
 GPS week: 1300   Day: 6   MJD: 53350                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  36621    280    -0.03     0.27     0.05    13.49      0
 emr |   288     0  27430    564  1046.57    52.03     0.05    13.25      0
 esa |   288     0  21718   2639  1045.52    51.98     0.07     7.54      0
 gfz |   288     0  30717    864    -0.12     0.76     0.03    27.11      0
 igr |   288     0  34763     43    -1.18     1.25     0.03     0.00      0
 jpl |   288     0  27184    353    -3.59     1.43     0.04    20.08      0
 mit |   288     0  38533   1150     0.30    -0.44     0.04    18.54      0
 ngs |    96     0   2784      0    -0.29     0.91     2.58     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   153    -8   -62   -21   105    30   -82 -6125     - |
    2 |    -6   -96     -    88   -43    90  -149  2389     - |
    3 |   -54  -150    25    95   -16   -64    65  1090     - |
    4 |    69    43   151    44    35    78  -275  1398     - |
    5 |    31   -36   -26   -20    26   -50    97  1255     - |
    6 |   -23   -54   -36   149     8   -67   -76 -1541     - |
    7 |    49   -51    86  -120   -51    -3   144 -2424     - |
    8 |   -35   -35    82    59   -26    -3   -66   641     - |
    9 |    54    -9   169    54   -14    -6  -173 -1563     - |
   10 |   -62    11    41   -13   -88   -79   118-10401     - |
   11 |    89   -42  -128    16   -13    99  -113   779     - |
   13 |   250   -23   129   107    52    64  -433  4258     - |
   14 |   141   -86  -137    42    38    48   -96  5270     - |
   15 |  -106     X   -48    32    30    58    -6 -4683     - |
   16 |   -51  -194   115    72    25     8    14  5060     - |
   17 |    -6    26   185    -9    -4   -61   -12 -4828     - |
   18 |     7  -147    -6    81    70    37   -56  3468     - |
   19 |    73  -398     X   -79  -134    13   333  4127     - |
   20 |    44  -123   -60     7   -81   -34   109  3907     - |
   21 |   -58  -118   -36   137   -25   -26   -28  6977     - |
   22 |   -22   -44    -9   174    56    42  -250 -3007     - |
   23 |   133  -133   -88    43     2    63   -95  -434     - |
   24 |   -48    39    60     0   -18     -   -17  1906     - |
   25 |    21   -67    -8    72    34     1   -70 -5360     - |
   26 |    96     6   121    68   -25    35  -263 -1408     - |
   27 |    67   -27   -55    91    55   -23  -112  -395     - |
   28 |    64  -107  -158    64    96     -     -  3472     - |
   29 |    96    -7   243    -8   -18    53  -208 -1695     - |
   30 |    42    53   188   133    22   -40  -295 -2135     - |
 -----+-------------------------------------------------------+
 ALBH |    28  -151     -     -   -90     -    87     -     - |
 ALGO |  -180    91     X   -40   -74   -73   203     -     - |
 ALIC |    80     -     -     -     -     -   -58     -     - |
 ALRT |   -64     -     -    -9    21     -    59     -     - |
 AMC2 |   -87   -17     -     -   -96    79   -11     -     - |
 AREQ |    37    -3     -    40    36   -98    24     -     - |
 ARTU |   178     -    63  -130    21    43     X     -     - |
 ASPA |     -     -     -   150   -59  -203     -     -     - |
 AUCK |    -2     -     X     -    17   -40    45     -     - |
 BAHR |  -102   123     -    93    13    20  -171     -     - |
 BAN2 |     -    84     -     X   113    13   -75     -     - |
 BJFS |    20     -     -   -39     -   191  -164     -     - |
 BOGT |    56     -     -    57    44  -117     3     -     - |
 BOR1 |   -65   -10     -     -    50     -    54     -     - |
 BREW |     -   -53     -     -     7     -    38     -     - |
 BRUS |   -49    20     -     -    52     -    22     -     - |
 CAS1 |   -11     -    22   -70   -33   114   -22     -     - |
 CEDU |     -     -     X     -  -397  -192   208     -     - |
 CHAT |     -     -     -   406     -  -547     X     -     - |
 CHUR |    28   -96     -     -   -30     -    48     -     - |
 COCO |    42     -   115   -61    16     1    11     -     - |
 CRO1 |     -     5   101     -   -37   -80    42     -     - |
 DAEJ |  -352   102     -     -    -2     -   183     -     - |
 DARW |   183   -46     -     -     -     -  -101     -     - |
 DAV1 |   140     -     -   -50    -8   -72    49     -     - |
 DGAR |   -51     -   -56   -89   -35   155    22     -     - |
 DRAO |   -53  -103   432  -127  -102     -   122     -     - |
 DUBO |    48     -     -     -     -   -32     -     -     - |
 DWH1 |   257    17     -     -   123  -243    32     -     - |
 FAIR |   121   -94    49   -16   -27   -54    45     -     - |
 FORT |     -   130   215    27     -     -  -220     -     - |
 GLPS |    83     -     -    42    54   -78   -38     -     - |
 GMAS |     -    29     -     -     -     -   -21     -     - |
 GODE |     -   -86    41     -  -128     -    44     -     - |
 GOLD |    -8     -   134   -27   155     -     -     -     - |
 GUAM |   172     -  -368   112    27  -217    96     -     - |
 HARB |   129     -     -   -22     -     -   -62     -     - |
 HERS |   -94    13     -     -     -     -    60     -     - |
 HOB2 |   -79   150   115  -183    32   168   -10     -     - |
 HRAO |   -29     -    41     -     3    16   -12     -     - |
 HYDE |    76     -     -     -     -     -   -56     -     - |
 IENG |   -69    70     -     -   152     -     -     -     - |
 IISC |     -     -   233   -65     -     -     X     -     - |
 INVK |    82     -     -   -41    25     -     -     -     - |
 IRKT |     -   183     -  -190     -     -   147     -     - |
 ISPA |     2     -    67    -2   -53   -24     -     -     - |
 JPLM |     -    -9     -   -58    69     -    91     -     - |
 KARR |  -177     -     -     -   -21   413  -318     -     - |
 KELY |  -100     -     -     -     -    67     -     -     - |
 KERG |     -    36  -204    45  -105    17   -28     -     - |
 KGN0 |   -33    34     -     -   -16     -     -     -     - |
 KHAJ |     -   -43     -     -     -     -    31     -     - |
 KIRU |   -49     -   177     -   -97     -   -36     -     - |
 KIT3 |     -     -   -50    52    10   -46    -5     -     - |
 KOKB |     -     -     -   382     -     -  -558     -     - |
 KOUR |    11     -  -298    14    15    22    69     -     - |
 LPGS |     -  -205  -166   607  -234  -273  -378     -     - |
 MAC1 |  -102     -  -162  -240  -154   417    38     -     - |
 MAS1 |   -68    50   -68   -67     9    62    72     -     - |
 MATE |   137     -  -443   -39   -21     -   137     -     - |
 MAW1 |   211     -   -94     -   150     -  -115     -     - |
 MBAR |   -19     -     -   -28     2    50     -     -     - |
 MCM4 |    89  -142  -234     X   -35     -   132     -     - |
 MDVJ |   292     -     -     -     -  -652   494     -     - |
 MEDI |   -60   -22     -     -    39     -    60     -     - |
 METS |   -79     0     -   -91     -     -   190     -     - |
 MIZU |     -   161     X  -326   121  -316   706     -     - |
 MKEA |   -42     -  -145     -   -95    26    61     -     - |
 MSKU |   -79     -     -   -35     -     -   107     -     - |
 NLIB |     -   -79     -   -46   -17    20   102     -     - |
 NNOR |     -    29  -267     -   -58     -    88     -     - |
 NOT1 |     5     -     -     -     -   -39    38     -     - |
 NPLD |   -82    84     -     -    61     -     -     -     - |
 NRC1 |    25   109     -   -74     8     -    12     -     - |
 NRIL |    52     -     -    22   104   175  -275     -     - |
 NSSP |   -42     -     -     -     -    28     -     -     - |
 NTUS |   -79     -   -25    -6    45   133   -68     -     - |
 OHI2 |   226     -   -58   -63   -24     -   -48     -     - |
 ONSA |   -23    35   -79  -108    -6    -1   183     -     - |
 OPMT |   -22   169     -   -72     -     -     -     -     - |
 OUS2 |     -     -     -   -98     -   133     -     -     - |
 PDEL |  -178     -    79    67     -     -     -     -     - |
 PERT |   -73    44     X     -   -66    38   -20     -     - |
 PETP |    -6     -     -   -52     -    74     -     -     - |
 PIE1 |  -463  -282  -175     -  -237     -   624     -     - |
 PIMO |     0     -   -61    38     -    18   -51     -     - |
 POL2 |    20     -    66     -    84     -   -41     -     - |
 POTS |   -89     -     -    44    34     -     -     -     - |
 PRDS |    -6    18     -     -    42     -    -8     -     - |
 PTBB |   -21    38     -     -    27     -   -12     -     - |
 QAQ1 |  -120   120     -  -138    27     -   221     -     - |
 RAMO |  -205     -     -     -     -   137     -     -     - |
 RESO |     1     -     -    -1     -     -     -     -     - |
 REYK |   -54     -     -   -31     8    76     -     -     - |
 RIOG |    19    -1   120   100     6   -81  -119     -     - |
 SANT |     -     -     X   -49    85     -    71     -     - |
 SCH2 |  -154    51     -     -    30    39    34     -     - |
 SEY1 |     -     -     -    39     -    81  -144     -     - |
 SFER |    78    65     -     -    98  -101    15     -     - |
 SPT0 |   -87    47     -     -    81     -    30     -     - |
 STJO |    38    99     -  -137   -70   -14   116     -     - |
 STR1 |     -   137     -     -    66     -   -98     -     - |
 SUTH |     3     -     -     -     -     -    -2     -     - |
 SUTM |     -   141     -  -116   -19   145   -88     -     - |
 SYOG |   343    58     -  -184     -    98  -128     -     - |
 THTI |     -   216  -114  -207   -44    25   193     -     - |
 THU3 |  -120    30     -    45   -51     -     -     -     - |
 TIXI |   -47     -     -   -76     -    34   108     -     - |
 TLSE |   103    79     -     -   107   -83   -53     -     - |
 TOW2 |     4     -     -   -11   -37    55   -46     -     - |
 TRO1 |   127     -     -   -72   -46     -    13     -     - |
 TSKB |   -44   129  -470    38    65    29    43     -     - |
 TWTF |   -79    98     -    36    19    67  -138     -     - |
 UNSA |     -     -     X     X   -56   -22    24     -     - |
 URUM |     4     -     -    -2     -     -     -     -     - |
 USN3 |    20     -     -     -    35   -14     -     -     - |
 USNO |   -32     8     -     -    35     -    17     -     - |
 USUD |     -   -66   101     -     3     -     6     -     - |
 VESL |     -     -     -   -28     -    38     -     -     - |
 VILL |   -31     -     X   -49   157     -    95     -     - |
 WHIT |   -52     -     -     -    39     -    38     -     - |
 WILL |   -43   -19     -     -   -50     -    46     -     - |
 WROC |     -    28     -     -   -28     -   -20     -     - |
 WSRT |  -108    71     -   -73     -     -   135     -     - |
 WTZR |  -145   124    38  -111    58   161   -11     -     - |
 WUHN |  -173    15     -   202     -     -  -180     -     - |
 YAR2 |    23   -37     -     7     -     -     -     -     - |
 YEBE |     -   -53     -     -    -4     -    38     -     - |
 YELL |   -71     X   569  -112   -74     X   -16     -     - |
 YSSK |    37     -     -   -10     -     -   -12     -     - |
 ZAMB |     -     -     -   160     -   -61  -168     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |   112    61    49    26    22    40    39  5877     - |  288   5.40
    2 |   109    40     -    26    31    49    53  2947     - |  288   0.42
    3 |    89    69    74    44    46    30    58  2785     - |  288   1.47
    4 |   142    74   174    38    38   109    68  2769     - |  288   0.84
    5 |    52    51    70    28    25    39    31  3032     - |  288   1.54
    6 |    75    52    58    20    43    31    24   710     - |  288   1.47
    7 |    48    46    33    25    25    59    26  1060     - |  288   0.74
    8 |    95    35    38    27    32    51    44  3234     - |  288   1.73
    9 |    67    42    45    22    17    31    36  3054     - |  288   1.55
   10 |   109    40    33    23    43    47    40  3982     - |  288   1.80
   11 |    80    75   121    55    42    75    34  1700     - |  288   0.47
   13 |    71    44   109    22    46    47    26   720     - |  288   0.42
   14 |    74    56    64    18    22    38    21   728     - |  288   0.23
   15 |    74     X    48    41    99    72    89  5748     - |  288   2.96
   16 |    37    89    42    20    22    51    37   507     - |  288   0.20
   17 |    90    42    56    25    17    60    27  1651     - |  288   1.48
   18 |    76    43    95    15    28    33    67   475     - |  288   0.36
   19 |    92    66     X    27    43    26    32   804     - |  288   0.21
   20 |    34    56    75    17    38    38    44   725     - |  288   0.23
   21 |   101    35    87    24    43    33    86  1926     - |  288   0.28
   22 |    76    52    44    10    28    30    28  2699     - |  288   1.89
   23 |    57    63   119    22    47    49    36  1995     - |  288   0.32
   24 |    75    55    69    53    54     -   115  4283     - |  288   4.07
   25 |    59    53    79    20    22    51    24  3151     - |  288   1.66
   26 |    86    44    78    20    45    43    54   787     - |  288   0.61
   27 |   102    36    36    26    35    49    29  1160     - |  288   0.80
   28 |    66    32    67    18    42     -     -   809     - |  288   0.54
   29 |    94    51    91    34    59    60    73   834     - |  288   0.80
   30 |    75    50    69    23    30    45    59  1437     - |  288   0.64
 -----+-------------------------------------------------------+--------------
 ALBH |    22    62     -     -    51     -    47     -     - |  288   0.09
 ALGO |    29    14     X    32    24    12    60     -     - |  288   0.04
 ALIC |    17     -     -     -     -     -    12     -     - |  288   8.71
 ALRT |    26     -     -    27    21     -    52     -     - |  288  11.72
 AMC2 |    29    56     -     -    31    20    13     -     - |  288   0.02
 AREQ |    17    23     -    23    25    21    36     -     - |  288  15.11
 ARTU |    63     -   101    27    32    39     X     -     - |  288  10.70
 ASPA |     -     -     -    26    30    35     -     -     - |  288    >>>
 AUCK |    35     -     X     -    76    41    37     -     - |  264  11.63
 BAHR |    34    31     -    33    30    33    25     -     - |  288   0.74
 BAN2 |     -    51     -     X    28    24    32     -     - |  288  16.68
 BJFS |    21     -     -    15     -    13    12     -     - |  287  10.16
 BOGT |    16     -     -    18    18    17    17     -     - |  288  18.58
 BOR1 |    32    28     -     -    20     -    41     -     - |  288   0.45
 BREW |     -    54     -     -    52     -    39     -     - |  288   0.03
 BRUS |    14    31     -     -    27     -    26     -     - |  288   0.02
 CAS1 |    35     -    85    22    11    48    26     -     - |  288   8.24
 CEDU |     -     -     X     -    38    19    21     -     - |  288  10.75
 CHAT |     -     -     -    19     -    26     X     -     - |  280  11.09
 CHUR |    26    36     -     -    20     -    21     -     - |  288   0.04
 COCO |    27     -    95    26    24    38    19     -     - |  288   9.39
 CRO1 |     -    17    58     -    20    14    17     -     - |  288  14.78
 DAEJ |    17    71     -     -    16     -    48     -     - |  287   2.42
 DARW |    17    38     -     -     -     -    33     -     - |  288   8.17
 DAV1 |    25     -     -    11    13    26    30     -     - |  288  14.37
 DGAR |    29     -    39    18    35    34    41     -     - |  288  14.05
 DRAO |    61    39    55    31    46     -    59     -     - |  288   0.08
 DUBO |    13     -     -     -     -     9     -     -     - |  288  70.15
 DWH1 |    24    52     -     -    25    16    27     -     - |  288   1.19
 FAIR |    13    33    42    30    26    14    50     -     - |  288   0.49
 FORT |     -    29    71    28     -     -    31     -     - |  288   0.10
 GLPS |    26     -     -    23    26    24    20     -     - |  288  20.30
 GMAS |     -    24     -     -     -     -    17     -     - |  288   2.86
 GODE |     -    36    43     -    12     -    38     -     - |  288   0.05
 GOLD |    36     -   127    21    30     -     -     -     - |  284   8.46
 GUAM |    36     -    98    32    26    40    27     -     - |  288  18.20
 HARB |    20     -     -    18     -     -    24     -     - |  287  34.21
 HERS |    46    71     -     -     -     -    31     -     - |  264  17.45
 HOB2 |    46    40   158    18    48    31    40     -     - |  286   0.06
 HRAO |    28     -    35     -    41    22    25     -     - |  288   0.17
 HYDE |    20     -     -     -     -     -    14     -     - |  288  15.24
 IENG |    22    22     -     -    18     -     -     -     - |  288   1.20
 IISC |     -     -    36    10     -     -     X     -     - |  288  22.75
 INVK |    21     -     -    10    42     -     -     -     - |  288   7.73
 IRKT |     -    73     -    44     -     -    19     -     - |  288   0.18
 ISPA |    17     -    27    17    20    17     -     -     - |  288  14.69
 JPLM |     -    73     -    23    36     -    38     -     - |  288   6.43
 KARR |    26     -     -     -    18    25    18     -     - |  288  11.65
 KELY |    18     -     -     -     -    12     -     -     - |  237   6.83
 KERG |     -    42    85    28    21    23    22     -     - |  288   1.67
 KGN0 |    52    53     -     -    18     -     -     -     - |  287   0.73
 KHAJ |     -    42     -     -     -     -    30     -     - |  288   0.09
 KIRU |    70     -    44     -    76     -    44     -     - |  287   6.12
 KIT3 |     -     -    33    16    15    19    19     -     - |  287  12.76
 KOKB |     -     -     -    55     -     -    80     -     - |  144   1.41
 KOUR |    45     -    35    21    21    20    23     -     - |  288   1.50
 LPGS |     -    18    34    19    27    18    27     -     - |  288  27.50
 MAC1 |    40     -    50    24    14    21    36     -     - |  288  16.52
 MAS1 |    28    23    28    26    12    26    23     -     - |  288   1.66
 MATE |    28     -    42    16    15     -    32     -     - |  288   0.06
 MAW1 |    36     -    26     -    29     -    29     -     - |  288   9.14
 MBAR |    63     -     -    30    22    31     -     -     - |  288  12.78
 MCM4 |    31    31    49     X    34     -    29     -     - |  288   2.75
 MDVJ |    41     -     -     -     -    25    52     -     - |  288   0.08
 MEDI |    24    16     -     -    16     -    14     -     - |  288   0.10
 METS |    40    28     -    27     -     -    28     -     - |  287   7.90
 MIZU |     -    97     X    25    38    37    41     -     - |  288   0.43
 MKEA |    32     -    77     -    13    18    27     -     - |  288  19.82
 MSKU |    32     -     -    29     -     -    37     -     - |  288  11.66
 NLIB |     -    43     -    19    22    31    21     -     - |  288   0.04
 NNOR |     -    29    54     -    29     -    29     -     - |  288  15.82
 NOT1 |    18     -     -     -     -    19    20     -     - |  288   0.05
 NPLD |    18    18     -     -    18     -     -     -     - |  287   0.03
 NRC1 |    15    12     -    21    27     -    31     -     - |  288   0.03
 NRIL |    41     -     -    54    37    81    41     -     - |  283  10.52
 NSSP |    13     -     -     -     -     9     -     -     - |  288   8.08
 NTUS |    27     -    32    28    25    35    29     -     - |  288  10.37
 OHI2 |    61     -   105    38    29     -    55     -     - |  288   7.24
 ONSA |    18    91    34    26    35    19    30     -     - |  288   0.04
 OPMT |    19    28     -    14     -     -     -     -     - |  287   0.02
 OUS2 |     -     -     -    15     -    21     -     -     - |  288  10.50
 PDEL |    31     -    53    21     -     -     -     -     - |  288  57.09
 PERT |    21    31     X     -    22    13    16     -     - |  288   3.90
 PETP |    24     -     -    20     -    27     -     -     - |  287  10.51
 PIE1 |    32    33    28     -    41     -    15     -     - |  222   1.19
 PIMO |    82     -   101    39     -    36   118     -     - |  288  15.66
 POL2 |    19     -    34     -    22     -    15     -     - |  288  11.61
 POTS |    24     -     -    12    14     -     -     -     - |  288  15.50
 PRDS |    36    58     -     -    50     -    24     -     - |  288   1.29
 PTBB |    34    23     -     -    14     -    36     -     - |  288   0.25
 QAQ1 |    26    25     -    18    17     -    39     -     - |  288   6.63
 RAMO |    11     -     -     -     -     8     -     -     - |  288  11.31
 RESO |     9     -     -     5     -     -     -     -     - |  288   7.66
 REYK |    31     -     -    15    14    18     -     -     - |  287   7.58
 RIOG |    15    27    73    40    22    28    29     -     - |  288  12.75
 SANT |     -     -     X    20    40     -    29     -     - |  240   6.68
 SCH2 |    28    15     -     -    28    18    28     -     - |  288  24.44
 SEY1 |     -     -     -    31     -    23    60     -     - |  288  12.33
 SFER |    15    20     -     -    18    15    25     -     - |  286   0.49
 SPT0 |    22    30     -     -    22     -    34     -     - |  288   0.03
 STJO |    13    17     -    23    14    14    22     -     - |  288   1.97
 STR1 |     -    51     -     -    64     -    36     -     - |  288   0.93
 SUTH |    18     -     -     -     -     -    13     -     - |  288  12.95
 SUTM |     -    46     -    29    16    17    26     -     - |  288  11.26
 SYOG |    46    18     -    27     -    25    50     -     - |  288   1.83
 THTI |     -    84    60    77    13    64    22     -     - |  276  12.83
 THU3 |    23    22     -    10    15     -     -     -     - |  288   7.27
 TIXI |    22     -     -    20     -    27    48     -     - |  287   8.28
 TLSE |    42    73     -     -    90    23    28     -     - |  287   0.43
 TOW2 |    50     -     -    35    15    36    35     -     - |  288   9.28
 TRO1 |    21     -     -    26    28     -    48     -     - |  288   9.00
 TSKB |    18   102    79    23    13    35    29     -     - |  288   0.82
 TWTF |    29    37     -    61    29    31    37     -     - |  288   0.58
 UNSA |     -     -     X     X    73    16    18     -     - |  288  17.43
 URUM |    39     -     -    19     -     -     -     -     - |  288  14.21
 USN3 |    18     -     -     -    28    12     -     -     - |  288   0.04
 USNO |    14    12     -     -    26     -    10     -     - |  288   0.02
 USUD |     -    81    62     -    33     -    47     -     - |  288   9.58
 VESL |     -     -     -    17     -    23     -     -     - |  288    >>>
 VILL |    17     -     X    15    20     -    18     -     - |  288   4.30
 WHIT |    24     -     -     -    38     -    18     -     - |  288   2.90
 WILL |    47    58     -     -    21     -    20     -     - |  288 110.98
 WROC |     -    47     -     -    35     -    34     -     - |  288  24.60
 WSRT |    17    31     -    25     -     -    21     -     - |  288   0.02
 WTZR |    28    36    45    10    20    15    33     -     - |  288   0.02
 WUHN |    23   125     -    20     -     -    53     -     - |  287  12.11
 YAR2 |    40    36     -    32     -     -     -     -     - |  288   3.16
 YEBE |     -    16     -     -    17     -    11     -     - |  288   0.04
 YELL |    29     X    25    21    19     X    40     -     - |  288   0.07
 YSSK |    23     -     -    20     -     -    21     -     - |  287   8.96
 ZAMB |     -     -     -    29     -    43    34     -     - |  288  13.18
 -----+-------------------------------------------------------+--------------
 TOT  |    48    50    71    27    34    36    39  2580     - |


 BEST CLOCK FIT: WTZR   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.96   | 3.84e-14  4.88e-15  2.57e-15 |
 AMC2 |   288     0     0   288    9.96   | 3.32e-14  7.08e-15  1.99e-15 |
 ALGO |   288     0     0   288    8.76   | 2.83e-14  6.90e-15  2.41e-15 |
 SPT0 |   288     0     0   288    7.95   | 4.10e-14  1.14e-14  1.47e-15 |
 BREW |   288     0     0   288    6.84   | 4.50e-14  9.02e-15  1.33e-15 |
 ONSA |   288     0     0   288    6.68   | 3.67e-14  1.04e-14  3.39e-15 |
 USNO |   288     0     0   288    6.17   | 4.10e-14  7.88e-15  2.43e-15 |
 ALBH |   288     0     0   288    5.42   | 4.27e-14  1.05e-14  8.78e-15 |
 OPMT |   287     0     0   140    4.84   | 4.12e-14  5.97e-15  1.39e-15 |
 NPLD |   287     0     0   140    4.84   | 3.16e-14  6.01e-15  2.47e-15 |
 WSRT |   288     0     0   288    3.72   | 2.90e-14  7.49e-15  2.12e-15 |
 CHUR |   288     0     0   288    2.96   | 4.81e-14  1.01e-14  3.48e-15 |
 WTZR |   288     0     0   252    2.00   | 3.26e-14  6.88e-15  2.58e-15 |
 NLIB |   288     0     0   288    1.96   | 3.39e-14  5.64e-15  3.22e-15 |
 MDVJ |   288     0     0   288    1.80   | 5.27e-14  8.12e-15  5.43e-15 |
 YEBE |   288     0     0   276    1.75   | 5.18e-14  8.77e-15  4.99e-15 |
 IRKT |   288     0     0   288    1.62   | 4.24e-14  1.29e-14  9.19e-15 |
 YELL |   288     1     0   287    1.60   | 3.12e-14  5.48e-15  4.18e-15 |
 MATE |   288     0     0   288    1.43   | 3.87e-14  7.96e-15  5.72e-15 |
 DRAO |   288     0     0   288    1.16   | 6.76e-14  1.75e-14  6.21e-15 |
 USN3 |   288     0     0   143    1.10   | 7.65e-14  1.07e-14  2.18e-15 |
 HOB2 |   286     0     0   284    1.06   | 3.54e-14  9.74e-15  5.38e-15 |
 NRC1 |   288     0     0   288    0.98   | 2.75e-14  8.02e-15  2.83e-15 |
 NOT1 |   288     0     0   288    0.94   | 4.77e-14  1.54e-14  2.79e-15 |
 MEDI |   288     0     0   288    0.72   | 4.63e-14  9.71e-15  9.49e-15 |
 FORT |   288     0     0   288    0.71   | 7.03e-14  1.24e-14  7.16e-15 |
 PIE1 |   222     1     0   220    0.65   | 3.89e-14  7.51e-15         - |
 KOKB |   144     0     0   142    0.46   | 5.52e-14  9.85e-15         - |
 GODE |   288     0     0   288    0.28   | 4.55e-14  1.02e-14  4.11e-15 |
 G23  |   288     0     0   288    0.22   | 5.04e-13  6.01e-14  3.38e-14 |
 PTBB |   288     0     0   288    0.15   | 2.56e-13  5.80e-14  2.37e-14 |
 G16  |   288     0     3   110    0.13   | 4.99e-13  4.98e-14  1.93e-14 |
 MIZU |   288     0     0   288    0.08   | 3.53e-13  1.37e-13  3.30e-14 |
 BAHR |   288     0     0   288    0.08   | 4.59e-13  1.06e-13  5.33e-14 |
 SFER |   286     0     0   284    0.08   | 3.71e-13  1.06e-13  5.29e-14 |
 G06  |   288     0     0   288    0.08   | 4.59e-13  1.00e-13  9.00e-14 |
 G26  |   288     0     0   288    0.07   | 3.56e-13  1.17e-13  6.16e-14 |
 G14  |   288     0     5    53    0.06   | 5.97e-13  6.05e-14  2.47e-14 |
 KGN0 |   287     0     0   286    0.06   | 3.91e-13  1.04e-13  5.57e-14 |
 TLSE |   287     0     0   286    0.06   | 4.71e-13  1.40e-13  3.52e-14 |
 KHAJ |   288     0     0   143    0.06   | 9.09e-14  1.40e-14  8.54e-15 |
 G30  |   288     0     0   288    0.05   | 3.34e-13  1.11e-13  7.33e-14 |
 TWTF |   288     0     0   288    0.05   | 4.28e-13  9.35e-14  4.26e-14 |
 G27  |   288     0     0   288    0.04   | 3.39e-13  9.67e-14  9.85e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.47e-13  1.09e-13  3.00e-14 |
 G02  |   288     0     1   143    0.04   | 5.44e-13  7.06e-14  3.51e-14 |
 G11  |   288     0     2    87    0.04   | 7.08e-13  8.40e-14  5.96e-14 |
 IENG |   288     0     0   288    0.03   | 5.27e-13  1.60e-13  8.92e-14 |
 DWH1 |   288     0     0   288    0.03   | 5.34e-13  1.53e-13  8.65e-14 |
 G07  |   288     0     0   288    0.03   | 3.08e-13  9.77e-14  1.01e-13 |
 STR1 |   288     0     0   288    0.03   | 6.69e-13  2.11e-13  9.85e-14 |
 FAIR |   288     0     0   288    0.03   | 3.76e-13  9.47e-14  4.34e-14 |
 G17  |   288     0     0   288    0.02   | 3.97e-13  1.14e-13  1.56e-13 |
 SYOG |   288     0     0   288    0.02   | 7.49e-13  1.86e-13  1.36e-13 |
 G04  |   288     0     0   288    0.01   | 4.18e-13  1.45e-13  1.01e-13 |
 G29  |   288     0     0   143    0.01   | 4.38e-13  1.25e-13  8.62e-14 |
 HRAO |   288     0     0   252    0.01   | 1.18e-13  2.55e-14  2.14e-14 |
 G22  |   288     0     2    95    0.01   | 7.82e-13  1.02e-13  1.42e-13 |
 TSKB |   288     0     0   288    0.01   | 1.00e-12  2.42e-13  5.88e-14 |
 G08  |   288     0     0   288    0.01   | 1.47e-12  4.03e-13  1.70e-13 |
 G09  |   288     0     0   288    0.01   | 1.40e-12  4.94e-13  1.34e-13 |
 DAEJ |   287     0     0   286    0.01   | 1.37e-12  3.80e-13  1.95e-13 |
 KOUR |   288     0     0   288    0.01   | 1.36e-12  4.64e-13  1.37e-13 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  3.19e-13  1.61e-13 |
 G25  |   288     0     0   288    0.01   | 1.47e-12  3.32e-13  1.27e-13 |
 G10  |   288     0     0   288    0.00   | 1.08e-12  3.89e-13  1.81e-13 |
 PRDS |   288     0     0   288    0.00   | 1.59e-12  4.20e-13  1.56e-13 |
 G05  |   288     0     0   288    0.00   | 1.30e-12  4.57e-13  1.12e-13 |
 KERG |   288     0     0   288    0.00   | 1.20e-12  4.16e-13  1.81e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.79e-12  3.72e-13  1.75e-13 |
 WHIT |   288     0     0   288    0.00   | 5.35e-13  1.80e-13  1.65e-13 |
 GMAS |   288     0     0   288    0.00   | 1.18e-12  3.95e-13  3.33e-13 |
 GPST |   288     0     0     0    0.00   | 2.20e-14  4.93e-15  1.25e-15 |
 KELY |   237     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 KIT3 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   280     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.78e-13  8.26e-14  5.02e-14 |
 G24  |   288     0     0     0    0.00   | 1.37e-12  4.41e-13  2.70e-13 |
 G21  |   288     0     6     0    0.00   | 1.11e-12  1.30e-13  2.31e-14 |
 G20  |   288     0     6     0    0.00   | 6.10e-13  7.14e-14  1.96e-14 |
 G19  |   288     0     6     0    0.00   | 6.79e-13  6.55e-14  1.82e-14 |
 G18  |   288     0     6     0    0.00   | 1.36e-12  1.28e-13  3.48e-14 |
 G15  |   288     0     0     0    0.00   | 1.60e-12  6.37e-13  2.17e-13 |
 G13  |   288     2     6     0    0.00   | 7.53e-13  1.82e-13  4.58e-14 |
 G01  |   288     0     0     0    0.00   | 1.47e-12  8.64e-13  6.03e-13 |
 ZAMB |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 8.37e-13  8.88e-13  3.56e-13 |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.05e-12  8.05e-13  2.99e-13 |
 VESL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 4.16e-13  2.47e-13  8.37e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     1     0    0.00   | 5.31e-13  1.39e-13  1.30e-13 |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 6.24e-13  4.58e-13  1.59e-12 |
 SANT |   240     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.70e-12  4.99e-13  3.53e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OUS2 |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   283     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.59e-13  2.40e-13  3.00e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   287     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.07e-13  2.45e-13  6.43e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.24e-13  6.97e-13  7.13e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     2     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.69e-17  4.42e-16  2.65e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      BRUS      BREW |
------------------------------------------+------------------------------+
