09e-15  3.04e-15 |
 WES2 |   288     0     0   288    1.48   | 5.47e-14  2.58e-14  3.35e-15 |
 FAIR |   288     0     0   288    1.43   | 5.73e-14  1.32e-14  5.17e-15 |
 NLIB |   288     0     0   288    1.07   | 4.04e-14  9.87e-15  3.56e-15 |
 MATE |   288     0     0   288    0.96   | 5.04e-14  1.50e-14  6.18e-15 |
 NYA1 |   288     0     0   143    0.94   | 3.17e-14  9.88e-15  7.68e-15 |
 TIDB |   288     0     2   120    0.87   | 1.52e-13  1.47e-14  5.83e-15 |
 DRAO |   286     0     0   285    0.79   | 7.32e-14  2.30e-14  9.04e-15 |
 IRKT |   288     2     0   286    0.48   | 6.30e-14  1.74e-14  2.67e-14 |
 PTBB |   286     0     0   285    0.24   | 3.35e-13  7.26e-14  1.38e-14 |
 ALBH |   288     0     0   288    0.16   | 4.40e-14  2.01e-14  3.64e-14 |
 G07  |   288     0     0   288    0.12   | 2.71e-13  7.12e-14  6.22e-14 |
 G29  |   288     0     0   288    0.11   | 4.14e-13  1.02e-13  6.66e-14 |
 MIZU |   288     0     0   288    0.10   | 3.56e-13  8.87e-14  3.75e-14 |
 TLSE |   287     0     0   286    0.08   | 4.07e-13  1.16e-13  5.10e-14 |
 G31  |   288     0     0   288    0.08   | 2.00e-13  1.32e-13  4.44e-14 |
 BOR1 |   288     0     0   288    0.08   | 4.28e-13  1.62e-13  3.15e-14 |
 G16  |   288     0     3    76    0.07   | 5.27e-13  5.15e-14  4.16e-14 |
 G27  |   280     0     0   275    0.06   | 3.62e-13  1.05e-13  5.22e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.20e-13  1.43e-13  3.53e-14 |
 G30  |   288     0     0   288    0.06   | 3.30e-13  1.12e-13  7.32e-14 |
 G04  |   288     0     0   288    0.05   | 5.24e-13  1.43e-13  3.41e-14 |
 G06  |   288     0     0   288    0.04   | 4.23e-13  1.34e-13  1.62e-13 |
 G26  |   288     0     0   288    0.04   | 3.38e-13  1.16e-13  4.68e-14 |
 YAKT |   288     0     0   288    0.04   | 4.57e-13  1.13e-13  5.42e-14 |
 G17  |   288     0     0   288    0.03   | 3.73e-13  1.39e-13  8.14e-14 |
 STR1 |   288     0     0   288    0.03   | 6.80e-13  1.80e-13  1.66e-13 |
 HRAO |   288     0     0   288    0.02   | 1.19e-13  4.60e-14  1.14e-13 |
 G05  |   288     0     0   288    0.01   | 1.41e-12  3.28e-13  1.66e-13 |
 G10  |   288     0     0   288    0.01   | 1.18e-12  3.36e-13  2.15e-13 |
 G03  |   288     0     0   288    0.01   | 1.30e-12  3.76e-13  1.44e-13 |
 KERG |   288     0     0   288    0.01   | 1.27e-12  3.81e-13  1.19e-13 |
 PRDS |   288     0     0   288    0.01   | 1.47e-12  4.15e-13  1.30e-13 |
 KOUR |   288     0     0   288    0.01   | 1.53e-12  4.25e-13  1.93e-13 |
 G09  |   276     0     0   274    0.01   | 1.32e-12  4.26e-13  1.74e-13 |
 G24  |   288     0     0   288    0.01   | 1.31e-12  3.81e-13  2.17e-13 |
 G15  |   288     0     0   288    0.01   | 1.64e-12  4.44e-13  3.40e-13 |
 PERT |   288     0     0   288    0.00   | 1.70e-12  5.55e-13  1.16e-13 |
 TNML |   288     0     0   143    0.00   | 3.99e-13  1.39e-13  9.36e-14 |
 THTI |   288     0     1   135    0.00   | 3.57e-13  1.62e-13  4.76e-13 |
 GPST |   288     0     0     0    0.00   | 1.82e-14  6.28e-15  1.33e-15 |
 TIXI |   287     1     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 KSTU |   285     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   249     0     0     0    0.00   |        -         -         - |
 DARW |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   275     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 7.33e-13  7.20e-14  4.08e-14 |
 G25  |   288     0     0     0    0.00   | 1.35e-12  3.92e-13  2.49e-13 |
 G23  |   288     0     6     0    0.00   | 5.24e-13  6.21e-14  4.24e-14 |
 G22  |   288     1     6     0    0.00   | 6.86e-13  7.34e-14  3.74e-14 |
 G21  |   288     0     6     0    0.00   | 9.58e-13  1.11e-13  3.76e-14 |
 G20  |   288     0     6     0    0.00   | 5.96e-13  6.87e-14  1.48e-14 |
 G19  |   288     0     6     0    0.00   | 8.55e-13  8.12e-14  2.11e-14 |
 G18  |   288     1     6     0    0.00   | 1.13e-12  1.23e-13  5.10e-14 |
 G14  |   288     0     6     0    0.00   | 6.96e-13  7.11e-14  1.03e-14 |
 G13  |   288     0     6     0    0.00   | 5.19e-13  7.55e-14  2.46e-14 |
 G11  |   288     0     6     0    0.00   | 7.86e-13  7.04e-14  3.76e-14 |
 G08  |   288     0     0     0    0.00   | 1.26e-12  4.65e-13  1.94e-13 |
 G01  |   288     0     0     0    0.00   | 1.51e-12  6.12e-13  3.51e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZECK |   260     0     0     0    0.00   |        -         -         - |
 YKRO |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   287     1     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.94e-13  3.33e-13  2.18e-13 |
 VILL |   288     0     0     0    0.00   | 1.15e-12  1.03e-12  9.35e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 1.81e-12  8.74e-13  4.37e-13 |
 RIOG |   286     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     2     0     0    0.00   |        -         -         - |
 PIMO |   248     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     2     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   285     1     0     0    0.00   | 7.97e-13  1.01e-12  5.24e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.91e-12  6.29e-13  1.86e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   180     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   282     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.41e-13  2.04e-13  4.22e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     1     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   277     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 4.27e-13  1.36e-12  3.93e-13 |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     2     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.87e-17  3.44e-16  2.06e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      STJO      OPMT |
------------------------------------------+------------------------------+
