
 GPS week: 1306   Day: 5   MJD: 53391                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2880    102     0.10    -0.22     2.73     0.00      0
 cod |   288     0  26859     71    -0.23     0.68     0.04    24.25      0
 emr |   288     0  23696    238   652.84    -0.13     0.03    31.26      0
 esa |   288     0  17792   5259  3146.85    54.09     0.09     7.99      0
 gfz |   288     0  21760      2     0.01    -0.13     0.05    16.24      0
 iga |    96     0   2688      9    -0.73    -6.15     0.12     0.00      0
 igu |    96     0   2688      2    -0.71    -6.24     3.60     0.00      0
 jpl |   288     0  17285    295     1.51    -0.21     0.07    12.28      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33973   4230  3169.19    51.44     0.09     7.98      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1271   -32  -130   555    56   157  5309   -14     -   -43 |
    2 | -2117   179    43  -612   -47   108 -1485     -     -    -5 |
    3 |  2968  -231  -146  1407    15  -150  2300   -44     -  -101 |
    4 | -1111   201    75  -720  -114    99 -2186    86     -   -86 |
    5 |  3232    17   -35    90   174    71 19408   -95     -  -214 |
    6 | -3935   -71  -113   983    29  -463-10733  -133     -  -181 |
    7 | -2814   -19   -47   192   214   -29   737   -92     -  -222 |
    8 | -4563     2   -25   -88    20   -94  1425    56     -    59 |
    9 | -3386    48    30    55    23  -475  1302   -78     -  -259 |
   10 |  -507     1    64   -91   -34   226  1925    58     -  -187 |
   11 |  2970   -15   -89   375   -31   173 -1193   134     -  -128 |
   13 |  4017   168   -52     2  -256     -     -   177     -   -62 |
   14 |  3108    32  -122   300    13   136 -1414   125     -  -140 |
   15 | -3037  -157  -141  1417   -31   280   331   -94     -  -184 |
   16 |  2639   -99   -18     X    65  -103  -949   168     -   -17 |
   17 |   257    54   -50  -215   205   153  6921     X     -  -175 |
   18 |  3869    -7   -13   101    56    46  -957    17     -  -172 |
   19 |  3181  -190  -161   897   146  1488   129   157     -  -231 |
   20 |  3556  -109   -91    80   221   364  -345   174     -  -110 |
   21 |  -104    36     4     X   -63   -57 -3678   142     -  -217 |
   22 |  4013   -31    31     X    61  -212 -6351    82     -  -281 |
   23 | -2439    66  -155   145  -176     5 -7354   357     -    71 |
   24 |   573   134    93  -642   -29    38  2111    12     -   -90 |
   25 |   225  -126  -173   956   140  -218  4754   -37     -  -147 |
   26 | -5194    26     0     X    20  -609 -2019    62     -  -218 |
   27 | -1254   -23   -84   319   -63  -150 -4318   115     -    21 |
   28 |  3601   205   -27  -608  -129    56  4176   168     -    99 |
   29 | -3832    90   -77     X   -31  -444 -4018   166     -  -168 |
   30 | -4329   -70   -83   706   105  -285 -3380  -129     -  -187 |
   31 |-21800    34     -     -     7     -     -   -86     -     - |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    -1     -     -     -     -   -28     -    47 |
 ALGO |     -     -     -     X     -     -     -    32     -   -49 |
 ALRT |     -   -42     -     -    63     -     -     -     -     - |
 AMC2 |     -   -49   139     -     -     -     -  -284     -    42 |
 AREQ |     -   -23    84     -   -74     -     -  -118     -    73 |
 ARTU |     -   114     -    69  -103     -     -  -133     -     X |
 ASPA |     -     -     -     -   161     -     -  -261     -    50 |
 AUCK |     -     -     -  -243     -     -     -     -     -   243 |
 BAHR |     -   -77    63     -    14     -     -     -     -   -42 |
 BILI |     -    43     -     -   -65     -     -     -     -     X |
 BOR1 |     -    22    -5     -     -     -     -     -     -   -45 |
 BRUS |     -  -123    56     -     -     -     -     -     -   158 |
 CAS1 |     -    65     -     X  -118     -     -     -     -    46 |
 CEDU |     -     -     -     X     -     -     -   -60     -    92 |
 CHAT |     -     -     -     -   -58     -     -     -     -   117 |
 COCO |     -   -50     -     X    16     -     -     -     -   121 |
 DAEJ |     -    41   -25     -     -     -     -     -     -   -26 |
 DAKA |     -    81     -     -   -82     -     -   -52     -     - |
 DAV1 |     -  -384     -     -   574     -     -     -     -     - |
 DGAR |     -   -43     -     -     -     -     -   118     -   -53 |
 DRAO |     -   236   127 -1596     -     -     -   111     -   119 |
 DWH1 |     -    99   -45     -     -     -     -     -     -  -125 |
 FAIR |     -     -   -92  1074  -243     -     -     -     -     - |
 FORT |     -     -    37     X   -72     -     -     -     -     X |
 GLPS |     -   158     -  -631    74     -     -     -     -     X |
 GODE |     -     -    38     X     -     -     -     -     -  -150 |
 GOLD |     -    28     -   174     -     -     -  -169     -     X |
 GRAS |     -   -22     -     -     -     -     -    44     -     X |
 GRAZ |     -     -    24     -     -     -     -     -     -   -93 |
 GUAM |     -   195     - -1436   209     -     -    85     -   293 |
 GUAT |     -     -     -     -   -87     -     -     -     -   178 |
 HARB |     -   -21     -     -     -     -     -     -     -    65 |
 HOB2 |     -   -29    41     -     -     -     -     -     -   -73 |
 HOFN |     -     -     -     -   -44     -     -     -     -    90 |
 HRAO |     -   -17     -     -   -82     -     -   108     -    50 |
 IISC |     -     -     -  -520   256     -     -     -     -     - |
 ISPA |     -   -84     -     -   -19     -     -    87     -   161 |
 JPLM |     -     -    26     -     -     -     -   -82     -    25 |
 KERG |     -   -26     -     X  -214     -     -     -     -   580 |
 KIT3 |     -     -     -     X   -35     -     -     0     -    72 |
 KOKB |     -   -54   124     -  -158     -     -     0     -     0 |
 KOUR |     -   -49     -   129     7     -     -     -     -     X |
 LPGS |     -   -53    68     X     -     -     -     -     -  -106 |
 MAC1 |     -   -58     -     X     5     -     -     -     -   169 |
 MAD2 |     -     -   -19     -     -     -     -     -     -    72 |
 MADR |     -     -     -     -     -     -     -     7     -   -11 |
 MAS1 |     -   -42    -2   142   -54     -     -    35     -    48 |
 MAW1 |     -   114     -     -   -96     -     -     -     -  -149 |
 MBAR |     -   -30     -     -     7     -     -   -28     -   119 |
 MCM4 |     -    39  -403     -   717     -     -     -     -     - |
 MDO1 |     -    69   -94     -     -     -     -     -     -   159 |
 MEDI |     -   -17    25     -     -     -     -     -     -   -45 |
 METS |     -   -39    27     -     -     -     -     -     -    12 |
 MIZU |     -     -   -30     X     -     -     -     -     -   119 |
 MSKU |     -     6     -     -    -9     -     -     -     -     - |
 NANO |     -   128     -     -     -     -     -  -252     -     - |
 NISU |     -    28     -     -   -42     -     -     -     -     - |
 NLIB |     -   -68   131     -     -     -     -  -195     -    -9 |
 NNOR |     -     -    55  -398     -     -     -     -     -   187 |
 NPLD |     -  -157    83     -     -     -     -     -     -   154 |
 NRC1 |     -   185   -32     -  -187     -     -     -     -   -56 |
 NRIL |     -    -5     -     -    -7     -     -    19     -     X |
 NSSP |     -   -21     -     -     -     -     -     -     -    65 |
 NYA1 |     -  -138     -     -    75     -     -     -     -   166 |
 OBE2 |     -     -     -     -     -     -     -     2     -    -3 |
 ONSA |     -     -   191  -993    96     -     -     -     -     - |
 PERT |     -  -105     3     X    80     -     -    70     -    39 |
 PIE1 |     -     -    87  -457     -     -     -     -     -   119 |
 PIMO |     -     -     -   228     -     -     -     -     -  -228 |
 POTS |     -    20     -     -   -30     -     -     -     -     X |
 PRDS |     -     -     1     -     -     -     -     -     -    -2 |
 PTBB |     -    -1   -11     -     -     -     -     -     -    44 |
 QAQ1 |     -     -     1     -     -     -     -     -     -    -4 |
 RABT |     -    58     -     -     -     -     -  -115     -     X |
 REYK |     -  -157     -     -     -     -     -     -     -   478 |
 RIOG |     -    29    84     -  -145     -     -     -     -  -121 |
 SANT |     -     -     -   156   -77     -     -     -     -     - |
 SCH2 |     -     -   106     -     -     -     -  -274     -     8 |
 SFER |     -    12   -10     -     -     -     -     -     -     - |
 SPT0 |     -  -149    90     -     -     -     -     -     -   100 |
 STJO |     -     -    27     -   -74     -     -    29     -     X |
 STR1 |     -     -    24     -     -     -     -     -     -   -94 |
 THTI |     -     -   -21   592  -239     -     -     -     -   -23 |
 THU3 |     -   -56   106     -     -     -     -     -     -  -251 |
 TIDB |     -     -    38     X     -     -     -     -     -  -149 |
 TIXI |     -     -     -   276  -136     -     -     -     -     X |
 TLSE |     -     -   -10     -     -     -     -     -     -    40 |
 TOW2 |     -    60     -     -  -117     -     -     -     -    51 |
 TRO1 |     -     8     -     -   -30     -     -     -     -    39 |
 TWTF |     -   -87    21     -     -     -     -     -     -   185 |
 UNSA |     -     -     -   372  -200     -     -     -     -    36 |
 URUM |     -    35     -     -     -     -     -     -     -  -106 |
 USN3 |     -    54     -     -     -     -     -  -112     -     9 |
 USNO |     -   -29    39     -     -     -     -     -     -   -65 |
 USUD |     -     -    96  -601     -     -     -   146     -     X |
 VILL |     -     -     -  -499     -     -     -     -     -   499 |
 WHIT |     -   -39     -     -     -     -     -     -     -   117 |
 WILL |     -   -73    61     -     -     -     -     -     -   -18 |
 WROC |     -     -    79     -     -     -     -  -200     -     - |
 WTZR |     -   156   197 -1383     -     -     -     -     -   143 |
 WUHN |     -     -   -71     -   116     -     -     -     -    42 |
 YAR2 |     -     -     2     -     -     -     -     -     -    -9 |
 YEBE |     -     -     5     -     -     -     -     -     -   -20 |
 YELL |     -    -9     X     X    13     -     -     -     -     X |
 ZIMM |     -     8     -     -     -     -     -     -     -   -23 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7317    45    27    60    27   109  7401    61     -    89 |  288   5.46
    2 |  1345    53    34    54    34    90   812     -     -    50 |  288   0.34
    3 |  2363    28    37    61    18    42  2123    47     -    88 |  288   1.50
    4 |   981    41    32   167    33   156  2137    77     -    81 |  288   0.82
    5 |  4776    38    15    47    28    62 11793   101     -    62 |  288   3.21
    6 |  3256    60    40    90    34    44  7720    70     -   135 |  288   1.35
    7 |  1237    38    31    94    56    59  1130    63     -   127 |  288   0.50
    8 |  2177    52    47    68    88   146  2366   111     -   108 |  288   2.21
    9 |  4370   168   146   149   111   161  2660   129     -   120 |  288   2.77
   10 |  4889    40    25    71    26    82  2682    96     -    76 |  288   2.85
   11 |   658    48    15    62    53    60   780    45     -   133 |  288   0.44
   13 |  1047    53    42   121    27     -     -    81     -   132 |  288   0.30
   14 |   672    47    36    66    71    74   800    84     -   107 |  288   0.43
   15 |  3843    52    62    80    23   130  1748    63     -    84 |  288   2.77
   16 |   614    33    34     X    34    78   528    93     -    69 |  288   0.32
   17 |  3121    54    18    63    28   103  3413     X     -    86 |  288   1.36
   18 |   818    59    20    84    28   142   601    76     -   103 |  288   0.44
   19 |   757    35    44   145    26   144   869    37     -    85 |  288   0.31
   20 |   470    53    39   110    30   100   400    48     -    83 |  288   0.31
   21 |  1553    60    58     X    49    75  2477    34     -    89 |  288   0.36
   22 |  4063    64    47     X    48   221  3497    68     -   106 |  288   0.34
   23 |   744    40    40    72    42    91  2873    66     -   138 |  288   0.40
   24 |  3227    45    41   145    36   126  2197    57     -   119 |  288   3.34
   25 |  2214    73    29    50    40    95  3290    98     -    99 |  288   1.64
   26 |   927    31    20     X    42   193  1460    54     -    82 |  288   0.59
   27 |   935   103    76    82   112   167  2469   162     -   121 |  288   0.56
   28 |  2543    42    24    49    54   127  2393   137     -   132 |  288   0.38
   29 |  1941    57    78     X   150   240  2594    85     -   179 |  288   0.60
   30 |  1648    32    18    55    32    81  2265    70     -    90 |  288   0.59
   31 |  2779    53     -     -    72     -     -    57     -     - |  288   0.72
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    18     -     -     -     -    36     -    37 |  288   0.08
 ALGO |     -     -     -     X     -     -     -   114     -   176 |  237   0.05
 ALRT |     -    19     -     -    29     -     -     -     -     - |  288   5.76
 AMC2 |     -    29    31     -     -     -     -    23     -    91 |  288   0.09
 AREQ |     -    37    24     -    49     -     -    32     -   165 |  288  13.21
 ARTU |     -    41     -   102    42     -     -    85     -     X |  284  11.96
 ASPA |     -     -     -     -    57     -     -    52     -    71 |  288    >>>
 AUCK |     -     -     -   211     -     -     -     -     -   212 |  123  10.58
 BAHR |     -    32    23     -    40     -     -     -     -   113 |  288   0.54
 BILI |     -    19     -     -    29     -     -     -     -     X |  286   8.53
 BOR1 |     -    30    26     -     -     -     -     -     -    25 |  286   0.40
 BRUS |     -    33    21     -     -     -     -     -     -    30 |  288   0.09
 CAS1 |     -    18     -     X    35     -     -     -     -    90 |  287   7.00
 CEDU |     -     -     -     X     -     -     -    72     -   110 |  283  11.82
 CHAT |     -     -     -     -    51     -     -     -     -   104 |  283  13.33
 COCO |     -    28     -     X    51     -     -     -     -    80 |  288  10.15
 DAEJ |     -    20    17     -     -     -     -     -     -    53 |  287    >>>
 DAKA |     -    59     -     -    48     -     -    74     -     - |  286  16.72
 DAV1 |     -    38     -     -    57     -     -     -     -     - |  191   8.80
 DGAR |     -    32     -     -     -     -     -    30     -   100 |  288  17.39
 DRAO |     -    27    18    74     -     -     -    25     -    86 |  288   0.15
 DWH1 |     -    40    39     -     -     -     -     -     -    48 |  288   0.75
 FAIR |     -     -    26    68    36     -     -     -     -     - |  268   0.39
 FORT |     -     -    12     X    24     -     -     -     -     X |  288   0.10
 GLPS |     -    13     -    30    24     -     -     -     -     X |  288  29.47
 GODE |     -     -    14     X     -     -     -     -     -    54 |  284   0.13
 GOLD |     -    25     -    85     -     -     -    30     -     X |  288  19.37
 GRAS |     -    39     -     -     -     -     -    77     -     X |  240   8.46
 GRAZ |     -     -    11     -     -     -     -     -     -    42 |  284    >>>
 GUAM |     -    22     -    90    33     -     -    89     -    67 |  288  12.03
 GUAT |     -     -     -     -    47     -     -     -     -    97 |  284    >>>
 HARB |     -    21     -     -     -     -     -     -     -    64 |  282  29.72
 HOB2 |     -    15    18     -     -     -     -     -     -    63 |  288   0.13
 HOFN |     -     -     -     -    20     -     -     -     -    41 |  255    >>>
 HRAO |     -    28     -     -    53     -     -    31     -   105 |  288   0.29
 IISC |     -     -     -    40    19     -     -     -     -     - |  288  25.90
 ISPA |     -    40     -     -    57     -     -    33     -    92 |  272  22.82
 JPLM |     -     -    31     -     -     -     -    53     -    57 |  288  10.33
 KERG |     -   108     -     X   122     -     -     -     -   162 |  255   1.11
 KIT3 |     -     -     -     X    32     -     -    44     -    32 |  264  15.83
 KOKB |     -    34    31     -    49     -     -    51     -   107 |  288   0.17
 KOUR |     -    26     -    45    32     -     -     -     -     X |  288   2.68
 LPGS |     -    30    23     X     -     -     -     -     -   132 |  288  17.80
 MAC1 |     -    40     -     X    43     -     -     -     -    57 |  288  15.95
 MAD2 |     -     -     8     -     -     -     -     -     -    29 |  283   0.15
 MADR |     -     -     -     -     -     -     -    12     -    19 |  283   9.83
 MAS1 |     -    52    18    63    35     -     -    52     -    84 |  287   2.06
 MAW1 |     -    35     -     -    48     -     -     -     -   115 |  279   8.59
 MBAR |     -    61     -     -   122     -     -   142     -    83 |  285  15.95
 MCM4 |     -    33    33     -    23     -     -     -     -     - |  288  18.61
 MDO1 |     -    33    24     -     -     -     -     -     -    38 |  288  14.31
 MEDI |     -    20    16     -     -     -     -     -     -    33 |  288   0.16
 METS |     -    97    67     -     -     -     -     -     -    49 |  284   9.15
 MIZU |     -     -     9     X     -     -     -     -     -    36 |  283   0.35
 MSKU |     -    15     -     -    22     -     -     -     -     - |  276  11.72
 NANO |     -    16     -     -     -     -     -    31     -     - |  288  45.51
 NISU |     -    18     -     -    26     -     -     -     -     - |  287   0.09
 NLIB |     -    28    22     -     -     -     -    22     -    94 |  288   0.09
 NNOR |     -     -    31   117     -     -     -     -     -    50 |  288  11.81
 NPLD |     -    32    16     -     -     -     -     -     -    46 |  287   0.09
 NRC1 |     -    24     9     -    26     -     -     -     -    87 |  288   0.09
 NRIL |     -    21     -     -    19     -     -    53     -     X |  288  11.02
 NSSP |     -     9     -     -     -     -     -     -     -    28 |  283   9.69
 NYA1 |     -    16     -     -    29     -     -     -     -    56 |  275   0.07
 OBE2 |     -     -     -     -     -     -     -    27     -    42 |  281  19.65
 ONSA |     -     -    43    56    63     -     -     -     -     - |  288   0.12
 PERT |     -    34    27     X    24     -     -   107     -   127 |  288   3.16
 PIE1 |     -     -    21    66     -     -     -     -     -    50 |  288   0.09
 PIMO |     -     -     -   168     -     -     -     -     -   168 |  231  14.04
 POTS |     -    16     -     -    23     -     -     -     -     X |  288  14.57
 PRDS |     -     -     9     -     -     -     -     -     -    36 |  283   1.24
 PTBB |     -    30    21     -     -     -     -     -     -    47 |  288   0.18
 QAQ1 |     -     -    22     -     -     -     -     -     -    86 |  273   5.46
 RABT |     -    19     -     -     -     -     -    38     -     X |  285  11.43
 REYK |     -    52     -     -     -     -     -     -     -   157 |  220   6.00
 RIOG |     -    28    22     -    34     -     -     -     -    88 |  288   7.52
 SANT |     -     -     -   140    69     -     -     -     -     - |  253  51.75
 SCH2 |     -     -    16     -     -     -     -    96     -    88 |  275  97.00
 SFER |     -    32    24     -     -     -     -     -     -     - |  287   0.86
 SPT0 |     -    16     9     -     -     -     -     -     -    32 |  288   0.08
 STJO |     -     -    15     -    36     -     -    26     -     X |  288   0.09
 STR1 |     -     -    19     -     -     -     -     -     -    76 |  284   0.86
 THTI |     -     -    34    43    60     -     -     -     -   156 |  288  13.46
 THU3 |     -    38    21     -     -     -     -     -     -    92 |  288   6.56
 TIDB |     -     -    18     X     -     -     -     -     -    69 |  284   0.14
 TIXI |     -     -     -   201    99     -     -     -     -     X |  272   9.47
 TLSE |     -     -     6     -     -     -     -     -     -    23 |  283   0.27
 TOW2 |     -    53     -     -    68     -     -     -     -   111 |  285  11.91
 TRO1 |     -    19     -     -    20     -     -     -     -    71 |  288   8.40
 TWTF |     -    27    15     -     -     -     -     -     -    64 |  287   0.16
 UNSA |     -     -     -    64    68     -     -     -     -   138 |  288  16.35
 URUM |     -    18     -     -     -     -     -     -     -    54 |  284  17.47
 USN3 |     -    20     -     -     -     -     -    28     -    43 |  288   0.08
 USNO |     -    22    20     -     -     -     -     -     -   103 |  288   0.08
 USUD |     -     -    35    47     -     -     -    89     -     X |  288   8.57
 VILL |     -     -     -    47     -     -     -     -     -    47 |  283   9.95
 WHIT |     -    29     -     -     -     -     -     -     -    89 |  284   1.56
 WILL |     -    35    30     -     -     -     -     -     -    43 |  288 116.94
 WROC |     -     -    13     -     -     -     -    33     -     - |  288  14.59
 WTZR |     -    86    66   107     -     -     -     -     -   116 |  288   0.11
 WUHN |     -     -    21     -    36     -     -     -     -    89 |  287   9.97
 YAR2 |     -     -    12     -     -     -     -     -     -    47 |  283  18.62
 YEBE |     -     -     8     -     -     -     -     -     -    31 |  283   0.09
 YELL |     -    14     X     X    21     -     -     -     -     X |  272   0.09
 ZIMM |     -    15     -     -     -     -     -     -     -    46 |  283    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  2727    45    35    94    52   124  3603    72     -    91 |


 BEST CLOCK FIT: NYA1   275   0.07 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.97   | 3.25e-14  5.66e-15  2.57e-15 |
 NPLD |   287     0     0   286    9.90   | 3.44e-14  8.17e-15  3.98e-15 |
 USNO |   288     0     0   288    9.64   | 4.23e-14  7.48e-15  2.20e-15 |
 NISU |   287     0     0   286    9.51   | 5.30e-14  8.52e-15  1.73e-15 |
 ALBH |   288     0     0   288    7.00   | 3.97e-14  1.14e-14  6.68e-15 |
 USN3 |   288     0     0   288    6.61   | 6.59e-14  8.57e-15  1.62e-15 |
 BRUS |   288     0     0   288    6.58   | 4.25e-14  7.00e-15  1.59e-15 |
 NRC1 |   288     3     0   285    4.89   | 2.98e-14  6.71e-15  1.48e-15 |
 STJO |   288     0     0   288    4.35   | 5.10e-14  1.04e-14  2.80e-15 |
 ALGO |   237     2     0   235    4.25   | 3.48e-14  5.51e-15         - |
 SPT0 |   288     0     0   288    4.04   | 3.68e-14  7.32e-15  4.00e-15 |
 NLIB |   288     2     0   286    3.98   | 2.97e-14  5.59e-15  3.36e-15 |
 ONSA |   288     0     0   143    3.09   | 6.82e-14  1.10e-14  4.68e-15 |
 TWTF |   287     0     0   286    2.43   | 4.00e-14  9.56e-15  6.36e-15 |
 MAD2 |   283     0     0   137    2.14   | 3.52e-14  7.34e-15  6.89e-15 |
 HOB2 |   288     0     0   288    2.00   | 4.08e-14  1.14e-14  5.47e-15 |
 MEDI |   288     0     0   143    1.96   | 3.68e-14  9.15e-15  6.58e-15 |
 WTZR |   288     0     0   288    1.75   | 5.53e-14  1.89e-14  3.58e-15 |
 PIE1 |   288     0     0   143    1.51   | 3.98e-14  6.60e-15  3.86e-15 |
 DRAO |   288     0     0   288    1.08   | 6.35e-14  1.88e-14  1.10e-14 |
 FORT |   288     0     0   143    0.67   | 6.51e-14  1.40e-14  7.01e-15 |
 GODE |   284     0     0   283    0.50   | 3.92e-14  9.90e-15  1.01e-14 |
 PTBB |   288     0     0   288    0.34   | 2.56e-13  6.25e-14  1.82e-14 |
 YELL |   272     1     0   270    0.23   | 3.24e-14  7.77e-15  2.49e-15 |
 HRAO |   288     0     0   288    0.21   | 1.18e-13  2.65e-14  1.94e-14 |
 G16  |   288     0     0   288    0.17   | 4.76e-13  5.92e-14  4.13e-14 |
 G07  |   288     0     0   288    0.14   | 2.97e-13  8.32e-14  5.79e-14 |
 FAIR |   268     0     0   121    0.11   | 1.96e-13  6.99e-14  2.43e-14 |
 BAHR |   288     0     0   288    0.09   | 3.72e-13  1.03e-13  5.70e-14 |
 G26  |   288     0     0   288    0.08   | 3.94e-13  1.03e-13  5.76e-14 |
 NYA1 |   275     0     0   272    0.07   | 2.57e-14  7.67e-15  5.65e-15 |
 G30  |   288     0     0   288    0.07   | 3.02e-13  9.28e-14  7.65e-14 |
 G23  |   288     0     0   288    0.07   | 5.49e-13  1.65e-13  2.61e-14 |
 G27  |   288     0     0   288    0.06   | 3.48e-13  9.08e-14  6.37e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.09e-13  1.48e-13  5.29e-14 |
 G29  |   288     0     0   288    0.05   | 3.94e-13  1.21e-13  7.53e-14 |
 SFER |   287     0     0   140    0.05   | 3.53e-13  9.56e-14  5.61e-14 |
 BOR1 |   286     0     0   285    0.05   | 4.47e-13  1.20e-13  2.55e-14 |
 G06  |   288     0     0   288    0.05   | 4.59e-13  1.27e-13  9.20e-14 |
 TLSE |   283     0     0   137    0.04   | 4.00e-13  1.04e-13  2.09e-14 |
 G04  |   288     0     0   288    0.04   | 4.86e-13  1.19e-13  1.05e-13 |
 KOKB |   288     0     0   288    0.04   | 6.21e-14  1.65e-14  7.51e-15 |
 MIZU |   283     0     0   137    0.04   | 3.50e-13  9.39e-14  3.27e-14 |
 G31  |   288     0     2    89    0.03   | 2.21e-13  6.75e-14  8.45e-14 |
 G17  |   288     0     0   288    0.02   | 6.56e-13  1.73e-13  1.74e-13 |
 STR1 |   284     0     0   138    0.01   | 6.79e-13  1.88e-13  7.05e-14 |
 G03  |   288     0     0   260    0.01   | 1.26e-12  4.10e-13  1.77e-13 |
 G25  |   288     0     0   288    0.01   | 1.34e-12  6.06e-13  1.50e-13 |
 KERG |   255     0     0   246    0.01   | 1.26e-12  3.65e-13         - |
 KOUR |   288     0     0   288    0.01   | 1.55e-12  4.78e-13  2.17e-13 |
 G08  |   288     0     0   288    0.01   | 1.38e-12  5.25e-13  2.78e-13 |
 PRDS |   283     0     0   137    0.00   | 1.51e-12  4.13e-13  1.08e-13 |
 WHIT |   284     0     0   283    0.00   | 5.19e-13  2.03e-13  1.59e-13 |
 GPST |   288     0     0     0    0.00   | 4.13e-14  1.75e-14  6.64e-15 |
 TIXI |   272     0     0     0    0.00   |        -         -         - |
 PIMO |   231     0     0     0    0.00   |        -         -         - |
 AUCK |   123     0     0     0    0.00   |        -         -         - |
 RABT |   285     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   284     0     0     0    0.00   |        -         -         - |
 HOFN |   255     0     0     0    0.00   |        -         -         - |
 HARB |   282     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   283     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     4     0    0.00   | 7.85e-13  8.24e-14  4.45e-14 |
 G24  |   288     0     0     0    0.00   | 1.44e-12  5.06e-13  4.67e-13 |
 G22  |   288     0     6     0    0.00   | 7.76e-13  7.85e-14  4.00e-14 |
 G21  |   288     1     6     0    0.00   | 9.27e-13  1.05e-13  4.05e-14 |
 G20  |   288     0     4     0    0.00   | 7.47e-13  8.24e-14  2.93e-14 |
 G19  |   288     0     6     0    0.00   | 7.12e-13  7.30e-14  1.92e-14 |
 G18  |   288     1     6     0    0.00   | 1.67e-12  1.49e-13  5.56e-14 |
 G15  |   288     0     0     0    0.00   | 1.45e-12  5.38e-13  3.53e-13 |
 G14  |   288     1     6     0    0.00   | 6.94e-13  1.08e-13  7.94e-14 |
 G13  |   288     0     2     0    0.00   | 5.19e-13  5.77e-14  2.67e-14 |
 G11  |   288     0     6     0    0.00   | 7.44e-13  7.02e-14  4.89e-14 |
 G10  |   288     0     0     0    0.00   | 1.18e-12  3.70e-13  3.60e-13 |
 G09  |   288     0     0     0    0.00   | 1.22e-12  4.34e-13  1.82e-13 |
 G05  |   288     0     0     0    0.00   | 1.31e-12  4.51e-13  4.34e-13 |
 G02  |   288     0     5     0    0.00   | 4.94e-13  5.85e-14  2.77e-14 |
 G01  |   288     0     0     0    0.00   | 1.63e-12  8.30e-13  5.70e-13 |
 ZIMM |   283     0     0     0    0.00   |        -         -         - |
 YEBE |   283     0     4     0    0.00   | 2.09e-13  1.26e-14  1.54e-14 |
 YAR2 |   283     0     0     0    0.00   |        -         -         - |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   283     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   284     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   285     2     0     0    0.00   |        -         -         - |
 TIDB |   284     0     4     0    0.00   | 2.24e-13  2.62e-14  8.38e-15 |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.80e-13  2.85e-13  9.30e-13 |
 SCH2 |   275     0     0     0    0.00   |        -         -         - |
 SANT |   253     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   220     0     0     0    0.00   |        -         -         - |
 QAQ1 |   273     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.68e-12  4.44e-13  3.42e-13 |
 OBE2 |   281     1     0     0    0.00   |        -         -         - |
 NSSP |   283     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   276     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.35e-13  6.97e-13  1.24e-12 |
 MBAR |   285     0     0     0    0.00   |        -         -         - |
 MAW1 |   279     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   | 1.99e-12  5.47e-13  2.57e-13 |
 MADR |   283     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   264     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.15e-13  3.55e-13  1.08e-12 |
 ISPA |   272     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   284     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   284     0     0     0    0.00   |        -         -         - |
 GRAS |   240     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   191     0     0     0    0.00   | 3.26e-13  9.77e-13         - |
 DAKA |   286     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.08e-13  6.55e-13  1.09e-12 |
 CEDU |   283     0     0     0    0.00   |        -         -         - |
 CAS1 |   287     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.36e-17  2.83e-16  1.70e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      ALGO      NRC1 |
------------------------------------------+------------------------------+
