
 GPS week: 1303   Day: 5   MJD: 53370                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2682      3    -0.27     0.36     3.30     0.00      0
 cod |   288     0  26965    667    -0.40     0.57     0.05    16.87      0
 emr |   288     0  22029    354  2063.43    51.12     0.05    16.72      0
 esa |   288     0  18427   1180  2063.51    50.95     0.07     9.75      0
 gfz |   288     0  19370    803     0.62    -1.16     0.04    20.70      0
 iga |    96     0   2590     11    -0.35     0.40     0.11     0.00      0
 igu |    96     0   2586      0    -0.30     0.37     3.09     0.00      0
 jpl |   288     0  18614    288    -6.26     0.06     0.04    23.05      0
 ngs |    96     0   2682      1    -0.33     0.42     3.16     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  32992   2368  2063.52    51.09     0.06    12.91      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |-12883    53   -16    51   -67    17-17456    17-10725     -   -11 |
    3 |  1523  -120   -84   246   -32    -4  2870    30  1437     -    79 |
    4 | -6368    24   -39    20    77  -120 -2716    26 -6181     -  -181 |
    5 | -1238   -89  -138   273    39    19 -8215   -18 -1350     -    58 |
    6 |  4955   -46   -95   -41   102   -48 -9875   -15  3387     -    77 |
    7 | -2790    40  -166  -153   239   153 -1314     - -2854     -  -147 |
    8 | -1696    -3   -88  -113   111   -39  6842    17 -1545     -    -5 |
    9 |  4215   -26  -172    69    61  -134 16292    52  4103     -    37 |
   10 | -2568    36    26  -169   -40   114  -819    66 -2724     -    -7 |
   11 |  3465    95   -74   -67    30   -17  1167    44  3576     -  -105 |
   13 |  5261   121    43  -141     7   -87  1100   -19  5014     -   -90 |
   14 |  4233    79     2   -39   -43   -73   525    21  4038     -   -45 |
   15 |   338  -110    79   306   -56    72 -3928   -97   892     -    70 |
   16 |  4046  -128   -78   140   -59   -95  -140    85  4044     -   104 |
   17 | -9615  -150   -37     X    64  -135    83    62 -9151     -    10 |
   18 |  1440   -16   -65   -58   -50     7   -96    79  1739     -    87 |
   19 |  2847   -20  -321    50   194   957  1064   167  3007     -  -206 |
   20 |  3247    70  -115  -398   130   -89   264   138  3471     -   -97 |
   21 |  1585    14   -50   -23  -101    97   851    51  1411     -   129 |
   22 | -3704   -43    63   197   -24   -85 -1361   -60 -3472     -   -28 |
   23 | -2717   133   -43  -150   -20  -139  -369   115 -2552     -  -180 |
   24 |   674     X   -17     X     X     -  8097    48   634     -   -65 |
   25 |  4760   -65    30   360   -66  -271  6627   -19  4580     -   -93 |
   26 | -4816     8   -69   205   -37   -40 -1228    25 -4615     -   -61 |
   27 |  -367    -4   -38   -23   117   -65  -137    -5  -439     -  -102 |
   28 | 10332   -13     X  -232   190    87  4497    15  9256     -  -139 |
   29 | -4079    -6  -115   171     6   -22     -    81 -3996     -  -130 |
   30 |  -682   -60    18   117   -75   -68 -2280   -15 -1265     -   115 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    34     -     -     -     -    23     -     -   -85 |
 ALGO |     -  -125    23   103     -     -     -    83     -     -   -94 |
 ALRT |     -   -23     -     -    54     -     -   -32     -     -     - |
 AMC2 |     -   -15   246     -     -     -     -  -243     -     -   135 |
 AREQ |     -     -    42   176   -73     -     -   -93     -     -    95 |
 ARTU |     -   127     -   157  -177     -     -     X     -     -     X |
 ASPA |     -     -     -     -     -     -     -   -71     -     -   127 |
 AUCK |     -    27     -     X     -     -     -   -37     -     -    32 |
 BAHR |     -   -39   -44     -   192     -     -   -48     -     -  -115 |
 BOGT |     -    39     -  -108   -29     -     -     -     -     -    75 |
 BOR1 |     -   -17    28     -     -     -     -     -     -     -   -13 |
 BREW |     -     -   266     -     -     -     -     -     -     -  -345 |
 BRUS |     -   -54    54     -     -     -     -     -     -     -     X |
 CAGZ |     -    82     -     -     -     -     -     -     -     -  -108 |
 CAS1 |     -    -3     -    21   -28     -     -     6     -     -    22 |
 CEDU |     -     -     -     X     -     -     -   -67     -     -   120 |
 CHAT |     -   -55     -     -    11     -     -     -     -     -    55 |
 CHUR |     -   209    10     -     -     -     -  -137     -     -    33 |
 COCO |     -   -28     -   113    18     -     -   -20     -     -   -43 |
 CRO1 |     -    87    98   -69   -75     -     -   -16     -     -   -40 |
 DAEJ |     -     -  -142     -     -     -     -     -     -     -   183 |
 DAV1 |     -   133     -     -    11     -     -   -42     -     -  -115 |
 DGAR |     -     1     -     -     -     -     -    33     -     -   -60 |
 DRAO |     -    96    -1   289     -     -     -   -47     -     -  -258 |
 DWH1 |     -    34   128     -     -     -     -     -     -     -  -211 |
 GLPS |     -    14     -    27   -24     -     -     -     -     -     X |
 GODE |     -     -    88   -35     -     -     -     -     -     -   -87 |
 GOLD |     -    96     -  -217     -     -     -    -1     -     -     X |
 GRAZ |     -     -    51     -     -     -     -     -     -     -   -66 |
 HARB |     -    23     -     -    -2     -     -     -     -     -   -27 |
 HOB2 |     -    16   237   -49     -     -     -  -130     -     -   -60 |
 HOFN |     -     -     -     -  -136     -     -     4     -     -   211 |
 HRAO |     -     -     -     -  -103     -     -    44     -     -    85 |
 IISC |     -    40     -  -107    18     -     -     -     -     -     - |
 ISPA |     -     8     -     -   -47     -     -    -7     -     -    78 |
 JPLM |     -     -   161     -  -161     -     -     -     -     -    50 |
 KELY |     -   187     -     -     -     -     -  -137     -     -     - |
 KGN0 |     -    28   -23     -     -     -     -     -     -     -    -6 |
 KIRU |     -    19     -    86     -     -     -     -     -     -   -90 |
 KOSG |     -  -109     -     -     -     -     -     -     -     -   142 |
 KOUR |     -    84     -  -124   -63     -     -     -     -     -    87 |
 MAC1 |     -    -4     -   104   -46     -     -     -     -     -     X |
 MAD2 |     -     -   -56     -     -     -     -     -     -     -    73 |
 MADR |     -     -     -     -     -     -     -   -11     -     -    20 |
 MAG0 |     -   -20     -     -     -     -     -    15     -     -     - |
 MALI |     -   150     -   -36     -     -     -     -     -     -  -169 |
 MAS1 |     -     -    15  -127   -83     -     -    66     -     -    92 |
 MAW1 |     -     -     -     -   -53     -     -     -     -     -    86 |
 MCM4 |     -  -157  -499     -   530     -     -     -     -     -     - |
 MDO1 |     -    96   -22     -     -     -     -     -     -     -   -98 |
 MKEA |     -     -     -   116   -15     -     -    -1     -     -   -62 |
 NISU |     -   -46    -2     -    38     -     -     -     -     -     - |
 NKLG |     -     -     -  -234     -     -     -     -     -     -   177 |
 NLIB |     -     -    -5     -     -     -     -    14     -     -   -19 |
 NNOR |     -     -   -73   -79     -     -     -     -     -     -   154 |
 NPLD |     -  -170    67     -     -     -     -     -     -     -   136 |
 NRC1 |     -     -    32     -   -60     -     -     -     -     -    55 |
 NRIL |     -    40     -     -   -42     -     -     9     -     -     X |
 NTUS |     -   -71     -   -45     -     -     -     -     -     -   126 |
 NYA1 |     -    99     -     -  -118     -     -     -     -     -    61 |
 OHI2 |     -    76     -   109   -32     -     -    24     -     -  -175 |
 ONSA |     -   -77   126    46   -61     -     -     -     -     -     X |
 PERT |     -     -   -29  -140   103     -     -   -22     -     -    17 |
 PIE1 |     -     -    26   -37     -     -     -     -     -     -    -5 |
 PIMO |     -     -     -   597     -     -     -     -     -     -  -451 |
 POL2 |     -   -12     -     -     -     -     -     -     -     -    15 |
 PRDS |     -   -32    49     -     -     -     -     -     -     -   -22 |
 PTBB |     -   -44    24     -     -     -     -     -     -     -    25 |
 QAQ1 |     -  -142    88     -     -     -     -     -     -     -    72 |
 REYK |     -   -10     -     -   -38     -     -     -     -     -    74 |
 SANT |     -     -     -  -537     X     -     -     -     -     -   405 |
 SCH2 |     -     8     0     -     -     -     -     -     -     -   -10 |
 SFER |     -    50   -50     -     -     -     -     -     -     -     - |
 SHAO |     -     -     -  -120     -     -     -     -     -     -    91 |
 SPT0 |     -  -128   101     -     -     -     -     -     -     -    36 |
 STJO |     -   125    18     -   -97     -     -   -18     -     -     X |
 STR1 |     -     -   -20     -     -     -     -     -     -     -    26 |
 SUTH |     -   -74     -     -     -     -     -     -     -     -    97 |
 THU3 |     -     7   166     -     -     -     -     -     -     -  -224 |
 TID1 |     -     -     -     -     -     -     -   -19     -     -    33 |
 TIDB |     -    34   -13  -102     -     -     -     -     -     -    49 |
 TLSE |     -     -   -48     -     -     -     -     -     -     -    62 |
 TOW2 |     -   -28     -     6   -27     -     -    56     -     -   -24 |
 TRO1 |     -   -23     -     -   -69     -     -     7     -     -   129 |
 TSKB |     -   -63   -36    83    63     -     -     -     -     -   -34 |
 TWTF |     -  -103   -43     -     -     -     -     -     -     -   190 |
 USN3 |     -   -33     -     -     -     -     -   -43     -     -   120 |
 USNO |     -   -92    59     -     -     -     -     -     -     -    44 |
 VILL |     -    17     -  -159   -65     -     -     -     -     -   202 |
 WHIT |     -    62     -     -   -60     -     -     8     -     -     0 |
 WILL |     -   -25   143     -     -     -     -     -     -     -  -153 |
 WTZR |     -    17   224  -178     -     -     -   -49     -     -   -92 |
 WUHN |     -     -   -51     -    73     -     -     -     -     -   -51 |
 YAR2 |     -   -47    56     -     -     -     -     -     -     -   -11 |
 YELL |     -     X    66  -162     X     -     -     -     -     -    37 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  9279    40    28    61    24    30  6503    24  8505     -    51 |  288   4.41
    3 |  2634    52    68    34    79    61  2607    50  2600     -    78 |  288   2.67
    4 |  1920   109    85   192    76   138  1509    67  2172     -   142 |  288   1.21
    5 |  2280    30    28    39    30    45  4936    16  2265     -    50 |  288   1.96
    6 |  6727    43    25    41    18    58  6858    24  6013     -    52 |  288   1.06
    7 |  1135    33   119    68    52    76  1125     -  1057     -   157 |  288   0.54
    8 |  1988    60    25    59    37    41  2144    39  2368     -    96 |  288   2.04
    9 |  5192    74    64    94    81   134  7912    40  5181     -   155 |  288   3.24
   10 |  3066    50    34    55    32    46  2966    27  3163     -    66 |  288   3.20
   11 |  1012    53    40    36    27    52   919    41   920     -    60 |  288   0.44
   13 |  1577    51    42   129    29    58  1113    44  1487     -   101 |  288   0.21
   14 |  1675    41    69    63    34    84   572    27  1451     -    71 |  288   0.21
   15 |  6346   158    46   120    56   137  3429    47  5891     -    86 |  288   3.14
   16 |   657    35    19    58    28   304   370    37   636     -    41 |  288   0.31
   17 |  2298   211   150     X   106   253  1496    73  2183     -    92 |  280   1.14
   18 |   718    46    45    76    18   145   624    25   608     -    56 |  288   0.42
   19 |   691    35    37    43    42    63   652    49   660     -   105 |  288   0.26
   20 |   920    46    44    43    36    69   733    35   808     -   105 |  288   0.34
   21 |  1548    64    42    43    31    91  1905    38  1617     -    67 |  288   0.91
   22 |   865    41    28    86    26    75   669    29   712     -    92 |  288   0.25
   23 |   789    55    46   106    24    69   327    44   768     -    64 |  288   0.25
   24 |  2493     X    70     X     X     -  2734    57  2372     -    51 |  276   2.31
   25 |  4672   126    71   146    42   113  5075    86  4774     -    83 |  288   2.31
   26 |  1038    34    83    66    29    52   792    38   933     -    59 |  288   0.81
   27 |  1074   148    46   147    49    96   838    90  1136     -    75 |  288   0.77
   28 |  4026    46     X    52    41   134  1278    51  4270     -   104 |  288   0.63
   29 |  2018    38    84   115    61    97     -    45  2171     -   108 |  288   0.50
   30 |  3576    35    33    57    22    58  1607    17  3296     -    49 |  288   0.40
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    31     -     -     -     -    25     -     -    19 |  288   0.05
 ALGO |     -    38    50    43     -     -     -    39     -     -    41 |  288   0.03
 ALRT |     -    29     -     -    18     -     -    15     -     -     - |  288   6.34
 AMC2 |     -    26    35     -     -     -     -    19     -     -    46 |  288   0.04
 AREQ |     -     -    58    68    72     -     -    23     -     -   138 |  288  14.58
 ARTU |     -    51     -    46    55     -     -     X     -     -     X |  288  10.54
 ASPA |     -     -     -     -     -     -     -    17     -     -    30 |  286    >>>
 AUCK |     -    31     -     X     -     -     -    67     -     -   121 |  264  11.12
 BAHR |     -    53    36     -    20     -     -    29     -     -    30 |  288   0.40
 BOGT |     -    27     -    90    46     -     -     -     -     -    51 |  287  21.19
 BOR1 |     -    88    56     -     -     -     -     -     -     -    47 |  275  14.11
 BREW |     -     -   145     -     -     -     -     -     -     -   188 |  234   1.12
 BRUS |     -    19    19     -     -     -     -     -     -     -     X |  288   0.04
 CAGZ |     -    13     -     -     -     -     -     -     -     -    17 |  288   0.44
 CAS1 |     -    38     -    43    20     -     -    21     -     -    39 |  288   8.47
 CEDU |     -     -     -     X     -     -     -    13     -     -    24 |  284  15.92
 CHAT |     -    50     -     -    51     -     -     -     -     -    48 |  287  11.31
 CHUR |     -    31    35     -     -     -     -    37     -     -    30 |  288   0.09
 COCO |     -    23     -    43    25     -     -    23     -     -    27 |  288   7.41
 CRO1 |     -    84    68    70    81     -     -    36     -     -    53 |  288  17.49
 DAEJ |     -     -    40     -     -     -     -     -     -     -    52 |  287    >>>
 DAV1 |     -    29     -     -    17     -     -    30     -     -    32 |  288  13.97
 DGAR |     -    46     -     -     -     -     -    18     -     -    56 |  288  14.34
 DRAO |     -    30    35    24     -     -     -    23     -     -    36 |  288   0.08
 DWH1 |     -    17    21     -     -     -     -     -     -     -    21 |  288   0.78
 GLPS |     -    30     -    69    39     -     -     -     -     -     X |  288  21.99
 GODE |     -     -    22    44     -     -     -     -     -     -    35 |  288   0.09
 GOLD |     -    59     -    89     -     -     -    48     -     -     X |  288  13.35
 GRAZ |     -     -    25     -     -     -     -     -     -     -    32 |  288    >>>
 HARB |     -    27     -     -    24     -     -     -     -     -    30 |  287  30.71
 HOB2 |     -    38    29    43     -     -     -    33     -     -    40 |  288   0.07
 HOFN |     -     -     -     -    26     -     -    24     -     -    37 |  287    >>>
 HRAO |     -     -     -     -    20     -     -    31     -     -    36 |  288   0.23
 IISC |     -    23     -    44    32     -     -     -     -     -     - |  288  21.29
 ISPA |     -    49     -     -    62     -     -    53     -     -    74 |  288  17.14
 JPLM |     -     -    29     -    73     -     -     -     -     -    98 |  288   5.56
 KELY |     -    32     -     -     -     -     -    23     -     -     - |  287   8.20
 KGN0 |     -    24    27     -     -     -     -     -     -     -    31 |  287   0.23
 KIRU |     -    15     -    64     -     -     -     -     -     -    41 |  288   6.85
 KOSG |     -    30     -     -     -     -     -     -     -     -    39 |  288  35.60
 KOUR |     -    25     -    49    30     -     -     -     -     -    47 |  288   1.93
 MAC1 |     -    43     -    48    32     -     -     -     -     -     X |  288  16.88
 MAD2 |     -     -    18     -     -     -     -     -     -     -    24 |  288   0.07
 MADR |     -     -     -     -     -     -     -    18     -     -    32 |  288   9.95
 MAG0 |     -    36     -     -     -     -     -    26     -     -     - |  286   6.97
 MALI |     -    32     -    73     -     -     -     -     -     -    29 |  288  16.58
 MAS1 |     -     -    43    50    34     -     -    26     -     -    43 |  288   1.93
 MAW1 |     -     -     -     -    18     -     -     -     -     -    30 |  286   7.63
 MCM4 |     -    29    23     -    17     -     -     -     -     -     - |  288  27.21
 MDO1 |     -    38    27     -     -     -     -     -     -     -    23 |  288  15.42
 MKEA |     -     -     -    36    28     -     -    25     -     -    55 |  288  18.51
 NISU |     -    24    42     -    32     -     -     -     -     -     - |  288   0.04
 NKLG |     -     -     -    82     -     -     -     -     -     -    62 |  287    >>>
 NLIB |     -     -    33     -     -     -     -    21     -     -    26 |  288   0.04
 NNOR |     -     -    36    41     -     -     -     -     -     -    29 |  288  13.65
 NPLD |     -    32    33     -     -     -     -     -     -     -    25 |  287   0.12
 NRC1 |     -     -    22     -    32     -     -     -     -     -    31 |  288   0.04
 NRIL |     -    34     -     -    11     -     -    20     -     -     X |  288  10.67
 NTUS |     -    34     -    36     -     -     -     -     -     -    25 |  288  10.56
 NYA1 |     -    20     -     -    15     -     -     -     -     -    22 |  287   0.07
 OHI2 |     -    47     -    41    44     -     -    31     -     -   116 |  287  10.91
 ONSA |     -    32    29    92    18     -     -     -     -     -     X |  288   0.04
 PERT |     -     -    33    54    35     -     -    35     -     -    36 |  288   1.67
 PIE1 |     -     -    24    40     -     -     -     -     -     -    25 |  288   0.08
 PIMO |     -     -     -    96     -     -     -     -     -     -    72 |  180  59.81
 POL2 |     -    20     -     -     -     -     -     -     -     -    27 |  288  10.46
 PRDS |     -    24    19     -     -     -     -     -     -     -    23 |  288   1.56
 PTBB |     -    23    30     -     -     -     -     -     -     -    34 |  288   0.31
 QAQ1 |     -    35    42     -     -     -     -     -     -     -    18 |  288   7.25
 REYK |     -    21     -     -    26     -     -     -     -     -    23 |  288   8.59
 SANT |     -     -     -    60     X     -     -     -     -     -    45 |  189   5.33
 SCH2 |     -    27    31     -     -     -     -     -     -     -    20 |  288  51.44
 SFER |     -    32    32     -     -     -     -     -     -     -     - |  284   0.46
 SHAO |     -     -     -   114     -     -     -     -     -     -    86 |  264  17.82
 SPT0 |     -    20    18     -     -     -     -     -     -     -    16 |  288   0.06
 STJO |     -    20    34     -    31     -     -    35     -     -     X |  288   0.04
 STR1 |     -     -    13     -     -     -     -     -     -     -    17 |  288   0.51
 SUTH |     -    25     -     -     -     -     -     -     -     -    32 |  288  12.32
 THU3 |     -    50    25     -     -     -     -     -     -     -    52 |  288   7.40
 TID1 |     -     -     -     -     -     -     -    24     -     -    44 |  288   0.13
 TIDB |     -    19    22    41     -     -     -     -     -     -    25 |  288   0.14
 TLSE |     -     -    17     -     -     -     -     -     -     -    22 |  287   0.30
 TOW2 |     -    39     -    53    34     -     -    50     -     -    22 |  288  13.77
 TRO1 |     -    96     -     -    32     -     -    21     -     -    57 |  288  31.63
 TSKB |     -    42    28    41    32     -     -     -     -     -    26 |  288   1.49
 TWTF |     -    34    43     -     -     -     -     -     -     -    32 |  288   0.05
 USN3 |     -    16     -     -     -     -     -    12     -     -    25 |  288   0.03
 USNO |     -    39    28     -     -     -     -     -     -     -    37 |  288   0.04
 VILL |     -    18     -    51    30     -     -     -     -     -    18 |  288   3.80
 WHIT |     -    50     -     -    17     -     -    16     -     -    49 |  288  20.07
 WILL |     -    33    36     -     -     -     -     -     -     -    17 |  288  32.01
 WTZR |     -    20    32    42     -     -     -    24     -     -    40 |  288   0.04
 WUHN |     -     -    24     -    22     -     -     -     -     -    23 |  287  15.24
 YAR2 |     -    27    25     -     -     -     -     -     -     -    20 |  288   4.52
 YELL |     -     X    75   127     X     -     -     -     -     -    17 |  284   0.48
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3299    52    48    74    41   112  3094    38  3162     -    61 |


 BEST CLOCK FIT: USN3   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.96   | 3.94e-14  9.64e-15  4.50e-15 |
 AMC2 |   288     0     0   288    9.96   | 3.64e-14  5.51e-15  2.21e-15 |
 NPLD |   287     0     0   286    7.34   | 3.90e-14  9.68e-15  1.31e-14 |
 YELL |   284     0     0   283    6.93   | 4.01e-14  8.08e-15  3.54e-15 |
 NRC1 |   288     1     0   287    5.76   | 4.22e-14  1.19e-14  2.66e-15 |
 SPT0 |   288     0     0   288    5.74   | 3.44e-14  6.66e-15  3.62e-15 |
 ALBH |   288     0     0   288    5.31   | 4.05e-14  9.54e-15  3.04e-15 |
 ALGO |   288     1     0   287    5.13   | 5.66e-14  1.73e-14  5.88e-15 |
 BRUS |   288     0     0   288    4.88   | 3.88e-14  1.12e-14  2.86e-15 |
 USN3 |   288     0     0   288    4.27   | 8.09e-14  1.14e-14  3.32e-15 |
 ONSA |   288     0     0   288    4.17   | 3.18e-14  6.42e-15  1.77e-15 |
 MAD2 |   288     0     0   288    3.84   | 4.76e-14  9.92e-15  5.87e-15 |
 NISU |   288     0     0   288    3.70   | 4.94e-14  8.32e-15  2.58e-15 |
 NLIB |   288     0     0   288    3.26   | 4.37e-14  1.05e-14  1.48e-15 |
 PIE1 |   288     1     0   287    2.51   | 4.36e-14  1.25e-14  6.18e-15 |
 WTZR |   288     0     0   288    2.46   | 3.74e-14  9.77e-15  1.85e-15 |
 TWTF |   288     0     0   288    2.31   | 4.25e-14  8.58e-15  3.20e-15 |
 NYA1 |   287     0     0   286    1.98   | 2.65e-14  8.66e-15  4.41e-15 |
 BREW |   234     1     0   229    1.85   | 3.28e-14  8.36e-15         - |
 CHUR |   288     1     0   143    1.74   | 5.49e-14  1.06e-14  1.56e-15 |
 HOB2 |   288     0     0   288    1.22   | 4.60e-14  1.54e-14  4.51e-15 |
 GODE |   288     0     0   288    1.13   | 4.53e-14  9.40e-15  7.68e-15 |
 STJO |   288     0     0   288    1.03   | 4.09e-14  7.52e-15  3.71e-15 |
 DRAO |   288     1     0   287    0.76   | 6.16e-14  1.82e-14  4.90e-15 |
 TIDB |   288     0     2   203    0.75   | 2.14e-13  2.21e-14  8.35e-15 |
 TID1 |   288     0     0   288    0.72   | 5.90e-14  1.26e-14  7.35e-15 |
 PTBB |   288     0     0   288    0.19   | 3.14e-13  4.73e-14  1.92e-14 |
 HRAO |   288     0     0   288    0.19   | 1.08e-13  1.83e-14  2.88e-14 |
 G07  |   288     0     0   288    0.12   | 2.70e-13  9.63e-14  4.71e-14 |
 G30  |   288     0     0   288    0.10   | 3.15e-13  8.16e-14  4.19e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.87e-13  1.12e-13  2.03e-14 |
 G23  |   288     0     1   144    0.08   | 5.14e-13  6.34e-14  2.18e-14 |
 G16  |   288     0     3    67    0.05   | 4.49e-13  5.16e-14  4.22e-14 |
 SFER |   284     0     0   138    0.04   | 3.87e-13  1.21e-13  3.15e-14 |
 G29  |   288     0     0   288    0.04   | 4.12e-13  1.09e-13  6.22e-14 |
 DWH1 |   288     0     0   288    0.04   | 4.88e-13  1.37e-13  6.42e-14 |
 BAHR |   288     0     0   288    0.04   | 3.86e-13  9.44e-14  4.23e-14 |
 G06  |   288     0     0   288    0.04   | 4.59e-13  1.52e-13  8.00e-14 |
 CAGZ |   288     0     0   175    0.03   | 5.87e-13  1.08e-13  4.36e-14 |
 TLSE |   287     0     0   141    0.03   | 3.68e-13  1.12e-13  2.97e-14 |
 G26  |   288     0     0   288    0.03   | 3.78e-13  9.78e-14  9.95e-14 |
 G27  |   288     0     0   288    0.03   | 3.28e-13  1.10e-13  9.01e-14 |
 BOR1 |   275     0     0   274    0.03   | 4.43e-13  1.26e-13  2.63e-14 |
 G17  |   280     0     0   278    0.02   | 3.75e-13  1.24e-13  8.68e-14 |
 G04  |   288     0     0   288    0.02   | 4.49e-13  1.66e-13  1.53e-13 |
 STR1 |   288     0     0   143    0.01   | 6.25e-13  1.66e-13  4.98e-14 |
 TSKB |   288     0     0   288    0.01   | 1.05e-12  2.69e-13  9.93e-14 |
 G05  |   288     0     0   288    0.01   | 1.30e-12  3.94e-13  1.72e-13 |
 G25  |   288     0     0   288    0.01   | 1.36e-12  3.94e-13  1.65e-13 |
 G03  |   288     0     0   288    0.01   | 1.31e-12  3.45e-13  2.14e-13 |
 G09  |   288     0     0   288    0.00   | 1.33e-12  4.11e-13  2.79e-13 |
 KOUR |   288     0     0   288    0.00   | 1.58e-12  3.54e-13  1.28e-13 |
 PERT |   288     0     0   288    0.00   | 1.84e-12  5.72e-13  1.69e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.78e-12  6.15e-13  1.72e-13 |
 PRDS |   288     0     0   143    0.00   | 1.53e-12  3.93e-13  1.28e-13 |
 GPST |   288     0     0     0    0.00   | 3.09e-14  7.85e-15  3.51e-15 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 MAG0 |   286     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     5     0    0.00   | 7.09e-13  1.02e-13  4.97e-14 |
 G24  |   276     0     0     0    0.00   | 1.33e-12  4.02e-13  2.00e-13 |
 G22  |   288     0     6     0    0.00   | 8.88e-13  8.70e-14  2.55e-14 |
 G21  |   288     0     6     0    0.00   | 9.91e-13  1.37e-13  6.41e-14 |
 G20  |   288     0     6     0    0.00   | 7.65e-13  7.91e-14  3.26e-14 |
 G19  |   288     0     6     0    0.00   | 7.33e-13  7.49e-14  2.02e-14 |
 G18  |   288     6     6     0    0.00   | 1.66e-12  2.31e-13  6.88e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.65e-13  4.05e-13 |
 G14  |   288     0     6     0    0.00   | 6.45e-13  7.02e-14  2.22e-14 |
 G13  |   288     1     4     0    0.00   | 5.09e-13  7.04e-14  2.57e-14 |
 G11  |   288     0     5     0    0.00   | 6.69e-13  6.72e-14  5.77e-14 |
 G10  |   288     0     0     0    0.00   | 1.20e-12  4.66e-13  4.33e-13 |
 G08  |   288     0     0     0    0.00   | 1.31e-12  3.43e-13  2.28e-13 |
 G01  |   288     0     0     0    0.00   | 1.49e-12  6.49e-13  5.23e-13 |
 YAR2 |   288     0     0     0    0.00   | 8.59e-13  1.12e-12  2.72e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.12e-12  6.85e-13  3.87e-13 |
 TRO1 |   288     2     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SHAO |   264     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   189     2     1     0    0.00   | 1.83e-12  1.08e-12         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   180     1     0     0    0.00   |        -         -         - |
 OHI2 |   287     1     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.13e-13  4.90e-13  1.61e-12 |
 MAW1 |   286     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 6.86e-13  8.97e-13  1.92e-12 |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KELY |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 7.38e-13  2.48e-13  4.65e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.18e-13  8.91e-13  8.89e-13 |
 CEDU |   284     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   287     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.93e-17  2.32e-16  1.39e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      AMC2      NLIB |
------------------------------------------+------------------------------+
