
 GPS week: 1300   Day: 5   MJD: 53349                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2782      0     0.03    -0.03     2.84     0.00      0
 cod |   288     0  25849    121    -0.13     0.12     0.05    16.15      0
 emr |   288     0  23673     24   998.87    49.86     0.03    24.14      0
 esa |   288     0  18110   1868  4829.48    55.90     0.07     8.20      0
 gfz |   278     0  20045     97    -0.10     0.24     0.04    22.07      0
 iga |    96     0   2782     23     0.00     0.03     0.06     0.00      0
 igu |    96     0   2782      0     0.03    -0.03     3.07     0.00      0
 jpl |   288     0  17396    293    -2.22    -0.68     0.05    15.38      0
 ngs |    96     0   2782      0     0.03    -0.02     2.72     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  32380   2046   998.89    49.77     0.05    14.06      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1050    40    36  -146   -56   -72 -5780    75  1072     -   -17 |
    2 |   556    -9   -27     -    34  -139  -884    69   294     -   -68 |
    3 |  3529   -62   -75   141    16   -26  3886    84  3500     -     3 |
    4 |   566    22    34   132    57  -301   369   -56   487     -  -182 |
    5 | -4667     3   -25   -97    80   109 -1405   -66 -4691     -    48 |
    6 |   839   -16   -79   154    11   -63 -1780   -68   474     -   123 |
    7 | -5456   119     4   -20   -18   205 -1117    39 -4861     -  -147 |
    8 | -5522    25   -38   -63   143   -80  2180   -86 -5337     -   -49 |
    9 | -2794     6   -25   -11    80  -136  -538   -59 -2674     -   -14 |
   10 | -3160    55   -33   -79    22    76-10260    37 -3677     -   -33 |
   11 |  2648    15   -31   -45   -24  -118  -731   118  2702     -   -31 |
   13 |  5725   329   -76   195   -99   -37 -2649    44  5568     -  -265 |
   14 |  2520   134  -128  -207    19   -33   635   155  2982     -   -11 |
   15 | -5255   -89   108   134   -51   282 11258   -39 -4653     -   -68 |
   16 |  4712  -133  -143   340   -82   -22  -722   228  4625     -    76 |
   17 | -3886    70    25   -92    16   102   948    34 -3981     -  -135 |
   18 |  3729   -13   -74   266    -2    47  -280   -64  3620     -    59 |
   19 |  4305   -16  -246    -2   121  1042  1654   236  4287     -     0 |
   20 |  3880     2   -47  -175   -22    11  -601   251  4001     -   -61 |
   21 |  5672    -4   -49    91   -63   108  -186    47  5328     -    76 |
   22 | -4592   -79   -78   186    64  -126 -2170    43 -4318     -   -27 |
   23 | -1253   125  -192    61    33   -56 -2341   191 -1056     -  -106 |
   24 | -4426    -8    26   -19    91   -98   437   -80 -4707     -   -74 |
   25 |  1519   -35   -96    25    56  -199 10632    64  1460     -    35 |
   26 | -2088   128   -37    63    34  -226   385   -83 -1636     -   -89 |
   27 |    19   111   102   -87   -24   -82 -2113   -37   111     -  -175 |
   28 |  2428   108    39  -462    -1     3  5720    63  2660     -    11 |
   30 | -2770   -51    45    60    91  -118  -908  -152 -2511     -   -26 |
   31 |  2208   -36  -132   -32   175   -18 -3736    63   941     -   -48 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -39     -     -     -     -    69     -     -    -9 |
 ALGO |     -     -     8     X   -63     -     -    88     -     -   -13 |
 AMC2 |     -   -51    98     -     -     -     -  -218     -     -   129 |
 AREQ |     -     -   118     -   -40     -     -   -85     -     -   -50 |
 ARTU |     -     -     -   111     2     -     -   -62     -     -     X |
 ASPA |     -     -     -     -     -     -     -   -96     -     -   106 |
 AUCK |     -    11     -     X     -     -     -     -     -     -   -12 |
 BAHR |     -   -69   -29     -   161     -     -     -     -     -  -114 |
 BAN2 |     -     -   -20     -     -     -     -     -     -     -    34 |
 BOGT |     -     2     -    74   -23     -     -     -     -     -   -11 |
 BOR1 |     -  -106    47     -     -     -     -     -     -     -    41 |
 BREW |     -     -    14     -     -     -     -  -100     -     -    85 |
 BRUS |     -   -86    48     -     -     -     -     -     -     -    16 |
 CAGZ |     -    58     -     -     -     -     -     -     -     -   -67 |
 CAS1 |     -    -8     -   186   -96     -     -     -     -     -    46 |
 CEDU |     -     -     -  -188     -     -     -     -     -     -   110 |
 CHAT |     -    27     -     -   -21     -     -     -     -     -     0 |
 CHUR |     -    30   -39     -     -     -     -   -10     -     -    43 |
 COCO |     -    35     -    59  -147     -     -     -     -     -   149 |
 CRO1 |     -     -    43   -51   -12     -     -    -3     -     -   -26 |
 DAEJ |     -   -60    71     -     -     -     -     -     -     -   -53 |
 DAV1 |     -    69     -     -   -37     -     -    31     -     -   -57 |
 DRAO |     -   -29   -42     -     -     -     -    72     -     -    26 |
 DWH1 |     -   175   -67     -     -     -     -     -     -     -   -87 |
 FAIR |     -     -    40   103   -85     -     -     -     -     -     - |
 GLPS |     -    50     -     -   -11     -     -     -     -     -   -40 |
 GODE |     -    36    72    98     -     -     -  -121     -     -   -89 |
 GOL2 |     -     -     5     -     -     -     -     -     -     -    -9 |
 GOLD |     -    48     -     X   -41     -     -     7     -     -     X |
 GRAZ |     -     -     5     -     -     -     -     -     -     -    -8 |
 GUAM |     -    94     -   -60    57     -     -  -223     -     -    87 |
 HOB2 |     -  -156   150  -103     -     -     -     -     -     -   -19 |
 HOFN |     -     -     -     -   -94     -     -     -     -     -   147 |
 HRAO |     -   -70     -     -     -     -     -     8     -     -    71 |
 IENG |     -   -96    64     -     -     -     -     -     -     -     - |
 ISPA |     -    58     -     -   -33     -     -   -33     -     -    20 |
 JPLM |     -     -   -80     -     -     -     -    59     -     -    73 |
 KERG |     -    58    20  -202    36     -     -     -     -     -   -35 |
 KGN0 |     -   -37    28     -     -     -     -     -     -     -    -6 |
 KIRU |     -  -137     -     -     -     -     -     -     -     -   158 |
 KIT3 |     -    31     -    11   -31     -     -   -24     -     -    29 |
 KOKB |     -     -     -     -  -104     -     -   149     -     -     X |
 KOSG |     -   -55     -     -     -     -     -     -     -     -    64 |
 KOUR |     -    52     -   -12   -54     -     -     -     -     -    30 |
 LPGS |     -   -67    34    11     -     -     -     -     -     -    11 |
 MAC1 |     -   -44     -  -160  -114     -     -     -     -     -   316 |
 MADR |     -     -     -     -     -     -     -    -3     -     -     3 |
 MAS1 |     -     -   208  -377   -74     -     -    11     -     -   -35 |
 MATE |     -     -     -  -286    18     -     -     -     -     -   140 |
 MAW1 |     -    31     -     -   -24     -     -     -     -     -     2 |
 MBAR |     -    21     -     -   -98     -     -     X     -     -   124 |
 MCM4 |     -   -18  -436     -   507     -     -     -     -     -     - |
 MEDI |     -     -   -15     -     -     -     -     -     -     -    27 |
 MIZU |     -     -   -85   565     -     -     -     -     -     -  -119 |
 MKEA |     -   143     -  -100     -     -     -   -58     -     -   -42 |
 MSKU |     -   -28     -     -    20     -     -     -     -     -     - |
 NLIB |     -     -   -17     -     -     -     -    39     -     -   -14 |
 NNOR |     -     -    34  -136     -     -     -     -     -     -    21 |
 NRIL |     -   207     -     -   -87     -     -   -51     -     -     X |
 NTUS |     -  -176     -  -162    78     -     -     -     -     -   179 |
 OHI2 |     -   113     -     8   -27     -     -     -     -     -   -93 |
 ONSA |     -   -23    99    23   -88     -     -     -     -     -     - |
 PDEL |     -   -85     -     -    62     -     -     -     -     -     X |
 PERT |     -   -36    34     X    31     -     -    -6     -     -   -58 |
 PIE1 |     -     -   -16   -40     -     -     -     -     -     -    51 |
 PIMO |     -     -     -   561     -     -     -     -     -     -  -327 |
 POL2 |     -    -5     -     -     -     -     -     -     -     -     6 |
 POTS |     -    84     -     -   -62     -     -     -     -     -     X |
 PRDS |     -   -29    14     -     -     -     -     -     -     -     9 |
 PTBB |     -   -57    34     -     -     -     -     -     -     -     7 |
 QAQ1 |     -  -140    43     -     -     -     -     -     -     -    88 |
 RIOG |     -    -8    79     -   -71     -     -     -     -     -   -14 |
 SFER |     -   -57    38     -     -     -     -     -     -     -     - |
 SPT0 |     -  -134    90     -     -     -     -     -     -     -     - |
 STJO |     -     -   -48     -  -113     -     -   101     -     -   142 |
 SUTM |     -     -    63     -    60     -     -  -182     -     -     - |
 THTI |     -     -    75    26    13     -     -     -     -     -  -163 |
 THU3 |     -    10   104     -    13     -     -     -     -     -  -210 |
 TLSE |     -     -    15     -     -     -     -   -99     -     -    82 |
 TOW2 |     -    -3     -     -     5     -     -     -     -     -    -4 |
 TRO1 |     -    38     -     -   -92     -     -     -     -     -   110 |
 TSKB |     -  -100   -31   190     6     -     -     -     -     -    48 |
 TWTF |     -  -123    79     -     -     -     -     -     -     -     6 |
 UNSA |     -     -     -  -207   -14     -     -     -     -     -   138 |
 USN3 |     -    23     -     -     -     -     -   -61     -     -    41 |
 USNO |     -     3    -4     -     -     -     -     -     -     -     3 |
 USUD |     -   -57    -3   150     -     -     -   -17     -     -     X |
 VILL |     -   -61     -     X     -     -     -     -     -     -    70 |
 WHIT |     -   -30     -     -     -     -     -     -     -     -    34 |
 WILL |     -     6    29     -     -     -     -     -     -     -   -56 |
 WROC |     -     -   157     -     -     -     -  -246     -     -     - |
 WTZR |     -     -   150  -151     -     -     -     -     -     -  -168 |
 YAR2 |     -     -    23     -     -     -     -     -     -     -   -40 |
 YEBE |     -     -   -10     -     -     -     -     -     -     -    18 |
 YELL |     -    65    33     X   -59     -     -     -     -     -   -41 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5382    62    34    76    35    37  4123    30  5527     -    65 |  288   5.60
    2 |  1258    62    29     -    27    65   574    37  1135     -    60 |  288   0.49
    3 |  2547    44    31    90    44    30  1906    39  2550     -    50 |  288   1.72
    4 |  1698   150    69   163    59   156  1120    82  1649     -    88 |  288   0.57
    5 |  2247    18    33    36    23    42  2901    27  2171     -    92 |  288   2.16
    6 |  1657    53    23    56    24    65  2129    55  1643     -   107 |  288   1.81
    7 |  2271    51    25    65    27    44   636    33  1870     -    42 |  288   0.39
    8 |  3404    46    32    51    19    42  2438    54  3728     -    88 |  288   1.97
    9 |  3158    34    35    75    15    62  1439    32  2933     -    63 |  288   1.51
   10 |  5122    46    37    42    24    32  6606    28  4636     -    70 |  288   1.49
   11 |   828    31    62    81    57    70   586    97   843     -    52 |  288   0.42
   13 |  1447    93    32    61    54    45  1923    38  1574     -    56 |  288   0.45
   14 |  2021    61    34    82    20    42   788    50  1810     -    46 |  288   0.32
   15 |  5351   106    87   121    95    78  8167    79  5423     -    89 |  288   1.87
   16 |   460    22    44    62    20    39   275    38   408     -    73 |  288   0.27
   17 |  2696    68    28    63    29    65   804    46  2683     -    54 |  288   1.21
   18 |   460    48    26    42    19    28   566    45   516     -    44 |  288   0.42
   19 |   752    63    30   142    41    92   464    47   756     -    62 |  288   0.39
   20 |   586    47    52    28    27    84   453    36   552     -    91 |  288   0.19
   21 |  2558   112    49    89   126    72  1299    77  2099     -    62 |  288   0.36
   22 |  1260    66    37    41    38    71   968   131  1077     -    51 |  288   0.24
   23 |   766    87    25    55    25    76  1324    44  1038     -    99 |  288   0.30
   24 |  5473    65    38    69    23    89  2382    43  5265     -   101 |  288   2.37
   25 |  5065    45    33    49    21    55  7494    34  4992     -    40 |  288   1.93
   26 |  1903    67    32    54    38    54   684    50  1956     -    64 |  288   0.63
   27 |   566    34    32    42    19    36  1290    33   594     -    35 |  288   0.53
   28 |  1481    38    50    49    20    65  4863    32  1344     -   113 |  288   0.67
   30 |  1610    20    24    65    19    40   639    70  1475     -    81 |  288   0.67
   31 |  4348    44    23    53    19    47  4841    30  3115     -    33 |  281   1.16
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    18     -     -     -     -    32     -     -    29 |  288   0.03
 ALGO |     -     -    24     X    17     -     -    20     -     -    15 |  288   0.02
 AMC2 |     -    30    21     -     -     -     -    31     -     -    21 |  288   0.04
 AREQ |     -     -    28     -    31     -     -    43     -     -    31 |  288  15.39
 ARTU |     -     -     -    40    12     -     -    15     -     -     X |  288   9.89
 ASPA |     -     -     -     -     -     -     -    40     -     -    44 |  248    >>>
 AUCK |     -    53     -     X     -     -     -     -     -     -    60 |  264  10.47
 BAHR |     -    48    27     -    28     -     -     -     -     -    37 |  288   0.32
 BAN2 |     -     -    19     -     -     -     -     -     -     -    32 |  288  15.49
 BOGT |     -    31     -    58    38     -     -     -     -     -    29 |  288  21.63
 BOR1 |     -    24    26     -     -     -     -     -     -     -    44 |  288   4.78
 BREW |     -     -    18     -     -     -     -    18     -     -    19 |  288   0.03
 BRUS |     -    25    20     -     -     -     -     -     -     -    18 |  288   0.03
 CAGZ |     -    48     -     -     -     -     -     -     -     -    56 |  129   0.68
 CAS1 |     -    49     -    57    44     -     -     -     -     -   121 |  288   7.62
 CEDU |     -     -     -    54     -     -     -     -     -     -    31 |  288  10.33
 CHAT |     -    47     -     -    29     -     -     -     -     -    34 |  287  10.15
 CHUR |     -    22    15     -     -     -     -    18     -     -    29 |  288   0.06
 COCO |     -    37     -   108    18     -     -     -     -     -    25 |  288  12.27
 CRO1 |     -     -    21    91    31     -     -    30     -     -    18 |  288  14.20
 DAEJ |     -    27    19     -     -     -     -     -     -     -    48 |  287   2.34
 DAV1 |     -    29     -     -    22     -     -    40     -     -    30 |  288  13.24
 DRAO |     -    12    11     -     -     -     -    39     -     -    31 |  288   0.05
 DWH1 |     -    29    25     -     -     -     -     -     -     -    21 |  288   0.56
 FAIR |     -     -    35    61    23     -     -     -     -     -     - |  288   0.27
 GLPS |     -    17     -     -    17     -     -     -     -     -    29 |  288  23.04
 GODE |     -    24    20    57     -     -     -    25     -     -    12 |  288   0.17
 GOL2 |     -     -    40     -     -     -     -     -     -     -    69 |  286   0.19
 GOLD |     -    46     -     X    23     -     -    27     -     -     X |  279   9.59
 GRAZ |     -     -    22     -     -     -     -     -     -     -    38 |  286    >>>
 GUAM |     -    31     -    90    47     -     -    51     -     -    32 |  288  18.14
 HOB2 |     -    25    16    40     -     -     -     -     -     -    20 |  288   0.04
 HOFN |     -     -     -     -    15     -     -     -     -     -    23 |  277    >>>
 HRAO |     -    30     -     -     -     -     -    27     -     -    32 |  288   0.49
 IENG |     -    27    18     -     -     -     -     -     -     -     - |  288   0.52
 ISPA |     -    48     -     -    21     -     -    57     -     -    43 |  288  12.27
 JPLM |     -     -    54     -     -     -     -    80     -     -    25 |  288  12.59
 KERG |     -    28    16    92    26     -     -     -     -     -    40 |  288   1.54
 KGN0 |     -    20    22     -     -     -     -     -     -     -    34 |  287   0.48
 KIRU |     -    92     -     -     -     -     -     -     -     -   106 |  243 100.70
 KIT3 |     -    32     -    30    20     -     -    34     -     -    23 |  287  15.46
 KOKB |     -     -     -     -    54     -     -    78     -     -     X |  278   0.05
 KOSG |     -    19     -     -     -     -     -     -     -     -    22 |  288   6.73
 KOUR |     -    37     -    90    46     -     -     -     -     -    30 |  288   1.65
 LPGS |     -    23    39    67     -     -     -     -     -     -    43 |  288  26.28
 MAC1 |     -    14     -    50    16     -     -     -     -     -    31 |  288  15.89
 MADR |     -     -     -     -     -     -     -    27     -     -    29 |  281  10.09
 MAS1 |     -     -    38    84    31     -     -    30     -     -    18 |  287   2.06
 MATE |     -     -     -   151    37     -     -     -     -     -    46 |  288   0.09
 MAW1 |     -    25     -     -    25     -     -     -     -     -    50 |  288   8.72
 MBAR |     -    51     -     -    76     -     -     X     -     -   103 |  288  13.74
 MCM4 |     -    15    14     -    14     -     -     -     -     -     - |  288  10.12
 MEDI |     -     -     7     -     -     -     -     -     -     -    12 |  288   0.12
 MIZU |     -     -    27    65     -     -     -     -     -     -    29 |  288   0.37
 MKEA |     -    20     -    89     -     -     -    40     -     -    34 |  288  18.10
 MSKU |     -    37     -     -    27     -     -     -     -     -     - |  278  14.37
 NLIB |     -     -    18     -     -     -     -    22     -     -    28 |  288   0.02
 NNOR |     -     -    29    59     -     -     -     -     -     -    54 |  288  16.76
 NRIL |     -    22     -     -    20     -     -    31     -     -     X |  276   8.28
 NTUS |     -    24     -    65    30     -     -     -     -     -    24 |  288   9.43
 OHI2 |     -    99     -    77    36     -     -     -     -     -   117 |  288  76.86
 ONSA |     -    35    58    48    30     -     -     -     -     -     - |  288   0.08
 PDEL |     -    24     -     -    18     -     -     -     -     -     X |  278  53.48
 PERT |     -    43    27     X    33     -     -    31     -     -    27 |  288   1.77
 PIE1 |     -     -    19    50     -     -     -     -     -     -    20 |  288   0.03
 PIMO |     -     -     -    54     -     -     -     -     -     -    31 |  163  20.20
 POL2 |     -    11     -     -     -     -     -     -     -     -    13 |  288   9.39
 POTS |     -    15     -     -    11     -     -     -     -     -     X |  278  21.41
 PRDS |     -    21    17     -     -     -     -     -     -     -    12 |  288   1.59
 PTBB |     -    16    26     -     -     -     -     -     -     -    37 |  288   0.20
 QAQ1 |     -    20    21     -     -     -     -     -     -     -    22 |  288   8.80
 RIOG |     -    63    36     -    49     -     -     -     -     -    72 |  264  10.12
 SFER |     -    31    21     -     -     -     -     -     -     -     - |  286   0.48
 SPT0 |     -    93    62     -     -     -     -     -     -     -     - |  285   0.07
 STJO |     -     -    19     -    67     -     -    81     -     -    30 |  285    >>>
 SUTM |     -     -    31     -    29     -     -    30     -     -     - |  288  10.26
 THTI |     -     -    27    65    29     -     -     -     -     -    34 |  288  13.57
 THU3 |     -    28    32     -    20     -     -     -     -     -    47 |  288  15.41
 TLSE |     -     -    26     -     -     -     -    38     -     -    33 |  285   0.64
 TOW2 |     -    24     -     -    30     -     -     -     -     -    35 |  288  10.35
 TRO1 |     -    34     -     -    26     -     -     -     -     -    51 |  287   8.62
 TSKB |     -    19    28    56    38     -     -     -     -     -    21 |  288   1.54
 TWTF |     -    29    27     -     -     -     -     -     -     -    64 |  288   0.38
 UNSA |     -     -     -   119    19     -     -     -     -     -    77 |  225  17.58
 USN3 |     -    29     -     -     -     -     -    29     -     -    11 |  288   0.04
 USNO |     -    25    20     -     -     -     -     -     -     -    25 |  288   0.04
 USUD |     -    17    25    74     -     -     -    65     -     -     X |  284   8.50
 VILL |     -    22     -     X     -     -     -     -     -     -    25 |  288   5.54
 WHIT |     -    16     -     -     -     -     -     -     -     -    19 |  288   0.52
 WILL |     -    29    38     -     -     -     -     -     -     -    34 |  288  13.67
 WROC |     -     -    20     -     -     -     -    31     -     -     - |  288  12.88
 WTZR |     -     -    24   117     -     -     -     -     -     -    46 |  203   0.06
 YAR2 |     -     -    17     -     -     -     -     -     -     -    30 |  288   9.00
 YEBE |     -     -    12     -     -     -     -     -     -     -    21 |  288   0.06
 YELL |     -    34    16     X    23     -     -     -     -     -    11 |  288   0.07
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2841    47    32    75    36    64  3067    48  2724     -    52 |


 BEST CLOCK FIT: NLIB   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   11.35   | 3.88e-14  5.65e-15  1.68e-15 |
 AMC2 |   288     0     0   288   11.35   | 3.26e-14  6.59e-15  3.60e-15 |
 ALGO |   288     0     0   288   11.35   | 3.51e-14  5.57e-15  2.72e-15 |
 BREW |   288     0     0   288   10.51   | 3.73e-14  8.13e-15  2.80e-15 |
 ALBH |   288     0     0   288    8.81   | 4.27e-14  1.10e-14  2.50e-15 |
 USNO |   288     0     0   288    8.02   | 4.82e-14  1.25e-14  3.04e-15 |
 SPT0 |   285     0     0   284    7.19   | 4.24e-14  7.49e-15  1.58e-15 |
 NLIB |   288     0     0   288    6.33   | 3.27e-14  5.40e-15  1.59e-15 |
 ONSA |   288     0     0   288    6.17   | 3.78e-14  9.39e-15  5.19e-15 |
 CHUR |   288     0     0   288    3.34   | 4.58e-14  1.08e-14  5.71e-15 |
 USN3 |   288     0     0   288    3.04   | 8.60e-14  1.35e-14  2.68e-15 |
 GOL2 |   286     2     0   283    1.68   | 3.37e-14  6.62e-15  3.84e-15 |
 PIE1 |   288     0     0   288    1.54   | 3.73e-14  7.66e-15  2.69e-15 |
 DRAO |   288     0     0   288    1.45   | 6.15e-14  2.28e-14  3.56e-15 |
 MATE |   288     0     0   288    1.24   | 5.74e-14  1.32e-14  7.56e-15 |
 HOB2 |   288     0     0   288    1.17   | 4.24e-14  8.82e-15  2.26e-15 |
 YELL |   288     1     0   287    0.81   | 2.96e-14  6.81e-15  4.78e-15 |
 WTZR |   203     0     0    90    0.77   | 5.18e-14  1.09e-14         - |
 MEDI |   288     0     0   288    0.66   | 4.81e-14  1.08e-14  1.51e-14 |
 KOKB |   278     1     0   276    0.58   | 4.76e-14  1.34e-14  4.76e-15 |
 YEBE |   288     0     0   143    0.42   | 1.30e-13  1.11e-14  5.96e-15 |
 GODE |   288     0     0   288    0.41   | 4.39e-14  1.24e-14  9.90e-15 |
 G16  |   288     0     0   267    0.20   | 4.36e-13  5.56e-14  3.36e-14 |
 G23  |   288     0     2   150    0.18   | 4.77e-13  6.15e-14  2.44e-14 |
 PTBB |   288     0     0   288    0.18   | 2.79e-13  5.79e-14  2.17e-14 |
 G07  |   288     0     0   288    0.11   | 2.88e-13  7.92e-14  4.38e-14 |
 MIZU |   288     0     0   288    0.11   | 3.86e-13  1.04e-13  2.81e-14 |
 SFER |   286     0     0   284    0.10   | 3.59e-13  9.21e-14  3.90e-14 |
 G27  |   288     0     0   288    0.09   | 3.34e-13  9.88e-14  6.28e-14 |
 TLSE |   285     0     0   283    0.09   | 4.11e-13  1.11e-13  4.92e-14 |
 G26  |   288     0     0   288    0.07   | 3.73e-13  9.03e-14  5.55e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.73e-13  9.78e-14  3.60e-14 |
 BAHR |   288     0     0   288    0.07   | 4.56e-13  1.03e-13  3.04e-14 |
 TWTF |   288     0     0   288    0.06   | 3.77e-13  1.00e-13  4.05e-14 |
 BOR1 |   288     1     0   287    0.05   | 4.35e-13  1.10e-13  7.04e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.18e-13  1.31e-13  6.72e-14 |
 G31  |   281     0     0   281    0.04   | 2.10e-13  9.49e-14  8.53e-14 |
 FAIR |   288     0     0   288    0.03   | 3.23e-13  8.73e-14  2.82e-14 |
 G19  |   288     0     3    44    0.03   | 5.50e-13  5.72e-14  5.06e-14 |
 G04  |   288     0     0   288    0.03   | 4.29e-13  1.38e-13  5.54e-14 |
 G30  |   288     0     0   162    0.03   | 3.10e-13  1.28e-13  6.95e-14 |
 G17  |   288     0     0   288    0.03   | 3.84e-13  1.07e-13  1.39e-13 |
 IENG |   288     0     0   288    0.02   | 5.42e-13  1.45e-13  5.66e-14 |
 G06  |   288     0     0   288    0.02   | 4.70e-13  2.19e-13  1.47e-13 |
 CAGZ |   129     0     1    48    0.01   | 7.11e-13  1.27e-13         - |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  2.69e-13  1.22e-13 |
 G05  |   288     0     0   288    0.01   | 1.34e-12  4.26e-13  2.04e-13 |
 HRAO |   288     0     3    78    0.01   | 1.30e-13  1.79e-13  4.29e-14 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  3.03e-13  1.56e-13 |
 DAEJ |   287     0     0   286    0.01   | 1.45e-12  3.46e-13  1.62e-13 |
 G02  |   288     0     4    12    0.01   | 6.02e-13  6.43e-14  2.92e-14 |
 G10  |   288     0     0   288    0.01   | 1.20e-12  3.47e-13  1.72e-13 |
 G25  |   288     0     0   288    0.01   | 1.53e-12  4.15e-13  1.93e-13 |
 PRDS |   288     0     0   288    0.01   | 1.45e-12  3.36e-13  1.50e-13 |
 G08  |   288     0     0   288    0.01   | 1.35e-12  4.10e-13  1.74e-13 |
 G09  |   288     0     0   288    0.01   | 1.33e-12  3.62e-13  8.45e-14 |
 KOUR |   288     0     0   288    0.01   | 1.50e-12  4.00e-13  1.64e-13 |
 KERG |   288     0     0   288    0.01   | 1.10e-12  3.71e-13  1.17e-13 |
 MAS1 |   287     0     0   286    0.00   | 1.71e-12  4.91e-13  1.66e-13 |
 WHIT |   288     0     0   288    0.00   | 5.23e-13  1.99e-13  4.31e-14 |
 GPST |   288     0     0     0    0.00   | 2.23e-14  4.09e-15  1.92e-15 |
 HOFN |   277     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     3     0    0.00   | 6.16e-13  8.49e-14  7.59e-14 |
 G24  |   288     0     0     0    0.00   | 1.27e-12  3.68e-13  2.48e-13 |
 G22  |   288     0     6     0    0.00   | 1.03e-12  1.06e-13  2.19e-14 |
 G21  |   288     0     6     0    0.00   | 1.10e-12  1.12e-13  2.77e-14 |
 G20  |   288     0     6     0    0.00   | 6.79e-13  7.82e-14  1.47e-14 |
 G18  |   288     0     6     0    0.00   | 1.20e-12  1.19e-13  3.58e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.00e-13  1.90e-13 |
 G14  |   288     0     6     0    0.00   | 5.61e-13  6.38e-14  2.70e-14 |
 G13  |   288     2     5     0    0.00   | 7.17e-13  1.87e-13  7.11e-14 |
 G11  |   288     0     5     0    0.00   | 6.15e-13  7.53e-14  5.22e-14 |
 G01  |   288     0     0     0    0.00   | 1.52e-12  7.40e-13  6.81e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.12e-12  1.09e-12  4.41e-13 |
 USUD |   284     0     0     0    0.00   |        -         -         - |
 UNSA |   225     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.17e-13  3.53e-13  9.38e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   285     0     0     0    0.00   |        -         -         - |
 RIOG |   264     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   278     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   163     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.83e-12  6.17e-13  1.33e-13 |
 PDEL |   278     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     3     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   276     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   278     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 7.17e-13  2.62e-13  5.46e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   281     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.13e-13  7.75e-13  5.77e-13 |
 KIT3 |   287     1     0     0    0.00   |        -         -         - |
 KIRU |   243     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.69e-13  4.20e-13  1.19e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   286     0     0     0    0.00   |        -         -         - |
 GOLD |   279     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.34e-13  8.87e-13  1.04e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     2     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   248     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     1     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.26e-17  2.71e-16  1.63e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      NLIB      SPT0 |
------------------------------------------+------------------------------+
