
 GPS week: 1282   Day: 5   MJD: 53223                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  36326    350    -0.03    -0.79     0.03    17.39
 emr |   288     0  24243    578   786.18    36.37     0.04    15.60
 esa |   288     0  20839   2096   785.03    36.41     0.05    10.57
 gfz |   288     0  30853    575     0.11    -0.48     0.03    19.63
 igr |   288     0  35523    201     0.06    -0.38     0.03     0.00
 jpl |   288     0  26122    927    -0.91    -0.39     0.03    19.88
 mit |   288     0  36584   1529    -0.52     0.56     0.03    16.92
 ngs |    96     0   2685      0     0.02    -0.38     2.98     0.00
 sio |    96    96      0      0 99999.99     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -13  -228  -141   -63  -102   -80   471  -636     - |
    3 |  -138  -206   166   -48  -129   -93   393  1817     - |
    4 |   -33  -200    44    64   -75  -129   259  -390     - |
    5 |  -125  -135   221     0  -138  -150   292 -1192     - |
    6 |   -50  -199   -62    47   -97  -143   386 -3773     - |
    7 |  -167  -100   -23    67  -119  -204   428 -5888     - |
    8 |     X  -218     X   -85   -94  -136   452 -2185     - |
    9 |  -112  -214   128    22  -102  -134   314 -6123     - |
   10 |  -108  -183   -19   -67  -129   -63   439  2657     - |
   11 |   155   -74   -71    91    43    75  -240  4871     - |
   13 |   229  -101    15    82     2   -23  -221  4867     - |
   14 |   110   -22   -31    98    -2    47  -239   720     - |
   15 |   -47  -120    45   -62  -112  -200   439  -363     - |
   16 |    44  -167   158   -10   -13    30   -12  3405     - |
   17 |   -74   -74  -139    33  -109  -155   365 -2740     - |
   18 |    18   -54   197    50    39    51  -207  4701     - |
   19 |   107  -128  -185    -4  -118   144   -41  5702     - |
   20 |   129  -142  -217    76   -31   106   -79  4849     - |
   21 |    52   105   -93    72   -22  -101   -67  6384     - |
   22 |    54    17  -168   155    57   102  -259 -4929     - |
   24 |   -73  -150    69     3  -115  -124   305 -2776     - |
   25 |   -71  -288   209   -76   -91  -169   481 -4079     - |
   26 |   -74  -127   229    -6   -66  -199   291 -4613     - |
   27 |  -104  -189    27    15   -63  -130   367  -760     - |
   28 |   144    59   -61    84    52   -60  -195  2136     - |
   29 |   -95    -4    28   -11  -169  -208   341 -3862     - |
   30 |  -112  -148    94    33   -91   -89   259   472     - |
   31 |   -91  -171   148   -22  -108  -179   375  1656     - |
 -----+-------------------------------------------------------+
 ALBH |    47   -15     -     -    -3     -   -34     -     - |
 ALGO |   -41   117     X  -137    96   108   -34     -     - |
 ALIC |  -106     -     -     -     -   159   -78     -     - |
 ALRT |    10     -     -    41   -10     -   -58     -     - |
 AMC2 |   -80   204     -     -    23    96  -218     -     - |
 AREQ |     -   -17    51   -14   -64     X     X     -     - |
 ARTU |    45     -   153    39    28   -94   -77     -     - |
 ASPA |     -     -     -   289     -  -285     -     -     - |
 AUCK |   -53     -     X     -  -115   -20    78     -     - |
 BAHR |    36   178     -   -56     5     -  -136     -     - |
 BAN2 |     -     -     -  -390   266     -   453     -     - |
 BJFS |    91     -     -   -49     -   100  -154     -     - |
 BOGT |    51     -     -   -45   -44     X     X     -     - |
 BOR1 |    59     -     -     -   112     -   -61     -     - |
 BREW |     -   105     -     -   -31     -   -96     -     - |
 BRUS |    60    82     -     -   117     -  -138     -     - |
 CAS1 |   -19     -     3   -88   -59    60    48     -     - |
 CEDU |  -169     -   149     -  -323     -    80     -     - |
 CHAT |   -53     -     -     1   -18   -39   100     -     - |
 CHUR |    74     -     -     -    79     -   -76     -     - |
 COCO |    59     -   -59  -187    17    54   130     -     - |
 CRO1 |     -    -3     X     -   -88     3     X     -     - |
 DARW |    30     -     -     -     -     -   -31     -     - |
 DAV1 |   -39     -     -  -102  -128    28   127     -     - |
 DGAR |  -107     -     -    16   -12    33    53     -     - |
 DRAO |    32    73     -  -107     -     -    24     -     - |
 DUBO |   -37     -     -     -     -    32     -     -     - |
 DWH1 |   309    94     -     -    -8  -374    35     -     - |
 FAIR |     2   -65   262   -30    16    31  -107     -     - |
 FORT |    99  -110     -     -     -     -     -     -     - |
 GLPS |   142     -    65    21    38    10  -222     -     - |
 GODE |    49   -68   142     -   -97     -   -76     -     - |
 GOLD |   170     -  -120   -86   149     -     -     -     - |
 HARB |    66     -     -   -59     -     -     -     -     - |
 HERS |    26    -2     -     -   -23     -   -25     -     - |
 HOB2 |    -3   116     -   -87    16    58   -71     -     - |
 HRAO |  -122     -   238     -   -20    35   -65     -     - |
 HYDE |     5     -     -     -     -     -    -5     -     - |
 IISC |   -16     -  -165    24   -23    68    11     -     - |
 INVK |     1     -     -    -1     -     -     -     -     - |
 IRKT |   213    16     -     -     -     -  -233     -     - |
 ISPA |    21     -     -     9   -10   -27     -     -     - |
 JAB1 |    10     -   -77     -     -     -    38     -     - |
 JPLM |     -   177     -   -62   154     -   -91     -     - |
 KARR |  -138     -     -     -     -   184   -74     -     - |
 KERG |     -   -70  -208   190   -40   -70    56     -     - |
 KGN0 |    -8     9     -     -   -13     -     -     -     - |
 KIRU |    89     -     -     -    33     -   -92     -     - |
 KIT3 |     -     -   156    67   143    70  -294     -     - |
 KOKB |    38   108     -  -102     3    38   -65     -     - |
 KOUR |   161     -   -98   -63    22     -   -32     -     - |
 LAE1 |   -47     -     -     8    15   127  -110     -     - |
 LHAS |    62     -  -116     7    47     -     -     -     - |
 LPGS |   -51    95   183     X    19    45  -203     -     - |
 MAC1 |  -169     -     X     X  -139   100    55     -     - |
 MALI |     -     -   -51    28   -41     -     X     -     - |
 MAS1 |   -50   122    -1   -54   -29    99  -114     -     - |
 MATE |    -4     -     -    32   -36     -   -33     -     - |
 MAW1 |    70     -  -115     -   -45     -     -     -     - |
 MBAR |   -46     -     -   -75   -26   115     -     -     - |
 MCM4 |     -     -  -644  -216     -   242   366     -     - |
 MDO1 |     -    89     -   -70    43     -     -     -     - |
 MDVJ |    35     -     -     -     -     -   -36     -     - |
 MEDI |    21    40     -     -    35     -   -59     -     - |
 METS |     4    86     -   -50    16     -   -26     -     - |
 MIZU |     -   -59     X   -31   147   -55   155     -     - |
 MKEA |     -     -    -1     -    14     -     1     -     - |
 NKLG |     -     -     -    33    51   -33     X     -     - |
 NLIB |     -   166     -   -20    75     -  -131     -     - |
 NNOR |     -   238     X     -   123     -  -219     -     - |
 NOT1 |   188     -     -     -     -   -15  -176     -     - |
 NOUM |     -     -     -   178     -  -176     -     -     - |
 NPLD |   -62    70     -     -   -11     -     -     -     - |
 NRC1 |    53   142     -    26    39     -  -216     -     - |
 NRIL |    23     -     -   -12   -29    26   -40     -     - |
 NYA1 |    83     -     -   -47   -31    42   -81     -     - |
 NYAL |     -    77     -     -    59     -   -71     -     - |
 OBET |     -    40     -   -32     -     -     -     -     - |
 OHI2 |   -35     -   135    24     -     -   -74     -     - |
 ONSA |    30     X   105   -81    39   -32    46     -     - |
 PDEL |  -227     -   239    22   -53    50     -     -     - |
 PERT |   -14    89  -575     -   213    67   213     -     - |
 PETP |   -35     -     -   -58   -12    88     -     -     - |
 PIE1 |     -  -374  -285     -  -451     -   572     -     - |
 PIMO |     -     -     -    93     -   -87     5     -     - |
 POL2 |    30     -   183     -   -18     -  -145     -     - |
 POTS |   -56     -     -    49   -18     -     -     -     - |
 PRDS |    46   135     -     -    57     -  -172     -     - |
 PTBB |   114    33     -     -    91     -  -147     -     - |
 RAMO |  -268     -     -     -     -   235     -     -     - |
 RESO |   -39     -     -    34   -59     -     -     -     - |
 REYK |    -2     -     -   -53    51    54     -     -     - |
 RIOG |   -17     -   109    16   -28   -10   -58     -     - |
 SANT |   -21     -  -131    55    21    71   -50     -     - |
 SCH2 |   -32   107     -     -    37    76  -154     -     - |
 SCUB |     -     -     -     -     -    28   -33     -     - |
 SEY1 |     -     -     -    11     -     X   -12     -     - |
 SFER |   -21    23     -     -    31     -     X     -     - |
 SPT0 |    74     X     -     -     X     -   -77     -     - |
 STJO |    23   118     -   -30    -7    92  -205     -     - |
 STR1 |     -   161     -     -   220     -  -148     -     - |
 SUTH |     8     -     -    71   155     -   -91     -     - |
 SUTM |     -   -11     -   188     -     -  -209     -     - |
 SUWN |   -51    57     -     -     -     -     -     -     - |
 SYOG |   119    56     -   -47     -    35  -159     -     - |
 THTI |     -   185  -211  -108    -2    84   -13     -     - |
 THU3 |   -87    39     -    46   -55     -     -     -     - |
 TIDB |   -23   -87    74     -   -35     -    58     -     - |
 TIXI |    74     -    72    -2   -24   -32   -81     -     - |
 TLSE |     -     -     -     -     -    35   -42     -     - |
 TOW2 |   -64     -     -   -71     -    86    47     -     - |
 TSKB |   -69    37     7    92    55    22  -100     -     - |
 TWTF |    50    22     -   -87     7    25     -     -     - |
 URUM |   -66     -     -     4    78    54     -     -     - |
 USNO |   113   107     -     -   109     -  -215     -     - |
 USUD |   -55    38    93    52    62     -   -97     -     - |
 VESL |     -     -     -  -108     -   107     -     -     - |
 VILL |   152     -  -543   106   221     -    60     -     - |
 WES2 |     -   141     -   -84    74     -   -33     -     - |
 WHIT |    81     -     -     -   124     -   -83     -     - |
 WILL |   -74    83     -     -    24     -     -     -     - |
 WTZR |   -68   122    12    66    11    77  -217     -     - |
 WUHN |   -86    40     -   314   182     -  -313     -     - |
 YAR2 |  -115     -     -   102   108     -     -     -     - |
 YEBE |     -   279     -     -   297     -  -257     -     - |
 YELL |   -29   105   283  -141   -46    36  -122     -     - |
 YIBL |     -     -     -    -9     -    48   -47     -     - |
 YKRO |    35     -     -    31     -   116  -207     -     - |
 YSSK |     7     -     -    36    47     -   -49     -     - |
 ZWEN |   -72     -    98   116   139     -  -121     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    39    48    39    18    19    28    14  5351     - |  288   4.01
    3 |    20    45    31    29    29    32    24  2867     - |  288   1.58
    4 |    31    38    42    27    34    28    28  1178     - |  288   0.98
    5 |    47    52    55    47    19    30    18  3359     - |  288   2.80
    6 |    19    56    26    83    24    54    32   792     - |  288   1.96
    7 |    21    45    20    21    17    25    42  1312     - |  288   0.41
    8 |     X    48     X    21    47    36    32  5725     - |  279   1.89
    9 |    82   108   127    99    31    88    86  4469     - |  288   2.45
   10 |    54    49    48    17    32    42    81  2871     - |  288   1.87
   11 |    41    39    30    30    25    27    35   956     - |  288   0.35
   13 |    40    49    59    25    30    35    29   584     - |  288   0.33
   14 |    23    41    31    24    19    33    23   755     - |  288   0.21
   15 |    36    38    39    13    37    41    21  7110     - |  288   2.91
   16 |    38    49    38     9    34    24    36   389     - |  288   0.40
   17 |    42    43    32    19    20    39    35  1384     - |  288   1.25
   18 |    66    45    23    31    32    34    25   858     - |  288   0.35
   19 |    19    49    26    16    25    35    35   744     - |  288   0.30
   20 |    59    52    37    24    29    27    24   522     - |  288   0.26
   21 |    55    36    29    11    33    40    45  1080     - |  288   0.28
   22 |    54    35    38    24    26    23    26  2031     - |  288   0.38
   24 |    31    34    39    30    14    28    39  3662     - |  288   2.89
   25 |    48    41    31    34    31    21    32  4733     - |  288   2.31
   26 |    40    54    32    21    25    54    46  3360     - |  288   1.24
   27 |    56    52    63    49    40    40    48  2629     - |  288   1.10
   28 |    47    60    31    34    49    30    34  1659     - |  288   0.57
   29 |    46    49    34    15    27    52    24  1637     - |  288   1.06
   30 |    46    61    33    51    22    26    27  1061     - |  288   1.28
   31 |    24    51    24    15    22    23    51  4202     - |  288   1.06
 -----+-------------------------------------------------------+--------------
 ALBH |    30    25     -     -     9     -    16     -     - |  288   5.15
 ALGO |    19    18     X    18     8    16    19     -     - |  288   0.04
 ALIC |    18     -     -     -     -    18    17     -     - |  288   8.35
 ALRT |    19     -     -    13    11     -    30     -     - |  288   5.51
 AMC2 |    20    18     -     -    14    15    21     -     - |  288   0.03
 AREQ |     -    29    88    34    24     X     X     -     - |  263  11.88
 ARTU |    20     -    36    19    13    16    27     -     - |  288  12.02
 ASPA |     -     -     -    45     -    44     -     -     - |  288    >>>
 AUCK |    42     -     X     -    93    19    34     -     - |  264  12.92
 BAHR |    24    23     -    30    25     -    26     -     - |  288   1.09
 BAN2 |     -     -     -    19    24     -    22     -     - |  196  15.54
 BJFS |    28     -     -    42     -    35    59     -     - |  287   8.76
 BOGT |    36     -     -    32    60     X     X     -     - |  283  13.54
 BOR1 |    19     -     -     -    14     -    20     -     - |  287   0.75
 BREW |     -    16     -     -    15     -    15     -     - |  288   0.04
 BRUS |    11    17     -     -    14     -    16     -     - |  288   0.04
 CAS1 |    34     -    33    12    19    18    37     -     - |  288   8.07
 CEDU |    15     -    50     -    14     -    27     -     - |  288  13.13
 CHAT |    30     -     -    41    35    21    18     -     - |  287  13.02
 CHUR |    16     -     -     -    21     -    16     -     - |  288  20.41
 COCO |    28     -    55    34    11    23    19     -     - |  288   8.80
 CRO1 |     -    43     X     -    24    34     X     -     - |  275  18.10
 DARW |    25     -     -     -     -     -    26     -     - |  288  10.28
 DAV1 |    29     -     -    25    18    20    37     -     - |  288  14.95
 DGAR |    19     -     -    17    14    16    17     -     - |  288  13.61
 DRAO |    32    12     -    19     -     -    19     -     - |  288   0.11
 DUBO |    24     -     -     -     -    21     -     -     - |  288  14.49
 DWH1 |    27    16     -     -    10    17    15     -     - |  288   0.59
 FAIR |    26    10    31    17    13    13    28     -     - |  288   0.12
 FORT |    21    24     -     -     -     -     -     -     - |  282   0.08
 GLPS |    18     -    46    19    17    18    19     -     - |  288  10.57
 GODE |    25    17    44     -    12     -    17     -     - |  288   0.07
 GOLD |    58     -    57    31    26     -     -     -     - |  284  13.15
 HARB |    16     -     -    15     -     -     -     -     - |  287  45.21
 HERS |    61    80     -     -    26     -    87     -     - |  264  18.60
 HOB2 |    35    19     -    23    27    15    25     -     - |  288   0.05
 HRAO |    38     -    23     -    23    25    16     -     - |  288   0.89
 HYDE |    10     -     -     -     -     -    10     -     - |  288  14.39
 IISC |    20     -    26    24    22    22    27     -     - |  288  12.84
 INVK |    19     -     -    17     -     -     -     -     - |  288   7.00
 IRKT |    24    40     -     -     -     -    43     -     - |  288   0.17
 ISPA |    36     -     -    23    11    22     -     -     - |  288   8.80
 JAB1 |    17     -    36     -     -     -    24     -     - |  288  13.26
 JPLM |     -    14     -    21    33     -    22     -     - |  288   6.12
 KARR |    20     -     -     -     -    17    17     -     - |  288   9.25
 KERG |     -    15    22    16    41    20    26     -     - |  288   1.51
 KGN0 |    32    35     -     -    13     -     -     -     - |  287   0.53
 KIRU |    36     -     -     -    41     -    37     -     - |  279   8.15
 KIT3 |     -     -    35    22    45    20    20     -     - |  276  30.39
 KOKB |    43    31     -    51    16    26    21     -     - |  288   0.07
 KOUR |    27     -    51    20    13     -    27     -     - |  288   1.88
 LAE1 |    36     -     -    35    53    22    23     -     - |  287  12.32
 LHAS |    22     -    26    22    21     -     -     -     - |  288  11.96
 LPGS |    43    23    60     X    10    15    36     -     - |  288  97.96
 MAC1 |    88     -     X     X    96    35    56     -     - |  287  13.42
 MALI |     -     -    49    26    25     -     X     -     - |  285  19.26
 MAS1 |    37    17    22    21    15    19    21     -     - |  288   2.96
 MATE |    28     -     -    27    18     -    31     -     - |  288   0.06
 MAW1 |    19     -    32     -    17     -     -     -     - |  288  26.53
 MBAR |    60     -     -    32    18    57     -     -     - |  288  19.58
 MCM4 |     -     -    56    27     -    21    35     -     - |  288   8.88
 MDO1 |     -    16     -    13    17     -     -     -     - |  288  24.16
 MDVJ |    15     -     -     -     -     -    15     -     - |  288   0.05
 MEDI |    22    25     -     -    28     -    38     -     - |  288   0.15
 METS |    20    33     -    35    15     -    55     -     - |  287  12.25
 MIZU |     -    26     X    26    31    16    34     -     - |  288   0.63
 MKEA |     -     -    34     -    34     -    21     -     - |  288  20.62
 NKLG |     -     -     -    10    15    10     X     -     - |   98  69.62
 NLIB |     -    24     -    36    19     -    35     -     - |  288 275.55
 NNOR |     -    20     X     -    22     -    18     -     - |  276  20.31
 NOT1 |    27     -     -     -     -    18    31     -     - |  288   0.14
 NOUM |     -     -     -    40     -    40     -     -     - |  288    >>>
 NPLD |    38    42     -     -    37     -     -     -     - |  287   0.04
 NRC1 |    21     9     -    14    12     -    29     -     - |  288   0.04
 NRIL |    17     -     -    24    17     9    35     -     - |  288   9.52
 NYA1 |    13     -     -    40    21    19    43     -     - |  288   0.08
 NYAL |     -    27     -     -    21     -    25     -     - |  288   0.08
 OBET |     -    28     -    22     -     -     -     -     - |  287   0.05
 OHI2 |    51     -   120    28     -     -    40     -     - |  288   6.41
 ONSA |    32     X    36    39    93    34    43     -     - |  259   0.05
 PDEL |    24     -    38    32    14    26     -     -     - |  288  55.41
 PERT |    38    18    96     -    20    20    23     -     - |  288   2.04
 PETP |    23     -     -    20    31    15     -     -     - |  287  11.08
 PIE1 |     -    32    32     -    32     -    37     -     - |  254   0.41
 PIMO |     -     -     -    51     -    85   146     -     - |  232  21.70
 POL2 |    20     -    32     -    18     -    14     -     - |  288   9.18
 POTS |    28     -     -    25    10     -     -     -     - |  288  32.33
 PRDS |    21    22     -     -    14     -    20     -     - |  288   1.52
 PTBB |    15    15     -     -    18     -    13     -     - |  288   0.22
 RAMO |    21     -     -     -     -    18     -     -     - |  288  16.63
 RESO |    12     -     -    11    19     -     -     -     - |  288   7.07
 REYK |    30     -     -    43    26    34     -     -     - |  288   7.49
 RIOG |    45     -    52    33    33    23    57     -     - |  287  10.41
 SANT |    44     -    44    35    21    21    42     -     - |  282   8.88
 SCH2 |    27    27     -     -    10    12    18     -     - |  288  24.83
 SCUB |     -     -     -     -     -    39    46     -     - |  285  12.63
 SEY1 |     -     -     -    17     -     X    20     -     - |  288  14.34
 SFER |    47    52     -     -    37     -     X     -     - |  182 832.64
 SPT0 |    27     X     -     -     X     -    28     -     - |  288   0.06
 STJO |    19    19     -    42    13    23    23     -     - |  288   0.05
 STR1 |     -    23     -     -    27     -    22     -     - |  217   0.67
 SUTH |    21     -     -    17    28     -    23     -     - |  288   7.62
 SUTM |     -    16     -    16     -     -    20     -     - |  288   9.68
 SUWN |    22    25     -     -     -     -     -     -     - |  288   1.52
 SYOG |    27    26     -    32     -    24    46     -     - |  288   0.76
 THTI |     -    31    97    64    26    42    28     -     - |  288   3.03
 THU3 |    17    20     -    17    16     -     -     -     - |  287   6.62
 TIDB |    17    24    40     -    31     -    19     -     - |  288   0.06
 TIXI |    23     -    38    23    16    20    43     -     - |  287   6.31
 TLSE |     -     -     -     -     -    20    23     -     - |  287   0.43
 TOW2 |    25     -     -    26     -    23    23     -     - |  288  10.06
 TSKB |    30    30    58    31    11    38    53     -     - |  288   1.38
 TWTF |    32    31     -    42    25    20     -     -     - |  288   0.75
 URUM |    22     -     -    30    17    16     -     -     - |  288  42.57
 USNO |    15    17     -     -    16     -    17     -     - |  288   0.03
 USUD |    41    35    42    31    41     -    23     -     - |  288  10.46
 VESL |     -     -     -     9     -     9     -     -     - |  269    >>>
 VILL |    27     -    35    26    15     -    32     -     - |  288  12.64
 WES2 |     -    36     -    18    38     -    23     -     - |  288   0.09
 WHIT |    23     -     -     -    23     -    23     -     - |  288   2.35
 WILL |    28    31     -     -    27     -     -     -     - |  288 166.02
 WTZR |    21    17    32    18    11    26    20     -     - |  288   0.08
 WUHN |    17    26     -    21    19     -    31     -     - |  287  13.13
 YAR2 |    24     -     -    21    34     -     -     -     - |  288   4.63
 YEBE |     -    18     -     -    23     -    16     -     - |  168   0.18
 YELL |    18    22    25    11     8    18    27     -     - |  288   0.03
 YIBL |     -     -     -    25     -    33    36     -     - |  288  17.88
 YKRO |    27     -     -    24     -    25    27     -     - |  288  98.06
 YSSK |    42     -     -    51    30     -    38     -     - |  287   8.15
 ZWEN |    20     -    44    22    22     -    23     -     - |  288  17.12
 -----+-------------------------------------------------------+--------------
 TOT  |    33    36    47    31    28    30    34  2982     - |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.88   | 3.94e-14  6.44e-15  2.47e-15 |
 AMC2 |   288     0     0   288    9.57   | 4.86e-14  1.20e-14  4.15e-15 |
 BREW |   288     0     0   288    6.50   | 4.53e-14  9.35e-15  1.28e-15 |
 USNO |   288     0     0   288    5.66   | 4.65e-14  1.15e-14  3.85e-15 |
 NPLD |   287     0     0   286    5.46   | 4.22e-14  1.07e-14  5.42e-15 |
 SPT0 |   288     0     0   288    5.08   | 3.93e-14  9.41e-15  3.05e-15 |
 YELL |   288     0     0   288    4.99   | 2.89e-14  4.95e-15  9.91e-16 |
 WTZR |   288     0     0   288    4.82   | 3.97e-14  2.30e-14  7.86e-15 |
 OBET |   287     0     0   142    4.36   | 5.06e-14  1.25e-14  3.75e-15 |
 NRC1 |   288     0     0   288    4.34   | 2.56e-14  8.79e-15  3.26e-15 |
 ONSA |   259     0     0   258    3.51   | 3.84e-14  8.87e-15  3.76e-15 |
 KOKB |   288     0     0   288    3.40   | 4.33e-14  7.51e-15  5.49e-15 |
 HOB2 |   288     0     0   288    3.32   | 3.64e-14  9.97e-15  2.99e-15 |
 NOT1 |   288     0     0   288    3.32   | 4.18e-14  1.79e-14  8.37e-15 |
 STJO |   288     0     0   288    2.83   | 5.19e-14  1.22e-14  5.47e-15 |
 WES2 |   288     0     0   288    2.58   | 3.71e-14  1.05e-14  5.33e-15 |
 NLIB |   288     1     0   287    2.44   | 4.00e-14  8.91e-15  1.75e-15 |
 ALGO |   288     0     0   288    2.31   | 2.77e-14  9.39e-15  4.48e-15 |
 NYA1 |   288     0     0   288    2.00   | 2.47e-14  9.82e-15  3.56e-15 |
 NYAL |   288     0     0   288    1.97   | 3.88e-14  1.12e-14  4.08e-15 |
 MATE |   288     0     0   288    1.86   | 5.30e-14  1.82e-14  3.76e-15 |
 TIDB |   288     0     0   288    1.77   | 1.68e-13  1.68e-14  3.54e-15 |
 FAIR |   288     0     0   288    1.54   | 3.72e-14  9.17e-15  6.79e-15 |
 MDVJ |   288     0     0   143    1.46   | 5.82e-14  1.20e-14  5.01e-15 |
 MEDI |   288     0     0   288    0.97   | 4.80e-14  1.10e-14  7.98e-15 |
 PIE1 |   254     0     0   108    0.86   | 1.03e-13  1.97e-14         - |
 DRAO |   288     1     0   287    0.82   | 6.89e-14  2.34e-14  1.06e-14 |
 FORT |   282     0     0   277    0.78   | 4.88e-14  1.82e-14  8.90e-15 |
 G07  |   288     0     0   288    0.21   | 2.72e-13  5.90e-14  4.40e-14 |
 PTBB |   288     0     0   288    0.16   | 3.17e-13  5.52e-14  1.53e-14 |
 IRKT |   288     0     0   143    0.15   | 5.82e-14  1.91e-14  2.13e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.41e-13  9.80e-14  3.65e-14 |
 MIZU |   288     0     0   288    0.11   | 3.77e-13  1.04e-13  4.04e-14 |
 G16  |   288     0     0   288    0.11   | 4.58e-13  5.95e-14  4.67e-14 |
 BOR1 |   287     0     0   286    0.07   | 4.80e-13  1.33e-13  8.41e-14 |
 TLSE |   287     0     0   286    0.07   | 4.41e-13  9.00e-14  5.11e-14 |
 TWTF |   288     0     0   288    0.06   | 4.16e-13  1.22e-13  7.90e-14 |
 G04  |   288     0     0   288    0.06   | 4.44e-13  1.20e-13  9.82e-14 |
 G30  |   288     0     0   288    0.06   | 3.07e-13  8.84e-14  8.21e-14 |
 G26  |   288     0     0   288    0.06   | 3.41e-13  1.24e-13  9.62e-14 |
 G27  |   288     0     0   288    0.05   | 3.19e-13  1.14e-13  8.86e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.00e-13  1.07e-13  3.92e-14 |
 G31  |   288     0     0   288    0.04   | 2.03e-13  9.53e-14  7.13e-14 |
 G29  |   288     0     0   288    0.04   | 3.93e-13  1.09e-13  1.20e-13 |
 HRAO |   288     0     0   288    0.03   | 1.41e-13  4.08e-14  1.01e-13 |
 G17  |   288     0     0   288    0.03   | 3.50e-13  1.49e-13  1.17e-13 |
 SYOG |   288     0     0   288    0.02   | 7.30e-13  2.35e-13  6.08e-14 |
 STR1 |   217     0     0   217    0.02   | 7.42e-13  1.43e-13         - |
 SFER |   182     1     0    52    0.02   | 3.54e-13  1.22e-13         - |
 G06  |   288     0     0   288    0.02   | 4.78e-13  1.70e-13  1.25e-13 |
 TSKB |   288     0     0   288    0.02   | 1.02e-12  2.93e-13  1.04e-13 |
 GODE |   288     0     0   288    0.01   | 5.06e-14  1.34e-14  3.09e-15 |
 KERG |   288     0     0   288    0.01   | 1.25e-12  3.94e-13  1.51e-13 |
 KOUR |   288     0     0   288    0.01   | 1.42e-12  5.33e-13  1.87e-13 |
 SUWN |   288     0     0   143    0.01   | 9.73e-13  2.70e-13  1.55e-13 |
 G03  |   288     0     0   288    0.01   | 1.32e-12  3.89e-13  1.88e-13 |
 PRDS |   288     0     0   288    0.01   | 1.58e-12  4.66e-13  1.04e-13 |
 BAHR |   288     0     0   288    0.01   | 3.24e-13  1.56e-13  8.16e-14 |
 G15  |   288     0     0   288    0.00   | 1.63e-12  4.10e-13  2.72e-13 |
 GPST |   288     0     0     0    0.00   | 1.43e-14  3.97e-15  2.39e-15 |
 YEBE |   168     0     3     0    0.00   | 3.06e-13  4.10e-14         - |
 BAN2 |   196     0     0     0    0.00   |        -         -         - |
 VESL |   269     0     0     0    0.00   |        -         -         - |
 NNOR |   276     2     0     0    0.00   |        -         -         - |
 SANT |   282     0     0     0    0.00   | 1.89e-12  8.48e-13  8.11e-13 |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |    98     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.37e-13  7.30e-14  5.41e-14 |
 G25  |   288     0     0     0    0.00   | 1.38e-12  4.78e-13  2.82e-13 |
 G24  |   288     0     0     0    0.00   | 1.27e-12  4.16e-13  3.24e-13 |
 G22  |   288     0     6     0    0.00   | 7.48e-13  7.85e-14  2.50e-14 |
 G21  |   288     1     6     0    0.00   | 8.01e-13  1.02e-13  1.85e-14 |
 G20  |   288     0     5     0    0.00   | 6.47e-13  7.61e-14  1.91e-14 |
 G19  |   288     1     6     0    0.00   | 6.14e-13  8.27e-14  2.07e-14 |
 G18  |   288     0     6     0    0.00   | 1.31e-12  1.16e-13  3.78e-14 |
 G14  |   288     1     6     0    0.00   | 5.24e-13  7.01e-14  2.27e-14 |
 G13  |   288     0     6     0    0.00   | 5.99e-13  1.05e-13  2.27e-14 |
 G11  |   288     0     6     0    0.00   | 7.30e-13  7.15e-14  4.11e-14 |
 G10  |   288     0     0     0    0.00   | 1.25e-12  4.10e-13  1.95e-13 |
 G09  |   288     0     0     0    0.00   | 1.45e-12  5.73e-13  2.65e-13 |
 G08  |   279     0     0     0    0.00   | 1.40e-12  3.94e-13  2.17e-13 |
 G05  |   288     0     1     0    0.00   | 1.46e-12  4.42e-13  3.69e-13 |
 G01  |   288     0     0     0    0.00   | 1.66e-12  6.61e-13  4.64e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   288     2     0     0    0.00   |        -         -         - |
 YIBL |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 8.35e-13  1.13e-12  3.63e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.75e-13  3.04e-13  1.47e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     1     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     1     0     0    0.00   |        -         -         - |
 THU3 |   287     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.92e-13  1.77e-13  2.23e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   285     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 5.89e-13  4.36e-13  1.90e-12 |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   232     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.95e-12  5.68e-13  2.38e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 8.34e-13  7.03e-13  1.74e-12 |
 MCM4 |   288     0     0     0    0.00   | 6.27e-13  2.18e-13  4.92e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.75e-12  6.79e-13  2.91e-13 |
 MALI |   285     0     0     0    0.00   |        -         -         - |
 MAC1 |   287     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   276     0     0     0    0.00   |        -         -         - |
 KIRU |   279     2     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.27e-13  2.57e-13  5.84e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   275     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.96e-13  1.34e-12  6.86e-13 |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   283     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   263     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.30e-17  3.96e-16  2.37e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      YELL |
------------------------------------------+------------------------------+
