
 GPS week: 1304   Day: 5   MJD: 53377                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.00     0.00     3.38     0.00      0
 cod |   288     0  26685    542    -0.24     0.36     0.05    19.68      0
 emr |   288     0  23397      1  2430.96    53.89     0.04    27.26      0
 esa |   288     0  18544   1102  6473.66    62.95     0.08    10.54      0
 gfz |   288     0  20020    269    -0.62     0.47     0.05    22.40      0
 iga |    96     0   2592      1     0.00     0.00     0.08     0.00      0
 igu |    96     0   2592      0     0.01     0.05     3.12     0.00      0
 ngs |    96     0   2782      0    -0.01     0.02     2.78     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  31266   2192  2431.09    53.87     0.05    20.12      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4073    88   -62   -69   -40     1  1041 -3392     -    78 |
    2 |     -   -54     -     -    47     -     - -6305     -     - |
    3 | -4651   -94    59  -102    50   -57 -6569 -2699     -    11 |
    4 |   176    45  -109   -54   119    13  -902   443     -    -1 |
    5 |  5912    -3  -161   -44   211     8  6763  2863     -    10 |
    6 |  1656    14   -19   -89   110  -229-11155   208     -   -65 |
    7 | -3435    31   -70   -71    85    81 -5835 -2966     -     7 |
    8 | -5002    -7  -123    84   121     -     - -4935     -    -6 |
    9 |  -892     4   -91   -27   173  -160  9771  -787     -   -62 |
   10 | -2313    79     2   -91    72    82 -8365  -416     -  -112 |
   11 | 12266   -16     9   219   -80    39 12709 11243     -   -22 |
   13 |  2931   127   -22    77   -65   -18  -656  3533     -   -63 |
   14 |  1960    91    -7  -153    23  -101  2223  2656     -   -24 |
   15 | -3717  -125   124    48   -23   174 -3601 -3105     -   -46 |
   16 |  4516    24    18    -3  -141     9  1916  4882     -   111 |
   17 |  -212   -54   -63   -89   275   -20  5486   448     -  -125 |
   18 |  2629    -1    29  -110     8  -107   -54  2646     -    10 |
   19 |  5129   -68   -24    -8   141   888  3613  5695     -   -54 |
   20 |  4160   -51   -37  -168    90    18  1827  4459     -    87 |
   21 | -2548    45    68   -76   -22    66   127  -641     -   -71 |
   22 | -3486   -27   131   -58  -133  -123 -5161 -4269     -    28 |
   23 | -1929   -23     0    63   -63   -55 -1266 -1945     -    60 |
   24 | -5527    24  -157   110   154    12 -3393 -4487     -   -40 |
   25 |  3984    17    26    28   -44  -216 11951  2142     -   -18 |
   26 | -4500    18    -9   -30    99  -138   535 -4229     -  -100 |
   27 | -4240   -21   -83   -27   116  -110  -752 -3274     -    18 |
   28 |  7817   133  -136   198    -1   102 -4649  7508     -   -49 |
   29 | -5927    86   -25   -15    -9  -117 -2459 -4674     -   -33 |
   30 |  -686   -53   -98     7   162   -36 -3145  -742     -     0 |
 -----+-------------------------------------------------------------+
 ALBH |     -   108   -61     -     -     -     -     -     -   -22 |
 ALGO |     -     -   -11   409     -     -     -     -     -  -146 |
 AMC2 |     -   -11   -37     -     -     -     -     -     -    60 |
 AREQ |     -    29    26     -   -17     -     -     -     -   -45 |
 ARTU |     -   137     -   146  -189     -     -     -     -     X |
 ASPA |     -    89     -     -   -85     -     -     -     -     8 |
 AUCK |     -     -     -   -66     -     -     -     -     -    35 |
 BAHR |     -   -96   136     -    54     -     -     -     -  -151 |
 BAN2 |     -     -    39     -     -     -     -     -     -   -53 |
 BOGT |     -     -     -  -224    60     -     -     -     -    50 |
 BOR1 |     -    69    70     -     -     -     -     -     -  -162 |
 BREW |     -     -    71     -     -     -     -     -     -   -96 |
 BRUS |     -   -75    54     -     -     -     -     -     -     X |
 CAGZ |     -    53     -     -     -     -     -     -     -   -52 |
 CAS1 |     -   -17     -    14     5     -     -     -     -     3 |
 CEDU |     -  -208     -   388     -     -     -     -     -     X |
 CHAT |     -     -     -     -   -40     -     -     -     -    44 |
 CHUR |     -     X     8     -     -     -     -     -     -   -11 |
 COCO |     -   -54     -   -53     9     -     -     -     -    70 |
 CRO1 |     -     -     1   -53    30     -     -     -     -    -9 |
 DAEJ |     -    62   -65     -     -     -     -     -     -    27 |
 DGAR |     -   -20     -     -     -     -     -     -     -    19 |
 DWH1 |     -   226  -105     -     -     -     -     -     -   -79 |
 FAIR |     -     -    31     7   -41     -     -     -     -     - |
 GODE |     -    70    43   100     -     -     -     -     -  -179 |
 GOLD |     -    37     -   -70     -     -     -     -     -     X |
 GRAZ |     -     -   113     -     -     -     -     -     -  -153 |
 GUAM |     -     -     -  -519    17     -     -     -     -   238 |
 HOB2 |     -   -76   187    36     -     -     -     -     -  -197 |
 HRAO |     -     -     -     -  -107     -     -     -     -   119 |
 IENG |     -   -75    54     -     -     -     -     -     -     - |
 IISC |     -     -     -  -121    57     -     -     -     -     - |
 ISPA |     -  -131     -     -    49     -     -     -     -    73 |
 JPLM |     -     -    42     -  -198     -     -     -     -   163 |
 KARR |     -    85     -  -159     -     -     -     -     -     - |
 KGN0 |     -     2    20     -     -     -     -     -     -   -29 |
 KIRU |     -    88     -     -     -     -     -     -     -   -86 |
 KIT3 |     -     -     -    41   -43     -     -     -     -    26 |
 KOKB |     -  -118    97     -  -126     -     -     -     -   124 |
 KOSG |     -  -104     -     -     -     -     -     -     -   101 |
 KOUR |     -   251     -  -266     -     -     -     -     -   -98 |
 LPGS |     -   -14    60  -296     -     -     -     -     -    87 |
 MAC1 |     -   -94     -     0   -70     -     -     -     -   170 |
 MAD2 |     -     -    26     -     -     -     -     -     -   -36 |
 MAS1 |     -   -18    16    13     4     -     -     -     -   -14 |
 MATE |     -     -     -   -85     -     -     -     -     -    45 |
 MAW1 |     -    89     -     -  -131     -     -     -     -    61 |
 MBAR |     -   -76     -     -   -38     -     -     -     -   117 |
 MCM4 |     -   143  -103     -     X     -     -     -     -     - |
 MDO1 |     -    35  -157     -     -     -     -     -     -   178 |
 MIZU |     -     -  -114   332     -     -     -     -     -   -20 |
 MKEA |     -     -     -   -71    33     -     -     -     -     X |
 MSKU |     -    86     -     -   -76     -     -     -     -     - |
 NISU |     -   106   -79     -     3     -     -     -     -     - |
 NLIB |     -     -     5     -     -     -     -     -     -    -6 |
 NNOR |     -     -    48    13     -     -     -     -     -   -72 |
 NPLD |     -  -138    82     -     -     -     -     -     -    23 |
 NRC1 |     -     -    -7     -   -65     -     -     -     -    83 |
 NTUS |     -   -92     -  -103     -     -     -     -     -   144 |
 NYA1 |     -    95     -     -   -96     -     -     -     -    14 |
 OHI2 |     -    72     -   -81   -25     -     -     -     -     X |
 ONSA |     -     -   -74   191     -     -     -     -     -     - |
 PDEL |     -    15     -     -   -13     -     -     -     -     - |
 PERT |     -     -    -8     X    -4     -     -     -     -    15 |
 PIE1 |     -    10  -105   400     -     -     -     -     -   -78 |
 POTS |     -   -44     -     -    39     -     -     -     -     - |
 PRDS |     -   -10   -30     -     -     -     -     -     -    50 |
 PTBB |     -    26    63     -     -     -     -     -     -  -111 |
 QAQ1 |     -     -   -41     -     -     -     -     -     -    56 |
 REYK |     -    44     -     -     -     -     -     -     -   -43 |
 RIOG |     -   -43   141     -   -10     -     -     -     -  -137 |
 SANT |     -     X     -   -16     7     -     -     -     -     - |
 SCH2 |     -     -   -16     -     -     -     -     -     -    22 |
 SFER |     -   -13    10     -     -     -     -     -     -     - |
 SPT0 |     -  -137    91     -     -     -     -     -     -    10 |
 STJO |     -     -    45     -   -55     -     -     -     -     X |
 STR1 |     -     -    65     -     -     -     -     -     -   -88 |
 SUTH |     -  -111     -     -     -     -     -     -     -   108 |
 THU3 |     -  -116    17     -    80     -     -     -     -     1 |
 TIDB |     -   -91    61   185     -     -     -     -     -   -91 |
 TRO1 |     -   169     -     -  -291     -     -     -     -   197 |
 TSKB |     -  -141   -37   559   -67     -     -     -     -   -29 |
 TWTF |     -  -100    64     -     -     -     -     -     -    11 |
 UNSA |     -     -     -  -170    13     -     -     -     -    74 |
 USN3 |     -    40     -     -     -     -     -     -     -   -40 |
 USNO |     -    13    10     -     -     -     -     -     -   -26 |
 USUD |     -     -    30   -77     -     -     -     -     -     X |
 VILL |     -   -11     -     X     -     -     -     -     -    11 |
 WHIT |     -  -135     -     -     -     -     -     -     -   132 |
 WILL |     -   -39    16     -     -     -     -     -     -    16 |
 WTZR |     -   -17     -   155     -     -     -     -     -   -64 |
 WUHN |     -     -   -54     -    34     -     -     -     -    36 |
 YAR2 |     -  -154    43     -     -     -     -     -     -    91 |
 YELL |     -     -    31     X   -54     -     -     -     -    18 |
 ZAMB |     -   -42     -    79     -     -     -     -     -     - |
 ZWE2 |     -    79     -     -   -69     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5816    58    49    75    27    48  2412  5515     -    35 |  288   4.14
    2 |     -    47     -     -    42     -     -  3537     -     - |  281   0.28
    3 |  4058    36    75   103    95    53  2637  2512     -    67 |  288   1.80
    4 |  1585    54    45    80    24    45   652  1600     -    40 |  288   0.61
    5 |  5319    70    38    35    20    36  3254  4546     -    96 |  288   2.39
    6 |  5435    32    25    75    28    36  7419  5193     -    50 |  288   1.58
    7 |   840    29    48    95    21    52  2298  1011     -    42 |  288   0.46
    8 |  6604   120    41   185    78     -     -  4572     -    92 |  288   1.77
    9 |  2272   100    49   129    47   134  4415  2149     -    57 |  288   2.14
   10 |  7840    46    30    44    49    42  4296  5511     -    72 |  288   3.84
   11 |  2891    41    46    68    62    89  6795  2702     -    57 |  288   0.35
   13 |   729    53    41   116    59    80   322   812     -    37 |  288   0.18
   14 |   885    54    73    86    24    69  1308  1112     -    60 |  288   0.52
   15 |  2927    63    50    75    65    81  5340  3109     -    92 |  288   2.30
   16 |   953    37    32   109    52    61  1133   860     -    80 |  288   0.26
   17 |  3189   124    61   142    52   126  4333  2605     -    91 |  288   1.41
   18 |   956    42    57    84    29    49   389   840     -    48 |  288   0.49
   19 |  2006    36    35   169    50    82  1802  1719     -    86 |  288   0.46
   20 |   534    79    50    64    28    97   894   561     -    53 |  288   0.20
   21 |  2530    37    51    54    82    71   445  2418     -    70 |  288   0.29
   22 |  3562    70    56    67    33    68  2978  2630     -    51 |  288   0.29
   23 |  1048   132    88   100    39    62   558  1099     -    57 |  288   0.19
   24 |  2543    52    44    67    27   122  2030  2177     -    39 |  288   2.29
   25 |  5110   111    60   104    59    84  4656  3533     -    39 |  288   1.89
   26 |   742    44    39    37    28    39   546   916     -    75 |  288   0.64
   27 |  1445   125    49   128    77   141   652  1194     -    81 |  288   0.94
   28 |  1139    22    28    48    44    65  2009   755     -    42 |  288   0.84
   29 |  3218    68    24    47    23   138   741  2296     -    66 |  288   0.61
   30 |   702    60    40    40    32    27  1670   695     -    55 |  288   0.73
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    24    32     -     -     -     -     -     -    31 |  288   0.03
 ALGO |     -     -    10    37     -     -     -     -     -    11 |  288   0.01
 AMC2 |     -    37    30     -     -     -     -     -     -    20 |  288   0.03
 AREQ |     -    32    27     -    20     -     -     -     -    21 |  288  17.61
 ARTU |     -    19     -    60    32     -     -     -     -     X |  284  11.46
 ASPA |     -    41     -     -    37     -     -     -     -    29 |  288    >>>
 AUCK |     -     -     -   178     -     -     -     -     -    93 |  176   9.89
 BAHR |     -    25    28     -    28     -     -     -     -    21 |  288   0.45
 BAN2 |     -     -    21     -     -     -     -     -     -    29 |  288  18.83
 BOGT |     -     -     -    71    16     -     -     -     -    42 |  288  22.00
 BOR1 |     -    32    22     -     -     -     -     -     -    13 |  288   0.46
 BREW |     -     -    58     -     -     -     -     -     -    79 |  282   0.06
 BRUS |     -    26    19     -     -     -     -     -     -     X |  288   0.05
 CAGZ |     -   129     -     -     -     -     -     -     -   126 |  288   0.46
 CAS1 |     -    57     -   107    44     -     -     -     -    48 |  288   7.09
 CEDU |     -    34     -    64     -     -     -     -     -     X |  194  34.03
 CHAT |     -     -     -     -    19     -     -     -     -    22 |  287  11.41
 CHUR |     -     X    35     -     -     -     -     -     -    48 |  281 367.44
 COCO |     -    74     -    62    33     -     -     -     -    44 |  288   9.85
 CRO1 |     -     -    41    84    57     -     -     -     -    42 |  282  17.83
 DAEJ |     -    36    38     -     -     -     -     -     -    33 |  287    >>>
 DGAR |     -    27     -     -     -     -     -     -     -    26 |  287  16.33
 DWH1 |     -    25    24     -     -     -     -     -     -    26 |  288   0.90
 FAIR |     -     -    55    40    60     -     -     -     -     - |  269   0.27
 GODE |     -    34    37    53     -     -     -     -     -    33 |  288   0.07
 GOLD |     -    98     -   182     -     -     -     -     -     X |  286  11.29
 GRAZ |     -     -    42     -     -     -     -     -     -    57 |  288    >>>
 GUAM |     -     -     -    57    28     -     -     -     -    48 |  288  18.10
 HOB2 |     -    41    27    67     -     -     -     -     -    31 |  288   0.04
 HRAO |     -     -     -     -    56     -     -     -     -    62 |  288   0.58
 IENG |     -    30    22     -     -     -     -     -     -     - |  288   0.63
 IISC |     -     -     -    29    14     -     -     -     -     - |  288  21.59
 ISPA |     -    31     -     -    37     -     -     -     -    33 |  288  11.05
 JPLM |     -     -    51     -    81     -     -     -     -   117 |  288  21.48
 KARR |     -    43     -    81     -     -     -     -     -     - |  288  12.26
 KGN0 |     -    46    38     -     -     -     -     -     -    20 |  287   0.71
 KIRU |     -    22     -     -     -     -     -     -     -    22 |  282   7.68
 KIT3 |     -     -     -    26    22     -     -     -     -    18 |  288  14.37
 KOKB |     -    18    18     -    31     -     -     -     -    24 |  288   0.04
 KOSG |     -    29     -     -     -     -     -     -     -    28 |  288  20.19
 KOUR |     -    35     -    58     -     -     -     -     -    47 |  288   1.90
 LPGS |     -    43    40    57     -     -     -     -     -    30 |  288  71.09
 MAC1 |     -    23     -    58    36     -     -     -     -    42 |  288  18.26
 MAD2 |     -     -    11     -     -     -     -     -     -    14 |  288   0.08
 MAS1 |     -    46    33    25    24     -     -     -     -    27 |  288   1.98
 MATE |     -     -     -    27     -     -     -     -     -    14 |  288   0.15
 MAW1 |     -    52     -     -    37     -     -     -     -    28 |  287   9.46
 MBAR |     -    70     -     -    66     -     -     -     -   121 |  288  12.18
 MCM4 |     -    79    57     -     X     -     -     -     -     - |  269    >>>
 MDO1 |     -    23    21     -     -     -     -     -     -    21 |  288  22.74
 MIZU |     -     -    31    59     -     -     -     -     -    22 |  288   0.35
 MKEA |     -     -     -    63    30     -     -     -     -     X |  288  13.91
 MSKU |     -    31     -     -    28     -     -     -     -     - |  288  11.33
 NISU |     -    23    32     -    28     -     -     -     -     - |  287   0.07
 NLIB |     -     -    32     -     -     -     -     -     -    43 |  288 108.55
 NNOR |     -     -    28    72     -     -     -     -     -    32 |  288  12.90
 NPLD |     -    26    22     -     -     -     -     -     -    25 |  287   0.04
 NRC1 |     -     -     9     -    14     -     -     -     -    18 |  288   0.02
 NTUS |     -    42     -    59     -     -     -     -     -    28 |  288   9.73
 NYA1 |     -    16     -     -    18     -     -     -     -    25 |  288   0.20
 OHI2 |     -    29     -    83    26     -     -     -     -     X |  288   9.52
 ONSA |     -     -    15    39     -     -     -     -     -     - |  288   0.09
 PDEL |     -    34     -     -    29     -     -     -     -     - |  288  54.88
 PERT |     -     -    38     X    44     -     -     -     -    37 |  288   3.06
 PIE1 |     -    19    34    71     -     -     -     -     -    21 |  288   0.04
 POTS |     -    88     -     -    77     -     -     -     -     - |  284 175.08
 PRDS |     -    26    29     -     -     -     -     -     -    23 |  288   1.59
 PTBB |     -    26    35     -     -     -     -     -     -    51 |  288   0.16
 QAQ1 |     -     -    13     -     -     -     -     -     -    18 |  275   8.84
 REYK |     -    18     -     -     -     -     -     -     -    18 |  283   7.00
 RIOG |     -    32    31     -    24     -     -     -     -    28 |  288  10.69
 SANT |     -     X     -    62    29     -     -     -     -     - |  284   9.14
 SCH2 |     -     -    10     -     -     -     -     -     -    13 |  273  38.65
 SFER |     -    37    27     -     -     -     -     -     -     - |  287   0.45
 SPT0 |     -    39    24     -     -     -     -     -     -    20 |  288   0.06
 STJO |     -     -    17     -    20     -     -     -     -     X |  288   0.05
 STR1 |     -     -    22     -     -     -     -     -     -    30 |  288   0.68
 SUTH |     -    30     -     -     -     -     -     -     -    29 |  288  12.39
 THU3 |     -    44    33     -    15     -     -     -     -    29 |  288   8.30
 TIDB |     -    44    29    50     -     -     -     -     -    41 |  288   0.09
 TRO1 |     -    34     -     -    23     -     -     -     -    54 |  288   9.25
 TSKB |     -    49    25    38    30     -     -     -     -    19 |  288   1.73
 TWTF |     -    27    30     -     -     -     -     -     -    35 |  288   0.05
 UNSA |     -     -     -    58    29     -     -     -     -    39 |  288  17.84
 USN3 |     -    26     -     -     -     -     -     -     -    26 |  288   0.03
 USNO |     -    23    10     -     -     -     -     -     -    13 |  288   0.03
 USUD |     -     -    16    40     -     -     -     -     -     X |  220    >>>
 VILL |     -    22     -     X     -     -     -     -     -    21 |  288   5.88
 WHIT |     -    17     -     -     -     -     -     -     -    17 |  288  16.20
 WILL |     -    21    33     -     -     -     -     -     -    34 |  288  21.77
 WTZR |     -    15     -    25     -     -     -     -     -    16 |  288   0.06
 WUHN |     -     -    31     -    35     -     -     -     -    26 |  287  12.37
 YAR2 |     -    48    31     -     -     -     -     -     -    36 |  288   7.62
 YELL |     -     -    51     X   141     -     -     -     -    91 |  288   0.07
 ZAMB |     -    59     -   109     -     -     -     -     -     - |  144 331.36
 ZWE2 |     -    15     -     -    13     -     -     -     -     - |  288   9.97
 -----+-------------------------------------------------------------+--------------
 TOT  |  3382    53    38    82    45    80  3123  2779     -    49 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NRC1 |   288     1     0   287   10.34   | 2.70e-14  7.45e-15  2.47e-15 |
 BREW |   282     0     0   281   10.12   | 3.24e-14  6.62e-15  2.73e-15 |
 NPLD |   287     0     0   286    9.42   | 3.86e-14  1.10e-14  2.32e-15 |
 ALGO |   288     1     0   287    9.34   | 2.67e-14  7.07e-15  1.85e-15 |
 NISU |   287     1     0   285    7.05   | 5.06e-14  7.91e-15  3.17e-15 |
 ONSA |   288     1     0   287    5.72   | 3.69e-14  9.65e-15  6.38e-15 |
 YELL |   288     1     0   287    5.02   | 4.01e-14  7.65e-15  2.41e-15 |
 TWTF |   288     0     0   288    4.85   | 4.30e-14  8.37e-15  4.13e-15 |
 AMC2 |   288     0     0   288    4.82   | 3.52e-14  7.00e-15  2.32e-15 |
 ALBH |   288     0     0   288    4.58   | 3.37e-14  8.87e-15  2.84e-15 |
 BRUS |   288     0     0   143    4.12   | 4.01e-14  6.83e-15  2.91e-15 |
 KOKB |   288     0     0   288    3.79   | 4.56e-14  1.19e-14  1.90e-15 |
 SPT0 |   288     0     0   288    3.42   | 4.28e-14  1.00e-14  3.39e-15 |
 WTZR |   288     0     0   288    2.52   | 3.65e-14  1.92e-14  3.79e-15 |
 HOB2 |   288     0     0   288    2.52   | 4.38e-14  9.79e-15  3.30e-15 |
 MAD2 |   288     0     0   143    2.39   | 3.97e-14  8.00e-15  7.52e-15 |
 USN3 |   288     0     0   288    2.17   | 8.32e-14  1.09e-14  3.64e-15 |
 USNO |   288     1     0   287    1.49   | 4.23e-14  8.01e-15  2.13e-15 |
 STJO |   288     0     0   143    1.15   | 8.44e-14  1.35e-14  4.04e-15 |
 PIE1 |   288     1     0   287    1.08   | 3.74e-14  7.83e-15  2.29e-15 |
 NLIB |   288     1     0   143    0.84   | 3.91e-14  6.52e-15  4.56e-15 |
 MATE |   288     0     0   288    0.62   | 4.57e-14  1.43e-14  1.45e-14 |
 TIDB |   288     0     0   269    0.59   | 2.05e-13  1.82e-14  7.32e-15 |
 GODE |   288     0     0   288    0.47   | 4.52e-14  1.17e-14  4.63e-15 |
 NYA1 |   288     0     0   288    0.21   | 4.49e-14  3.71e-14  2.38e-14 |
 PTBB |   288     0     0   288    0.19   | 2.83e-13  5.33e-14  1.43e-14 |
 G16  |   288     0     1   191    0.18   | 4.81e-13  5.04e-14  3.20e-14 |
 G07  |   288     0     0   288    0.11   | 2.81e-13  9.42e-14  5.76e-14 |
 G06  |   288     0     0   288    0.09   | 3.87e-13  1.46e-13  8.64e-14 |
 FAIR |   269     0     0   268    0.08   | 2.18e-13  8.28e-14  2.21e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.87e-13  1.20e-13  7.41e-14 |
 MIZU |   288     0     0   288    0.06   | 3.67e-13  1.06e-13  2.22e-14 |
 CAGZ |   288     0     0   288    0.06   | 6.03e-13  1.09e-13  4.67e-14 |
 G26  |   288     0     0   288    0.06   | 3.99e-13  1.01e-13  6.64e-14 |
 G23  |   288     0     2    92    0.06   | 5.55e-13  6.52e-14  1.23e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.51e-13  1.52e-13  2.89e-14 |
 G29  |   288     0     0   288    0.04   | 4.07e-13  1.55e-13  7.41e-14 |
 DWH1 |   288     0     0   288    0.04   | 4.94e-13  1.31e-13  8.34e-14 |
 G30  |   288     0     0   288    0.04   | 3.11e-13  1.12e-13  1.01e-13 |
 G11  |   288     0     5    60    0.04   | 7.14e-13  6.44e-14  4.20e-14 |
 SFER |   287     0     0   142    0.03   | 3.88e-13  9.52e-14  3.04e-14 |
 G04  |   288     0     0   288    0.03   | 4.31e-13  1.45e-13  6.34e-14 |
 G17  |   288     0     0   288    0.03   | 3.68e-13  1.21e-13  1.38e-13 |
 G27  |   288     0     0   288    0.03   | 3.71e-13  9.66e-14  1.28e-13 |
 HRAO |   288     0     0   288    0.02   | 1.16e-13  5.13e-14  6.12e-14 |
 IENG |   288     0     0   143    0.01   | 5.41e-13  1.67e-13  5.90e-14 |
 STR1 |   288     0     0   143    0.01   | 6.50e-13  1.84e-13  7.50e-14 |
 TSKB |   288     0     0   288    0.01   | 9.99e-13  2.61e-13  1.76e-13 |
 G03  |   288     0     1   146    0.01   | 1.29e-12  4.91e-13  1.31e-13 |
 BAHR |   288     0     0   239    0.01   | 3.46e-13  6.14e-14  3.45e-14 |
 KOUR |   288     0     0   288    0.01   | 1.42e-12  4.38e-13  2.11e-13 |
 G25  |   288     0     0   288    0.00   | 1.36e-12  4.50e-13  2.13e-13 |
 G09  |   288     0     0   288    0.00   | 1.41e-12  4.49e-13  2.60e-13 |
 G05  |   288     0     0   288    0.00   | 1.40e-12  4.65e-13  3.16e-13 |
 G08  |   288     0     0   143    0.00   | 1.25e-12  4.64e-13  1.42e-13 |
 PRDS |   288     0     0   143    0.00   | 1.50e-12  4.89e-13  1.78e-13 |
 GPST |   288     0     0     0    0.00   | 2.37e-14  5.69e-15  1.55e-15 |
 CEDU |   194     0     0     0    0.00   |        -         -         - |
 G02  |   281     0     5     0    0.00   | 4.74e-13  5.63e-14  2.30e-14 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   176     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 7.53e-13  1.05e-13  3.85e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  4.74e-13  2.35e-13 |
 G22  |   288     0     6     0    0.00   | 8.25e-13  8.17e-14  3.38e-14 |
 G21  |   288     0     6     0    0.00   | 8.83e-13  1.06e-13  2.52e-14 |
 G20  |   288     0     6     0    0.00   | 6.90e-13  7.16e-14  1.54e-14 |
 G19  |   288     0     4     0    0.00   | 7.49e-13  8.61e-14  4.21e-14 |
 G18  |   288     0     6     0    0.00   | 1.82e-12  1.77e-13  4.47e-14 |
 G15  |   288     0     0     0    0.00   | 1.54e-12  6.17e-13  2.38e-13 |
 G14  |   288     0     6     0    0.00   | 6.46e-13  6.81e-14  3.32e-14 |
 G13  |   288     0     3     0    0.00   | 4.94e-13  6.04e-14  1.50e-14 |
 G10  |   288     0     0     0    0.00   | 1.27e-12  3.88e-13  4.17e-13 |
 G01  |   288     0     0     0    0.00   | 1.44e-12  6.90e-13  4.92e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   144     1     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     1     0    0.00   | 9.24e-13  1.35e-12  5.91e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     1     0    0.00   | 5.67e-13  3.84e-13  1.42e-12 |
 VILL |   288     0     0     0    0.00   | 1.11e-12  6.88e-13  5.63e-13 |
 USUD |   220     2     0     0    0.00   |        -         -         - |
 UNSA |   288     2     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   273     2     2     0    0.00   | 6.19e-13  1.03e-12  2.72e-12 |
 SANT |   284     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   283     0     0     0    0.00   |        -         -         - |
 QAQ1 |   275     0     0     0    0.00   |        -         -         - |
 POTS |   284     1     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.83e-12  4.47e-13  4.05e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   269     1     1     0    0.00   | 6.85e-13  3.54e-13  1.38e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.88e-12  5.41e-13  1.50e-13 |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     3     0     0    0.00   |        -         -         - |
 KOSG |   288     0     2     0    0.00   | 7.19e-13  8.28e-13  1.63e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   282     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 6.88e-13  5.13e-13  1.39e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   286     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 CRO1 |   282     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.75e-13  7.97e-13  1.07e-12 |
 CHUR |   281     1     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.35e-17  2.82e-16  1.69e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      NLIB      ALGO |
------------------------------------------+------------------------------+
