
 GPS week: 1280   Day: 1   MJD: 53205                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  37250    283    -0.17    -0.04     0.04    18.36
 emr |   288     0  25012    560   159.46    36.85     0.04    14.28
 esa |   288     0  19947   3179   167.85    36.93     0.06     8.97
 gfz |   288     0  31640   1360    -0.11     0.12     0.04    17.50
 igr |   288     0  29923    378    -0.76     3.32     0.04     0.00
 jpl |   288     0  26653    608    -4.69     3.05     0.03    23.47
 mit |   288     0  36605   2544    -0.32    -0.13     0.04    17.42
 ngs |    96     0   2685      0    -0.13     0.13     2.31     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -54  -198   264  -151  -111  -182   479  1022     - |
    3 |   -52  -204  -295   -63  -260   -17   459  -672     - |
    4 |    75  -255    20    35   -77  -121   248 -2910     - |
    5 |  -108  -124   -20   -89   -81  -127   486 -5262     - |
    6 |   -38   -73  -257   -23   -86  -107   394   619     - |
    7 |   -53  -296  -180    94  -119   -93   416 -2969     - |
    8 |    65  -133   -28    39   149    15     X -3177     - |
    9 |     X  -215  -211   -46   -21   -42   359   356     - |
   10 |   -39  -242   -28  -124  -101   -58   457 -1443     - |
   11 |   112    -8    30    51   -13    30  -218  2466     - |
   13 |   182   -94   214    58    67    -3  -279  2932     - |
   14 |    70    77   -35   110    10   -43  -173  3755     - |
   15 |   -48   -67  -222   -40  -142  -184   504 -3768     - |
   16 |    -1  -127    35   -27   -45    23    84  3331     - |
   17 |     2  -138  -287    30   -17  -139   414   802     - |
   18 |    52    38   -37    98    67   -31  -124  3542     - |
   19 |   196  -174   119   -52   -82     2   -75  4000     - |
   20 |    55  -148   207    49   -81   -23   -61  5217     - |
   21 |    38    30    74    26    94   -88   -16 -1967     - |
   22 |     4   -22  -190   254    21     2  -147 -1939     - |
   24 |    31  -247  -238    29   -66   -75   365  2412     - |
   25 |  -119  -259    40  -147  -205     -   450 -1157     - |
   26 |   -41  -206   -55   -89    22   -26   366 -2103     - |
   27 |   -15     X   -69    52    66     X     X -3243     - |
   28 |    70    38  -132   189   218     5  -234  6086     - |
   29 |   -41  -183  -188     3     1   -91   410   -52     - |
   30 |  -165  -125   135   -92   -50   -99   433 -2321     - |
   31 |   -22  -216   -25    13   -95   -96   330 -3599     - |
 -----+-------------------------------------------------------+
 ALBH |     -  -335     -     -     -     -   275     -     - |
 ALGO |   -79    38     X   -83  -184    77    31     -     - |
 ALIC |  -178     -     -     -     -   171   -42     -     - |
 ALRT |   -13     -     -    59     -    53  -116     -     - |
 AMC2 |   -68    74     -     -   109    82  -100     -     - |
 ARTU |    80     -   468    44    58   -65  -275     -     - |
 ASC1 |   -58     -     -  -192  -111   228     -     -     - |
 AUCK |   -70     -     X     -     -    44    16     -     - |
 BAHR |    51    94     -   -89     -     -   -42     -     - |
 BAN2 |     -  -544     -     X     -     -   446     -     - |
 BILI |    77     -     -    97     -   -60   -99     -     - |
 BJFS |     -     -     -    81     -     -   -81     -     - |
 BOGT |   105     -   160    -4    67   -28  -151     -     - |
 BOR1 |    20    85     -     -    32     -   -91     -     - |
 BREW |     -   100     -     -    49     -   -82     -     - |
 BRMU |  -279     -     -   293     -     -     -     -     - |
 BRUS |    49    70     -     -   102     -  -109     -     - |
 CAS1 |    22     -    97  -110   -24   -30    77     -     - |
 CEDU |   -94     -   -44     -   -27    57    45     -     - |
 CHAT |     4     -     -   -43     -     -    39     -     - |
 COCO |   -83     -   708  -174   -65   -50   -32     -     - |
 CRO1 |   110  -159     X     -    48    11     X     -     - |
 DAEJ |   -95   192     -     -     -     -   -58     -     - |
 DARW |    30   -25     -     -    23    54   -84     -     - |
 DAV1 |    53     -     -   -45   -70   -66    80     -     - |
 DGAR |   -57     -     1    -2    -6    40     7     -     - |
 DRAO |   -52    42     -  -105    56     -   145     -     - |
 DWH1 |   278   170     -     -     -  -294   -35     -     - |
 FAIR |    59   -39     X    -9    41     -   -19     -     - |
 FORT |     -   356     -     X     -    78  -397     -     - |
 GLPS |    26     -   180    76    43   -47  -132     -     - |
 GODE |    83    74  -477     -     7     -    98     -     - |
 GOLD |    16     -    80   -57   -10     -     -     -     - |
 GUAT |   -38     -     -     -  -181    30     -     -     - |
 HERS |     -    36     -     -    83     -   -29     -     - |
 HLFX |     -   246     -     -     -  -149     -     -     - |
 HOB2 |    -3   190     -  -104    -3     -   -47     -     - |
 HRAO |     -     -     X     -   -29    46   -63     -     - |
 HYDE |    10     -     -     -     -    -8     -     -     - |
 IISC |  -143     -   116    91    87     -     -     -     - |
 INVK |    28     -     -   -29     -     -     -     -     - |
 IRKT |     -    63     -   -63    97    70   -82     -     - |
 ISPA |    18     -     -   -33   -28    10     -     -     - |
 JAB1 |    57     -  -258     -     -     -    73     -     - |
 JPLM |     -   169     -    -4   117     -  -135     -     - |
 KARR |   -88     -     -     -   -86   105   -49     -     - |
 KELY |    17     -     -     -     -   -14     -     -     - |
 KERG |  -120  -122   236   143   -50   -30     1     -     - |
 KGN0 |    46   -59     -     -     -     -     -     -     - |
 KIRU |   -22     -    46     -     -     -     -     -     - |
 KIT3 |     -     -   -77     -     -    30     -     -     - |
 KOKB |   105    11     -   -90     0    59  -109     -     - |
 KOSG |   -86     -     -    90    33     -     -     -     - |
 KOUR |    12     -     X   -18  -396     -     5     -     - |
 KSTU |     -     -   -83    42   -45     -     X     -     - |
 LHAS |     -     -  -117    91   134    99  -164     -     - |
 LPGS |     -    77   -51     X   -10   -10   -24     -     - |
 MAC1 |  -138     -   -83  -177  -109   258    19     -     - |
 MADR |     -     -     -   159   158  -119     -     -     - |
 MALI |     -     -     -  -133     -     -   133     -     - |
 MANZ |   204     -     -     -     -     -  -215     -     - |
 MAS1 |   -30     9     X   -61   -18    41    31     -     - |
 MATE |   -54     -   378    93   -37     -  -231     -     - |
 MAW1 |    74     -  -120     -  -205     -   -16     -     - |
 MBAR |   -42     -     -   -75     -    89     -     -     - |
 MCM4 |     -     -  -375     X     -   538  -541     -     - |
 MDO1 |     -   -52     -   -17   -31    45     -     -     - |
 MDVJ |   281     -     -     -     -  -392   232     -     - |
 MEDI |    31    84     -     -    37    10  -115     -     - |
 METS |     -   564     -  -460     -     -     X     -     - |
 MIZU |     -     4     X    56    54     -   -53     -     - |
 MKEA |   102     -   -25     -   -34     -   -95     -     - |
 NKLG |     -     -     -   -10     -    74   -89     -     - |
 NLIB |    14    23     -   -75    52    93   -84     -     - |
 NNOR |     -   -97    -1     -     -     -    79     -     - |
 NOUM |     -     -     -   193     -  -144     -     -     - |
 NPLD |     0    58     -     -    30   -35     -     -     - |
 NRC1 |    89   141     -    73   213     -  -282     -     - |
 NRIL |    16     -     -   -32     -   125  -153     -     - |
 NSSP |    69     -     -     -     -   -54     -     -     - |
 NTUS |  -247     -     -    20     7   202   -32     -     - |
 NYA1 |   113     -     -   -54   -72   -48     X     -     - |
 NYAL |     -    27     -     -    -3     -   -22     -     - |
 OHI2 |    21     -   126   -39     -   -36     X     -     - |
 ONSA |    46    30     -   -92  -207    25   -15     -     - |
 OPMT |  -128   119     -    37    -2     -     -     -     - |
 PDEL |   -94     -     -   -50     -   111     -     -     - |
 PERT |  -137    57     X     -   116     -    98     -     - |
 PETP |    57     -     -   -59     -     -     -     -     - |
 PIE1 |     -     -  -183     -  -161     -    94     -     - |
 PIMO |     -     -     X   -19    79    14     -     -     - |
 POL2 |    50     -    18     -    -8     -   -62     -     - |
 POTS |   -51     -     -    53    42     -     -     -     - |
 PRDS |    -7    38     -     -     -     -   -25     -     - |
 PTBB |    -7   147     -     -   111     -  -113     -     - |
 QAQ1 |     1   197     -    26    42     -  -188     -     - |
 RESO |     5     -     -  -134     -    96     -     -     - |
 REUN |    66     -     -   -69     -     -     -     -     - |
 REYK |   -59     -     -    78     -   -12     -     -     - |
 SCH2 |   -10   108     -     -   298   108  -224     -     - |
 SCUB |   138     -     -    17     -     -  -162     -     - |
 SEY1 |   -48     -     -   -60     -     X   111     -     - |
 SFER |    43   -55     -     -   -30     -     X     -     - |
 SPT0 |   -22     X     -     -     -     -    24     -     - |
 STJO |    85    -6     -   -62     -    22   -52     -     - |
 STR1 |     -     2     -     -   -31     -    -2     -     - |
 SUTH |    18     -     -   -49    98     -    31     -     - |
 SUTM |     -   108     -     X     -    28  -126     -     - |
 SYOG |    61     -     -   -55     -     -    -9     -     - |
 THU3 |    28   -47     -     9  -118     -     -     -     - |
 TIDB |   -45    -3   311     -   -53     -  -111     -     - |
 TIXI |    74     -     -    13     -     0   -90     -     - |
 TLSE |     -   106     -     -   113     -   -87     -     - |
 TOW2 |   -29     -     -  -124   -74    78    50     -     - |
 TRO1 |    11     -     -    79   107    68  -175     -     - |
 TSKB |   -93     -     -    58     -   110  -109     -     - |
 UNSA |     -     -   161     -   311     -   -83     -     - |
 URUM |   -34     -     -    36     1     -     -     -     - |
 USNO |    48    -7     -     -    62     -   -44     -     - |
 USUD |   -26     2   160   104    56   -27  -125     -     - |
 VILL |   109     -  -645    72   138     -   144     -     - |
 WES2 |     -    88     -   -14    94     -   -59     -     - |
 WHIT |    72     -     -     -     -    24  -109     -     - |
 WILL |   -51    66     -     -    78     -     -     -     - |
 WROC |     -   101     -     -     -     -   -83     -     - |
 WSRT |   -24   107     -   -66     -     -     3     -     - |
 WTZR |  -180    67   661   -25   -44    14  -200     -     - |
 WUHN |    32    45     -    99     -     -  -171     -     - |
 YAKT |    43     -     -     -     -   -15   -25     -     - |
 YAR2 |   -36   115     -    62   120   -88     -     -     - |
 YEBE |     -    63     -     -   285     -   -52     -     - |
 YELL |    36    74     X   -21     -     -   -77     -     - |
 YKRO |  -251     -     -   263     X     -     X     -     - |
 YSSK |     5     -     -   102     -     -  -108     -     - |
 ZWEN |   -75     -    16   269   217     -  -200     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    52    56    42    18    37    32    30  4092     - |  288   3.76
    3 |    31    42    28    20    33    22    28  3407     - |  288   2.56
    4 |    57    49    42    23    31    38    35  1175     - |  288   0.95
    5 |    31    48    39    12    37    25    23  3989     - |  288   1.95
    6 |    41    44    25    32    23    26    31   938     - |  288   1.95
    7 |    20    31    53    22    16    32    42   717     - |  288   0.77
    8 |    78    45    50   137    78    32     X  1526     - |  288   1.55
    9 |     X    93   137    66    97    32    75  4711     - |  282   4.12
   10 |    49    42    80    19    36    32    21  2641     - |  288   2.29
   11 |    44    38    55    14    29    34    31  1334     - |  288   0.33
   13 |    60    31    32    26    32    38    77  2429     - |  288   0.22
   14 |    30    60    55    30    31    37    33   539     - |  288   0.27
   15 |    65    40    33    34    36    26    34  3133     - |  288   2.53
   16 |    29    47    70    27    39    42    30   399     - |  288   0.29
   17 |    58    52    43    26    53    36    32  2985     - |  288   1.27
   18 |    67    44    40    52    24    44    31   698     - |  288   0.36
   19 |    30    60   102    20    41    25    31   505     - |  288   0.28
   20 |    57    51    55    19    44    47    23  1013     - |  288   0.23
   21 |    62    51    32    16    29    30    33  1286     - |  288   0.36
   22 |    39    54    28    26    37    27    34  1722     - |  288   0.58
   24 |    67    27    35    28    26    26    39  4132     - |  288   1.82
   25 |    77    57    56    40    46     -    63  2218     - |  288   2.17
   26 |    42    28    53    41    31    40    18   668     - |  288   0.82
   27 |    40     X    45    42    88     X     X   932     - |  286   1.22
   28 |    24    33    54    31    32    31    59  1486     - |  288   0.37
   29 |    39    28    54    51    22    31    33   730     - |  288   0.62
   30 |    36    51    39    17    36    24    29  1070     - |  288   0.74
   31 |    18    40    38    16    16    29    39  3581     - |  288   1.27
 -----+-------------------------------------------------------+--------------
 ALBH |     -    16     -     -     -     -    13     -     - |   73   0.05
 ALGO |    23    12     X    39    19    20    29     -     - |  288   0.03
 ALIC |    24     -     -     -     -    17     9     -     - |  288   8.04
 ALRT |     9     -     -    12     -    24    45     -     - |  288   6.39
 AMC2 |    16    50     -     -    11    27    74     -     - |  288   0.03
 ARTU |    51     -    74    41    23    43    26     -     - |  280  13.38
 ASC1 |    55     -     -    66    37    27     -     -     - |  287    >>>
 AUCK |    56     -     X     -     -    17    42     -     - |  264  12.97
 BAHR |    21    26     -    33     -     -    18     -     - |  288   1.15
 BAN2 |     -    97     -     X     -     -    79     -     - |  167  20.39
 BILI |    17     -     -    35     -    17    31     -     - |  287   9.62
 BJFS |     -     -     -    16     -     -    16     -     - |  287  10.66
 BOGT |    86     -    91   131    44    90    60     -     - |  288  14.94
 BOR1 |    14    24     -     -    15     -    17     -     - |  288   0.75
 BREW |     -    33     -     -    32     -    27     -     - |  288   0.05
 BRMU |    21     -     -    22     -     -     -     -     - |  288    >>>
 BRUS |    13    21     -     -    16     -    15     -     - |  288   0.03
 CAS1 |    28     -    41    16    39    16    51     -     - |  288   6.90
 CEDU |    15     -    41     -    19    14    15     -     - |  288  11.05
 CHAT |    25     -     -    29     -     -    20     -     - |  287  13.31
 COCO |    16     -    31    41    19    24    24     -     - |  288   8.00
 CRO1 |    32    47     X     -    69    21     X     -     - |  275  17.60
 DAEJ |    13    66     -     -     -     -    55     -     - |  287   1.59
 DARW |    16    24     -     -    27    18    19     -     - |  288  11.97
 DAV1 |    29     -     -    28    39    20    48     -     - |  288  17.73
 DGAR |    17     -    41    20    15    20    25     -     - |  288  19.03
 DRAO |    27    45     -    63    56     -    29     -     - |  288    >>>
 DWH1 |    19    49     -     -     -    27    26     -     - |  288   0.50
 FAIR |   122    28     X    43    40     -    75     -     - |  288   0.11
 FORT |     -    27     -     X     -    18    15     -     - |  288   0.05
 GLPS |    26     -    31    19    27    29    15     -     - |  288  11.66
 GODE |    33    18    41     -    31     -    25     -     - |  288   0.08
 GOLD |    45     -   176    54    86     -     -     -     - |  278  11.43
 GUAT |    26     -     -     -    21    20     -     -     - |  285    >>>
 HERS |     -    20     -     -    25     -    16     -     - |  239  18.95
 HLFX |     -    35     -     -     -    22     -     -     - |  288  18.24
 HOB2 |    20    23     -    13    32     -    30     -     - |  288   0.07
 HRAO |     -     -     X     -    25    10    13     -     - |  288   0.62
 HYDE |    15     -     -     -     -    12     -     -     - |  288  19.29
 IISC |    23     -    37    25    10     -     -     -     - |  288  18.05
 INVK |    19     -     -    19     -     -     -     -     - |  288   8.92
 IRKT |     -    18     -    24    27    18    22     -     - |  288   0.15
 ISPA |    20     -     -    24    10    30     -     -     - |  288  12.70
 JAB1 |    12     -    20     -     -     -    14     -     - |  288  14.42
 JPLM |     -    24     -    22    14     -    29     -     - |  288   2.12
 KARR |    25     -     -     -    34    24    14     -     - |  288   9.98
 KELY |    27     -     -     -     -    21     -     -     - |  256   8.57
 KERG |    23    14    61    41    20    21    29     -     - |  288   2.23
 KGN0 |    18    23     -     -     -     -     -     -     - |  287   0.29
 KIRU |    18     -    37     -     -     -     -     -     - |  269 271.19
 KIT3 |     -     -    69     -     -    26     -     -     - |  288  25.68
 KOKB |    27    37     -    41    21    21    28     -     - |  288   0.05
 KOSG |    18     -     -    18    17     -     -     -     - |  288  13.87
 KOUR |    35     -     X    32    33     -    29     -     - |  282   1.53
 KSTU |     -     -    75    38    38     -     X     -     - |  213   9.30
 LHAS |     -     -    23    23    14    14    23     -     - |  288  11.51
 LPGS |     -    40   105     X    23    18    38     -     - |  288 211.89
 MAC1 |    50     -    41    25    31    21    43     -     - |  288  17.56
 MADR |     -     -     -    36    26    27     -     -     - |  288  13.47
 MALI |     -     -     -    23     -     -    24     -     - |  180  12.37
 MANZ |    20     -     -     -     -     -    21     -     - |  287  10.63
 MAS1 |    49    18     X    32    18    29    21     -     - |  288   2.37
 MATE |    21     -    36    29    16     -    16     -     - |  288   0.06
 MAW1 |    19     -    39     -    38     -    33     -     - |  288  27.77
 MBAR |    22     -     -    21     -    16     -     -     - |  288  25.85
 MCM4 |     -     -    82     X     -    29    64     -     - |  243   7.55
 MDO1 |     -    21     -    40    25    34     -     -     - |  288  18.33
 MDVJ |    17     -     -     -     -    21    18     -     - |  288   0.06
 MEDI |    20    18     -     -    16    33    31     -     - |  288   0.09
 METS |     -    29     -    24     -     -     X     -     - |  280  12.85
 MIZU |     -    34     X    43   114     -    28     -     - |  288   0.35
 MKEA |    30     -    80     -    23     -    44     -     - |  288  26.09
 NKLG |     -     -     -    13     -    12    18     -     - |  221 380.09
 NLIB |    28    23     -    33    16    25    22     -     - |  288   0.03
 NNOR |     -    19    46     -     -     -    23     -     - |  288  12.96
 NOUM |     -     -     -    27     -    20     -     -     - |  288    >>>
 NPLD |    22    17     -     -    33    24     -     -     - |  287   0.06
 NRC1 |    12    15     -    13    24     -    13     -     - |  288   0.02
 NRIL |    13     -     -    32     -    21    13     -     - |  288   9.49
 NSSP |    16     -     -     -     -    13     -     -     - |  288  17.70
 NTUS |    31     -     -    45    21    21    41     -     - |  288   8.90
 NYA1 |    27     -     -    44    33    44     X     -     - |  287  24.66
 NYAL |     -    27     -     -    28     -    22     -     - |  288 116.25
 OHI2 |    29     -    68    49     -    23     X     -     - |  287   6.95
 ONSA |    36   112     -    35    50    20    49     -     - |  288   0.04
 OPMT |    19    41     -    26    20     -     -     -     - |  287   0.04
 PDEL |    38     -     -    52     -    24     -     -     - |  288  57.61
 PERT |    17    20     X     -    22     -    13     -     - |  288   2.33
 PETP |    28     -     -    29     -     -     -     -     - |  287  10.13
 PIE1 |     -     -    80     -    65     -    41     -     - |  204   0.08
 PIMO |     -     -     X    47   103    35     -     -     - |  228  17.56
 POL2 |    13     -    25     -    21     -    16     -     - |  288  14.10
 POTS |    27     -     -    29    23     -     -     -     - |  288  26.72
 PRDS |    17    43     -     -     -     -    45     -     - |  288   1.31
 PTBB |    14    32     -     -    30     -    21     -     - |  288   0.47
 QAQ1 |    20    40     -    27    19     -    20     -     - |  288  11.09
 RESO |    21     -     -    22     -    14     -     -     - |  288   7.57
 REUN |    14     -     -    15     -     -     -     -     - |  288  18.31
 REYK |   113     -     -    42     -    61     -     -     - |  287   6.26
 SCH2 |    13    21     -     -    19    26    26     -     - |  288  52.33
 SCUB |    33     -     -    27     -     -    25     -     - |  287  12.92
 SEY1 |    21     -     -    29     -     X    24     -     - |  288  14.53
 SFER |    39    50     -     -    17     -     X     -     - |  250 746.89
 SPT0 |    44     X     -     -     -     -    46     -     - |  288   0.02
 STJO |    26    23     -    41     -    23    32     -     - |  288   0.08
 STR1 |     -    16     -     -    27     -    13     -     - |  288   0.54
 SUTH |    15     -     -    15    17     -    22     -     - |  288  12.02
 SUTM |     -    33     -     X     -    70    78     -     - |  263  10.14
 SYOG |    24     -     -    38     -     -    31     -     - |  288   0.77
 THU3 |    16    17     -    14    21     -     -     -     - |  288   7.96
 TIDB |    18    15    42     -    37     -    15     -     - |  288   0.09
 TIXI |    12     -     -    19     -    15    28     -     - |  287   8.64
 TLSE |     -    19     -     -    57     -    16     -     - |  287   0.54
 TOW2 |    19     -     -    21    15    21    15     -     - |  288  11.27
 TRO1 |    17     -     -    29    29    24    29     -     - |  288   8.03
 TSKB |    30     -     -    27     -    16    17     -     - |  288   1.94
 UNSA |     -     -    17     -    44     -     9     -     - |  155  17.42
 URUM |    16     -     -    17    28     -     -     -     - |  288  18.75
 USNO |    17    18     -     -    20     -    13     -     - |  288   0.03
 USUD |    14    20    40    30    19    16    28     -     - |  288  11.13
 VILL |    19     -    37    37    17     -    19     -     - |  288   7.51
 WES2 |     -    18     -    36    19     -    29     -     - |  288   0.10
 WHIT |    21     -     -     -     -    11    18     -     - |  288   2.34
 WILL |    26    34     -     -    42     -     -     -     - |  288  50.40
 WROC |     -    42     -     -     -     -    34     -     - |  275  14.47
 WSRT |    20    22     -    27     -     -    20     -     - |  288   0.02
 WTZR |    24    16    39    24    15    23    18     -     - |  288   0.05
 WUHN |    17    30     -    25     -     -    27     -     - |  287  17.10
 YAKT |    12     -     -     -     -    15    28     -     - |  288   0.75
 YAR2 |    15    14     -    27    20    14     -     -     - |  288   7.29
 YEBE |     -   170     -     -    16     -   139     -     - |  225 458.51
 YELL |    17    22     X    25     -     -    36     -     - |  288   0.06
 YKRO |    21     -     -    22     X     -     X     -     - |  282  33.91
 YSSK |    23     -     -    30     -     -    19     -     - |  287  10.07
 ZWEN |    25     -    60    36    17     -    29     -     - |  288  14.49
 -----+-------------------------------------------------------+--------------
 TOT  |    35    42    58    36    36    29    35  2314     - |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NRC1 |   288     0     0   288    9.95   | 2.98e-14  8.47e-15  1.35e-15 |
 ALGO |   288     0     0   288    9.14   | 3.70e-14  1.31e-14  2.41e-15 |
 USNO |   288     0     0   288    7.67   | 4.20e-14  7.48e-15  2.32e-15 |
 AMC2 |   288     0     0   288    7.18   | 4.15e-14  9.48e-15  2.00e-15 |
 ONSA |   288     0     0   288    7.06   | 4.10e-14  1.30e-14  4.02e-15 |
 NPLD |   287     0     0   286    6.88   | 3.74e-14  9.00e-15  5.46e-15 |
 OPMT |   287     0     0   286    6.59   | 4.99e-14  1.20e-14  4.52e-15 |
 BREW |   288     0     0   288    5.48   | 5.84e-14  2.10e-14  2.39e-15 |
 BRUS |   288     0     0   288    5.10   | 3.79e-14  8.30e-15  2.14e-15 |
 HOB2 |   288     0     0   288    3.58   | 3.85e-14  1.18e-14  7.42e-15 |
 NYAL |   288     1     0   287    2.80   | 3.84e-14  1.03e-14  4.81e-15 |
 GODE |   288     0     0   288    2.71   | 5.01e-14  1.08e-14  5.86e-15 |
 WTZR |   288     0     0   288    2.70   | 4.06e-14  2.49e-14  4.32e-15 |
 YELL |   288     0     0   288    2.47   | 3.12e-14  9.37e-15  3.56e-15 |
 SPT0 |   288     0     0   143    2.47   | 4.14e-14  1.23e-14  1.55e-15 |
 KOKB |   288     0     0   288    2.39   | 4.81e-14  1.35e-14  3.72e-15 |
 MDVJ |   288     0     0   288    2.28   | 5.56e-14  9.60e-15  6.07e-15 |
 NLIB |   288     0     0   288    1.74   | 3.84e-14  1.32e-14  2.67e-15 |
 MEDI |   288     0     0   288    1.69   | 4.22e-14  9.68e-15  7.36e-15 |
 WSRT |   288     0     0   288    1.28   | 3.30e-14  1.10e-14  2.40e-15 |
 MATE |   288     0     0   288    1.26   | 4.17e-14  1.17e-14  4.78e-15 |
 DRAO |   288     1     0   287    0.96   | 7.27e-14  1.64e-14  5.52e-15 |
 FAIR |   288     0     0   288    0.94   | 5.45e-14  1.07e-14  9.34e-15 |
 NYA1 |   287     0     0   286    0.94   | 2.84e-14  9.62e-15  3.96e-15 |
 STJO |   288     1     0   287    0.89   | 4.36e-14  1.46e-14  5.30e-15 |
 WES2 |   288     0     0   288    0.78   | 4.43e-14  1.50e-14  9.69e-15 |
 FORT |   288     0     0   143    0.66   | 5.79e-14  1.73e-14  3.90e-15 |
 TIDB |   288     0     2    94    0.55   | 1.69e-13  1.62e-14  7.64e-15 |
 IRKT |   288     0     0   288    0.36   | 5.95e-14  1.42e-14  1.24e-14 |
 PTBB |   288     0     0   288    0.17   | 3.62e-13  9.78e-14  2.87e-14 |
 YEBE |   225     0     1   141    0.16   | 2.14e-13  5.15e-14         - |
 PIE1 |   204     1     0    56    0.15   | 6.26e-14  1.55e-14         - |
 G07  |   288     0     0   288    0.09   | 2.95e-13  7.42e-14  6.37e-14 |
 KGN0 |   287     0     0   286    0.09   | 3.67e-13  1.09e-13  2.29e-14 |
 MIZU |   288     0     0   288    0.09   | 3.97e-13  1.08e-13  2.29e-14 |
 TLSE |   287     0     0   286    0.07   | 4.09e-13  1.17e-13  3.68e-14 |
 YAKT |   288     0     0   288    0.05   | 4.30e-13  1.16e-13  6.91e-14 |
 G30  |   288     0     0   288    0.05   | 3.25e-13  9.71e-14  4.92e-14 |
 G16  |   288     0     2    65    0.05   | 4.25e-13  5.19e-14  2.76e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.44e-13  1.43e-13  7.96e-14 |
 G06  |   288     0     0   288    0.05   | 5.02e-13  1.39e-13  1.57e-13 |
 G27  |   286     0     0   285    0.05   | 3.47e-13  1.18e-13  6.71e-14 |
 G29  |   288     0     0   288    0.04   | 4.17e-13  1.13e-13  5.35e-14 |
 G04  |   288     0     0   288    0.04   | 5.03e-13  1.34e-13  8.85e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.11e-13  1.48e-13  5.77e-14 |
 ALBH |    73     0     0    66    0.04   | 6.21e-14  1.59e-14         - |
 SFER |   250     0     0   140    0.04   | 4.23e-13  1.01e-13         - |
 G26  |   288     0     0   288    0.04   | 3.18e-13  1.07e-13  1.10e-13 |
 G17  |   288     0     0   288    0.02   | 3.85e-13  1.21e-13  1.63e-13 |
 BAHR |   288     0     0   288    0.02   | 3.09e-13  1.12e-13  1.00e-13 |
 STR1 |   288     0     0   288    0.02   | 6.23e-13  1.54e-13  5.10e-14 |
 G31  |   288     0     0   288    0.01   | 2.18e-13  1.31e-13  1.62e-13 |
 TSKB |   288     0     0   288    0.01   | 9.58e-13  3.00e-13  1.46e-13 |
 HRAO |   288     0     0   288    0.01   | 1.12e-13  2.90e-14  5.24e-14 |
 G24  |   288     0     0   288    0.01   | 1.32e-12  3.42e-13  1.64e-13 |
 KERG |   288     0     0   288    0.01   | 1.21e-12  3.59e-13  1.48e-13 |
 SYOG |   288     0     0   143    0.01   | 7.64e-13  1.90e-13  5.64e-14 |
 G08  |   288     0     0   288    0.01   | 1.32e-12  4.49e-13  1.83e-13 |
 KOUR |   282     0     0   281    0.01   | 1.45e-12  4.41e-13  1.50e-13 |
 PRDS |   288     0     0   288    0.01   | 1.64e-12  4.06e-13  1.14e-13 |
 G25  |   288     0     0   288    0.01   | 1.53e-12  4.69e-13  1.49e-13 |
 G05  |   288     0     0   288    0.00   | 1.29e-12  3.92e-13  1.78e-13 |
 G10  |   288     0     0   288    0.00   | 1.25e-12  4.02e-13  2.97e-13 |
 PERT |   288     0     0   288    0.00   | 1.94e-12  4.95e-13  1.82e-13 |
 DAEJ |   287     0     0   140    0.00   | 1.71e-12  4.94e-13  1.44e-13 |
 GPST |   288     0     0     0    0.00   | 1.58e-14  3.76e-15  5.86e-16 |
 UNSA |   155     0     0     0    0.00   |        -         -         - |
 MALI |   180     0     0     0    0.00   |        -         -         - |
 PIMO |   228     0     0     0    0.00   |        -         -         - |
 BAN2 |   167     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   221     0     0     0    0.00   |        -         -         - |
 METS |   280     0     0     0    0.00   |        -         -         - |
 MANZ |   287     0     0     0    0.00   |        -         -         - |
 HERS |   239     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.07e-13  7.52e-14  4.32e-14 |
 G22  |   288     3     6     0    0.00   | 1.41e-12  2.91e-13  1.13e-13 |
 G21  |   288     1     6     0    0.00   | 8.76e-13  1.39e-13  2.87e-14 |
 G20  |   288     0     6     0    0.00   | 5.79e-13  6.66e-14  2.34e-14 |
 G19  |   288     0     6     0    0.00   | 6.24e-13  6.62e-14  2.76e-14 |
 G18  |   288     2     6     0    0.00   | 1.49e-12  1.60e-13  3.93e-14 |
 G15  |   288     0     0     0    0.00   | 1.53e-12  5.55e-13  2.25e-13 |
 G14  |   288     0     6     0    0.00   | 5.58e-13  5.90e-14  1.83e-14 |
 G13  |   288     0     6     0    0.00   | 5.76e-13  7.97e-14  2.40e-14 |
 G11  |   288     0     6     0    0.00   | 6.88e-13  7.10e-14  3.98e-14 |
 G09  |   282     0     0     0    0.00   | 1.27e-12  5.43e-13  3.09e-13 |
 G03  |   288     0     0     0    0.00   | 1.26e-12  4.60e-13  2.46e-13 |
 G01  |   288     0     0     0    0.00   | 1.48e-12  5.85e-13  4.38e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   282     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     1     0    0.00   | 1.11e-12  1.21e-12  5.27e-13 |
 WROC |   275     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.73e-13  3.14e-13  2.07e-13 |
 VILL |   288     0     1     0    0.00   | 1.06e-12  1.29e-12  5.47e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   263     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 5.87e-13  8.65e-13  3.49e-12 |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   287     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     2     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   243     0     0     0    0.00   | 6.07e-13  3.63e-13         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.91e-12  4.48e-13  1.92e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   213     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.60e-13  5.40e-13  1.49e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   269     0     0     0    0.00   |        -         -         - |
 KELY |   256     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.73e-13  1.64e-13  1.63e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     2     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     1     0    0.00   | 3.52e-13  4.91e-13  1.28e-12 |
 GUAT |   285     0     0     0    0.00   |        -         -         - |
 GOLD |   278     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   275     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.67e-13  1.11e-12  9.38e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   280     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.85e-17  4.62e-16  2.77e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      USNO      NRC1 |
------------------------------------------+------------------------------+
