
 GPS week: 1280   Day: 2   MJD: 53206                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  35371    279    -0.30    -0.08     0.04    17.93
 emr |   288     0  26026    377   195.27    33.51     0.05    13.25
 esa |   288     0  20225   4120   195.05    33.35     0.06    10.20
 gfz |   288     0  32054   1234     0.22    -0.67     0.04    19.99
 igr |   288     0  29952    121     1.62    -1.04     0.04     0.00
 jpl |   288     0  27791    596    -2.45    -1.09     0.03    20.93
 mit |   288     0  37388   1617     0.48    -1.74     0.04    17.69
 ngs |    96     0   2686      0     0.16    -0.46     3.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |    17  -180   -33  -129  -130  -207   527 -5665     - |
    3 |   -68  -197   -76   -59  -111   -51   386 -7290     - |
    4 |   119  -194   -37   -56   -46  -102   230 -7096     - |
    5 |  -173   -72    13   -46  -136  -142   441  6101     - |
    6 |   -55  -226  -173    69   -79  -119   388  1611     - |
    7 |   -54  -274  -247     9  -143   -72   479 -5283     - |
    8 |   -51  -321     X    -9   -74    -7   335 -7028     - |
    9 |   -92  -218   -70   -20   -53   -73   381 -8915     - |
   10 |   -77  -276    16   -98   -96  -112   519 -1161     - |
   11 |   144   -13   229   107    -8   -53  -326  1065     - |
   13 |   201   -31    27    43    35   -25  -216  4180     - |
   14 |    60    42    64   121    86   -37  -222  -516     - |
   15 |   -50  -139  -139   -60  -101  -164   497  2853     - |
   16 |    42  -162   -84    42    57   -21   104  2509     - |
   17 |    -8  -121  -130   -51   -61  -161   420 -2490     - |
   18 |    39   -45   -45    98   112     9  -101  3103     - |
   19 |   136   -56   117    34  -161  -105   -77  3629     - |
   20 |    64  -103   -37    -2    10    58   -33  4285     - |
   21 |    38    23    25    98    43  -112   -54  6954     - |
   22 |   -35    11   -66   188   105   -14  -131  6406     - |
   24 |    22  -269  -186    52   -74  -119   369  7569     - |
   25 |   -83  -309     X   -66  -126   -90   435 -1795     - |
   26 |   -67  -175   -69   -74   -65   -48   379  -328     - |
   27 |   -25     X   -45    36   -85    11     X -4369     - |
   28 |    33    46   175    61   -20    24  -265  7932     - |
   29 |   -63  -252   -67   -75   -82     X   376 -3015     - |
   30 |  -139  -170   113   -15   -30  -125   368   672     - |
   31 |    23  -147  -206   -86   -73   -71   371 -4086     - |
 -----+-------------------------------------------------------+
 ALBH |     -    44     -     -   130     -   -33     -     - |
 ALGO |   -64    12   245  -120   -49    12    33     -     - |
 ALIC |   -43     -     -     -     -     -    44     -     - |
 ALRT |   -17     -     -    44    12    89  -138     -     - |
 AMC2 |  -102   119     -     -    -2   125  -133     -     - |
 ARTU |    58     -   197    56    24  -119  -102     -     - |
 ASC1 |     X     -     -  -225  -441   215     -     -     - |
 AUCK |   -39     -     X     -   -20    70   -43     -     - |
 BAHR |    32    80     -   -22     -     -   -68     -     - |
 BAN2 |     -   180     -     X     -     -  -134     -     - |
 BILI |    55     -     -   114     6   -38  -139     -     - |
 BJFS |     -     -     -    96     -     -  -108     -     - |
 BOGT |   105     -     X   -50   -73   -42     X     -     - |
 BOR1 |   -54   111     -     -   103     -   -28     -     - |
 BREW |     -   141     -     -     -     -  -106     -     - |
 BRMU |     -     -     -   149     -  -142     -     -     - |
 BRUS |    36    39     -     -    78     -   -65     -     - |
 CAS1 |    29     -   297   -65   -28  -139    37     -     - |
 CEDU |  -145     -   201     -   -63    31    -5     -     - |
 CHAT |    -4     -     -    71    -2    52  -138     -     - |
 CHUR |    69    40     -     -     6     -  -100     -     - |
 COCO |   -86     -   413   -43   -18   -27   -70     -     - |
 CRO1 |    -5    40    95     -    37     6   -91     -     - |
 DAEJ |    77    98     -     -     -     -  -152     -     - |
 DARW |    82   -51     -     -     -    28   -78     -     - |
 DAV1 |    61     -     -   -45   -25   -10     -     -     - |
 DGAR |   -18     -   -74   -42    24    77    17     -     - |
 DRAO |    -6    -8     -   -88    -3     -   112     -     - |
 DWH1 |   229   238     -     -    61  -305   -50     -     - |
 FAIR |    43    -6     X   -18    75     -   -19     -     - |
 FORT |   438    98     -   124     -  -178  -409     -     - |
 GLPS |   100     -     -    24    31   -21  -103     -     - |
 GMAS |     -   128     -     -     -     -   -96     -     - |
 GODE |   124   -54  -258     -     9     -    64     -     - |
 GOLD |    47     -     X   -42    87     -     -     -     - |
 GUAT |    62     -     -     -  -283   -53     -     -     - |
 HERS |     -    65     -     -   504     -   -49     -     - |
 HOB2 |   -27   133     -  -146    77   141   -74     -     - |
 HRAO |   -58     -     X     -     8    35    17     -     - |
 HYDE |    41     -     -     -     -   -35     -     -     - |
 IISC |    29     -    35    43    32     -   -97     -     - |
 INVK |    68     -     -   -61     -     -     -     -     - |
 IRKT |     -   161     -   -51    76    35  -105     -     - |
 ISPA |   -16     -     -    27   -49   -12     -     -     - |
 JAB1 |     3     -   -96     -     -     -    52     -     - |
 JPLM |     -   242     -   -14    88     -  -165     -     - |
 KARR |   -63     -     -     -     -    62    -9     -     - |
 KELY |   -53     -     -     -  -262    46     -     -     - |
 KERG |   -72   -89    63     9    -2    -7   102     -     - |
 KGN0 |    22   -29     -     -     -     -     -     -     - |
 KIRU |    75     -     -     -   -28     -   -76     -     - |
 KIT3 |     -     -   -55     -     -    27     -     -     - |
 KOKB |    62    13     -   -68    40   105  -120     -     - |
 KOSG |   -83     -     -    75    -1     -     -     -     - |
 KOUR |   -34     -     X   -76    -9   100     2     -     - |
 KSTU |     -     -     X    38     7     -   -43     -     - |
 LHAS |     -     -  -650   108   139   218   -32     -     - |
 LPGS |   -95    -9     X     X   -49   128   -51     -     - |
 MAC1 |   -87     -     X  -230   -56   212    95     -     - |
 MADR |     -     -     -   200     -  -191     -     -     - |
 MAS1 |   -67    82   -74     X     -    41     X     -     - |
 MATE |     4     -     -    -4   -79     -     X     -     - |
 MAW1 |   -30     -   140     -  -128     -   -51     -     - |
 MBAR |    88     -     -   -59   -65   -15     -     -     - |
 MCM4 |     -     -    44     X     -   -21     X     -     - |
 MDO1 |     -    50     -   -33    23     -     -     -     - |
 MDVJ |    24     -     -     -     -     -   -25     -     - |
 MEDI |     -   109     -     -   174     -   -82     -     - |
 METS |     -  -155     -   -33  -172     -   153     -     - |
 MIZU |     -    95  -304   -56     -     -   211     -     - |
 MKEA |    33     -   285     -     0     -  -198     -     - |
 NKLG |     -     -     -   -20    18   -12    37     -     - |
 NLIB |     -   -70     -   -94    46   109    30     -     - |
 NNOR |     -  -113     7     -     -     -    81     -     - |
 NOT1 |     -     -     -     -     -   199  -235     -     - |
 NOUM |     -     -     -   192     -  -183     -     -     - |
 NPLD |   -59    80     -     -    20     -     -     -     - |
 NRC1 |     -   189     -    42   102     -  -189     -     - |
 NRIL |    26     -     -   -36   -46   140  -151     -     - |
 NTUS |  -147     -  -111    95    -6   102   -15     -     - |
 NYA1 |  -230     -     -     X   -73    71   149     -     - |
 NYAL |     -    25     -     -   362     -   -19     -     - |
 OHI2 |    96     -    28   -45     1     1   -60     -     - |
 ONSA |    29    49    -9   -26    11    36   -73     -     - |
 OPMT |     8    93     -   -69    35     -     -     -     - |
 OUS2 |     -     -     -   -53     -    51     -     -     - |
 PDEL |   -75     -  -260    46    64   147     -     -     - |
 PERT |   -67   194  -348     -   198   -20   147     -     - |
 PETP |   -17     -     -    15   -16     -     -     -     - |
 PIE1 |     -     -   270     -   555     -  -156     -     - |
 PIMO |   109     -     -    -8     -    -1  -125     -     - |
 POL2 |   -22     -    38     -   -62     -     -     -     - |
 POTS |  -113     -     -   101    44     -     -     -     - |
 PRDS |   -20   120     -     -     -     -   -70     -     - |
 PTBB |    48    46     -     -    80     -   -83     -     - |
 QAQ1 |    59   120     -    22     -     -  -175     -     - |
 RAMO |  -175     -     -     -     -   150     -     -     - |
 RESO |   -35     -     -    45     -   -13     -     -     - |
 REUN |    61     -     -   -55     -     -     -     -     - |
 REYK |   -84     -     -    10    51    62     -     -     - |
 SANT |    11     -     X    92    53   -45   -66     -     - |
 SCH2 |    22    83     -     -    54    87  -188     -     - |
 SCUB |    74     -     -   -16     -    74  -145     -     - |
 SEY1 |     -     -     -   -40   113     X    45     -     - |
 SFER |    21   -28     -     -   320     -     X     -     - |
 SPT0 |   -32   101     -     -     -     -   -42     -     - |
 STJO |    23   -50     -   -40    33    60   -12     -     - |
 STR1 |     -    45     -     -     -     -   -34     -     - |
 SUTH |    12     -     -   -14   -41     -     4     -     - |
 SUTM |     -   146     -   -60     -    -2   -40     -     - |
 SYOG |     -     9     -    13     -     -   -21     -     - |
 THTI |     -    93   335  -109   -40   -48   -82     -     - |
 THU3 |     6   -19     -     7     2     -     -     -     - |
 TIDB |   -58   -14   237     -   -68     -   -68     -     - |
 TIXI |    30     -     -    56     -     -   -94     -     - |
 TLSE |     -    79     -     -     -     -   -59     -     - |
 TOW2 |    15     -     -  -151   -70   119    14     -     - |
 TRO1 |     -     -     -    44    96    38   -95     -     - |
 TSKB |   -77   103     -    72     -    78  -173     -     - |
 UNSA |     -     -     X   -12     2     -    14     -     - |
 URUM |   -42     -     -    38   -13     -     -     -     - |
 USNO |    54    22     -     -   -67     -   -71     -     - |
 USUD |     -  -123   471    22    -7   -59  -135     -     - |
 VILL |     -     -     X  -132     X     -   149     -     - |
 WES2 |     -    -7     -   -41     -     -    52     -     - |
 WHIT |    49     -     -     -   110    89  -156     -     - |
 WILL |   -53    72     -     -   -53     -     -     -     - |
 WROC |     -   128     -     -     -     -   -96     -     - |
 WSRT |   -45    97     -   -19     -     -    -6     -     - |
 WTZR |   -31   175  -301   -27    14   143   -65     -     - |
 WUHN |    28    67     -    94     -     -  -185     -     - |
 YAKT |    37     -     -     -     5    36   -80     -     - |
 YAR2 |   -92    99     -    16    80     -     -     -     - |
 YELL |    50    63  -250    25    15    71   -90     -     - |
 YSSK |    46     -     -    78     -     -  -135     -     - |
 ZWEN |  -135     -   311   188   188     -  -255     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    45    70    98    20    18    49    27  5034     - |  288   4.53
    3 |    23    43    33    16    54    33    29  4479     - |  288   2.05
    4 |    55    62    44    31    32    33    23  1256     - |  288   0.79
    5 |    27    55    39    24    30    42    33  4417     - |  288   1.99
    6 |    23    50    27    29    20    34    32  2109     - |  288   1.27
    7 |    33    59    44    25    45    42    37   974     - |  288   0.60
    8 |   133    91     X   118    74   106   140  4316     - |  281   2.62
    9 |   138   139   159    61    41    65    48  4544     - |  288   2.45
   10 |    53    75    84    18    30    37    30  4207     - |  288   2.42
   11 |    60    54    64    23    27    47    31  1137     - |  288   0.27
   13 |    40    61    46    17    26    27    57   863     - |  288   0.28
   14 |    43    80    98    24    71    33    34  1281     - |  288   0.28
   15 |    68    44    32    20    59    49    32  5549     - |  288   2.31
   16 |    27    52    74    31    31    36    27   843     - |  288   0.28
   17 |    56    78    43    30    37    41    38   666     - |  288   0.93
   18 |    46    57    43    51    39    44    21   693     - |  288   0.32
   19 |    45    61    52    18    66    25    27   600     - |  288   0.23
   20 |    40    57    75    20    29    41    32  1146     - |  288   0.21
   21 |    60    47    49    41    40    45    30  1921     - |  288   0.33
   22 |    37    70    58    23    41    34    36  4833     - |  288   0.48
   24 |    47    68    31    25    24    27    40  4841     - |  288   1.57
   25 |   102    64     X    37    53    98    46  2853     - |  288   1.64
   26 |    43    80    30    27    27    51    28  1166     - |  288   0.48
   27 |    64     X    31    37    77    36     X  2934     - |  287   0.58
   28 |    40    55    83    25    37    39    41  3249     - |  288   0.44
   29 |    37    59    36    20    22     X    31  1826     - |  288   0.97
   30 |    24    57    26    24    28    35    23   913     - |  288   0.73
   31 |    31    59    33    22    29    24    28  3377     - |  288   1.50
 -----+-------------------------------------------------------+--------------
 ALBH |     -    35     -     -    23     -    26     -     - |  288   0.05
 ALGO |    24    35    52    53    21    30    59     -     - |  288   0.04
 ALIC |    14     -     -     -     -     -    15     -     - |  288   8.02
 ALRT |    15     -     -    24    15    23    50     -     - |  288   9.05
 AMC2 |    21    29     -     -    16    14    21     -     - |  288   0.02
 ARTU |    43     -    85    42    23    20    40     -     - |  263  13.18
 ASC1 |     X     -     -    71    32    68     -     -     - |  240    >>>
 AUCK |    47     -     X     -    64    25    22     -     - |  264  15.52
 BAHR |    33    23     -    26     -     -    19     -     - |  288   0.64
 BAN2 |     -    72     -     X     -     -    54     -     - |  211  16.72
 BILI |    31     -     -    32    14    20    39     -     - |  287  10.63
 BJFS |     -     -     -    35     -     -    39     -     - |  287  11.32
 BOGT |    66     -     X    46    32    93     X     -     - |  288  14.83
 BOR1 |   128    29     -     -    99     -   147     -     - |  287  12.81
 BREW |     -    40     -     -     -     -    30     -     - |  288   0.04
 BRMU |     -     -     -    31     -    30     -     -     - |  288    >>>
 BRUS |    15    19     -     -    20     -    22     -     - |  288   0.03
 CAS1 |    21     -    48    16    21    26    37     -     - |  288   8.06
 CEDU |    22     -    42     -    19    29    13     -     - |  288  15.76
 CHAT |    15     -     -    15    25    17    15     -     - |  251  14.01
 CHUR |    22    57     -     -    28     -    58     -     - |  288  15.12
 COCO |    19     -    48    30    19    18    36     -     - |  288   7.39
 CRO1 |    57    23    79     -    72    48    40     -     - |  277  19.13
 DAEJ |    22    55     -     -     -     -    33     -     - |  287   2.49
 DARW |    16    15     -     -     -    12    16     -     - |  288  10.61
 DAV1 |    20     -     -    24    21    20     -     -     - |  288  16.82
 DGAR |    20     -    40    15    25    20    34     -     - |  288  24.90
 DRAO |    32    25     -    38    21     -    28     -     - |  288   0.21
 DWH1 |    15    42     -     -    16    14    28     -     - |  288   0.41
 FAIR |    19    26     X    26    20     -    53     -     - |  288   0.05
 FORT |    32    48     -    23     -    24    21     -     - |  288   0.14
 GLPS |    31     -     -    23    13    12    17     -     - |  288  12.42
 GMAS |     -    29     -     -     -     -    22     -     - |  288   2.33
 GODE |    15    31    35     -    32     -    27     -     - |  288   0.07
 GOLD |    24     -     X    22    77     -     -     -     - |  287  15.75
 GUAT |    25     -     -     -    39    22     -     -     - |  287    >>>
 HERS |     -    26     -     -    14     -    19     -     - |  241  10.25
 HOB2 |    46    32     -    30    32    32    35     -     - |  288   0.09
 HRAO |    49     -     X     -    18    13    41     -     - |  288   0.65
 HYDE |    14     -     -     -     -    12     -     -     - |  288  22.22
 IISC |    17     -    27    26    28     -    24     -     - |  288  19.92
 INVK |    10     -     -     9     -     -     -     -     - |  288   9.50
 IRKT |     -    20     -    15    47    19    19     -     - |  288   0.13
 ISPA |    21     -     -    16    14    24     -     -     - |  288  13.33
 JAB1 |    20     -    28     -     -     -    22     -     - |  288  13.32
 JPLM |     -    29     -    20    12     -    13     -     - |  288   1.65
 KARR |    19     -     -     -     -    16    15     -     - |  288  10.94
 KELY |    22     -     -     -    18    19     -     -     - |  287  13.07
 KERG |    37    22    75    30    22    24    30     -     - |  288   1.36
 KGN0 |    16    21     -     -     -     -     -     -     - |  287   0.36
 KIRU |    68     -     -     -    32     -    69     -     - |  282   9.31
 KIT3 |     -     -    28     -     -    14     -     -     - |  288  39.96
 KOKB |    20    38     -    52    24    34    21     -     - |  288   0.07
 KOSG |    35     -     -    32    31     -     -     -     - |  288 124.09
 KOUR |    24     -     X    38    24    16    23     -     - |  288   1.95
 KSTU |     -     -     X   117   112     -   132     -     - |  255  12.03
 LHAS |     -     -    35    21    12    22    22     -     - |  288  12.83
 LPGS |    22    49     X     X    30    30    30     -     - |  288 244.34
 MAC1 |    75     -     X    27    20    42    32     -     - |  288  15.53
 MADR |     -     -     -    29     -    28     -     -     - |  288  15.97
 MAS1 |    19    36    22     X     -    26     X     -     - |  155   1.21
 MATE |    12     -     -    10    17     -     X     -     - |  100    >>>
 MAW1 |    20     -    56     -    30     -    38     -     - |  288  20.89
 MBAR |    33     -     -    25    20    19     -     -     - |  288  27.54
 MCM4 |     -     -    41     X     -    20     X     -     - |  281  14.18
 MDO1 |     -    50     -    33    32     -     -     -     - |  288  67.07
 MDVJ |    12     -     -     -     -     -    12     -     - |  288   0.03
 MEDI |     -    26     -     -    20     -    19     -     - |  287   0.12
 METS |     -    25     -    32    28     -    26     -     - |  287  13.61
 MIZU |     -    56    59    67     -     -    41     -     - |  240  23.39
 MKEA |    43     -    44     -    30     -    37     -     - |  288  25.29
 NKLG |     -     -     -    44    61    30    81     -     - |  287 304.56
 NLIB |     -    47     -    28    23    23    36     -     - |  275   0.17
 NNOR |     -    21    35     -     -     -    17     -     - |  288  16.75
 NOT1 |     -     -     -     -     -    30    35     -     - |  288   0.13
 NOUM |     -     -     -    43     -    41     -     -     - |  288    >>>
 NPLD |    15    20     -     -    17     -     -     -     - |  287   0.06
 NRC1 |     -    31     -    40    20     -    36     -     - |  288   0.04
 NRIL |    15     -     -    18    14    13    19     -     - |  288  10.12
 NTUS |    18     -    36    32    22    29    39     -     - |  288   9.77
 NYA1 |    24     -     -     X    15    30    37     -     - |  288   0.05
 NYAL |     -    36     -     -    25     -    27     -     - |  288   0.05
 OHI2 |    26     -    49    29    30    24    47     -     - |  288   6.41
 ONSA |    21    94    41    37    49    33    27     -     - |  288   0.03
 OPMT |    27    25     -    28    19     -     -     -     - |  287   0.03
 OUS2 |     -     -     -    13     -    12     -     -     - |  288 137.61
 PDEL |    29     -    65    40    21    31     -     -     - |  288  57.38
 PERT |    19    22    51     -    39    25    22     -     - |  288   2.37
 PETP |    21     -     -    19    16     -     -     -     - |  287  11.67
 PIE1 |     -     -    45     -    45     -    26     -     - |  137 249.07
 PIMO |    78     -     -    79     -    48    58     -     - |  224  19.45
 POL2 |    19     -    33     -    27     -     -     -     - |  287  17.58
 POTS |    32     -     -    28    32     -     -     -     - |  288  27.06
 PRDS |    29    47     -     -     -     -    53     -     - |  288   1.20
 PTBB |    13    48     -     -    26     -    37     -     - |  288   0.31
 QAQ1 |    15    45     -    35     -     -    36     -     - |  288  16.45
 RAMO |    24     -     -     -     -    21     -     -     - |  288    >>>
 RESO |    11     -     -    13     -    13     -     -     - |  288   8.34
 REUN |    14     -     -    13     -     -     -     -     - |  287  17.90
 REYK |    21     -     -    10    23    19     -     -     - |  288   6.58
 SANT |    56     -     X   102    48    17    66     -     - |  288   7.05
 SCH2 |    28    20     -     -    23    33    42     -     - |  288  16.69
 SCUB |    29     -     -    32     -    32    47     -     - |  287  12.56
 SEY1 |     -     -     -    22    20     X    25     -     - |  288  22.72
 SFER |    39    53     -     -    24     -     X     -     - |  279 733.63
 SPT0 |    46    94     -     -     -     -    27     -     - |  288   0.03
 STJO |    18    11     -    33    19    29    28     -     - |  288   0.06
 STR1 |     -    15     -     -     -     -    12     -     - |  288   0.92
 SUTH |    26     -     -    16    16     -    21     -     - |  288  12.78
 SUTM |     -    45     -    17     -    18    21     -     - |  288  11.38
 SYOG |     -    36     -    17     -     -    37     -     - |  288   1.27
 THTI |     -    24    67    25    14    24    24     -     - |  288  11.33
 THU3 |    14    26     -    12    24     -     -     -     - |  288   9.14
 TIDB |    11    24    48     -    17     -    15     -     - |  288   0.09
 TIXI |    18     -     -    23     -     -    30     -     - |  287   9.28
 TLSE |     -    17     -     -     -     -    12     -     - |  287   0.39
 TOW2 |    26     -     -    21    21    34    23     -     - |  288   9.34
 TRO1 |     -     -     -    26    18    27    41     -     - |  288   7.86
 TSKB |    24    27     -    38     -    18    19     -     - |  288   0.70
 UNSA |     -     -     X    14    28     -    16     -     - |  288  17.22
 URUM |    30     -     -    27    18     -     -     -     - |  288  12.46
 USNO |    14    20     -     -    19     -    18     -     - |  288   0.03
 USUD |     -    17    32    38    17    29    18     -     - |  288  12.69
 VILL |     -     -     X    12     X     -    14     -     - |  288   4.57
 WES2 |     -    31     -    25     -     -    26     -     - |  288   0.10
 WHIT |    19     -     -     -    23    12    21     -     - |  288   2.18
 WILL |    28    38     -     -    19     -     -     -     - |  288 126.01
 WROC |     -    61     -     -     -     -    45     -     - |  275  14.72
 WSRT |    26    21     -    48     -     -    42     -     - |  288   0.04
 WTZR |    26    44    70    37    15    38    41     -     - |  288   0.07
 WUHN |    30    30     -    37     -     -    27     -     - |  287  17.61
 YAKT |    13     -     -     -    49    12    16     -     - |  288   0.87
 YAR2 |    33    21     -    33    20     -     -     -     - |  288   4.54
 YELL |    40    31    49    61    58    46    73     -     - |  288   0.13
 YSSK |    21     -     -    26     -     -    23     -     - |  287  11.64
 ZWEN |    28     -   106    42    22     -    49     -     - |  288  20.50
 -----+-------------------------------------------------------+--------------
 TOT  |    40    48    57    36    36    35    39  3038     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     0     0   288    9.25   | 3.69e-14  1.08e-14  3.64e-15 |
 AMC2 |   288     0     0   288    7.89   | 4.07e-14  7.29e-15  1.92e-15 |
 ONSA |   288     0     0   288    7.18   | 3.44e-14  9.15e-15  3.69e-15 |
 USNO |   288     0     0   288    6.94   | 5.50e-14  1.28e-14  2.32e-15 |
 NRC1 |   288     0     0   288    6.89   | 5.22e-14  1.53e-14  4.27e-15 |
 OPMT |   287     0     0   286    6.05   | 4.94e-14  1.01e-14  1.80e-15 |
 BREW |   288     0     0   288    6.04   | 4.15e-14  9.14e-15  2.13e-15 |
 NPLD |   287     0     0   286    5.46   | 4.02e-14  1.07e-14  5.65e-15 |
 BRUS |   288     0     0   288    5.36   | 3.98e-14  8.73e-15  3.13e-15 |
 SPT0 |   288     1     0   287    4.93   | 4.32e-14  9.08e-15  3.23e-15 |
 NYAL |   288     0     0   288    3.88   | 3.35e-14  7.90e-15  3.54e-15 |
 HOB2 |   288     0     0   288    3.46   | 3.88e-14  1.21e-14  7.93e-15 |
 YELL |   288     1     0   287    3.44   | 3.69e-14  9.77e-15  1.76e-15 |
 GODE |   288     0     0   288    2.65   | 4.27e-14  1.09e-14  3.47e-15 |
 KOKB |   288     0     0   288    2.49   | 4.60e-14  1.26e-14  4.75e-15 |
 WTZR |   288     0     0   288    2.43   | 8.63e-14  2.53e-14  4.99e-15 |
 NLIB |   275     0     0   272    2.36   | 5.91e-14  1.28e-14  2.77e-15 |
 MDVJ |   288     0     0   288    1.94   | 6.01e-14  1.02e-14  2.53e-15 |
 FAIR |   288     0     0   288    1.45   | 4.09e-14  1.07e-14  2.60e-15 |
 FORT |   288     0     0   288    1.32   | 5.95e-14  1.70e-14  1.12e-14 |
 WSRT |   288     0     0   288    1.25   | 3.72e-14  9.79e-15  3.09e-15 |
 STJO |   288     1     0   287    1.25   | 4.74e-14  1.23e-14  5.25e-15 |
 MEDI |   287     0     0   286    1.07   | 6.72e-14  1.19e-14  7.04e-15 |
 NYA1 |   288     0     0   288    0.97   | 2.48e-14  6.36e-15  4.32e-15 |
 DRAO |   288     0     0   288    0.96   | 7.77e-14  1.81e-14  1.39e-14 |
 WES2 |   288     0     0   288    0.67   | 4.72e-14  1.16e-14  6.10e-15 |
 NOT1 |   288     0     0   143    0.45   | 4.54e-14  1.63e-14  1.06e-14 |
 IRKT |   288     0     0   288    0.36   | 6.57e-14  2.02e-14  1.36e-14 |
 TIDB |   288     0     3    53    0.30   | 1.68e-13  1.47e-14  6.25e-15 |
 PTBB |   288     0     0   288    0.15   | 3.35e-13  8.38e-14  3.62e-14 |
 G30  |   288     0     0   288    0.14   | 3.07e-13  9.61e-14  5.23e-14 |
 ALBH |   288     0     0   143    0.13   | 4.48e-14  1.21e-14  4.49e-15 |
 KGN0 |   287     0     0   286    0.09   | 3.47e-13  1.05e-13  4.13e-14 |
 TLSE |   287     0     0   286    0.07   | 4.44e-13  8.99e-14  3.80e-14 |
 MIZU |   240     0     0   239    0.07   | 3.50e-13  8.62e-14         - |
 G16  |   288     0     2    87    0.06   | 5.13e-13  5.62e-14  3.44e-14 |
 G26  |   288     0     0   288    0.06   | 2.93e-13  1.05e-13  3.31e-14 |
 YAKT |   288     0     0   288    0.06   | 4.42e-13  1.16e-13  5.88e-14 |
 SFER |   279     1     0   274    0.05   | 3.83e-13  1.24e-13  5.11e-14 |
 BOR1 |   287     0     0   286    0.05   | 4.52e-13  1.37e-13  8.04e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.63e-13  1.36e-13  4.40e-14 |
 G07  |   288     0     0   288    0.04   | 3.05e-13  9.71e-14  5.48e-14 |
 G27  |   287     0     0   286    0.04   | 3.31e-13  1.21e-13  6.42e-14 |
 G29  |   288     0     0   288    0.04   | 3.74e-13  1.52e-13  1.05e-13 |
 G06  |   288     0     0   288    0.03   | 4.29e-13  1.27e-13  8.68e-14 |
 PIE1 |   137     0     0     5    0.03   | 5.07e-14  9.66e-15         - |
 G17  |   288     0     0   288    0.02   | 3.94e-13  1.30e-13  1.00e-13 |
 G04  |   288     0     0   288    0.02   | 4.70e-13  1.37e-13  9.11e-14 |
 G31  |   288     0     0   288    0.02   | 2.01e-13  1.48e-13  8.73e-14 |
 BAHR |   288     0     0   288    0.02   | 3.24e-13  1.02e-13  6.00e-14 |
 STR1 |   288     0     0   288    0.02   | 7.02e-13  1.88e-13  6.34e-14 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  2.79e-13  3.90e-14 |
 HRAO |   288     0     0   288    0.01   | 1.33e-13  3.47e-14  6.03e-14 |
 G10  |   288     0     0   288    0.01   | 1.25e-12  2.77e-13  1.90e-13 |
 SYOG |   288     0     0   288    0.01   | 7.07e-13  1.93e-13  1.33e-13 |
 G03  |   288     0     0   288    0.01   | 1.24e-12  4.30e-13  1.70e-13 |
 KERG |   288     0     0   288    0.01   | 1.16e-12  3.26e-13  1.12e-13 |
 G24  |   288     0     0   288    0.01   | 1.42e-12  4.24e-13  1.87e-13 |
 G15  |   288     0     0   288    0.01   | 1.63e-12  6.14e-13  1.79e-13 |
 KOUR |   288     0     0   288    0.01   | 1.54e-12  4.93e-13  1.85e-13 |
 G05  |   288     0     0   288    0.00   | 1.38e-12  3.78e-13  1.42e-13 |
 PRDS |   288     0     0   288    0.00   | 1.33e-12  4.02e-13  1.10e-13 |
 DAEJ |   287     0     0   286    0.00   | 1.40e-12  5.06e-13  2.37e-13 |
 G25  |   288     0     0   288    0.00   | 1.43e-12  3.92e-13  1.13e-13 |
 PERT |   288     0     0   288    0.00   | 1.78e-12  5.19e-13  2.47e-13 |
 GMAS |   288     0     0   143    0.00   | 1.15e-12  3.56e-13  1.52e-13 |
 MAS1 |   155     0     0     6    0.00   | 1.71e-12  3.20e-13         - |
 GPST |   288     0     0     0    0.00   | 2.43e-14  6.85e-15  1.44e-15 |
 ASC1 |   240     1     0     0    0.00   |        -         -         - |
 PIMO |   224     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   251     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.26e-13  8.43e-14  4.32e-14 |
 G22  |   288     1     6     0    0.00   | 7.71e-13  8.04e-14  3.34e-14 |
 G21  |   288     0     6     0    0.00   | 9.80e-13  1.04e-13  2.63e-14 |
 G20  |   288     0     6     0    0.00   | 6.34e-13  7.06e-14  1.32e-14 |
 G19  |   288     0     6     0    0.00   | 5.96e-13  6.51e-14  1.86e-14 |
 G18  |   288     0     6     0    0.00   | 1.08e-12  1.03e-13  3.05e-14 |
 G14  |   288     0     6     0    0.00   | 5.42e-13  5.77e-14  2.62e-14 |
 G13  |   288     0     6     0    0.00   | 5.99e-13  8.88e-14  2.17e-14 |
 G11  |   288     0     6     0    0.00   | 7.22e-13  7.00e-14  2.67e-14 |
 G09  |   288     0     0     0    0.00   | 1.45e-12  5.86e-13  2.75e-13 |
 G08  |   281     0     0     0    0.00   | 1.40e-12  4.45e-13  1.89e-13 |
 G01  |   288     0     0     0    0.00   | 1.50e-12  6.97e-13  5.37e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 1.04e-12  1.21e-12  4.56e-13 |
 WROC |   275     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.04e-13  3.75e-13  1.81e-13 |
 VILL |   288     0     0     0    0.00   | 1.12e-12  6.65e-13  3.01e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.79e-13  2.09e-13  8.08e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     2     0     0    0.00   |        -         -         - |
 SCUB |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 1.83e-12  7.52e-13  6.09e-13 |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 REUN |   287     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     2     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   287     2     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OUS2 |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   281     0     2     0    0.00   | 7.00e-13  1.07e-12  1.27e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MATE |   100     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   255     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     1     0     0    0.00   |        -         -         - |
 KIRU |   282     0     0     0    0.00   |        -         -         - |
 KELY |   287     2     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.49e-13  1.97e-13  1.58e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     2     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GOLD |   287     1     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   277     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.39e-13  1.02e-12  7.17e-13 |
 CHUR |   288     2     0     0    0.00   | 1.13e-12  5.73e-13  1.45e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   211     0     0     0    0.00   |        -         -         - |
 ARTU |   263     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.97e-17  4.77e-16  2.87e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYA1      YELL |
------------------------------------------+------------------------------+
