
 GPS week: 1293   Day: 5   MJD: 53300                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  35887    343    -0.04     0.19     0.04    17.19      0
 emr |   288     0  25064     82  1922.41    41.04     0.04    19.29      0
 esa |   288     0  20809   1489  1921.51    40.95     0.06    10.16      0
 gfz |   288     0  28959   1428     0.02     0.47     0.04    19.62      0
 igr |   288     0  34058    410     2.25     2.52     0.04     0.00      0
 jpl |   288     0  25590    618    -4.18     2.46     0.05    15.62      0
 mit |   288     0  35618   1222    -0.56     1.26     0.04    18.12      0
 ngs |    96     0   2664      0     0.26    -0.26     2.82     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -10  -183   -92   -31  -110  -108   375 -5284     - |
    3 |   -80  -258   -57   -63  -180  -140   558  1146     - |
    4 |    44  -207    43   -36   -31   -94   267  -402     - |
    5 |  -141    26    67   -87   -90  -224   349  1099     - |
    6 |     X   -76     X   -68   -91  -249   352 -2348     - |
    7 |   -44    52    52    16   -14   -70     X -2551     - |
    8 |    -3  -275   -70  -143  -105   -29   513 -2299     - |
    9 |   -40   -23  -135   -68   -29  -105   303 -7669     - |
   10 |    -7   -92  -148   -68  -113  -182   406 -1057     - |
   11 |   217  -156   -79   119    84   133  -240  3381     - |
   13 |   241  -200   124    85    37     6  -180  6514     - |
   14 |   114   -18    -6   143   139    45  -275  3053     - |
   15 |   -45   -74   162   102   -42  -102     X -7527     - |
   16 |   -30   -28    -4    63    42     7   -14  4029     - |
   17 |  -139  -211   182    90   -73  -274   367  2195     - |
   18 |    70    90  -104   118   117   102  -313  4169     - |
   19 |    99  -189  -122   -52   -62    45   191  7783     - |
   20 |   114  -126    25    83    54    56  -124  5549     - |
   21 |    38    24     0    69    78     9  -143  4292     - |
   22 |   171    41   -32   160   148    80  -427 -4814     - |
   23 |   119  -163    76   193    42   133  -296   172     - |
   24 |   -54  -236   -33   117   -64  -186   336   390     - |
   25 |  -131   -25   -32   -79   -69  -153   371 -5594     - |
   26 |   -22  -152    14   -22   -67   -62   252 -2381     - |
   27 |    14  -300   -46   -40   -79  -182   520 -1303     - |
   28 |   138  -105   -12   134    75    55  -203  3002     - |
   29 |   -72   -66    10   -14   -94  -112   245 -3736     - |
   30 |   -94   -96    55    19   -32  -154   272 -1533     - |
   31 |   -49     -    83     -     -     -     -     -     - |
 -----+-------------------------------------------------------+
 ALBH |   -44    10     -     -     4     -    32     -     - |
 ALGO |  -182   149     X   -82   -78    52    57     -     - |
 ALRT |   -11     -     -    18   -45     -    -9     -     - |
 AMC2 |  -137    95     -     -   -62    74   -36     -     - |
 AREQ |     -    62     -    14    88   -95     1     -     - |
 ARTU |    89     -    41  -114   -40   -42    52     -     - |
 ASC1 |    62     -     -   -54  -187     -     -     -     - |
 BAHR |   -20    58     -   -38   -26     -    -2     -     - |
 BAN2 |     -   149     -     X     -     -  -159     -     - |
 BILI |    91     -     -   -62   -29    43   -56     -     - |
 BJFS |    81     -     -    13     -   123  -197     -     - |
 BOGT |  -123     -     -    79  -157   -70    91     -     - |
 BOR1 |  -300     -     -     -     -     -   285     -     - |
 BREW |     -    36     -     -    15     -   -38     -     - |
 BRUS |    59    10     -     -    94     -   -67     -     - |
 CHAT |   -47     -     -    -5   -12    73   -13     -     - |
 CHUR |    32    39     -     -   -49   -23   -52     -     - |
 CRO1 |    55    60   -74     -   -73   -61   -25     -     - |
 DGAR |   -47     -   -19   -19    49    88    -1     -     - |
 DRAO |   -21   -59   271  -165   -18     -   110     -     - |
 DWH1 |   162    79     -     -   -47  -308    28     -     - |
 FAIR |   -74   -16   236   -17   -31   -22    -7     -     - |
 FORT |   193     -    26   -87     -   -15   -94     -     - |
 GLPS |    99     -     -    23    67   -34   -86     -     - |
 GMAS |     -   131     -     -     -    86  -214     -     - |
 GODE |   -55    67  -190     -   -37     -    88     -     - |
 GOLD |     2     -   -58    28    53     -     -     -     - |
 GUAM |   126     -  -143    62   -59  -119    -3     -     - |
 GUAT |   114     -     -     -     -  -126     -     -     - |
 HARB |    36     -     -   -32     -     -     -     -     - |
 HERS |   -32   -56     -     -   318     -    85     -     - |
 HLFX |     -   200     -     -     -  -247     -     -     - |
 HRAO |    23     -    44     -    64   122  -152     -     - |
 HYDE |   -83     -     -     -     -    64    23     -     - |
 IENG |   -78    69     -     -   244     -     -     -     - |
 IISC |    31     -   -68   105    55     -  -105     -     - |
 INVK |   -20     -     -    18   -54     -     -     -     - |
 ISPA |     1     -    68    45   -51  -102     -     -     - |
 JPLM |     -    82     -  -112    64     -    34     -     - |
 KARR |  -158     -     -     -     -   602  -369     -     - |
 KERG |   -23   -14  -118    86   -25     3     7     -     - |
 KGN0 |    10    -9     -     -    25     -     -     -     - |
 KIRU |    40     -     -     -   -21     -   -38     -     - |
 KIT3 |     -     -   -60  -232  -102   368   -33     -     - |
 KOKB |    28    26     -   -87    44   119   -64     -     - |
 KOUR |   203     -  -336   -10   103    10     X     -     - |
 KUNM |     -     -     -     -    88    86   -74     -     - |
 LPGS |  -234    19   -83     X   -68  -316   591     -     - |
 MAG0 |    25     -     -     -    -5   -27     -     -     - |
 MALI |     -     -    59   -31    -5     -     X     -     - |
 MAS1 |   -58   -46   -36     9    -7     -   114     -     - |
 MATE |    17     -  -474    38     -     -   208     -     - |
 MBAR |   -96     -     -     4   -49   100     -     -     - |
 MCM4 |   126  -450   507     X  -312     -    76     -     - |
 MDO1 |     -     3     -   -83    -1   117   -14     -     - |
 MDVJ |   129     -     -     -     -     -  -122     -     - |
 MEDI |   -77    -1     -     -    37     -    74     -     - |
 MIZU |     -    11     X  -135    -2     -   134     -     - |
 MKEA |    55     -   -86     -   -35     -    -4     -     - |
 MSKU |  -108     -     -   109     8     -   -16     -     - |
 NKLG |     -     -    16   -71   -21    79     -     -     - |
 NLIB |     -   -23     -   -53    55     8    75     -     - |
 NNOR |     -   105  -212     -    58     -    10     -     - |
 NOT1 |   119     -     -     -     -   133  -228     -     - |
 NPLD |  -106    34     -     -    44    75     -     -     - |
 NRC1 |    -2   162     -   -92   -16     -   -71     -     - |
 NRIL |    -1     -     -     X   -72     X     0     -     - |
 NTUS |  -156     -    84   -21    -4   207   -55     -     - |
 NYA1 |    76     -     -   -75   -48   -43    46     -     - |
 NYAL |     -    49     -     -     -     -   -52     -     - |
 OHI2 |     4     -    94   -49     -     -    -3     -     - |
 ONSA |    40    63   -19   -50    -9   -64    15     -     - |
 OPMT |   -27     -     -    24     -     -     -     -     - |
 OUS2 |     -     -     -     5     -    -7     -     -     - |
 PDEL |  -161     -   273     -     -     -     -     -     - |
 PERT |  -145    91     X     -   -36    73   -22     -     - |
 PETP |    58     -     -   -51   -14     -     -     -     - |
 PIE1 |   -81    69    61     -    34     -   -31     -     - |
 PIMO |     5     -   155    40     9   -58   -77     -     - |
 POL2 |    28     -    96     -   -32     -   -80     -     - |
 POTS |   -62     -     -    54   -44     -     -     -     - |
 PRDS |    55    92     -     -   104     -  -150     -     - |
 PTBB |    77    38     -     -    98     -  -114     -     - |
 QAQ1 |    29   165     -   -61   182  -269    95     -     - |
 QUIN |   -64     -     -     -     -    70     -     -     - |
 RAMO |  -176     -     -     -     -   297   -89     -     - |
 RESO |   -60     -     -    52   -54     -     -     -     - |
 REYK |     5     -     -    28   -36   -41     -     -     - |
 RIOG |    14   174   -12   -88     -   -99   -11     -     - |
 SANT |     -     -  -110   590     X     X  -566     -     - |
 SCH2 |  -147   100     -     -    29    66   -24     -     - |
 SFER |    27    31     -     -    97     -   -58     -     - |
 SPT0 |    57    -2     -     -    75     -   -52     -     - |
 STJO |     4    61     -   -61   -49   112  -100     -     - |
 STR1 |     -   143     -     -     -     -  -152     -     - |
 SUTH |    69     -     -     -   188     -   -65     -     - |
 SUTM |     -   148     -     X     -    67  -215     -     - |
 SYOG |   101     -     -   -89     -     -     -     -     - |
 THTI |     -    -8    -6   105   -54     -  -101     -     - |
 THU3 |   -59    22     -    13    -7    21     -     -     - |
 TID2 |     -     -     -    -5     -     6     -     -     - |
 TIDB |   -37    88   206     -    -9     -  -174     -     - |
 TLSE |   153    43     -     -   119     -  -231     -     - |
 TNML |     -   127     -     -     -     -  -135     -     - |
 TOW2 |    -2     -    80    85     -    45  -174     -     - |
 TRO1 |   176     -     -   -62   -49     -  -101     -     - |
 TSKB |   -64    40    66    97    -1     7  -131     -     - |
 TWTF |    70    94     -  -205    44    98   -29     -     - |
 UNSA |     -     -   136   -70     -     -     -     -     - |
 URUM |   -11     -     -    10   106     -     -     -     - |
 USUD |   -10     2    60     -   117     -   -26     -     - |
 VILL |   -24     -    13   -66    42     -    87     -     - |
 WHIT |    18     -     -     -    47     -   -17     -     - |
 WILL |   -22    43     -     -   -28     -   -25     -     - |
 WROC |     -   122     -     -     -     -  -130     -     - |
 WSRT |  -106    98     -   -50     -     -    50     -     - |
 WTZR |   -77   140  -196    19    44   148  -113     -     - |
 YAKT |    51     -     -     -     3   -22   -29     -     - |
 YEBE |     -   -34     -     -    71     -    36     -     - |
 YELL |   -58    82     X   -32    12    27   -22     -     - |
 YIBL |     -     -     -   -59     -   121   -41     -     - |
 YSSK |    25     -     -   -10     -    26   -35     -     - |
 ZAMB |     -     -     -   122  -173   -20  -115     -     - |
 ZECK |   -22     -     -    20     -     -     -     -     - |
 ZWEN |     -     -  -251     -  -262     -   141     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    53    45    24    20    24    32    29  7568     - |  288   4.67
    3 |   172    35    96    77    38    41    93  1750     - |  288   1.54
    4 |    51    32    27    21    15    35    23  1771     - |  288   0.56
    5 |    53    35    41    18    24    60    27  3971     - |  288   3.85
    6 |     X    40     X    17    70    45    34  2243     - |  277   1.45
    7 |    98   141   112    47    59    86     X  1234     - |  286   1.00
    8 |    45    34    52    18    25    34    29  2926     - |  288   2.08
    9 |    40    44    42    12    30    51    44  3456     - |  288   2.35
   10 |    46    39    40    18    21    33    25  2711     - |  288   2.28
   11 |    37    51    38    27    20    83    22  1228     - |  288   0.40
   13 |    48    53   141    65    62    46    77  2259     - |  288   0.69
   14 |    57    58    61    21    40    51    29  2037     - |  288   0.26
   15 |    26    41    57    21    45    23     X  3431     - |  226   2.33
   16 |    30    38    57    20    61    52    29   794     - |  288   0.36
   17 |    24    30    36    12    27    55    26  3830     - |  288   0.88
   18 |    38    33    71    31    24    57    30   862     - |  288   0.39
   19 |    56    40    37    19    44    51    97  1038     - |  288   0.37
   20 |    43    37    70    26    29    65    28   692     - |  288   0.31
   21 |    37    42    36    27    33    68    61   849     - |  288   0.30
   22 |    51    55    65    24    32    50    34  1534     - |  288   0.35
   23 |    47    38    95    30    34    51    59   945     - |  288   0.27
   24 |    39    28    33    19    15    42    37  3205     - |  288   2.77
   25 |    35    44    36    20    40    49    28  6604     - |  288   2.10
   26 |    43    23    87    15    28    52    27  2122     - |  288   0.53
   27 |    43    34    25    24    25    58    37  1412     - |  288   0.53
   28 |    48    38    59    23    51    41    52  1442     - |  288   0.52
   29 |    48    54    92    15    40    50    32   823     - |  288   0.82
   30 |    55    30    57    21    35    55    28  2197     - |  288   0.87
   31 |    38     -    65     -     -     -     -     -     - |  288   1.22
 -----+-------------------------------------------------------+--------------
 ALBH |    16    33     -     -    26     -    38     -     - |  288   0.05
 ALGO |    21    19     X    34     8    21    23     -     - |  288   0.03
 ALRT |    24     -     -    24    14     -    45     -     - |  288   6.50
 AMC2 |    18    20     -     -     8    23    18     -     - |  288  24.93
 AREQ |     -    13     -    16    29    29    15     -     - |  288  16.85
 ARTU |    25     -    40    30     9    16    33     -     - |  288  10.63
 ASC1 |   189     -     -   166   221     -     -     -     - |  275    >>>
 BAHR |    41    17     -    33    23     -    18     -     - |  288   0.63
 BAN2 |     -    27     -     X     -     -    29     -     - |  288  13.91
 BILI |    20     -     -    14    27    20    30     -     - |  287  10.03
 BJFS |    16     -     -    18     -    16    18     -     - |  287   9.02
 BOGT |    48     -     -    41    21    48    52     -     - |  286  27.60
 BOR1 |    16     -     -     -     -     -    16     -     - |  139   0.32
 BREW |     -    27     -     -    22     -    29     -     - |  288   0.05
 BRUS |    13    29     -     -    26     -    34     -     - |  288   0.02
 CHAT |    58     -     -    74    24    51    78     -     - |  287   9.62
 CHUR |    12    12     -     -    16    29    28     -     - |  288   0.07
 CRO1 |    28    28   143     -    68    61   110     -     - |  288  20.13
 DGAR |    21     -    34    35    10    28    29     -     - |  288  22.37
 DRAO |    29    19    40    32    15     -    41     -     - |  288   0.12
 DWH1 |    15    30     -     -    24    21    40     -     - |  288   0.47
 FAIR |    12    21    45    35    16    13    33     -     - |  288   0.13
 FORT |    40     -    64    31     -    65    26     -     - |  288   0.13
 GLPS |    47     -     -    37    36    29    24     -     - |  288  26.64
 GMAS |     -    24     -     -     -    38    16     -     - |  288   4.92
 GODE |    28    16    23     -    11     -    30     -     - |  288   0.11
 GOLD |    66     -   103    19    68     -     -     -     - |  288  12.78
 GUAM |    25     -    45    29    21    31    30     -     - |  288  17.13
 GUAT |    17     -     -     -     -    19     -     -     - |  287    >>>
 HARB |    34     -     -    30     -     -     -     -     - |  287  36.83
 HERS |    41    46     -     -    32     -    29     -     - |  264   8.01
 HLFX |     -    33     -     -     -    41     -     -     - |  288  11.07
 HRAO |    29     -    54     -    27    27    18     -     - |  288   0.66
 HYDE |    14     -     -     -     -    22    18     -     - |  288  24.12
 IENG |    23    21     -     -    10     -     -     -     - |  288   0.73
 IISC |    23     -    70    33    18     -    23     -     - |  288  26.27
 INVK |    13     -     -    12    24     -     -     -     - |  288   8.83
 ISPA |    36     -    34    23    28    48     -     -     - |  288  18.76
 JPLM |     -    25     -    17    21     -    35     -     - |  288  12.25
 KARR |    16     -     -     -     -    15    19     -     - |  288  15.19
 KERG |    34    23    32    23    32    33    23     -     - |  288   2.08
 KGN0 |    18    16     -     -    20     -     -     -     - |  287   0.40
 KIRU |    31     -     -     -    33     -    30     -     - |  288 131.74
 KIT3 |     -     -    24    23    11    24    22     -     - |  288  25.05
 KOKB |    21    35     -    27    19    30    34     -     - |  288   0.12
 KOUR |    34     -    62    27    33    43     X     -     - |  285   2.05
 KUNM |     -     -     -     -    20    19    17     -     - |  288  24.28
 LPGS |    26    28    95     X    40    52    35     -     - |  285  24.77
 MAG0 |    11     -     -     -    11    13     -     -     - |  287   9.88
 MALI |     -     -    63    33    48     -     X     -     - |  285  18.42
 MAS1 |    17    28    47    23     9     -    20     -     - |  288   1.82
 MATE |    18     -    31    24     -     -    24     -     - |  288   0.09
 MBAR |    73     -     -    26    52    75     -     -     - |  288  19.33
 MCM4 |    28    27    39     X    23     -    31     -     - |  288  29.22
 MDO1 |     -    20     -    32    19    39    44     -     - |  288   5.23
 MDVJ |    17     -     -     -     -     -    16     -     - |  215   0.05
 MEDI |    24    26     -     -    26     -    21     -     - |  288   0.18
 MIZU |     -    37     X    33    25     -    27     -     - |  288   0.37
 MKEA |    26     -    21     -    22     -    22     -     - |  288  26.43
 MSKU |   111     -     -    33    54     -   107     -     - |  288  23.76
 NKLG |     -     -    60    26    33    37     -     -     - |  287 812.19
 NLIB |     -    31     -    37    17    23    25     -     - |  288   0.04
 NNOR |     -    14    27     -    33     -    19     -     - |  288  14.75
 NOT1 |    33     -     -     -     -    21    19     -     - |  288   0.12
 NPLD |    14    25     -     -    18    32     -     -     - |  287   0.04
 NRC1 |    20    19     -    28    18     -    12     -     - |  288   0.03
 NRIL |    54     -     -     X    45     X    52     -     - |  287   8.49
 NTUS |    23     -    40    35    14    24    26     -     - |  288   9.78
 NYA1 |    18     -     -    14    18    21    43     -     - |  288   0.12
 NYAL |     -    33     -     -     -     -    35     -     - |  288   0.12
 OHI2 |    22     -    43    26     -     -    56     -     - |  288   7.75
 ONSA |    27    30    55    49    22    25    43     -     - |  288   0.04
 OPMT |    38     -     -    34     -     -     -     -     - |  287   0.04
 OUS2 |     -     -     -    72     -    90     -     -     - |  288   8.34
 PDEL |    36     -    61     -     -     -     -     -     - |  288  54.21
 PERT |    22    13     X     -    14    20    14     -     - |  288   3.05
 PETP |    14     -     -    12    27     -     -     -     - |  287  12.16
 PIE1 |    30    22    24     -    22     -    28     -     - |  288   0.03
 PIMO |    60     -   121    80    78    70   109     -     - |  284  23.50
 POL2 |    24     -    26     -    21     -    19     -     - |  288  10.24
 POTS |    16     -     -    14    15     -     -     -     - |  288  15.53
 PRDS |    17    21     -     -    14     -    20     -     - |  288   1.30
 PTBB |    20    30     -     -    18     -    37     -     - |  288   0.24
 QAQ1 |    19    46     -    17    20    34    18     -     - |  288   9.42
 QUIN |    12     -     -     -     -    13     -     -     - |  288  11.15
 RAMO |    12     -     -     -     -    21    22     -     - |  288  16.73
 RESO |     7     -     -     6    17     -     -     -     - |  288   7.44
 REYK |    18     -     -    10    21    21     -     -     - |  288   7.72
 RIOG |    29    23    50    23     -    22    40     -     - |  288  12.84
 SANT |     -     -    44    22     X     X    29     -     - |  288   8.05
 SCH2 |    17    24     -     -    10    28    14     -     - |  288   8.24
 SFER |    41    34     -     -    48     -    67     -     - |  287   0.43
 SPT0 |    58   128     -     -    46     -    83     -     - |  288   0.03
 STJO |    21    25     -    17    13    19    27     -     - |  288   0.07
 STR1 |     -    24     -     -     -     -    25     -     - |  288   0.86
 SUTH |    31     -     -     -    18     -    29     -     - |  288  15.88
 SUTM |     -    41     -     X     -   103   109     -     - |  274  32.62
 SYOG |    43     -     -    37     -     -     -     -     - |  282   0.93
 THTI |     -    35    42    34    26     -    36     -     - |  288   7.79
 THU3 |    13    18     -    14    19    22     -     -     - |  288   7.08
 TID2 |     -     -     -   141     -   177     -     -     - |  278   0.11
 TIDB |    16    25    62     -    33     -    28     -     - |  288   0.10
 TLSE |    94    85     -     -    86     -    34     -     - |  286   0.38
 TNML |     -    19     -     -     -     -    21     -     - |  288   1.82
 TOW2 |    37     -    48    28     -    17    28     -     - |  288  10.79
 TRO1 |    17     -     -    15    23     -    26     -     - |  288   9.63
 TSKB |    19    25    58    29     9    26    29     -     - |  288   1.18
 TWTF |    15    25     -    45    23    20    33     -     - |  288   0.44
 UNSA |     -     -    50    26     -     -     -     -     - |   80  12.86
 URUM |    14     -     -    12    34     -     -     -     - |  288  27.20
 USUD |    22    25    72     -    30     -    23     -     - |  288  10.28
 VILL |    26     -    48    17    18     -    14     -     - |  288 557.20
 WHIT |    26     -     -     -    39     -    24     -     - |  288   2.67
 WILL |    30    22     -     -    14     -    25     -     - |  288  69.59
 WROC |     -    13     -     -     -     -    14     -     - |  180  12.42
 WSRT |    19    27     -    31     -     -    34     -     - |  288   0.03
 WTZR |    21    35    25    26    18    28    37     -     - |  288   0.06
 YAKT |    14     -     -     -    32    33    33     -     - |  288   1.19
 YEBE |     -    26     -     -    37     -    27     -     - |  288   0.13
 YELL |    25    21     X    26    19    14    42     -     - |  288   0.02
 YIBL |     -     -     -    20     -    27    21     -     - |  288  26.85
 YSSK |    15     -     -    21     -    17    22     -     - |  287  10.39
 ZAMB |     -     -     -    23    22    12    27     -     - |  288  18.06
 ZECK |    14     -     -    12     -     -     -     -     - |  288  25.71
 ZWEN |     -     -    23     -    14     -    13     -     - |   84  85.99
 -----+-------------------------------------------------------+--------------
 TOT  |    42    38    60    37    37    46    40  2820     - |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     3     0   285    9.82   | 3.67e-14  9.72e-15  2.43e-15 |
 NPLD |   287     0     0   286    9.30   | 4.16e-14  1.68e-14  3.06e-15 |
 BREW |   288     0     0   288    9.03   | 4.09e-14  1.63e-14  4.91e-15 |
 ONSA |   288     0     0   288    7.82   | 4.93e-14  1.81e-14  2.93e-15 |
 SPT0 |   288     0     0   288    6.94   | 5.47e-14  1.77e-14  3.12e-15 |
 BRUS |   288     0     0   288    6.64   | 4.22e-14  8.57e-15  1.23e-15 |
 NLIB |   288     0     0   288    5.51   | 5.45e-14  1.48e-14  3.64e-15 |
 PIE1 |   288     0     0   287    5.29   | 4.43e-14  8.17e-15  5.03e-15 |
 YELL |   288     0     0   288    4.64   | 2.44e-14  5.73e-15  1.81e-15 |
 ALBH |   288     0     0   288    4.53   | 3.89e-14  1.12e-14  2.70e-15 |
 WTZR |   288     0     0   288    3.87   | 3.62e-14  1.73e-14  4.97e-15 |
 NYA1 |   288     0     0   288    2.61   | 2.59e-14  5.78e-15  8.39e-15 |
 ALGO |   288     0     0   288    2.39   | 2.67e-14  7.16e-15  3.48e-15 |
 KOKB |   288     0     0   288    2.38   | 4.89e-14  1.07e-14  9.91e-15 |
 NYAL |   288     0     0   288    2.26   | 3.91e-14  7.21e-15  8.47e-15 |
 MATE |   288     0     0   288    2.11   | 3.84e-14  1.30e-14  1.14e-14 |
 NRC1 |   288     0     0   288    1.97   | 2.80e-14  4.89e-15  3.03e-15 |
 WSRT |   288     0     0   288    1.88   | 3.45e-14  1.12e-14  2.28e-15 |
 STJO |   288     0     0   288    1.78   | 2.77e-14  5.88e-15  3.94e-15 |
 CHUR |   288     0     0   288    1.61   | 4.28e-14  9.12e-15  5.45e-15 |
 YEBE |   288     0     0   243    1.25   | 1.15e-13  1.66e-14  1.54e-14 |
 FORT |   288     0     0   288    1.10   | 7.57e-14  1.41e-14  7.82e-15 |
 MEDI |   288     0     0   288    1.01   | 4.23e-14  1.12e-14  1.12e-14 |
 DRAO |   288     0     0   288    0.82   | 6.37e-14  1.94e-14  1.07e-14 |
 MDVJ |   215     0     0    62    0.65   | 4.99e-14  1.64e-14         - |
 GODE |   288     0     0   288    0.52   | 3.30e-14  8.33e-15  1.02e-14 |
 NOT1 |   288     0     0   288    0.49   | 4.52e-14  2.85e-14  9.60e-15 |
 TIDB |   288     0     1    99    0.44   | 1.95e-13  1.99e-14  6.55e-15 |
 FAIR |   288     0     0   288    0.14   | 1.60e-13  4.12e-14  1.60e-14 |
 G16  |   288     0     0   288    0.14   | 5.01e-13  6.32e-14  4.23e-14 |
 MIZU |   288     0     0   288    0.09   | 3.69e-13  8.53e-14  2.52e-14 |
 SFER |   287     0     0   286    0.08   | 3.50e-13  9.88e-14  3.84e-14 |
 G27  |   288     0     0   288    0.08   | 3.25e-13  9.02e-14  5.35e-14 |
 HRAO |   288     0     0   288    0.07   | 1.15e-13  4.27e-14  8.33e-14 |
 TWTF |   288     0     0   288    0.07   | 3.87e-13  1.13e-13  3.38e-14 |
 TLSE |   286     0     0   284    0.07   | 4.68e-13  1.52e-13  3.10e-14 |
 G26  |   288     0     0   288    0.05   | 3.68e-13  9.77e-14  5.12e-14 |
 G29  |   288     0     0   288    0.05   | 4.06e-13  1.18e-13  1.02e-13 |
 KGN0 |   287     0     0   286    0.05   | 3.62e-13  1.11e-13  3.83e-14 |
 G19  |   288     0     1   144    0.04   | 5.91e-13  8.87e-14  3.82e-14 |
 G17  |   288     0     0   288    0.04   | 3.61e-13  1.23e-13  1.01e-13 |
 IENG |   288     0     0   288    0.04   | 5.00e-13  1.64e-13  3.53e-14 |
 TID2 |   278     0     0   143    0.04   | 4.36e-14  9.41e-15  6.74e-15 |
 G07  |   286     0     0   284    0.03   | 2.70e-13  9.49e-14  8.68e-14 |
 G04  |   288     0     0   288    0.03   | 4.66e-13  1.51e-13  5.25e-14 |
 G30  |   288     0     0   288    0.03   | 3.46e-13  1.18e-13  1.04e-13 |
 PTBB |   288     0     3    48    0.03   | 3.70e-13  8.48e-14  2.69e-14 |
 YAKT |   288     0     0   288    0.03   | 4.81e-13  1.41e-13  1.09e-13 |
 SYOG |   282     0     0   281    0.02   | 6.78e-13  2.18e-13  1.10e-13 |
 G06  |   277     0     0   275    0.02   | 4.54e-13  1.57e-13  1.34e-13 |
 DWH1 |   288     0     0   143    0.02   | 4.93e-13  1.68e-13  4.09e-14 |
 STR1 |   288     0     0   143    0.01   | 6.62e-13  2.05e-13  9.63e-14 |
 TSKB |   288     0     0   288    0.01   | 1.05e-12  2.79e-13  1.41e-13 |
 G31  |   288     0     0   143    0.01   | 2.23e-13  1.67e-13  1.24e-13 |
 TNML |   288     0     0   143    0.01   | 3.96e-13  1.40e-13  1.64e-13 |
 KERG |   288     0     0   288    0.01   | 1.07e-12  3.13e-13  1.68e-13 |
 PRDS |   288     0     0   288    0.01   | 1.42e-12  5.24e-13  1.05e-13 |
 KOUR |   285     0     0   284    0.01   | 1.45e-12  4.35e-13  9.40e-14 |
 G10  |   288     0     0   288    0.00   | 1.22e-12  3.67e-13  2.76e-13 |
 G03  |   288     0     0   288    0.00   | 1.37e-12  4.36e-13  1.24e-13 |
 G15  |   226     0     0   226    0.00   | 1.58e-12  3.95e-13         - |
 GMAS |   288     0     0   288    0.00   | 1.11e-12  2.65e-13  3.53e-13 |
 G25  |   288     0     1   144    0.00   | 1.37e-12  4.10e-13  2.28e-13 |
 MAS1 |   288     0     0   143    0.00   | 2.07e-12  6.01e-13  1.47e-13 |
 OPMT |   287     0     1   143    0.00   | 4.56e-14  1.15e-14  2.75e-15 |
 GPST |   288     0     0     0    0.00   | 1.97e-14  3.53e-15  1.24e-15 |
 ZWEN |    84     0     0     0    0.00   |        -         -         - |
 UNSA |    80     0     0     0    0.00   |        -         -         - |
 BOR1 |   139     0     0     0    0.00   | 5.07e-13  1.21e-13         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.30e-13  6.30e-14  4.79e-14 |
 G24  |   288     0     0     0    0.00   | 1.28e-12  3.90e-13  2.72e-13 |
 G23  |   288     0     3     0    0.00   | 4.90e-13  6.12e-14  1.63e-14 |
 G22  |   288     0     6     0    0.00   | 7.57e-13  8.10e-14  2.81e-14 |
 G21  |   288     0     6     0    0.00   | 9.23e-13  1.16e-13  2.90e-14 |
 G20  |   288     0     6     0    0.00   | 6.02e-13  7.50e-14  2.45e-14 |
 G18  |   288     0     6     0    0.00   | 1.25e-12  1.07e-13  3.93e-14 |
 G14  |   288     0     6     0    0.00   | 5.21e-13  5.87e-14  2.68e-14 |
 G13  |   288     1     4     0    0.00   | 7.30e-13  2.23e-13  5.22e-14 |
 G11  |   288     0     6     0    0.00   | 8.10e-13  7.95e-14  4.15e-14 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  5.07e-13  2.43e-13 |
 G08  |   288     0     0     0    0.00   | 1.44e-12  4.54e-13  2.57e-13 |
 G05  |   288     0     0     0    0.00   | 1.26e-12  4.78e-13  5.13e-13 |
 G01  |   288     0     0     0    0.00   | 1.55e-12  7.56e-13  5.56e-13 |
 ZECK |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   288     2     0     0    0.00   |        -         -         - |
 YIBL |   288     0     0     0    0.00   |        -         -         - |
 WROC |   180     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.73e-13  2.60e-13  2.34e-13 |
 VILL |   288     2     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.19e-13  2.45e-13  7.18e-13 |
 SUTM |   274     1     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 6.11e-13  2.68e-13  4.92e-13 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   284     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.90e-12  5.51e-13  3.88e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OUS2 |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   287     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 7.05e-13  1.02e-12  5.25e-13 |
 MCM4 |   288     0     1     0    0.00   | 6.79e-13  7.48e-13  2.01e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MALI |   285     0     0     0    0.00   |        -         -         - |
 LPGS |   285     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.55e-13  3.99e-13  1.19e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     2     1     0    0.00   | 1.94e-13  1.69e-13  7.91e-13 |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   286     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 BAHR |   288     0     6     0    0.00   | 7.05e-13  1.24e-13  6.14e-14 |
 ASC1 |   275     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.81e-17  4.57e-16  2.74e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      NRC1      BRUS |
------------------------------------------+------------------------------+
