
 GPS week: 1301   Day: 0   MJD: 53351                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2762      0     0.00     0.04     2.86     0.00      0
 cod |   288     0  27415     23    -0.18     0.35     0.05    18.40      0
 emr |   288     0  24439      0  1098.39    47.61     0.04    23.89      0
 gfz |   288     0  21333     42     0.10     0.01     0.04    22.90      0
 iga |    96     0   2762      2    -0.03     0.04     0.11     0.00      0
 igu |    96     0   2666      0    -0.05     0.06     3.54     0.00      0
 jpl |   288     0  17744    333    -2.96    -3.20     0.05    15.71      0
 ngs |    96     0   2762      0     0.00     0.03     2.71     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33886   2265  1098.29    47.67     0.05    19.09      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -530    89   -38   -36   -26  2789    56  -323     -   -41 |
    2 |  2742    10   -69   -24   -21 -3489   132  1827     -    -5 |
    3 |  -140     2   -94    80   -35  -955   -18  -198     -    34 |
    4 | -2049   117    11    44   -90 -4070     X -2074     -  -172 |
    5 |   296   -82    35   187    84 -5253   -92  -147     -  -113 |
    6 | -1913  -152  -105   253  -140-15756   -77 -1937     -    37 |
    7 | -3014    62     2    -8    13 -1740    20 -2944     -   -70 |
    8 |  -923    86     6    33    90  3355   -18  -888     -  -115 |
    9 | -4397    -3   -91    60  -207   360    31 -4245     -    20 |
   10 | -6718    76    14   -39    34  6474    56 -6218     -   -89 |
   11 |  3379   142   -74   -70   -33  1756    63  3222     -   -15 |
   13 |  5102   271  -108  -123   -30  1163   132  5034     -   -94 |
   14 |  4697    13   -86   -28     2 -1085   137  4488     -    14 |
   15 |  1754  -160    35   143   179 12415   -43  1299     -   -25 |
   16 |  4571  -100  -147   120    41 -1297   152  4549     -    12 |
   17 | -4472   -94    33    92   -28  8288    47 -4373     -   -99 |
   18 |  2483   -52   -89   143   -15  -640   -19  2391     -     5 |
   19 |  4265   142  -313   138   952  -324   115  4259     -    -5 |
   20 |  2753   123   -99   -45    28   106   238  2959     -  -135 |
   21 |  7907  -130   -20   105  -107    34   -11  7759     -    38 |
   22 |  3939   -92     5    15  -112 13957    83  2810     -    -3 |
   23 | -3825   218  -250  -119   -36 -2540   189 -3502     -    85 |
   24 | -9745    27    29    32  -121-10586    12 -8602     -  -111 |
   25 |   835   -23  -186   147   -47  8540    53  1388     -    35 |
   26 | -4197    37   -90    89  -270 -4550   -59 -4059     -    18 |
   27 | -1194    81   -29    24  -168 -2717    53 -1164     -  -114 |
   28 |  3365    29   -18     2    16  1039   106  3491     -   -97 |
   29 |  -843    16     0   -35   107     -   -11 -1053     -    35 |
   30 | -4898  -153   -75   343   -59 -4990  -145 -4470     -   -50 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -41     -     -     -    73     -     -    -9 |
 ALGO |     -     -   -60     -     -     -   116     -     -   -21 |
 ALRT |     -   -47     -    38     -     -     -     -     -     - |
 AMC2 |     -   -35    61     -     -     -  -210     -     -   130 |
 AREQ |     -    -5    63   -97     -     -     5     -     -    40 |
 ARTU |     -   220     -   -65     -     -  -163     -     -     X |
 ASPA |     -     -     -   139     -     -   -61     -     -  -120 |
 AUCK |     -   -48     -     -     -     -     -     -     -    47 |
 BAHR |     -     -   -22    17     -     -     -     -     -     6 |
 BAN2 |     -     -    15     -     -     -     -     -     -   -19 |
 BOGT |     -    54     -     5     -     -     -     -     -   -58 |
 BOR1 |     -   -76    58     -     -     -     -     -     -     1 |
 BREW |     -     -   -42     -     -     -     -     -     -    52 |
 BRUS |     -  -131    40     -     -     -     -     -     -    76 |
 CAS1 |     -    92     -   -93     -     -     -     -     -    23 |
 CHAT |     -   -24     -    71     -     -     -     -     -   -62 |
 CHUR |     -     -    15     -     -     -   -58     -     -    28 |
 CRO1 |     -   212     4   -58     -     -    38     -     -  -157 |
 DAEJ |     -  -223   169     -     -     -     5     -     -     X |
 DAV1 |     -   116     -   -63     -     -     -     -     -   -36 |
 DGAR |     -   -33     -     8     -     -    27     -     -     X |
 DRAO |     -   -62   -34     -     -     -   107     -     -    14 |
 DWH1 |     -    97   -72     -     -     -     -     -     -    -3 |
 FAIR |     -     -    30   -32     -     -     -     -     -     - |
 GLPS |     -    43     -    -8     -     -     -     -     -   -31 |
 GMAS |     -     -   174     -     -     -     -     -     -  -218 |
 GODE |     -     -    67     -     -     -     -     -     -   -84 |
 GOLD |     -   -52     -   -91     -     -     9     -     -   151 |
 GUAM |     -    91     -   -47     -     -  -158     -     -    99 |
 HERS |     -  -108    83     -     -     -     -     -     -     X |
 HOB2 |     -   -75   185     -     -     -     -     -     -  -160 |
 HOFN |     -     -     -  -164     -     -     -     -     -   197 |
 HOLM |     -    17     -     -     -     -   -20     -     -     - |
 HRAO |     -   -49     -   -74     -     -    36     -     -   107 |
 IENG |     -  -121    93     -     -     -     -     -     -     - |
 ISPA |     -    23     -    -9     -     -    30     -     -   -35 |
 JPLM |     -     -   -57     -     -     -     7     -     -    66 |
 KERG |     -     -   -29    75     -     -     -     -     -   -53 |
 KGN0 |     -   -63    35     -     -     -     -     -     -    17 |
 KIRU |     -   -39     -     -     -     -  -151     -     -   162 |
 KIT3 |     -     -     -   -17     -     -   -73     -     -    80 |
 KOKB |     -     -  -108     -     -     -     -     -     -   135 |
 KOSG |     -  -123     -     -     -     -     -     -     -   118 |
 KOUR |     -   -51     -   -80     -     -     -     -     -   145 |
 LAE1 |     -    66     -   -25     -     -     -     -     -   -33 |
 LPGS |     -   -98    60     -     -     -     -     -     -    19 |
 MAC1 |     -   -16     -    13     -     -     -     -     -     X |
 MADR |     -     -     -     -     -     -   -14     -     -    11 |
 MAS1 |     -     -    37   -80     -     -    27     -     -    27 |
 MATE |     -     -     -   -44     -     -     -     -     -    53 |
 MAW1 |     -   165     -  -166     -     -     -     -     -    40 |
 MBAR |     -   -15     -     9     -     -  -133     -     -   113 |
 MCM4 |     -   476   108  -496     -     -     -     -     -     - |
 MIZU |     -     -   -13     -     -     -     -     -     -    16 |
 MKEA |     -    78     -   -34     -     -     7     -     -   -40 |
 MSKU |     -     7     -    -5     -     -     -     -     -     - |
 NKLG |     -     5     -     -     -     -     -     -     -    -5 |
 NLIB |     -     -   -76     -     -     -   102     -     -    12 |
 NNOR |     -     -   -46     -     -     -     -     -     -    57 |
 NPLD |     -  -162    55     -     -     -     -     -     -    86 |
 NRC1 |     -    93    -3   -60     -     -     -     -     -   -14 |
 NRIL |     -    21     -    -8     -     -   -11     -     -     X |
 NTUS |     -  -152     -     -     -     -     -     -     -   146 |
 OHI2 |     -   143     -    28     -     -     -     -     -  -181 |
 ONSA |     -   -56    89   -51     -     -     -     -     -     - |
 PDEL |     -   -95     -    76     -     -     -     -     -     X |
 PERT |     -     -   -18    81     -     -    -1     -     -   -75 |
 PIE1 |     -     -   -97     -     -     -     -     -     -   121 |
 POL2 |     -   -40     -     -     -     -     -     -     -    39 |
 PRDS |     -     -   -33     -     -     -     -     -     -    42 |
 PTBB |     -    29    22     -     -     -     -     -     -   -56 |
 QAQ1 |     -   -79     3     -     -     -     -     -     -    73 |
 REYK |     -   -20     -     -     -     -     -     -     -    19 |
 RIOG |     -   -38   110  -131     -     -     -     -     -    56 |
 SANT |     -     -     -   120     -     -     -     -     -  -144 |
 SCH2 |     -     -    71     -     -     -  -130     -     -    18 |
 SFER |     -     3    -2     -     -     -     -     -     -     - |
 SPT0 |     -  -153    57     -     -     -     -     -     -    76 |
 STJO |     -   126   -62   -37     -     -   -24     -     -    20 |
 SUTH |     -  -128     -     -     -     -     -     -     -   123 |
 SUTM |     -     -   268  -271     -     -   -11     -     -     - |
 THTI |     -     -    90     0     -     -     -     -     -  -112 |
 THU3 |     -     1   121     -     -     -     -     -     -  -153 |
 TLSE |     -     -    65     -     -     -  -149     -     -    42 |
 TRO1 |     -    66     -   -53     -     -     -     -     -     X |
 TSKB |     -  -116   -57   151     -     -     -     -     -     2 |
 TWTF |     -   -78    84     -     -     -     -     -     -   -30 |
 UNSA |     -     -     -     4     -     -     -     -     -    -5 |
 URUM |     -   -53     -     -     -     -     -     -     -    51 |
 USN3 |     -     6     -     -     -     -   -32     -     -    21 |
 USNO |     -    43    -4     -     -     -     -     -     -   -37 |
 VILL |     -   -60     -     -     -     -     -     -     -    58 |
 WHIT |     -    78     -     -     -     -  -193     -     -    84 |
 WILL |     -     3    50     -     -     -     -     -     -   -65 |
 WROC |     -     -   120     -     -     -  -182     -     -     - |
 WTZR |     -  -148   170     -     -     -     -     -     -   -70 |
 WUHN |     -     -   -35    33     -     -     -     -     -     4 |
 YAR2 |     -    -8    60     -     -     -     -     -     -   -68 |
 YEBE |     -     -   -15     -     -     -     -     -     -    19 |
 YELL |     -    -3   -28   -17     -     -     -     -     -    58 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7618    82    38    31    71  6485    42  6728     -    49 |  276   4.62
    2 |  4165    75    32    26   135  2474    38  3734     -    48 |  288   0.41
    3 |  2084    67    85    58    44  1545    80  2065     -    58 |  288   1.82
    4 |  1846   135    57    51    98  2723     X  1795     -    63 |  277   0.80
    5 |  3965    19    31    16    72  3621    26  4285     -    20 |  288   2.50
    6 |   928    41    24    17    81  9820    45   979     -    35 |  288   1.56
    7 |   891    34    23    30    63  1385   101   781     -    60 |  288   0.71
    8 |  2757    80    38    39   155  3695    80  2604     -    63 |  288   2.03
    9 |  3351    36    34    27    87  2544    34  3174     -    52 |  288   1.70
   10 |  2591    35    32    35    73  4614    29  2916     -    70 |  288   1.91
   11 |   730    43    43    81    72  1204    89   801     -    57 |  288   0.48
   13 |   685    54    36    41    79   790    54   698     -    75 |  288   0.51
   14 |   794    69    58    36    89   867    40   768     -    59 |  288   0.28
   15 |  4949   146    79   106   129  5554    77  4751     -   109 |  276   2.26
   16 |   535    29    59    10    31   911    72   589     -    38 |  288   0.24
   17 |   790   154    94   144   274  4993   134   671     -   111 |  278   1.06
   18 |   859    49    70    41    41   972    34   902     -    79 |  288   0.33
   19 |  1144    64    34    43   150  1526    60  1125     -    73 |  288   0.27
   20 |   633    41    42    34    89   842    57   507     -    58 |  288   0.35
   21 |  2782    56    40    40   134   394    80  2519     -    71 |  288   0.32
   22 |  4625    66    44    26    74  6253    67  3857     -    45 |  288   0.24
   23 |   988    60    41    64    52  1826    82   820     -   106 |  288   0.29
   24 |  4960    63    32    25    79  3726    69  5366     -    93 |  278   3.08
   25 |  4729    38    37    21    59  2934    54  4415     -    50 |  288   2.86
   26 |  1364    64    45    35    72  2489    26  1323     -    68 |  277   0.69
   27 |   772    47    24    21    52  1759    45   719     -    47 |  288   0.64
   28 |  1412    38    51    45    75  1634    41  1429     -    87 |  288   0.59
   29 |   895    63    37    32   210     -    41   731     -    46 |  288   0.73
   30 |  1967    26    23    17    84  2426    31  1943     -    35 |  288   0.29
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    29     -     -     -    25     -     -    33 |  288   0.06
 ALGO |     -     -    12     -     -     -    11     -     -    13 |  288   0.01
 ALRT |     -    14     -    11     -     -     -     -     -     - |  287   6.40
 AMC2 |     -    37    54     -     -     -    24     -     -    25 |  288   0.03
 AREQ |     -    24    58    27     -     -   129     -     -    45 |  288  16.42
 ARTU |     -    20     -    11     -     -    29     -     -     X |  287  11.49
 ASPA |     -     -     -    31     -     -    38     -     -    33 |  288    >>>
 AUCK |     -    45     -     -     -     -     -     -     -    43 |  264   8.42
 BAHR |     -     -    33    25     -     -     -     -     -    24 |  288   0.40
 BAN2 |     -     -    16     -     -     -     -     -     -    20 |  288  17.66
 BOGT |     -    31     -    22     -     -     -     -     -    24 |  288  20.79
 BOR1 |     -    26    23     -     -     -     -     -     -    20 |  288   0.68
 BREW |     -     -    25     -     -     -     -     -     -    32 |  288   0.03
 BRUS |     -    37    30     -     -     -     -     -     -    19 |  288   0.03
 CAS1 |     -    45     -    23     -     -     -     -     -    36 |  288   6.46
 CHAT |     -    29     -    31     -     -     -     -     -    35 |  287   8.94
 CHUR |     -     -    53     -     -     -    31     -     -    79 |  287   0.13
 CRO1 |     -    72    26    33     -     -    21     -     -    21 |  288  12.92
 DAEJ |     -    40    44     -     -     -    41     -     -     X |  287   1.23
 DAV1 |     -    18     -    12     -     -     -     -     -    20 |  288  13.83
 DGAR |     -    36     -    25     -     -    34     -     -     X |  288  16.48
 DRAO |     -    44    15     -     -     -    17     -     -    28 |  288   0.08
 DWH1 |     -    40    36     -     -     -     -     -     -    34 |  288   0.58
 FAIR |     -     -    51    53     -     -     -     -     -     - |  262   0.31
 GLPS |     -    18     -    17     -     -     -     -     -    17 |  288  22.60
 GMAS |     -     -    19     -     -     -     -     -     -    23 |  288   2.28
 GODE |     -     -    26     -     -     -     -     -     -    32 |  288   0.12
 GOLD |     -    48     -    63     -     -    80     -     -    35 |  288   9.58
 GUAM |     -    49     -    59     -     -    43     -     -    37 |  288  19.59
 HERS |     -    30    23     -     -     -     -     -     -     X |  241   9.98
 HOB2 |     -    31    34     -     -     -     -     -     -    65 |  288   0.03
 HOFN |     -     -     -    29     -     -     -     -     -    35 |  287    >>>
 HOLM |     -    14     -     -     -     -    16     -     -     - |  287   7.57
 HRAO |     -    34     -    28     -     -    38     -     -    40 |  288   0.17
 IENG |     -    45    34     -     -     -     -     -     -     - |  288   0.62
 ISPA |     -    38     -    35     -     -    66     -     -    41 |  288  13.24
 JPLM |     -     -    67     -     -     -    52     -     -    44 |  288   8.48
 KERG |     -     -    18    15     -     -     -     -     -    25 |  288   1.12
 KGN0 |     -    46    46     -     -     -     -     -     -    31 |  287   0.38
 KIRU |     -    14     -     -     -     -    14     -     -     9 |  288   5.99
 KIT3 |     -     -     -    23     -     -    31     -     -    19 |  286  17.15
 KOKB |     -     -    31     -     -     -     -     -     -    39 |  159   1.11
 KOSG |     -    13     -     -     -     -     -     -     -    13 |  288  10.08
 KOUR |     -    23     -    32     -     -     -     -     -    33 |  288   2.92
 LAE1 |     -    42     -    46     -     -     -     -     -    57 |  287  18.42
 LPGS |     -    30    25     -     -     -     -     -     -    33 |  288  26.02
 MAC1 |     -    27     -    22     -     -     -     -     -     X |  288  23.28
 MADR |     -     -     -     -     -     -    17     -     -    14 |  288  12.78
 MAS1 |     -     -    53    38     -     -    92     -     -    47 |  288   2.83
 MATE |     -     -     -    28     -     -     -     -     -    33 |  288   0.09
 MAW1 |     -    20     -    43     -     -     -     -     -    55 |  288   7.64
 MBAR |     -   100     -    70     -     -    82     -     -   100 |  287   9.76
 MCM4 |     -    14    17    14     -     -     -     -     -     - |  288  10.05
 MIZU |     -     -    28     -     -     -     -     -     -    35 |  288   0.29
 MKEA |     -    26     -    54     -     -    19     -     -    64 |  288  17.96
 MSKU |     -    40     -    32     -     -     -     -     -     - |  288   9.75
 NKLG |     -    35     -     -     -     -     -     -     -    34 |  282    >>>
 NLIB |     -     -    37     -     -     -    30     -     -    44 |  288 195.03
 NNOR |     -     -    16     -     -     -     -     -     -    20 |  288  15.15
 NPLD |     -    23    28     -     -     -     -     -     -    28 |  287   0.02
 NRC1 |     -    26     9    16     -     -     -     -     -    23 |  288   0.02
 NRIL |     -    24     -     8     -     -    30     -     -     X |  281   9.83
 NTUS |     -    31     -     -     -     -     -     -     -    30 |  288  10.09
 OHI2 |     -    88     -    54     -     -     -     -     -   148 |  288   7.16
 ONSA |     -    41    70    58     -     -     -     -     -     - |  280   0.04
 PDEL |     -    25     -    20     -     -     -     -     -     X |  288  53.02
 PERT |     -     -    26    29     -     -    38     -     -    28 |  288   2.27
 PIE1 |     -     -    27     -     -     -     -     -     -    34 |  266   1.29
 POL2 |     -    17     -     -     -     -     -     -     -    16 |  288  10.15
 PRDS |     -     -    21     -     -     -     -     -     -    26 |  288   2.25
 PTBB |     -    19    27     -     -     -     -     -     -    33 |  288   0.40
 QAQ1 |     -    32    20     -     -     -     -     -     -    32 |  288   6.76
 REYK |     -    21     -     -     -     -     -     -     -    20 |  288   6.60
 RIOG |     -    45    32    34     -     -     -     -     -    57 |  287  11.34
 SANT |     -     -     -    33     -     -     -     -     -    39 |  236   8.08
 SCH2 |     -     -    19     -     -     -    17     -     -    21 |  288  27.23
 SFER |     -    28    22     -     -     -     -     -     -     - |  285   0.33
 SPT0 |     -    19    21     -     -     -     -     -     -    22 |  288   0.04
 STJO |     -    34    18    32     -     -    25     -     -    15 |  288   5.27
 SUTH |     -    19     -     -     -     -     -     -     -    18 |  287  10.86
 SUTM |     -     -    31    31     -     -    32     -     -     - |  288  10.64
 THTI |     -     -    35    32     -     -     -     -     -    65 |  288  16.39
 THU3 |     -    28    27     -     -     -     -     -     -    29 |  288   6.95
 TLSE |     -     -    22     -     -     -    40     -     -    21 |  287   0.54
 TRO1 |     -    27     -    22     -     -     -     -     -     X |  286   9.17
 TSKB |     -    50    31    35     -     -     -     -     -    34 |  288   1.24
 TWTF |     -    42    38     -     -     -     -     -     -    47 |  288   0.53
 UNSA |     -     -     -    31     -     -     -     -     -    38 |  284  21.01
 URUM |     -    26     -     -     -     -     -     -     -    25 |  288  21.55
 USN3 |     -    29     -     -     -     -    15     -     -    24 |  288   0.03
 USNO |     -    28    17     -     -     -     -     -     -    21 |  288   0.03
 VILL |     -    33     -     -     -     -     -     -     -    32 |  288   2.13
 WHIT |     -    41     -     -     -     -    14     -     -    38 |  288   1.04
 WILL |     -    46    56     -     -     -     -     -     -    29 |  288  49.19
 WROC |     -     -    41     -     -     -    62     -     -     - |  288  17.78
 WTZR |     -    46    36     -     -     -     -     -     -    30 |  288   0.02
 WUHN |     -     -    36    19     -     -     -     -     -    33 |  287  13.00
 YAR2 |     -    27    25     -     -     -     -     -     -    24 |  288   9.90
 YEBE |     -     -    20     -     -     -     -     -     -    25 |  288   0.06
 YELL |     -    56    52    47     -     -     -     -     -    58 |  288   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  2855    49    39    41   106  3542    54  2713     -    48 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.82   | 3.56e-14  4.46e-15  1.78e-15 |
 AMC2 |   288     0     0   288   10.82   | 3.38e-14  5.98e-15  2.00e-15 |
 ALGO |   288     0     0   288   10.82   | 3.17e-14  6.70e-15  2.38e-15 |
 NPLD |   287     0     0   286   10.74   | 3.46e-14  5.12e-15  2.14e-15 |
 ONSA |   280     0     0   280    7.16   | 4.52e-14  8.91e-15  3.34e-15 |
 USNO |   288     0     0   288    6.49   | 3.68e-14  8.08e-15  1.43e-15 |
 ALBH |   288     0     0   288    6.36   | 3.97e-14  1.04e-14  3.43e-15 |
 SPT0 |   288     0     0   288    5.72   | 3.84e-14  6.00e-15  2.93e-15 |
 WTZR |   288     0     0   288    4.09   | 4.34e-14  8.37e-15  1.18e-15 |
 CHUR |   287     0     0   286    3.87   | 5.91e-14  1.25e-14  7.02e-15 |
 USN3 |   288     0     0   288    3.85   | 8.16e-14  1.13e-14  2.21e-15 |
 NLIB |   288     1     0   287    3.72   | 4.19e-14  7.35e-15  4.36e-15 |
 BREW |   288     0     0   288    3.52   | 3.78e-14  5.73e-15  2.42e-15 |
 DRAO |   288     0     0   288    2.01   | 6.18e-14  1.71e-14  4.35e-15 |
 MATE |   288     0     0   288    1.81   | 5.83e-14  1.33e-14  1.14e-14 |
 YEBE |   288     0     0   288    1.75   | 4.53e-14  8.59e-15  5.95e-15 |
 YELL |   288     0     0   288    1.22   | 4.79e-14  8.23e-15  2.60e-15 |
 HOB2 |   288     0     0   288    0.97   | 4.26e-14  1.13e-14  2.96e-15 |
 NRC1 |   288     0     0   288    0.92   | 2.56e-14  6.14e-15  1.48e-15 |
 GODE |   288     0     0   288    0.57   | 4.32e-14  1.08e-14  1.02e-14 |
 G23  |   288     0     0   288    0.32   | 5.04e-13  6.22e-14  2.88e-14 |
 G30  |   288     0     0   288    0.30   | 3.14e-13  7.64e-14  2.28e-14 |
 PTBB |   288     0     0   288    0.27   | 2.81e-13  7.10e-14  4.11e-14 |
 MIZU |   288     0     0   287    0.13   | 3.89e-13  1.02e-13  2.64e-14 |
 PIE1 |   266     0     0   265    0.13   | 7.04e-14  1.91e-14  3.21e-15 |
 G02  |   288     0     2   179    0.13   | 5.48e-13  6.53e-14  2.83e-14 |
 G11  |   288     0     0   288    0.12   | 7.04e-13  7.20e-14  5.22e-14 |
 SFER |   285     0     0   282    0.11   | 4.15e-13  1.11e-13  3.00e-14 |
 KGN0 |   287     0     0   286    0.11   | 3.67e-13  1.14e-13  3.78e-14 |
 TLSE |   287     0     0   286    0.11   | 4.29e-13  1.16e-13  6.05e-14 |
 G29  |   288     0     0   288    0.10   | 4.81e-13  1.16e-13  4.86e-14 |
 G27  |   288     0     0   288    0.09   | 3.58e-13  8.49e-14  8.35e-14 |
 G04  |   277     0     0   275    0.08   | 4.62e-13  1.13e-13  9.95e-14 |
 TWTF |   288     0     0   288    0.08   | 4.04e-13  1.22e-13  4.27e-14 |
 HRAO |   288     0     0   288    0.07   | 1.10e-13  2.08e-14  2.09e-14 |
 G06  |   288     0     0   288    0.07   | 4.11e-13  1.36e-13  9.97e-14 |
 BAHR |   288     0     0   288    0.07   | 4.34e-13  9.21e-14  4.17e-14 |
 G07  |   288     0     0   288    0.06   | 2.61e-13  1.05e-13  9.12e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.13e-13  1.63e-13  5.46e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.84e-13  1.16e-13  6.44e-14 |
 G26  |   277     0     0   275    0.05   | 3.46e-13  1.35e-13  6.88e-14 |
 G17  |   278     0     0   276    0.04   | 3.51e-13  1.22e-13  9.78e-14 |
 IENG |   288     0     0   288    0.04   | 5.11e-13  1.47e-13  5.25e-14 |
 FAIR |   262     0     0   260    0.04   | 3.76e-13  8.86e-14  2.58e-14 |
 KOKB |   159     1     0    32    0.04   | 4.72e-14  1.16e-14         - |
 TSKB |   288     0     0   288    0.02   | 9.80e-13  3.12e-13  1.06e-13 |
 G22  |   288     1     6     7    0.01   | 9.44e-13  9.12e-14  2.43e-14 |
 G03  |   288     0     0   288    0.01   | 1.31e-12  3.53e-13  2.16e-13 |
 DAEJ |   287     0     0   286    0.01   | 1.42e-12  3.38e-13  8.20e-14 |
 KOUR |   288     0     0   288    0.01   | 1.43e-12  4.43e-13  2.50e-13 |
 PRDS |   288     0     0   288    0.01   | 1.44e-12  3.98e-13  2.00e-13 |
 WHIT |   288     0     0   288    0.01   | 4.97e-13  2.11e-13  9.20e-14 |
 KERG |   288     0     0   288    0.01   | 1.15e-12  3.93e-13  9.25e-14 |
 G08  |   288     0     0   288    0.01   | 1.30e-12  3.96e-13  2.56e-13 |
 G05  |   288     0     0   288    0.01   | 1.36e-12  5.24e-13  1.87e-13 |
 G25  |   288     0     0   288    0.01   | 1.31e-12  4.44e-13  2.53e-13 |
 G15  |   276     0     0   274    0.01   | 1.53e-12  4.64e-13  2.09e-13 |
 G10  |   288     0     0   288    0.01   | 1.19e-12  3.78e-13  2.57e-13 |
 MAS1 |   288     0     0   288    0.01   | 1.92e-12  5.38e-13  1.92e-13 |
 GMAS |   288     0     0   143    0.00   | 1.08e-12  3.72e-13  2.47e-13 |
 GPST |   288     0     0     0    0.00   | 1.91e-14  4.44e-15  1.71e-15 |
 SANT |   236     0     0     0    0.00   |        -         -         - |
 UNSA |   284     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   282     1     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.21e-13  8.27e-14  3.97e-14 |
 G24  |   278     0     0     0    0.00   | 1.20e-12  4.95e-13  2.89e-13 |
 G21  |   288     0     6     0    0.00   | 1.04e-12  1.27e-13  2.91e-14 |
 G20  |   288     0     6     0    0.00   | 6.00e-13  6.31e-14  2.30e-14 |
 G19  |   288     0     5     0    0.00   | 7.34e-13  7.34e-14  2.79e-14 |
 G18  |   288     0     6     0    0.00   | 1.25e-12  1.12e-13  3.20e-14 |
 G16  |   288     0     4     0    0.00   | 4.42e-13  5.44e-14  2.34e-14 |
 G14  |   288     0     5     0    0.00   | 6.24e-13  6.73e-14  2.97e-14 |
 G13  |   288     1     6     0    0.00   | 6.97e-13  1.96e-13  7.22e-14 |
 G09  |   288     0     0     0    0.00   | 1.40e-12  5.10e-13  1.37e-13 |
 G01  |   276     0     0     0    0.00   | 1.35e-12  7.45e-13  2.51e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   288     1     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.08e-12  6.53e-13  1.89e-13 |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.97e-13  2.88e-13  1.06e-12 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   287     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     0     0    0.00   | 5.44e-13  1.88e-13  5.57e-13 |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.88e-12  5.26e-13  2.17e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   281     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.41e-13  3.93e-13  7.88e-13 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 6.71e-13  5.55e-13  7.51e-13 |
 KIT3 |   286     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.72e-13  2.96e-13  9.32e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   287     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   287     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.98e-17  2.37e-16  1.43e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      BRUS      WTZR |
------------------------------------------+------------------------------+
