
 GPS week: 1298   Day: 1   MJD: 53331                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2877      0     0.10    -0.07     2.69     0.00      0
 cod |   288     0  28180    191     0.07    -0.36     0.04    23.09      0
 emr |   288     0  21496    342   130.56    42.32     0.08    10.14      0
 esa |   288     0  19031    741   131.00    42.18     0.07    11.26      0
 gfz |   288     0  20223    616     0.47    -0.49     0.06    14.65      0
 iga |    96     0   2685     75     0.01     0.06     0.06     0.00      0
 igu |    96     0   2781      0     0.06     0.01     2.87     0.00      0
 jpl |   288     0  18614     21    -3.91    -2.73     0.05    18.44      0
 ngs |    96     0   2781      0     0.08    -0.03     2.40     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  35533   2320   130.47    42.38     0.04    22.41      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |   326    98   -48     9    41  -100  2300   -71  -492     -   -46 |
    2 |  3435   -29     -     -   -41     -     -    68     -     -     - |
    3 | -4658    12   -48  -110    65   -45  2092   106 -4207     -   -64 |
    4 |   390    25   -16    91   -22   -47  3511    22   207     -   -69 |
    5 | -7047   -10    54   163    14    68 -2287  -113 -6440     -   -13 |
    6 |  -175  -111   -33   412    13   -38-11849  -120  -538     -    12 |
    7 | -2956    39   118  -473   132   104 -1362    28 -3495     -    35 |
    8 | -4012   -18   115  -161   153    18 -6025   -41 -4631     -   -19 |
    9 | -1825    -8   -58    69    19  -106 -2740     0 -1526     -   -12 |
   10 | -2930    86    29  -165    -3   137 -1675   -34 -2414     -    11 |
   11 |  3793     4  -163   -60    20   -90  1604   198  3794     -   -77 |
   13 |  3552   114  -201    50    -4   -67   261   158  3370     -  -178 |
   14 |  1916   -16  -128   124     6   -53  1204   193  2737     -  -151 |
   15 |  4195   -92   172    63   -94   243   893    28  3109     -    24 |
   16 |  3221   -36  -219    78   -28   -51   668   208  3670     -   -56 |
   17 |  2807   -47    14   458    34   118  7289  -105  1992     -  -125 |
   18 |  4222   -14  -117    83     7   -12  1182    36  4394     -    -8 |
   19 |  3965     9  -163   159   120   759  2680   106  3839     -  -181 |
   20 |  5938    14  -159  -167    30    14  2080   116  5730     -    26 |
   21 |  1296    43   -46  -160  -133   -26  3624   205  1960     -   -24 |
   22 |  1366    70  -183  -158   -85  -130   787   239   393     -   -51 |
   23 |  -502    13  -269    43   -86   -94  -271   220  -754     -   -52 |
   24 | -7531    30   -86   108    41     - -6808   -86 -6090     -    -3 |
   25 | -5009   -68    15   126   109   -69 -2665   -50 -3191     -   -30 |
   26 | -1398  -128     X   313   -33  -396 -2209   -30 -2042     -    29 |
   27 | -2211   -56   -58   -59   257   -84   715   -45 -1814     -   -18 |
   28 |  1337    14  -198  -118    99    42  8709   104  2282     -   -15 |
   29 |  3963    -7    86     X    -8  -456  1230     4  4582     -   -32 |
   30 | -3136   -76    51   241    83    36 -1431  -100 -2035     -   -38 |
   31 | -2215    -3  -147   -85    77    21 -1472    53 -2256     -    19 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    47   -96     -     -     -     -    43     -     -   -40 |
 ALGO |     -     -    69  -264     -     -     -     9     -     -    94 |
 AMC2 |     -     0   204     -     -     -     -  -262     -     -   123 |
 AREQ |     -   -22   255     -  -130     -     -   -97     -     -    70 |
 ARTU |     -   109     -   102   -75     -     -   -44     -     -   -78 |
 AUCK |     -    28     -     X   -46     -     -     -     -     -     1 |
 BAHR |     -     -   -45     -   190     -     -     -     -     -  -104 |
 BOGT |     -     -     -  -282    91     -     -     -     -     -    85 |
 BOR1 |     -   -30   -84     -     -     -     -   -69     -     -   121 |
 BREW |     -     -   -23     -     -     -     -     -     -     -    11 |
 BRMU |     -     -     -     -   -13     -     -     -     -     -     8 |
 BRUS |     -    24  -107     -     -     -     -     -     -     -    24 |
 CAGZ |     -   178     -     -     -     -     -     -     -     -  -184 |
 CAS1 |     -  -100     -   205     8     -     -     -     -     -    -5 |
 CHAT |     -    -5     -     -    20     -     -     -     -     -    -8 |
 CHUR |     -    59   113     -     -     -     -   108     -     -  -200 |
 COCO |     -   117     -   -81  -123     -     -     -     -     -     X |
 CRO1 |     -   105    54   -33   -16     -     -   -22     -     -   -86 |
 DAV1 |     -   -96     -     -    -1     -     -    77     -     -    37 |
 DGAR |     -   -66     -     -     -     -     -    82     -     -     X |
 DRAO |     -    46   -87     -     -     -     -    43     -     -   -44 |
 DWH1 |     -   183     -     -     -     -     -     -     -     -  -189 |
 FAIR |     -     -    53   -54     5     -     -     -     -     -     - |
 GLPS |     -    86     -  -116   -36     -     -     -     -     -    -5 |
 GMAS |     -     -   137     -     -     -     -     -     -     -   -62 |
 GODE |     -  -117   165     1     -     -     -     -     -     -    46 |
 GOL2 |     -     -   136     -     -     -     -   -16     -     -   -48 |
 GOLD |     -   -73     -  -151   -32     -     -   129     -     -    53 |
 GRAZ |     -     -  -103     -     -     -     -     -     -     -    46 |
 GUAM |     -    60     -  -309     -     -     -  -179     -     -   242 |
 HERS |     -     5   -10     -     -     -     -     -     -     -    -1 |
 HLFX |     -     -   326     -     -     -     -  -179     -     -     X |
 HOB2 |     -  -149    82   231     -     -     -     -     -     -     X |
 HOFN |     -     -     -     -  -199     -     -     -     -     -   130 |
 IENG |     -   -49   112     -     -     -     -     -     -     -     - |
 IISC |     -    54     -  -128    13     -     -     -     -     -     - |
 INVK |     -     -     -     -     -     -     -   -83     -     -    68 |
 ISPA |     -     1     -     -    20     -     -  -113     -     -    79 |
 JPLM |     -     -    -9     -  -100     -     -    -5     -     -    74 |
 KERG |     -     -    -8   -57     4     -     -     -     -     -    28 |
 KGN0 |     -   -22   -86     -     -     -     -     -     -     -    61 |
 KIRU |     -   -93     -     -     -     -     -     -     -     -    95 |
 KIT3 |     -     -     -    47   -25     -     -   -60     -     -    42 |
 KOKB |     -     -   141     -    39     -     -  -124     -     -    13 |
 KOUR |     -    96     -  -196     -     -     -     -     -     -     - |
 LPGS |     -    48   153  -199     X     -     -     -     -     -   -18 |
 MAC1 |     -     0     -   188  -145     -     -     -     -     -     X |
 MADR |     -     -     -     -     -     -     -     2     -     -    -1 |
 MAS1 |     -   -27   108    57     -     -     -     -     -     -   -47 |
 MATE |     -     -     -   -53     -     -     -     -     -     -    27 |
 MAW1 |     -     0     -     -    46     -     -     -     -     -   -30 |
 MBAR |     -   -59     -     -  -124     -     -     3     -     -   139 |
 MCM4 |     -   151  -344     -     X     -     -     -     -     -     - |
 MEDI |     -     -   -65     -     -     -     -     -     -     -    30 |
 METS |     -    -2   -68     -     -     -     -     -     -     -    33 |
 MIZU |     -     -     -   263     -     -     -     -     -     -  -132 |
 MKEA |     -    50     -   -48     -     -     -    13     -     -   -37 |
 NKLG |     -   245     -  -150  -121     -     -     -     -     -   -94 |
 NLIB |     -     -    93     -     -     -     -    23     -     -   -61 |
 NNOR |     -     -     6   -91     -     -     -   -61     -     -    93 |
 NPLD |     -   -93    27     -     -     -     -     -     -     -    84 |
 NRC1 |     -     -    47     -     5     -     -     -     -     -   -24 |
 NRIL |     -    27     -     -   -70     -     -   -51     -     -    60 |
 NSSP |     -  -102     -     -     -     -     -     -     -     -   105 |
 NTUS |     -  -163     -  -116     -     -     -     -     -     -   226 |
 NYA1 |     -    56     -     -   -62     -     -     -     -     -   -17 |
 NYAL |     -     -   -32     -     -     -     -     -     -     -    15 |
 ONSA |     -     -   -30    27     -     -     -     -     -     -     - |
 PETP |     -    32     -     -   -27     -     -     -     -     -   -15 |
 PIE1 |     -     -   136  -261     -     -     -     -     -     -    70 |
 PIMO |     -     -     -   649     -     -     -     -     -     -  -326 |
 POL2 |     -    -4     -     -     -     -     -     -     -     -     4 |
 PRDS |     -   -65   -23     -     -     -     -     -     -     -    77 |
 PTBB |     -   -56   -27     -     -     -     -     -     -     -    70 |
 QAQ1 |     -  -140    89     -     -     -     -     -     -     -   104 |
 RABT |     -    64     -     -     -     -     -   -80     -     -     - |
 RIOG |     -   -34   159     -  -102     -     -     -     -     -    21 |
 SANT |     -    14     -   242   -68     -     -     -     -     -   -91 |
 SCH2 |     -     -   110     -     -     -     -  -140     -     -    65 |
 SEY1 |     -   390     -     -   295     -     -     -     -     -  -589 |
 SFER |     -   -24    55     -     -     -     -     -     -     -     - |
 STJO |     -    -9   128     -     -     -     -   -57     -     -    -2 |
 SUTM |     -     -     -     -   -78     -     -    62     -     -     X |
 THU3 |     -    27     -     -     -     -     -     -     -     -   -28 |
 TID1 |     -     -     -     -     -     -     -   -69     -     -    57 |
 TIDB |     -     -     -   -56     -     -     -     -     -     -    28 |
 TLSE |     -     -     -     -     -     -     -   -63     -     -    52 |
 TOW2 |     -    54     -   -78   -25     -     -     -     -     -     X |
 TRO1 |     -    61     -     -    -9     -     -     -     -     -   -57 |
 TSKB |     -  -108   -84    70    67     -     -     -     -     -    70 |
 TWTF |     -  -103     -     -     -     -     -     -     -     -   106 |
 UNSA |     -     -     -   102    60     -     -     -     -     -   -90 |
 URUM |     -   -97     -     -     -     -     -     -     -     -   100 |
 USN3 |     -     7     -     -     -     -     -   -48     -     -    32 |
 USNO |     -   -33    81     -     -     -     -     -     -     -    -3 |
 USUD |     -     -     -    86     -     -     -   -53     -     -     X |
 VILL |     -    22     -  -143     -     -     -     -     -     -    49 |
 WHIT |     -  -121     -     -     -     -     -   -31     -     -   150 |
 WILL |     -    18     -     -     -     -     -     -     -     -   -19 |
 WTZR |     -   -44     -    27     -     -     -     -     -     -    32 |
 WUHN |     -     -     -     -   101     -     -     -     -     -   -66 |
 YAKT |     -   -33     -     -     -     -     -     -     -     -    34 |
 YAR2 |     -   -39     -     -     -     -     -     -     -     -    40 |
 YELL |     -   -83   -45    59  -100     -     -     -     -     -   142 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6468   197    74   165    63   120  5287   179  5003     -   158 |  288   3.14
    2 |  1417    49     -     -    55     -     -    41     -     -     - |  288   1.09
    3 |  2503    55    53    25    34    67  1353    50  2763     -    65 |  288   1.89
    4 |  1073    37   128    85    61    52  1934    59  1371     -    69 |  288   1.16
    5 |  2774    48    35    49    25    37  3373    27  2853     -    61 |  288   2.33
    6 |   820    42   138    62    35    74  8137    52   953     -    48 |  288   1.53
    7 |  2317    59    62    40    47    46  1260    28  2046     -    49 |  288   0.66
    8 |  4492    34    93    33    34    31  3372    37  3533     -    30 |  288   1.81
    9 |  3306    37    39    25    34    39  1977    33  3416     -    37 |  288   1.73
   10 |  4252    49   148    68    38    57  2981    41  3934     -    54 |  288   3.22
   11 |   581    55    67    41    28    86   925    46   519     -    48 |  288   0.34
   13 |   903    37   170   163    81    86   503    54   845     -    60 |  288   0.30
   14 |  1520    48    43    53    73    46   849    59  1288     -    82 |  288   0.30
   15 |  2665    51    43    63    22    45  2099    74  2696     -    39 |  288   2.58
   16 |  1398    32    42    74   105    24   541    38  1606     -   109 |  288   0.34
   17 |  1839    48   107    65    31    39  5558    24  1479     -    38 |  288   1.83
   18 |   696    34    31    70    25    41   635    49   650     -    29 |  288   0.36
   19 |   729    51    46    70    48    56   621    43   607     -    44 |  288   0.29
   20 |   432    36   216    41    65    55  1006    50   493     -    34 |  288   0.24
   21 |  2409    50    50    48   183    58  2019    39  2641     -    89 |  288   0.38
   22 |  2266    36    28    31    23    40   391    59  2233     -    44 |  288   0.31
   23 |   624    54   220   141    67    57   861    69   516     -    86 |  288   0.38
   24 |  4272    67   136    68    45     -  4951    46  2624     -    74 |  288   2.77
   25 |  4761    52    37    95    26    41  2026    36  4028     -    33 |  288   2.03
   26 |  1138   165     X   207   126    93   876    79   952     -   109 |  288   0.52
   27 |  1360    36    99    43    27    46   387    60  1004     -    44 |  288   0.55
   28 |  2798    40    73    40    61    73  4747    42  1950     -    79 |  288   0.62
   29 |  2279   164   175     X   100   146  2307   150  2051     -    92 |  278   0.90
   30 |  4137    24    38    56    24    46   771    24  4221     -    28 |  288   0.35
   31 |  1499    46    60    43    31    30  1466    38  1469     -    30 |  288   1.19
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    23    27     -     -     -     -    23     -     -    25 |  288   0.03
 ALGO |     -     -    21    50     -     -     -    24     -     -    19 |  288   0.05
 AMC2 |     -    11    41     -     -     -     -    32     -     -    24 |  288   0.05
 AREQ |     -    29    49     -    21     -     -    34     -     -    25 |  288  16.14
 ARTU |     -    27     -    28    24     -     -    27     -     -    39 |  288  10.85
 AUCK |     -    25     -     X    45     -     -     -     -     -    25 |  264  13.69
 BAHR |     -     -    73     -    33     -     -     -     -     -    20 |  288   0.98
 BOGT |     -     -     -    54    25     -     -     -     -     -    28 |  276  22.60
 BOR1 |     -    26    58     -     -     -     -    16     -     -    10 |  288   0.42
 BREW |     -     -    31     -     -     -     -     -     -     -    14 |  288   0.08
 BRMU |     -     -     -     -    24     -     -     -     -     -    16 |  288    >>>
 BRUS |     -    18    38     -     -     -     -     -     -     -    19 |  288   0.04
 CAGZ |     -    26     -     -     -     -     -     -     -     -    27 |  287    >>>
 CAS1 |     -    35     -    61    25     -     -     -     -     -    39 |  288   8.10
 CHAT |     -    26     -     -    35     -     -     -     -     -    17 |  287  12.15
 CHUR |     -    15    27     -     -     -     -    20     -     -    25 |  288   0.14
 COCO |     -    21     -    43    31     -     -     -     -     -     X |  288  10.65
 CRO1 |     -    24    48    44    21     -     -    27     -     -    35 |  288  15.64
 DAV1 |     -    19     -     -    44     -     -    63     -     -    28 |  288  12.59
 DGAR |     -    39     -     -     -     -     -    49     -     -     X |  287  17.90
 DRAO |     -    27    27     -     -     -     -    24     -     -    27 |  287   0.06
 DWH1 |     -    20     -     -     -     -     -     -     -     -    21 |  233   0.66
 FAIR |     -     -    41    45    24     -     -     -     -     -     - |  288   0.91
 GLPS |     -    45     -    82   195     -     -     -     -     -    49 |  288  24.69
 GMAS |     -     -    70     -     -     -     -     -     -     -    32 |  288   1.28
 GODE |     -    32    48   113     -     -     -     -     -     -    40 |  288 372.42
 GOL2 |     -     -    64     -     -     -     -    41     -     -    19 |  286   0.26
 GOLD |     -    18     -    65    37     -     -    43     -     -    27 |  288   9.75
 GRAZ |     -     -    52     -     -     -     -     -     -     -    24 |  284    >>>
 GUAM |     -    37     -    94     -     -     -    24     -     -    34 |  288  19.58
 HERS |     -    39    69     -     -     -     -     -     -     -    20 |  264   7.14
 HLFX |     -     -    49     -     -     -     -    27     -     -     X |  288   3.61
 HOB2 |     -    35    79    33     -     -     -     -     -     -     X |  288   0.11
 HOFN |     -     -     -     -    21     -     -     -     -     -    14 |  287    >>>
 IENG |     -    17    38     -     -     -     -     -     -     -     - |  288   0.48
 IISC |     -    19     -    34    26     -     -     -     -     -     - |  288  27.04
 INVK |     -     -     -     -     -     -     -    53     -     -    44 |  288   7.41
 ISPA |     -    29     -     -    34     -     -    51     -     -    49 |  288  17.48
 JPLM |     -     -    38     -    36     -     -    34     -     -    31 |  288  14.83
 KERG |     -     -   140   122    64     -     -     -     -     -    42 |  288   1.22
 KGN0 |     -    17    37     -     -     -     -     -     -     -    18 |  287   0.38
 KIRU |     -    11     -     -     -     -     -     -     -     -    11 |  288   6.87
 KIT3 |     -     -     -    30    29     -     -    26     -     -    15 |  288  11.34
 KOKB |     -     -   106     -    33     -     -    34     -     -    31 |  288   0.04
 KOUR |     -    23     -    46     -     -     -     -     -     -     - |  261   1.94
 LPGS |     -    38    49    76     X     -     -     -     -     -    23 |  288  26.89
 MAC1 |     -    23     -    56    30     -     -     -     -     -     X |  288  15.92
 MADR |     -     -     -     -     -     -     -    14     -     -    12 |  288  14.39
 MAS1 |     -    47    42    59     -     -     -     -     -     -    60 |  287   1.97
 MATE |     -     -     -    41     -     -     -     -     -     -    21 |  288   0.16
 MAW1 |     -    28     -     -    28     -     -     -     -     -    27 |  216  17.40
 MBAR |     -    51     -     -   115     -     -    91     -     -    84 |  248  32.23
 MCM4 |     -    19    43     -     X     -     -     -     -     -     - |  288  19.62
 MEDI |     -     -    25     -     -     -     -     -     -     -    11 |  288   0.07
 METS |     -    13    50     -     -     -     -     -     -     -    18 |  287  10.77
 MIZU |     -     -     -    48     -     -     -     -     -     -    24 |  263   0.46
 MKEA |     -    24     -    66     -     -     -    35     -     -    19 |  288  23.05
 NKLG |     -    43     -    70    39     -     -     -     -     -    57 |  287    >>>
 NLIB |     -     -    39     -     -     -     -    20     -     -    27 |  288  42.60
 NNOR |     -     -   105    66     -     -     -    40     -     -    44 |  288  18.37
 NPLD |     -    20    44     -     -     -     -     -     -     -     9 |  287   0.09
 NRC1 |     -     -    27     -    16     -     -     -     -     -    13 |  288   0.09
 NRIL |     -    21     -     -    23     -     -    24     -     -    25 |  288   8.37
 NSSP |     -    27     -     -     -     -     -     -     -     -    28 |  288   8.80
 NTUS |     -    25     -    34     -     -     -     -     -     -    27 |  288  10.10
 NYA1 |     -    12     -     -    20     -     -     -     -     -    10 |  288   0.23
 NYAL |     -     -    22     -     -     -     -     -     -     -    10 |  288   0.22
 ONSA |     -     -    28    25     -     -     -     -     -     -     - |  284   0.04
 PETP |     -    35     -     -    32     -     -     -     -     -    23 |  287   9.89
 PIE1 |     -     -    40    49     -     -     -     -     -     -    11 |  288   0.03
 PIMO |     -     -     -    37     -     -     -     -     -     -    18 |  135  16.02
 POL2 |     -    36     -     -     -     -     -     -     -     -    37 |  288  10.12
 PRDS |     -    23    37     -     -     -     -     -     -     -    19 |  287   1.94
 PTBB |     -    18    50     -     -     -     -     -     -     -    21 |  288   0.29
 QAQ1 |     -    12    44     -     -     -     -     -     -     -    15 |  288   7.37
 RABT |     -    13     -     -     -     -     -    17     -     -     - |  288  12.45
 RIOG |     -    28    62     -    48     -     -     -     -     -    43 |  288  12.50
 SANT |     -    50     -    97   179     -     -     -     -     -    34 |  288   7.37
 SCH2 |     -     -    40     -     -     -     -    58     -     -    33 |  288   7.99
 SEY1 |     -    30     -     -    33     -     -     -     -     -    27 |  288  18.11
 SFER |     -    13    30     -     -     -     -     -     -     -     - |  287   0.79
 STJO |     -    18    17     -     -     -     -    24     -     -    10 |  288   0.06
 SUTM |     -     -     -     -    32     -     -    25     -     -     X |  288  10.52
 THU3 |     -    19     -     -     -     -     -     -     -     -    20 |  288   7.84
 TID1 |     -     -     -     -     -     -     -    23     -     -    19 |  288   0.08
 TIDB |     -     -     -    23     -     -     -     -     -     -    12 |  288   0.10
 TLSE |     -     -     -     -     -     -     -    41     -     -    34 |  286   0.56
 TOW2 |     -    22     -    34    34     -     -     -     -     -     X |  288   9.94
 TRO1 |     -    16     -     -    20     -     -     -     -     -    19 |  288   8.32
 TSKB |     -    37    46    60    21     -     -     -     -     -    34 |  288   1.14
 TWTF |     -    37     -     -     -     -     -     -     -     -    39 |  288   0.51
 UNSA |     -     -     -    68    44     -     -     -     -     -    55 |  288  17.44
 URUM |     -    13     -     -     -     -     -     -     -     -    13 |  288  18.46
 USN3 |     -    15     -     -     -     -     -    20     -     -    16 |  288   0.05
 USNO |     -    15    21     -     -     -     -     -     -     -    19 |  288   0.04
 USUD |     -     -     -    48     -     -     -    30     -     -     X |  288  10.15
 VILL |     -    15     -    34     -     -     -     -     -     -    13 |  288  14.61
 WHIT |     -    71     -     -     -     -     -    22     -     -    79 |  288   1.61
 WILL |     -    18     -     -     -     -     -     -     -     -    19 |  288 125.15
 WTZR |     -    21     -    34     -     -     -     -     -     -    16 |  288   0.05
 WUHN |     -     -     -     -    18     -     -     -     -     -    12 |  286  14.07
 YAKT |     -    13     -     -     -     -     -     -     -     -    14 |  288   0.70
 YAR2 |     -    42     -     -     -     -     -     -     -     -    44 |  288   5.92
 YELL |     -    28    41    80    44     -     -     -     -     -    88 |  288   0.05
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2688    44    76    70    60    61  2869    50  2397     -    43 |


 BEST CLOCK FIT: PIE1   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.95   | 4.08e-14  1.04e-14  2.02e-15 |
 ONSA |   284     0     0   283    9.78   | 5.15e-14  9.24e-15  4.06e-15 |
 ALBH |   288     0     0   288    7.63   | 3.48e-14  1.17e-14  2.48e-15 |
 AMC2 |   288     0     0   288    6.69   | 3.11e-14  5.85e-15  1.68e-15 |
 ALGO |   288     1     0   287    6.68   | 2.84e-14  6.66e-15  5.37e-15 |
 WTZR |   288     0     0   288    6.13   | 4.27e-14  1.05e-14  5.44e-15 |
 BREW |   288     0     0   288    6.08   | 3.67e-14  6.95e-15  3.02e-15 |
 USNO |   288     0     0   288    5.84   | 3.45e-14  7.80e-15  2.28e-15 |
 USN3 |   288     0     0   288    4.81   | 7.10e-14  9.81e-15  2.13e-15 |
 NRC1 |   288     1     0   287    4.38   | 7.29e-14  1.12e-14  5.67e-15 |
 YELL |   288     0     0   288    3.31   | 3.12e-14  9.16e-15  2.07e-15 |
 DRAO |   287     0     0   286    3.29   | 6.54e-14  1.93e-14  3.50e-15 |
 NPLD |   287     1     0   285    3.02   | 4.56e-14  9.92e-15  3.08e-15 |
 KOKB |   288     0     0   288    2.85   | 4.07e-14  1.02e-14  3.91e-15 |
 NYAL |   288     0     0   288    2.51   | 3.26e-14  6.47e-15  1.44e-14 |
 NLIB |   288     1     0   287    2.51   | 3.69e-14  6.67e-15  1.85e-15 |
 HOB2 |   288     0     0   288    2.37   | 4.22e-14  1.53e-14  8.65e-15 |
 NYA1 |   288     0     0   288    2.31   | 2.56e-14  5.42e-15  1.52e-14 |
 TID1 |   288     0     0   143    2.06   | 4.95e-14  8.84e-15  4.52e-15 |
 GOL2 |   286     1     0   283    1.51   | 3.49e-14  7.31e-15  4.66e-15 |
 MATE |   288     0     0   288    0.88   | 8.04e-14  1.83e-14  2.12e-14 |
 MEDI |   288     0     0   288    0.76   | 4.96e-14  8.98e-15  7.20e-15 |
 GODE |   288     1     0   287    0.63   | 3.40e-14  6.17e-15  6.51e-15 |
 STJO |   288     0     0   288    0.53   | 2.94e-14  6.21e-15  6.00e-15 |
 TIDB |   288     0     3    78    0.42   | 1.80e-13  2.51e-14  4.19e-15 |
 G13  |   288     0     0   204    0.42   | 5.75e-13  7.81e-14  2.03e-14 |
 CHUR |   288     0     0   288    0.35   | 4.62e-14  1.07e-14  1.02e-14 |
 PIE1 |   288     0     0   288    0.22   | 4.63e-14  8.93e-15  3.37e-15 |
 G23  |   288     0     0   242    0.20   | 4.77e-13  7.72e-14  2.38e-14 |
 G16  |   288     0     0   288    0.18   | 5.09e-13  6.04e-14  3.95e-14 |
 G30  |   288     0     0   288    0.14   | 3.11e-13  8.41e-14  3.52e-14 |
 PTBB |   288     0     0   252    0.13   | 3.31e-13  6.94e-14  1.74e-14 |
 MIZU |   263     0     0   262    0.12   | 3.85e-13  8.88e-14  4.67e-14 |
 G14  |   288     0     4    72    0.12   | 6.15e-13  6.98e-14  2.82e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.62e-13  1.00e-13  3.50e-14 |
 G27  |   288     0     0   288    0.11   | 3.56e-13  9.85e-14  6.79e-14 |
 SFER |   287     0     0   286    0.11   | 3.74e-13  1.01e-13  8.00e-14 |
 TWTF |   288     0     0   288    0.10   | 4.07e-13  1.08e-13  3.89e-14 |
 G07  |   288     0     0   288    0.09   | 3.07e-13  8.71e-14  8.76e-14 |
 YAKT |   288     0     0   288    0.08   | 4.48e-13  1.66e-13  5.27e-14 |
 TLSE |   286     0     0   285    0.08   | 4.44e-13  1.40e-13  3.94e-14 |
 IENG |   288     0     0   288    0.07   | 5.62e-13  1.52e-13  4.31e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.39e-13  1.29e-13  4.13e-14 |
 DWH1 |   233     0     0   233    0.05   | 4.76e-13  1.25e-13         - |
 G26  |   288     0     0   288    0.05   | 3.73e-13  1.23e-13  3.07e-14 |
 G04  |   288     0     0   288    0.04   | 4.57e-13  1.38e-13  1.40e-13 |
 G29  |   278     0     0   275    0.04   | 4.22e-13  1.32e-13  9.72e-14 |
 G06  |   288     0     0   288    0.04   | 4.17e-13  1.49e-13  1.11e-13 |
 FAIR |   288     0     0   288    0.03   | 4.96e-13  1.61e-13  8.71e-14 |
 G31  |   288     0     0   288    0.03   | 2.15e-13  1.30e-13  1.43e-13 |
 TSKB |   288     0     0   288    0.02   | 9.47e-13  3.26e-13  1.13e-13 |
 KERG |   288     0     0   288    0.01   | 1.24e-12  3.19e-13  8.18e-14 |
 G05  |   288     0     0   288    0.01   | 1.38e-12  3.52e-13  2.57e-13 |
 BAHR |   288     0     3    49    0.01   | 6.91e-13  1.52e-13  1.04e-13 |
 G25  |   288     0     0   288    0.01   | 1.57e-12  4.20e-13  1.37e-13 |
 GMAS |   288     0     0   288    0.01   | 1.07e-12  4.96e-13  8.01e-14 |
 G08  |   288     0     0   288    0.01   | 1.35e-12  5.46e-13  1.44e-13 |
 PRDS |   287     0     0   286    0.01   | 1.50e-12  4.34e-13  1.85e-13 |
 G17  |   288     0     0   263    0.01   | 9.51e-13  2.53e-13  2.18e-13 |
 KOUR |   261     0     0   250    0.01   | 1.50e-12  4.33e-13         - |
 G09  |   288     0     0   288    0.01   | 1.34e-12  4.96e-13  1.37e-13 |
 WHIT |   288     0     0   288    0.00   | 5.11e-13  2.09e-13  1.13e-13 |
 HLFX |   288     0     1   246    0.00   | 1.91e-13  1.04e-13  2.29e-13 |
 GPST |   288     0     0     0    0.00   | 2.12e-14  4.18e-15  2.33e-15 |
 PIMO |   135     0     0     0    0.00   |        -         -         - |
 WUHN |   286     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     1     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.09e-13  8.28e-14  4.63e-14 |
 G24  |   288     0     0     0    0.00   | 1.23e-12  4.61e-13  3.11e-13 |
 G22  |   288     2     6     0    0.00   | 7.96e-13  1.17e-13  4.97e-14 |
 G21  |   288     0     6     0    0.00   | 9.26e-13  1.03e-13  3.46e-14 |
 G20  |   288     0     4     0    0.00   | 6.44e-13  6.70e-14  2.86e-14 |
 G19  |   288     0     3     0    0.00   | 7.09e-13  8.66e-14  2.28e-14 |
 G18  |   288     2     6     0    0.00   | 1.38e-12  1.52e-13  7.46e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  6.52e-13  2.64e-13 |
 G11  |   288     0     6     0    0.00   | 6.93e-13  7.07e-14  4.58e-14 |
 G10  |   288     0     0     0    0.00   | 1.24e-12  3.96e-13  3.47e-13 |
 G03  |   288     0     0     0    0.00   | 1.26e-12  5.15e-13  1.91e-13 |
 G02  |   288     0     3     0    0.00   | 5.82e-13  8.37e-14  5.99e-14 |
 G01  |   288     0     0     0    0.00   | 1.56e-12  7.13e-13  2.93e-13 |
 YAR2 |   288     0     1     0    0.00   | 8.27e-13  1.29e-12  6.33e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 5.80e-13  3.08e-13  4.81e-13 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.68e-13  3.38e-13  1.56e-12 |
 MBAR |   248     1     0     0    0.00   |        -         -         - |
 MAW1 |   216     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   | 1.81e-12  4.24e-13  1.38e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     1     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.50e-13  4.49e-13  1.32e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   284     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   287     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   276     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.01e-17  2.42e-16  1.45e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYA1      AMC2 |
------------------------------------------+------------------------------+
