
 GPS week: 1295   Day: 5   MJD: 53314                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  35933    237    -0.12     0.30     0.04    19.82      0
 emr |   288     0  26812    293  2468.82    40.08     0.08     9.33      0
 esa |   288     0  21434   1002  2468.16    40.04     0.06    12.03      0
 gfz |   288     0  31382    565    -0.01     0.00     0.04    23.03      0
 igr |   288     0  37412    219     0.12    -1.67     0.03     0.00      0
 jpl |   288     0  26468      1    -4.03    -1.43     0.05    16.79      0
 mit |   288     0  30295    524    -0.47     0.18     0.04    18.99      0
 ngs |    96     0   2780      4    -0.15     0.05     2.13     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -68  -121   -83     8   -99  -159   303 -3015     - |
    3 |  -134  -294   -20   -59   -99  -176   519 -2100     - |
    4 |    34  -120     7   -86   -73   -94   197 -3468     - |
    5 |   -54  -102    41  -164  -132  -129   393 -3205     - |
    6 |  -188  -190     X   -19  -141  -141   420 -1435     - |
    7 |   -87  -110   -56  -138  -153  -177   474 -1114     - |
    8 |   -48  -216  -100   -36   -94  -136   370  3746     - |
    9 |   -45  -151  -107   -74   -62    -6   284 -6185     - |
   10 |   -39  -209  -127   -38  -190  -217   443  -265     - |
   11 |    92   -29    59    90   106    33  -258  5867     - |
   13 |   187   -36    54    55    27     5  -279  4833     - |
   14 |    92   -80   -78   150    82    88  -253  3371     - |
   15 |  -153  -171   -23    -3   -91  -205   419 -1063     - |
   16 |   -10  -204    31    54    -3   -15    38  4017     - |
   17 |   -75  -155   -89   -23  -118  -149   362 -4197     - |
   18 |    84   -87    76    82    63    62  -245  3410     - |
   19 |    82  -139   -60  -148  -116    12   183  3285     - |
   20 |   104   -56    71    23    39    40  -189  4682     - |
   21 |    92   -76    47    50    54   -59  -102   201     - |
   22 |   134     7   123   104    48    18  -362  -330     - |
   23 |    91   -14  -140    68    18   130  -180  -881     - |
   24 |   -39  -219   -85   -60  -124     -   274  -752     - |
   25 |  -115  -188   -95   -21   -66  -157   424 -3602     - |
   26 |    37  -202   -50   -52  -115   -43   190 -1523     - |
   27 |   -58   -73   -73   -90   -57  -145   365  -785     - |
   28 |   113  -142    74    98   116    42  -249  5107     - |
   30 |   -46  -171   -29    52   -53  -130   203 -1184     - |
   31 |   -49  -212   -82   -49  -125  -122   354 -1804     - |
   29 |     -     -     -     -  -393  -220   195 -1829     - |
 -----+-------------------------------------------------------+
 ALBH |    12   -97     -     -    -7     -    35     -     - |
 ALGO |  -137    19   745  -116    64  -174   -30     -     - |
 ALRT |    39     -     -    44   -24   -35   -63     -     - |
 AMC2 |  -109   120     -     -    28   139   -68     -     - |
 AREQ |     -    22     -     3    17   -16     -     -     - |
 ARTU |   125     -    21   -88    -1   -42     -     -     - |
 ASPA |     -     -     -   189    47  -260     -     -     - |
 AUCK |   -30     -     X     -   -42    67   -28     -     - |
 BAHR |     1   120     -   -70   -36    26     -     -     - |
 BAN2 |     -  -211     -   638     -     -  -670     -     - |
 BILI |   117     -     -  -127   -27    96   -53     -     - |
 BJFS |    31     -     -   -26   139     -     -     -     - |
 BOGT |    -3     -     -    70   -64   -92     -     -     - |
 BOR1 |    72    66     -     -   110     -  -108     -     - |
 BRAZ |     -     -     -   -98     -   134     -     -     - |
 BRUS |    69    92     -     -   129     -  -117     -     - |
 CAS1 |   -76     -   168   -16   -49   156  -145     -     - |
 CEDU |  -244     -    48     -   -88   254     -     -     - |
 CHAT |   -72     -     -    23     -    84   -27     -     - |
 CHUR |    88   -64     -     -    56     -   -61     -     - |
 COCO |   -17     -   201   -22     4     5   -88     -     - |
 CRO1 |     -    44   -15     -  -105   -13     -     -     - |
 DAEJ |   -31    65     -     -    90     -     -     -     - |
 DARW |   123   -50     -     -     -     -  -104     -     - |
 DAV1 |   107     -     -   -61   -57    25   -60     -     - |
 DGAR |     0     -     6   -51   -16   142   -67     -     - |
 DRAO |   -53  -101   338  -114   -69     -    29     -     - |
 DWH1 |   189    35     -     -   -39  -243     -     -     - |
 FAIR |    39   -22    68   -32    33     -   -34     -     - |
 GLPS |   136     -  -138   -72    83    43     -     -     - |
 GODE |   -40    28   109     -   -41     -   -41     -     - |
 GOLD |    56     -   -32   -31    86     -     -     -     - |
 GOUG |     -     -     -    23     -   -32     -     -     - |
 GUAM |   158     -  -256    58    51   -41   -37     -     - |
 GUAT |    -3     -     -     -  -142     3     -     -     - |
 HARB |   196     -     -  -169     -     -     -     -     - |
 HERS |    16     8     -     -   378     -   -21     -     - |
 HOB2 |     4   217     -   -38   100    40  -100     -     - |
 HRAO |     -     -   -26     -  -155    19     -     -     - |
 HYDE |     7     -     -     -     -   103   -98     -     - |
 IENG |   -70   148     -     -   -68     -     -     -     - |
 INVK |    13     -     -   -11   -32     -     -     -     - |
 IRKT |     -   128     -    59     -   -47   -93     -     - |
 ISPA |   -15     -    26   -36    22    48     -     -     - |
 JAB1 |    39     -     -     -  -171     -   -41     -     - |
 JPLM |     -   147     -   -59   216     -     X     -     - |
 KARR |  -194     -     -     -     -   229     -     -     - |
 KERG |     -   -28  -180   187   -47    73  -163     -     - |
 KGN0 |    20   -43     -     -    51     -     -     -     - |
 KHAJ |     -    17     -     -     -   -15     4     -     - |
 KIT3 |     -     -  -164   -11   -73   -93   255     -     - |
 KOKB |    57    66     -   -49    27    82  -105     -     - |
 KOUR |     -     -  -372    76   112   162     -     -     - |
 LHAS |   -19     -  -143    57     -    16    15     -     - |
 LPGS |     -   159   -57     X   -76    61   -96     -     - |
 MAC1 |    -5     -   -76  -212   -49   271    70     -     - |
 MAS1 |     -    43    -7   -13     5     -     -     -     - |
 MATE |    81     -  -452    39    58   172     2     -     - |
 MAW1 |   205     -   -72     -  -116     -  -168     -     - |
 MBAR |     2     -     -   -35   -37    46     -     -     - |
 MCM4 |   186  -246  -124     X  -120     -     -     -     - |
 MDO1 |     -   166     -   -67    56     -     -     -     - |
 MDVJ |  -755     -     -     -     -     -   788     -     - |
 MEDI |    47    64     -     -   109     -   -81     -     - |
 METS |    10    63     -   -85    63     -    63     -     - |
 MIZU |     -    80   184  -147    76     -    43     -     - |
 MKEA |    86     -  -127     -   -89     -   -10     -     - |
 MSKU |     4     -     -    74   -11     -   -94     -     - |
 NKLG |     -     -     -  -188    38   258     X     -     - |
 NLIB |     -   128     -   -88   164     -    44     -     - |
 NNOR |     -    28   -10     -   -22     -    -7     -     - |
 NOUM |     -     -     -    81     -  -111     -     -     - |
 NPLD |   -50   106     -     -    68     -     -     -     - |
 NRC1 |   -16   101     -    70    85     -  -118     -     - |
 NRIL |     X     -     -  -491  -445  -183   757     -     - |
 NSSP |    -9     -     -     -   -45    11     -     -     - |
 NTUS |   -75     -     -    65     -     -     -     -     - |
 NYA1 |   141     -     -   -63   -69     -   -71     -     - |
 NYAL |     -    10     -     -     -     -    -5     -     - |
 OHI2 |    12     -    85   -81   -47     -    32     -     - |
 ONSA |    -1    28   123   -36    57   -15   -34     -     - |
 OPMT |   -42    66     -     9     -     -     -     -     - |
 PDEL |  -206     -   194   -10     -   118     -     -     - |
 PERT |   -98   101     X     -    21   114   -48     -     - |
 PETP |   -27     -     -   -10   -45    45     -     -     - |
 PIE1 |     -    36   -28     -   103     -     -     -     - |
 PIMO |     -     -   135   120     -  -138  -108     -     - |
 POL2 |    97     -   115     -   139     -  -174     -     - |
 POTS |  -207     -     -   178   219     -     -     -     - |
 PRDS |   -34    71     -     -   176     -     -     -     - |
 PTBB |   106   138     -     -   187     -  -178     -     - |
 QAQ1 |    31   172     -     7   119  -220    70     -     - |
 RAMO |  -140     -     -     -     -   165     -     -     - |
 RESO |    13     -     -   -11   -25     -     -     -     - |
 REYK |    53     -     -   -46    10     -     -     -     - |
 RIOG |    -7   169    32   -37   -58    31   -79     -     - |
 SANT |   -60     -   104  -124   -47   185   -16     -     - |
 SCH2 |   -64    77     -     -    86   105   -63     -     - |
 SFER |   -10    84     -     -    79     -   -30     -     - |
 SPT0 |   -34    73     -     -     5     -     -     -     - |
 STJO |    12    18     -   -39    -8   167  -122     -     - |
 SUTM |     -   364     -     1     -     -  -179     -     - |
 SUWN |     -   165     -     -     -   -92     -     -     - |
 SYOG |     -   186     -   -44     -   138  -160     -     - |
 THTI |     -    40   -56    58   -50   125  -165     -     - |
 THU3 |   -14   -83     -    46   -96     -     -     -     - |
 TIDB |    48    27   199     -   -26     -  -189     -     - |
 TIXI |    93     -     -    18    11     -  -118     -     - |
 TLSE |   159    69     -     -   154     -  -231     -     - |
 TOW2 |   -37     -     -   -32     -    87     -     -     - |
 TRO1 |   239     -     -   -39   -40   -77  -133     -     - |
 TSKB |   -16    14  -149    68     9    24     -     -     - |
 TWTF |    21   128     -   -70    -8     -     -     -     - |
 UNSA |     -     -   -60    31   -46     -     -     -     - |
 URUM |  -541     -     -   466  -510     -     -     -     - |
 USN3 |    46     -     -     -   -44   -54     -     -     - |
 USUD |    -4   -37    92     -   210     -   -35     -     - |
 VILL |    42     -    97   -87    99     -     -     -     - |
 WES2 |     -     X     -    73     -     -   -88     -     - |
 WHIT |     7     -     -     -    31    72   -71     -     - |
 WILL |    34    42     -     -   -13     -   -56     -     - |
 WROC |     -   -20     -     -     -     -    10     -     - |
 WSRT |   -37   151     -   -42     -     -    14     -     - |
 WTZR |    14   122   -99    44     7   106  -159     -     - |
 WUHN |  -353     -     -   422   350  -162     -     -     - |
 YAKT |    55     -     -     -    49   -65     -     -     - |
 YAR2 |    86   133     -  -128    26     -     -     -     - |
 YELL |   -39    31   237   -67    25    15   -57     -     - |
 YSSK |    35     -     -    56     -     -  -105     -     - |
 ZAMB |     -     -     -   216     -    10  -270     -     - |
 ZWEN |     -     -   -18     -   281     -    11     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    40   100    51    27    38    43    59  3812     - |  288   5.43
    3 |   109   127    48   110    40    80   124  2250     - |  288   2.24
    4 |   104    95    36    30    44    68    83  1300     - |  288   0.83
    5 |    46    99    27    23    26    53    35  3490     - |  288   2.26
    6 |    83    83     X    91    54    41    44  2604     - |  288   2.30
    7 |   111   136   117    51    53    52    75  1342     - |  288   0.74
    8 |    28    92    81    28    30    40    27  2600     - |  288   2.07
    9 |    25    96    26    24    28    42    38  2044     - |  288   1.38
   10 |    49   108    36    26    33    48    25  3286     - |  288   1.95
   11 |    43   106    38    30    44    60    38  1213     - |  288   0.43
   13 |    37    95    94    31    37    39    52   680     - |  288   0.26
   14 |    47    92    58    32    45    71    54  1201     - |  288   0.27
   15 |    37   106    49    24    32    53    45  4454     - |  288   3.97
   16 |    47   116   138    17    50    60    60   476     - |  288   0.27
   17 |    47   109    37    25    47    55    29  3069     - |  288   1.06
   18 |    51   125    44    50    39    95    46   436     - |  288   0.29
   19 |    77   109    51    50    46    37    44   962     - |  288   0.45
   20 |    51   114    71    26    29    74    35   496     - |  288   0.28
   21 |    36   114    39    31    35    82    66  2528     - |  288   0.28
   22 |    49   121    46    18    24    82    53  1142     - |  288   0.58
   23 |    46   110    69    40    42    52    68   572     - |  288   0.38
   24 |    49   104    32    27    21     -    33  2689     - |  288   2.75
   25 |    42    91    92    26    41    49    48  2035     - |  288   2.07
   26 |    82   164    81   177    58    51   149   662     - |  288   0.49
   27 |    23    93    52    32    26    58    44  1145     - |  288   0.53
   28 |    32   104    54    29    37    40    20  2528     - |  288   1.32
   30 |    53    98    32    21    39    69    36  1189     - |  288   0.42
   31 |   106   136   119    56    53    53    55  2290     - |  288   1.56
   29 |     -     -     -     -   152    43    38  1170     - |  276   0.83
 -----+-------------------------------------------------------+--------------
 ALBH |    20    36     -     -    31     -    31     -     - |  288   0.09
 ALGO |    25    16    29    18    11    33    22     -     - |  288   0.09
 ALRT |    16     -     -    13    14    30    37     -     - |  288   7.15
 AMC2 |    13    30     -     -    16    20    14     -     - |  288   0.05
 AREQ |     -    36     -    28    25    40     -     -     - |  288  16.64
 ARTU |    16     -    63    16    28    31     -     -     - |  284  13.28
 ASPA |     -     -     -    21    22    29     -     -     - |  288    >>>
 AUCK |    13     -     X     -    47    15    16     -     - |  264  10.80
 BAHR |    31    69     -    49    21    56     -     -     - |  285   0.87
 BAN2 |     -    28     -    28     -     -    28     -     - |  288  17.60
 BILI |    13     -     -    13    16    15    21     -     - |  286   8.50
 BJFS |    13     -     -    11    11     -     -     -     - |  287  10.65
 BOGT |    26     -     -    27    19    32     -     -     - |  288  26.00
 BOR1 |    18    43     -     -    33     -    30     -     - |  288   0.67
 BRAZ |     -     -     -    32     -    44     -     -     - |  287    >>>
 BRUS |    23    24     -     -    20     -    31     -     - |  288   0.05
 CAS1 |    38     -    24    16    12    18    36     -     - |  288   7.90
 CEDU |    19     -    36     -    25    21     -     -     - |  288  12.78
 CHAT |    24     -     -    46     -    32    23     -     - |  287   9.65
 CHUR |    12    26     -     -    18     -    13     -     - |  288   0.05
 COCO |    46     -    49    22    22    58    41     -     - |  288  12.22
 CRO1 |     -    44    58     -    54    41     -     -     - |  284  17.87
 DAEJ |    25    54     -     -    28     -     -     -     - |  287   1.76
 DARW |    17    31     -     -     -     -    22     -     - |  288  17.29
 DAV1 |    23     -     -    21    18    16    41     -     - |  288  13.30
 DGAR |    24     -    50    19    26    37    18     -     - |  288  19.03
 DRAO |    36    18    35    31    26     -    44     -     - |  288   0.07
 DWH1 |    20    38     -     -    17    12     -     -     - |  288   0.47
 FAIR |    24    13    28    14    28     -    37     -     - |  288   0.07
 GLPS |    42     -    99    24    16    56     -     -     - |  288  23.47
 GODE |    29    22    47     -    16     -    19     -     - |  288   0.43
 GOLD |    27     -    79    22    17     -     -     -     - |  282  11.98
 GOUG |     -     -     -   101     -   138     -     -     - |  288    >>>
 GUAM |    23     -    72    21    15    35    43     -     - |  288  19.96
 GUAT |    22     -     -     -    20    26     -     -     - |  288    >>>
 HARB |    32     -     -    28     -     -     -     -     - |  287  32.63
 HERS |    29    79     -     -    54     -    22     -     - |  264  11.15
 HOB2 |    32    17     -    37    22    21    44     -     - |  288   0.05
 HRAO |     -     -    39     -    32    28     -     -     - |  288   0.60
 HYDE |    47     -     -     -     -    23    39     -     - |  288  23.63
 IENG |    20    42     -     -    19     -     -     -     - |  288   0.86
 INVK |    17     -     -    15    25     -     -     -     - |  288   9.08
 IRKT |     -    17     -    26     -    24    25     -     - |  288   0.14
 ISPA |    23     -    34    46    29    29     -     -     - |  288  14.73
 JAB1 |    23     -     -     -    80     -    24     -     - |  288  19.74
 JPLM |     -    36     -    15    39     -     X     -     - |  288    >>>
 KARR |   183     -     -     -     -   216     -     -     - |  275  17.22
 KERG |     -    25    39    37    15    31    34     -     - |  288   1.38
 KGN0 |    12    25     -     -    21     -     -     -     - |  287   0.35
 KHAJ |     -    28     -     -     -    29    29     -     - |  288   0.15
 KIT3 |     -     -    63    57    27    57    20     -     - |  273  11.82
 KOKB |    20    50     -    26    16    26    43     -     - |  288   0.09
 KOUR |     -     -    51    44    23    51     -     -     - |  288   1.72
 LHAS |    48     -    32    44     -   110    14     -     - |  276  10.18
 LPGS |     -    43    90     X    34    48    21     -     - |  288  28.55
 MAC1 |    25     -    33    32    29    20    28     -     - |  288  15.09
 MAS1 |     -    92    35    30    47     -     -     -     - |  288   2.32
 MATE |    23     -    27    25    13    20    36     -     - |  288   0.07
 MAW1 |    40     -    28     -    29     -    36     -     - |  286  19.00
 MBAR |    50     -     -    34    36    84     -     -     - |  288  18.22
 MCM4 |    80    55   179     X    37     -     -     -     - |  276    >>>
 MDO1 |     -    71     -    29    48     -     -     -     - |  202 317.50
 MDVJ |    33     -     -     -     -     -    35     -     - |  142   0.07
 MEDI |    22    29     -     -    29     -    24     -     - |  288   0.11
 METS |    25    28     -    47    32     -    41     -     - |  287  11.95
 MIZU |     -    30    40    16    28     -    23     -     - |  288   0.84
 MKEA |    27     -    34     -    20     -    19     -     - |  288  30.06
 MSKU |    55     -     -    34    29     -    30     -     - |  288  22.57
 NKLG |     -     -     -    15    51    21     X     -     - |   78  18.75
 NLIB |     -    62     -    23    37     -    19     -     - |  288   0.03
 NNOR |     -    18    42     -    39     -    26     -     - |  288  18.65
 NOUM |     -     -     -    26     -    36     -     -     - |  288    >>>
 NPLD |     6    13     -     -    27     -     -     -     - |  287   0.04
 NRC1 |    25    17     -    21    14     -    16     -     - |  288   0.02
 NRIL |     X     -     -    17    40    19    30     -     - |  238   8.24
 NSSP |    11     -     -     -    25    13     -     -     - |  288  11.69
 NTUS |    36     -     -    31     -     -     -     -     - |  288   7.80
 NYA1 |    30     -     -    22    32     -    39     -     - |  288   0.04
 NYAL |     -    35     -     -     -     -    17     -     - |  287   0.04
 OHI2 |    31     -    31    31    58     -    58     -     - |  288   7.12
 ONSA |    22    78    50    16    32    21    35     -     - |  288   0.03
 OPMT |    20    27     -    25     -     -     -     -     - |  287   0.06
 PDEL |    25     -    48    34     -    27     -     -     - |  288  52.42
 PERT |    39    12     X     -    32    24    31     -     - |  288   2.24
 PETP |    18     -     -     8    11    17     -     -     - |  287  12.90
 PIE1 |     -    98    76     -    70     -     -     -     - |  257   1.91
 PIMO |     -     -   134    80     -    77   129     -     - |  288  26.21
 POL2 |    23     -    21     -    26     -    28     -     - |  288  11.72
 POTS |    29     -     -    25    18     -     -     -     - |  278  16.61
 PRDS |     7    15     -     -    16     -     -     -     - |  288   2.30
 PTBB |    27    19     -     -    24     -    32     -     - |  288   0.32
 QAQ1 |    16    35     -    22    11    29    21     -     - |  288   7.47
 RAMO |    55     -     -     -     -    65     -     -     - |  288  16.27
 RESO |    41     -     -    36    48     -     -     -     - |  288   7.64
 REYK |    47     -     -    41    42     -     -     -     - |  288   8.19
 RIOG |    18    30    28    39    34    24    35     -     - |  288  12.36
 SANT |    22     -    28    35    29    26    36     -     - |  288  12.58
 SCH2 |    54    29     -     -    23    28    50     -     - |  288  20.08
 SFER |    58   202     -     -    72     -    46     -     - |  286   0.56
 SPT0 |    49   105     -     -    23     -     -     -     - |  286   0.04
 STJO |    26    18     -    35    27    27    26     -     - |  288   0.06
 SUTM |     -    25     -    25     -     -    34     -     - |  288  10.19
 SUWN |     -   171     -     -     -    95     -     -     - |  288 464.69
 SYOG |     -    17     -    29     -    19    41     -     - |  288   0.77
 THTI |     -    25    35    26    39    34    25     -     - |  288   4.41
 THU3 |    11    14     -     9    30     -     -     -     - |  288   7.70
 TIDB |    30    27    45     -    26     -    44     -     - |  288   0.09
 TIXI |    12     -     -    12    17     -    19     -     - |  286   6.66
 TLSE |    58   103     -     -   100     -    32     -     - |  287   0.34
 TOW2 |    27     -     -    22     -    15     -     -     - |  288  11.90
 TRO1 |    17     -     -    30    24    19    42     -     - |  288   8.88
 TSKB |    34    32    60    31    18    38     -     -     - |  288   1.57
 TWTF |    31    30     -    36    27     -     -     -     - |  288   0.76
 UNSA |     -     -    77    40    23     -     -     -     - |  236    >>>
 URUM |    37     -     -    32    22     -     -     -     - |  288    >>>
 USN3 |    13     -     -     -    22    15     -     -     - |  288   0.04
 USUD |    23    34    47     -    29     -    44     -     - |  288  12.03
 VILL |    23     -    43    16    25     -     -     -     - |  288  15.59
 WES2 |     -     X     -    25     -     -    30     -     - |  288   0.18
 WHIT |    18     -     -     -    18    12    21     -     - |  288   1.24
 WILL |    16    26     -     -    18     -    17     -     - |  288  48.06
 WROC |     -   163     -     -     -     -    80     -     - |  275  13.30
 WSRT |    16    35     -    21     -     -    36     -     - |  288   0.03
 WTZR |    29    32    40    52    21    28    30     -     - |  288   0.06
 WUHN |    35     -     -    25    44    28     -     -     - |  287  21.80
 YAKT |    39     -     -     -    42    46     -     -     - |  284    >>>
 YAR2 |    27    37     -    17    51     -     -     -     - |  288   6.98
 YELL |    22    20    31    12    19    19    37     -     - |  288   0.05
 YSSK |    26     -     -    17     -     -    13     -     - |  287  11.14
 ZAMB |     -     -     -    50     -    28    71     -     - |  288  34.65
 ZWEN |     -     -   108     -    33     -    69     -     - |  288  14.69
 -----+-------------------------------------------------------+--------------
 TOT  |    42    77    62    38    35    52    44  2133     - |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.97   | 3.33e-14  7.00e-15  1.71e-15 |
 AMC2 |   288     0     0   288    9.97   | 2.80e-14  6.95e-15  2.42e-15 |
 OPMT |   287     0     0   286    9.90   | 4.08e-14  7.19e-15  3.79e-15 |
 NPLD |   287     0     0   286    9.90   | 3.16e-14  5.39e-15  1.97e-15 |
 ONSA |   288     0     0   288    8.14   | 3.47e-14  8.56e-15  3.87e-15 |
 WTZR |   288     0     0   288    5.84   | 3.76e-14  1.77e-14  3.72e-15 |
 ALGO |   288     1     0   287    5.73   | 2.60e-14  7.15e-15  6.64e-15 |
 SPT0 |   286     0     0   285    4.26   | 3.64e-14  6.91e-15  2.16e-15 |
 STJO |   288     0     0   288    3.90   | 3.43e-14  7.80e-15  4.27e-15 |
 KOKB |   288     0     0   288    3.22   | 5.04e-14  1.79e-14  4.24e-15 |
 ALBH |   288     0     0   288    3.22   | 4.00e-14  1.27e-14  4.43e-15 |
 WSRT |   288     0     0   288    3.17   | 3.84e-14  1.25e-14  2.04e-15 |
 MATE |   288     0     0   288    3.06   | 3.28e-14  1.32e-14  8.05e-15 |
 NLIB |   288     0     0   288    2.84   | 3.66e-14  7.82e-15  2.25e-15 |
 PIE1 |   257     0     2   218    1.79   | 9.53e-14  1.71e-14         - |
 NYA1 |   288     0     0   288    1.60   | 2.90e-14  9.26e-15  2.75e-15 |
 NRC1 |   288     1     0   287    1.46   | 6.78e-14  1.02e-14  3.00e-15 |
 USN3 |   288     0     0   288    1.42   | 8.30e-14  1.56e-14  2.70e-15 |
 HOB2 |   288     0     0   288    1.41   | 3.73e-14  1.28e-14  4.77e-15 |
 NYAL |   287     0     0   286    1.26   | 3.52e-14  1.05e-14  2.38e-15 |
 YELL |   288     0     0   288    1.15   | 2.71e-14  5.81e-15  2.10e-15 |
 DRAO |   288     0     0   288    0.95   | 6.85e-14  1.78e-14  5.74e-15 |
 TIDB |   288     0     0   288    0.87   | 1.71e-13  2.18e-14  4.35e-15 |
 IRKT |   288     0     0   288    0.82   | 5.22e-14  1.49e-14  1.08e-14 |
 MEDI |   288     0     0   288    0.76   | 4.33e-14  8.37e-15  4.98e-15 |
 CHUR |   288     0     0   288    0.74   | 4.40e-14  9.56e-15  5.28e-15 |
 MDVJ |   142     1     0   141    0.58   | 5.62e-14  8.78e-15         - |
 G30  |   288     0     0   288    0.30   | 2.90e-13  8.75e-14  2.86e-14 |
 G16  |   288     0     0   288    0.16   | 4.98e-13  6.33e-14  2.78e-14 |
 WES2 |   288     0     0   143    0.15   | 5.27e-14  1.87e-14  1.40e-14 |
 PTBB |   288     0     0   288    0.14   | 3.73e-13  7.36e-14  3.46e-14 |
 KHAJ |   288     0     0   288    0.11   | 8.08e-14  1.12e-14  1.12e-14 |
 G26  |   288     0     0   288    0.10   | 3.46e-13  8.61e-14  3.72e-14 |
 FAIR |   288     0     0   288    0.10   | 8.87e-14  2.30e-14  5.50e-15 |
 KGN0 |   287     0     0   286    0.09   | 3.83e-13  9.73e-14  3.28e-14 |
 G27  |   288     0     0   288    0.09   | 3.49e-13  9.88e-14  6.67e-14 |
 SFER |   286     0     0   284    0.08   | 4.06e-13  1.21e-13  4.32e-14 |
 MIZU |   288     0     0   288    0.08   | 3.66e-13  9.20e-14  6.16e-14 |
 TWTF |   288     0     0   288    0.07   | 3.75e-13  1.20e-13  8.62e-14 |
 G19  |   288     0     0   288    0.06   | 6.45e-13  9.27e-14  4.82e-14 |
 TLSE |   287     0     0   286    0.06   | 5.25e-13  1.22e-13  2.46e-14 |
 G07  |   288     0     0   288    0.05   | 2.92e-13  8.50e-14  6.80e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.42e-13  1.20e-13  5.07e-14 |
 IENG |   288     0     0   288    0.04   | 5.63e-13  1.68e-13  8.60e-14 |
 G13  |   288     0     2    59    0.04   | 5.39e-13  5.93e-14  2.43e-14 |
 G23  |   288     0     2    63    0.04   | 5.50e-13  5.97e-14  3.23e-14 |
 G04  |   288     0     0   288    0.03   | 4.21e-13  1.21e-13  1.05e-13 |
 GODE |   288     0     0   288    0.03   | 4.31e-14  1.60e-14  2.57e-14 |
 HRAO |   288     0     0   288    0.03   | 1.26e-13  3.92e-14  7.84e-14 |
 DWH1 |   288     0     0   143    0.02   | 4.55e-13  1.34e-13  4.96e-14 |
 G31  |   288     0     0   288    0.02   | 2.34e-13  1.36e-13  1.61e-13 |
 G17  |   288     0     0   288    0.02   | 3.89e-13  1.17e-13  1.37e-13 |
 G29  |   276     0     0   274    0.02   | 4.27e-13  1.20e-13  8.20e-14 |
 SYOG |   288     0     0   287    0.02   | 7.18e-13  1.84e-13  7.97e-14 |
 G06  |   288     0     0   288    0.01   | 3.85e-13  1.70e-13  1.48e-13 |
 SUWN |   288     1     0   287    0.01   | 9.16e-13  2.35e-13  5.40e-14 |
 TSKB |   288     0     0   288    0.01   | 1.00e-12  3.12e-13  9.22e-14 |
 KOUR |   288     0     0   288    0.01   | 1.51e-12  3.57e-13  1.23e-13 |
 PRDS |   288     0     0   288    0.01   | 1.51e-12  4.64e-13  2.22e-13 |
 G09  |   288     0     0   288    0.01   | 1.25e-12  4.44e-13  1.01e-13 |
 KERG |   288     0     0   288    0.01   | 1.15e-12  3.29e-13  1.19e-13 |
 G10  |   288     0     0   288    0.00   | 1.14e-12  3.64e-13  2.54e-13 |
 G25  |   288     0     0   288    0.00   | 1.30e-12  3.79e-13  2.34e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.64e-12  6.09e-13  2.94e-13 |
 G08  |   288     0     1   144    0.00   | 1.38e-12  3.49e-13  2.55e-13 |
 DAEJ |   287     0     0   142    0.00   | 1.47e-12  5.01e-13  1.80e-13 |
 YAKT |   284     1     2    89    0.00   | 5.51e-13  3.69e-13  1.35e-13 |
 WHIT |   288     0     0   288    0.00   | 4.88e-13  1.78e-13  1.27e-13 |
 BAHR |   285     0     4     2    0.00   | 6.56e-13  1.44e-13  7.70e-14 |
 GPST |   288     0     0     0    0.00   | 2.45e-14  5.17e-15  1.63e-15 |
 NRIL |   238     0     0     0    0.00   |        -         -         - |
 MAW1 |   286     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |    78     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 KARR |   275     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BRAZ |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.64e-13  6.73e-14  8.51e-14 |
 G24  |   288     0     0     0    0.00   | 1.29e-12  4.63e-13  3.05e-13 |
 G22  |   288     0     6     0    0.00   | 9.15e-13  8.23e-14  4.10e-14 |
 G21  |   288     1     6     0    0.00   | 8.35e-13  1.33e-13  4.34e-14 |
 G20  |   288     0     5     0    0.00   | 6.14e-13  6.43e-14  3.53e-14 |
 G18  |   288     0     6     0    0.00   | 1.11e-12  9.66e-14  2.73e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.17e-13  3.92e-13 |
 G14  |   288     0     6     0    0.00   | 5.53e-13  6.11e-14  2.76e-14 |
 G11  |   288     0     6     0    0.00   | 8.25e-13  8.22e-14  3.71e-14 |
 G05  |   288     0     0     0    0.00   | 1.34e-12  4.12e-13  1.62e-13 |
 G03  |   288     0     0     0    0.00   | 1.33e-12  4.43e-13  2.20e-13 |
 G01  |   288     0     0     0    0.00   | 1.59e-12  8.90e-13  6.31e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   288     2     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   275     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     1     0     0    0.00   |        -         -         - |
 UNSA |   236     1     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     1     0    0.00   | 3.66e-13  2.18e-13  4.68e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 6.07e-13  3.22e-13  1.28e-12 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   278     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.70e-12  4.74e-13  2.30e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   202     0     0     0    0.00   |        -         -         - |
 MCM4 |   276     0     0     0    0.00   | 6.17e-13  3.22e-13  1.08e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   276     0     0     0    0.00   |        -         -         - |
 KIT3 |   273     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     1     0    0.00   | 5.70e-13  5.26e-13  1.77e-12 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOUG |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   282     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   284     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     2     0    0.00   | 2.62e-13  1.41e-12  1.60e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     1     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     2     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.33e-17  3.99e-16  2.39e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      NPLD      BRUS |
------------------------------------------+------------------------------+
