
 GPS week: 1307   Day: 2   MJD: 53395                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.00     0.02     2.58     0.00      0
 cod |   288     0  28214      4     0.28    -0.77     0.04    19.23      0
 emr |   288     0  25560      3  3376.79    51.53     0.05    15.71      0
 esa |   288     0  18668   1607  3375.41    51.47     0.06    10.89      0
 gfz |   288     0  20445    289    -0.23     0.22     0.03    25.66      0
 iga |    96     0   2784      3     0.00     0.00     0.07     0.00      0
 igu |    96     0   2784      0     0.02    -0.01     3.14     0.00      0
 jpl |   288     0  17165     12    -3.65    -1.74     0.05    12.36      0
 ngs |    96     0   2784      0     0.00     0.00     2.42     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  35844   2847  3376.57    51.58     0.04    16.15      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -2796   -32  -118    56   143    34   224   -54 -2480     -   -71 |
    2 | -4152   -15   -12   139  -116   -57 -1695   182 -3552     -   -19 |
    3 |   154  -105   -68    12   183    48  3685   -30  -623     -   -85 |
    4 | -2381    23    63    73  -122    -7 -4314    78 -2307     -    -4 |
    5 |-10485    34   -34    92   -38   -37-15266    50 -7315     -   -47 |
    6 | -2425   -65  -120    92   244  -152 -5605   -95 -2259     -  -182 |
    7 |  -327    -9    63   -19    42     1 -3293    17  -884     -  -117 |
    8 |  2443    -7   -94   278    27  -102 -1321    21  2288     -  -156 |
    9 | -2583   108    -9   116   -51  -283  9496    73 -2335     -  -183 |
   10 | -4972   -32   125    37    51    10 -3862   -68 -3701     -  -136 |
   11 |  2707    45   -51    68   -72   159   836   181  3006     -   -73 |
   13 |  3627   197    -8  -124  -198     3 -2721   207  4163     -     0 |
   14 |  2897    15  -136   -62    51   -68 -1158   114  3058     -   -12 |
   15 | -1713   -36    32    75   112   153  -380   -97 -1960     -  -143 |
   16 |  3196   -21    15   -54    55    -1   136    63  3752     -   -89 |
   17 | -7675    30   -77   106    36   -96  2997    57 -6609     -  -134 |
   18 |  4063    -8  -153  -117   186   -85  1163   -44  3929     -   -24 |
   19 |  4208   -28  -109  -151   217  1160   658   152  4412     -  -219 |
   20 |  3644    81  -128  -283    39    -7  -367   193  3779     -    10 |
   21 |  5502   -29  -142    86   165    -6  3072    75  5687     -  -206 |
   22 |  8062   -79   -40   109   139   -32 17464   -13  4562     -  -151 |
   23 |  -260    60  -140  -102   -52  -109  -505   213  -310     -    52 |
   24 | -6842   -33    56   150   -40    -3 -1713    13 -6229     -   -64 |
   25 |  8062    32   -98  -108    98  -153 10253     9  3642     -   -33 |
   26 |  -276    38    48  -115    42  -147  -227    45  -698     -  -116 |
   27 |   842    40    13   -41     2  -150 -1570    61   614     -   -84 |
   28 |  4998    82    17   -72   -88   130   255    87  4890     -     9 |
   29 | -2907    80   -34    29   -38  -103 -3642   108 -2857     -  -105 |
   30 | -4612    13   -65   143    12   -88 -2599   -22 -3661     -   -52 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -12     -     -     -     -    10     -     -     4 |
 ALGO |     -     -  -156     X     -     -     -   145     -     -    40 |
 ALRT |     -   -48     -     -    36     -     -     -     -     -     - |
 AMC2 |     -  -110   153     -     -     -     -  -326     -     -   231 |
 AREQ |     -    95    32     -   -77     -     -  -121     -     -    71 |
 ARTU |     -   180     -   178  -133     -     -  -161     -     -     X |
 ASPA |     -    90     -     -    33     -     -  -287     -     -    55 |
 AUCK |     -    43     -     X     -     -     -     -     -     -   -51 |
 BAHR |     -     -    99     -   -30     -     -     -     -     -   -49 |
 BAN2 |     -     -   -82     -     -     -     -     -     -     -    80 |
 BILI |     -   106     -     -   -79     -     -     -     -     -     X |
 BOGT |     -    17     -    19     -     -     -     -     -     -   -32 |
 BOR1 |     -    10    61     -     -     -     -     -     -     -   -71 |
 BRUS |     -   -75    23     -     -     -     -     -     -     -    66 |
 CAGZ |     -   113     -     -     -     -     -     -     -     -  -134 |
 CAS1 |     -   -50     -   114    32     -     -     -     -     -   -67 |
 CEDU |     -     -     -     X     -     -     -    53     -     -   -41 |
 CHAT |     -    13     -     -   -32     -     -     -     -     -    35 |
 COCO |     -    -7     -   -68   -33     -     -     -     -     -   108 |
 DAEJ |     -    -4    48     -     -     -     -     -     -     -   -42 |
 DAKA |     -    93     -     -   -40     -     -   -61     -     -     - |
 DGAR |     -   -51     -     -     -     -     -    79     -     -     X |
 DRAO |     -    26   -83   290     -     -     -  -111     -     -   -61 |
 DWH1 |     -    66    10     -     -     -     -     -     -     -   -88 |
 FAIR |     -   -94   125   -91    33     -     -     -     -     -     - |
 FORT |     -     -   143  -202   -11     -     -     -     -     -     X |
 GLPS |     -     -     -     -    77     -     -     -     -     -  -123 |
 GMAS |     -     -   -18     -     -     -     -     -     -     -    17 |
 GODE |     -     -    16    94     -     -     -     -     -     -   -79 |
 GOLD |     -    69     -   -28     -     -     -  -212     -     -   100 |
 GRAZ |     -     -    59     -     -     -     -     -     -     -   -57 |
 GUAT |     -   -60     -     -   -78     -     -     -     -     -   196 |
 HLFX |     -     -   226     -     -     -     -  -287     -     -     X |
 HOB2 |     -    60   119  -272     -     -     -     -     -     -    -4 |
 HOFN |     -     -     -     -   -78     -     -     -     -     -   123 |
 HRAO |     -   -24     -     -  -109     -     -   157     -     -    82 |
 IENG |     -   -27    33     -     -     -     -     -     -     -     - |
 IISC |     -    -1     -   -27    13     -     -     -     -     -     - |
 INVK |     -   -19     -     -     -     -     -    30     -     -     X |
 ISPA |     -   -27     -     -    75     -     -   -73     -     -   -34 |
 JPLM |     -     -    35     -     -     -     -   -78     -     -    26 |
 KERG |     -     -    58  -141  -117     -     -     -     -     -   193 |
 KGN0 |     -   -47    73     -     -     -     -     -     -     -   -16 |
 KIRU |     -   -40     -     -     -     -     -    76     -     -   -10 |
 KIT3 |     -     -     -  -140    81     -     -   -73     -     -    21 |
 KOKB |     -  -102   145     -   -99     -     -   -31     -     -   162 |
 KOSG |     -   -86     -     -     -     -     -     -     -     -   102 |
 KOUR |     -   111     -  -292    20     -     -     -     -     -    36 |
 LAE1 |     -   -21     -     -    25     -     -     -     -     -   -15 |
 LPGS |     -    22   161  -244     -     -     -     -     -     -   -18 |
 MAC1 |     -   -44     -   -78    66     -     -     -     -     -     X |
 MAD2 |     -     -   -92     -     -     -     -     -     -     -    90 |
 MADR |     -     -     -     -     -     -     -    25     -     -   -19 |
 MALI |     -    34     -    96     -     -     -     -     -     -  -106 |
 MAS1 |     -     -   -92    39   -21     -     -    79     -     -    35 |
 MATE |     -     -     -  -421     -     -     -     -     -     -   284 |
 MAW1 |     -     -     -     -   -54     -     -     -     -     -    85 |
 MBAR |     -   -33     -     -   -12     -     -    35     -     -    32 |
 MCM4 |     -   245  -300     -     X     -     -     -     -     -     - |
 MDO1 |     -     -  -151     -     -     -     -     -     -     -   147 |
 MEDI |     -    -4     5     -     -     -     -     -     -     -     X |
 METS |     -   -90    97     -     -     -     -     -     -     -    12 |
 MIZU |     -     -  -147   397     -     -     -     -     -     -  -125 |
 NANO |     -   153     -     -     -     -     -  -239     -     -     - |
 NISU |     -   -15     -     -    11     -     -     -     -     -     - |
 NLIB |     -     -   -16     -     -     -     -   -40     -     -    47 |
 NNOR |     -     -   -32  -156     -     -     -     -     -     -   137 |
 NPLD |     -  -156    62     -     -     -     -     -     -     -   125 |
 NRC1 |     -   132    -7     -   -98     -     -     -     -     -     5 |
 NRIL |     -   -24     -     -    34     -     -   -33     -     -     X |
 NTUS |     -  -157     -    10     -     -     -     -     -     -   181 |
 NYA1 |     -    78     -     -   -51     -     -     -     -     -   -12 |
 ONSA |     -  -101    28   138     -     -     -     -     -     -     - |
 PERT |     -     -   -47     X    59     -     -   -27     -     -   -27 |
 PIE1 |     -     -   -76    -8     -     -     -     -     -     -    79 |
 POTS |     -    91     -     -  -108     -     -     -     -     -    63 |
 PRDS |     -     -   -88     -     -     -     -     -     -     -    86 |
 PTBB |     -   -39    27     -     -     -     -     -     -     -    20 |
 QAQ1 |     -  -130    52     -     -     -     -     -     -     -   104 |
 RIOG |     -   -33    96     -   -45     -     -     -     -     -    18 |
 SANT |     -   -33     -     X    25     -     -     -     -     -     - |
 SCH2 |     -     -   -41     -     -     -     -     -     -     -    39 |
 SFER |     -    83  -101     -     -     -     -     -     -     -     - |
 SPT0 |     -  -140    92     -     -     -     -     -     -     -    77 |
 STR1 |     -     -    91     -     -     -     -     -     -     -   -89 |
 SUTH |     -   -97     -     -     -     -     -     -     -     -   116 |
 THTI |     -     -    95   -61   -13     -     -     -     -     -   -31 |
 THU3 |     -     5    77     -     -     -     -     -     -     -   -81 |
 TID1 |     -     -     -     -     -     -     -   -10     -     -     7 |
 TIDB |     -   -38    38   201     -     -     -     -     -     -  -128 |
 TLSE |     -     -   -55     -     -     -     -     -     -     -    53 |
 TRO1 |     -    68     -     -   -77     -     -     -     -     -    43 |
 TSKB |     -   -82    94     X   -38     -     -     -     -     -    65 |
 TWTF |     -  -164    68     -     -     -     -     -     -     -   129 |
 UNSA |     -     -     -   -45    -3     -     -     -     -     -    35 |
 URUM |     -    30     -     -     -     -     -     -     -     -   -35 |
 USN3 |     -    47     -     -     -     -     -    -8     -     -   -50 |
 USUD |     -     -   -27   -59     -     -     -    86     -     -     X |
 VILL |     -     -     -   -76     -     -     -     -     -     -    51 |
 WHIT |     -   -72     -     -     -     -     -   -38     -     -   115 |
 WILL |     -   -64    98     -     -     -     -     -     -     -   -20 |
 WROC |     -     -   124     -     -     -     -  -157     -     -     - |
 WTZR |     -  -120   167     0     -     -     -     -     -     -   -21 |
 WUHN |     -     -    13     -   -29     -     -     -     -     -    33 |
 YAR2 |     -     -    12     -     -     -     -     -     -     -   -11 |
 YEBE |     -     -   -52     -     -     -     -     -     -     -    50 |
 YELL |     -   -11   -84   357  -159     -     -     -     -     -   105 |
 ZIMM |     -    51     -     -     -     -     -     -     -     -   -60 |
 ZWE2 |     -    28     -     -   -21     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5212    52    18    21    20    56  3131    77  5355     -    64 |  288   4.72
    2 |  1327    64    28    43    30    70  1123    45  1110     -    66 |  288   0.30
    3 |  2711    40    28    39    25    23  3079    62  2799     -    37 |  288   1.77
    4 |   674    50    33   111    25    32  2200    48   774     -    48 |  288   0.46
    5 |  4831    35    33    32    14    53  5659    39  5610     -    46 |  288   2.62
    6 |  1744    26    37    35    28    26  4141    42  1574     -    58 |  288   1.71
    7 |  1768    39    33    50    20    47  2421    71  1142     -    43 |  288   0.42
    8 |  2818    61    47    90    54    63  4440    82  3089     -    69 |  288   2.26
    9 |  2075    98   143    91    65    51  5210    63  2163     -    86 |  288   1.93
   10 |  3925    41    36    50    26    47  2399    55  3226     -    39 |  288   2.55
   11 |   761    55    27    33    27    35   310   115   794     -    56 |  288   0.39
   13 |   718    38    81   102    36    44  1563    69   480     -    47 |  288   0.22
   14 |   640    40    46    35    23    66  1056    51   618     -    56 |  288   0.23
   15 |  3497    54    44    32    26    44  4175    52  3190     -    33 |  288   2.56
   16 |   736    35   155    92    34    43   262    61   749     -    42 |  288   0.32
   17 |  2159    58    24    45    35   214  2845    58  1685     -    74 |  288   1.60
   18 |   684    70    35    48    30    62   409    47   709     -    79 |  288   0.39
   19 |   852    39    78    82    27   102   395    41   783     -    58 |  288   0.22
   20 |  1081    55    27    38    38    73   698    44   934     -    65 |  288   0.26
   21 |  2736    51   112    52    35    37  2604    52  2634     -    92 |  288   0.89
   22 |  6198    57    56    35    29    77  8787    78  4344     -    69 |  288   0.35
   23 |   567    43    20   102    29    85   503   108   487     -    42 |  288   0.35
   24 |  2990    51    37    62    30    41  1528    53  3021     -    80 |  288   2.10
   25 |  3833    67    35    38    21    55  5223    44  3524     -    52 |  288   1.83
   26 |  1144    37    40    75    16    30   993    85  1118     -    74 |  288   1.04
   27 |  1137    53    29   111    35    98  1250    75  1178     -    80 |  288   0.88
   28 |   966    39    34    74    33    69   928    47   831     -    42 |  288   0.91
   29 |   759    45   112    66    34    74  1803    92   730     -    56 |  288   0.57
   30 |  2543    42    25    30    10    48  2145    49  2130     -    67 |  288   0.82
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    41     -     -     -     -    24     -     -    36 |  288   0.04
 ALGO |     -     -     9     X     -     -     -    16     -     -    16 |  288   0.03
 ALRT |     -    21     -     -    16     -     -     -     -     -     - |  288   6.26
 AMC2 |     -    18    41     -     -     -     -    22     -     -    42 |  288   0.03
 AREQ |     -    34    34     -    24     -     -    34     -     -    25 |  288  19.88
 ARTU |     -    37     -    31    60     -     -    54     -     -     X |  262   9.35
 ASPA |     -    82     -     -    68     -     -    77     -     -    43 |  288    >>>
 AUCK |     -    47     -     X     -     -     -     -     -     -    56 |  263   9.98
 BAHR |     -     -    26     -    26     -     -     -     -     -    48 |  288   0.29
 BAN2 |     -     -     9     -     -     -     -     -     -     -     9 |  288  19.62
 BILI |     -    22     -     -    16     -     -     -     -     -     X |  287   6.77
 BOGT |     -    32     -    46     -     -     -     -     -     -    54 |  288  22.94
 BOR1 |     -    29    21     -     -     -     -     -     -     -    21 |  288   0.64
 BRUS |     -    16    17     -     -     -     -     -     -     -    22 |  288   0.03
 CAGZ |     -    18     -     -     -     -     -     -     -     -    21 |  288   0.36
 CAS1 |     -    45     -    41    15     -     -     -     -     -    61 |  288   7.43
 CEDU |     -     -     -     X     -     -     -    46     -     -    35 |  277  12.67
 CHAT |     -    41     -     -    20     -     -     -     -     -    48 |  287  10.89
 COCO |     -    27     -    40    24     -     -     -     -     -    37 |  288   8.74
 DAEJ |     -    33    24     -     -     -     -     -     -     -    23 |  287    >>>
 DAKA |     -    20     -     -    16     -     -    35     -     -     - |  288  15.57
 DGAR |     -    20     -     -     -     -     -    31     -     -     X |  288  14.35
 DRAO |     -    24    18    36     -     -     -    18     -     -    53 |  288   0.07
 DWH1 |     -    85    79     -     -     -     -     -     -     -    34 |  287   0.72
 FAIR |     -    23    34    25    28     -     -     -     -     -     - |  288   0.20
 FORT |     -     -    40    75    34     -     -     -     -     -     X |  287   0.05
 GLPS |     -     -     -     -    15     -     -     -     -     -    24 |  288  23.22
 GMAS |     -     -    38     -     -     -     -     -     -     -    37 |  288   2.14
 GODE |     -     -    44    35     -     -     -     -     -     -    48 |  288   0.06
 GOLD |     -    21     -    40     -     -     -    21     -     -    38 |  288  10.81
 GRAZ |     -     -    11     -     -     -     -     -     -     -    10 |  288    >>>
 GUAT |     -    40     -     -    22     -     -     -     -     -    24 |  288    >>>
 HLFX |     -     -    26     -     -     -     -    33     -     -     X |  288  20.41
 HOB2 |     -    45    28    60     -     -     -     -     -     -    20 |  288   0.06
 HOFN |     -     -     -     -    19     -     -     -     -     -    29 |  287    >>>
 HRAO |     -    24     -     -    36     -     -    28     -     -    32 |  288   0.43
 IENG |     -    18    23     -     -     -     -     -     -     -     - |  286   0.56
 IISC |     -    19     -    29    16     -     -     -     -     -     - |  288  22.91
 INVK |     -    12     -     -     -     -     -    18     -     -     X |  288   7.39
 ISPA |     -    44     -     -    41     -     -    33     -     -    54 |  272  13.53
 JPLM |     -     -    64     -     -     -     -    40     -     -    34 |  288   7.98
 KERG |     -     -    82    68    33     -     -     -     -     -    79 |  288   1.85
 KGN0 |     -    24    34     -     -     -     -     -     -     -    25 |  287   0.38
 KIRU |     -    21     -     -     -     -     -    19     -     -    28 |  288   5.96
 KIT3 |     -     -     -    36    20     -     -    43     -     -    25 |  285  44.67
 KOKB |     -    44    21     -    22     -     -    31     -     -    49 |  288   0.21
 KOSG |     -    28     -     -     -     -     -     -     -     -    33 |  288  10.55
 KOUR |     -    39     -    41    29     -     -     -     -     -    37 |  288   2.40
 LAE1 |     -    34     -     -    36     -     -     -     -     -    48 |  287  14.87
 LPGS |     -    41    37    46     -     -     -     -     -     -    55 |  288  20.30
 MAC1 |     -    30     -    70    39     -     -     -     -     -     X |  284  14.16
 MAD2 |     -     -    15     -     -     -     -     -     -     -    14 |  288   0.03
 MADR |     -     -     -     -     -     -     -    36     -     -    27 |  288   6.93
 MALI |     -    21     -    35     -     -     -     -     -     -    27 |  288  16.27
 MAS1 |     -     -    42    69    25     -     -    30     -     -    43 |  288   1.58
 MATE |     -     -     -    32     -     -     -     -     -     -    22 |  288   0.08
 MAW1 |     -     -     -     -    20     -     -     -     -     -    32 |  285   7.91
 MBAR |     -    49     -     -    45     -     -    55     -     -    43 |  288  10.83
 MCM4 |     -    44    54     -     X     -     -     -     -     -     - |  288  41.13
 MDO1 |     -     -    18     -     -     -     -     -     -     -    18 |  288  11.18
 MEDI |     -    17    20     -     -     -     -     -     -     -     X |  288   0.19
 METS |     -    11    25     -     -     -     -     -     -     -    21 |  287   6.25
 MIZU |     -     -    33   102     -     -     -     -     -     -    47 |  288   0.48
 NANO |     -     8     -     -     -     -     -    13     -     -     - |  288  47.11
 NISU |     -    10     -     -     8     -     -     -     -     -     - |  288   0.03
 NLIB |     -     -    37     -     -     -     -    31     -     -    41 |  288   0.05
 NNOR |     -     -    43    38     -     -     -     -     -     -    48 |  285  13.64
 NPLD |     -    13    23     -     -     -     -     -     -     -    23 |  287   0.02
 NRC1 |     -    38    20     -    21     -     -     -     -     -    38 |  288   0.04
 NRIL |     -    15     -     -     7     -     -    21     -     -     X |  288   8.92
 NTUS |     -    33     -    67     -     -     -     -     -     -    37 |  288   8.18
 NYA1 |     -    29     -     -    22     -     -     -     -     -    54 |  288  70.54
 ONSA |     -    16    23    15     -     -     -     -     -     -     - |  288   0.05
 PERT |     -     -    53     X    48     -     -    84     -     -    63 |  287   2.64
 PIE1 |     -     -    50    48     -     -     -     -     -     -    22 |  288   0.03
 POTS |     -    20     -     -    10     -     -     -     -     -    33 |  288  14.77
 PRDS |     -     -    31     -     -     -     -     -     -     -    30 |  288   2.09
 PTBB |     -    17    30     -     -     -     -     -     -     -    34 |  288   0.18
 QAQ1 |     -    27    38     -     -     -     -     -     -     -    22 |  288   7.09
 RIOG |     -    41    38     -    24     -     -     -     -     -    21 |  288   6.60
 SANT |     -   113     -     X    85     -     -     -     -     -     - |  101  97.06
 SCH2 |     -     -    16     -     -     -     -     -     -     -    15 |  288 193.00
 SFER |     -    21    25     -     -     -     -     -     -     -     - |  287   0.50
 SPT0 |     -    12    28     -     -     -     -     -     -     -    22 |  288   0.04
 STR1 |     -     -    37     -     -     -     -     -     -     -    36 |  288   0.86
 SUTH |     -    23     -     -     -     -     -     -     -     -    28 |  288  11.83
 THTI |     -     -    37    64    25     -     -     -     -     -    31 |  288  12.37
 THU3 |     -    24     9     -     -     -     -     -     -     -    27 |  288   6.12
 TID1 |     -     -     -     -     -     -     -    36     -     -    28 |  288   0.05
 TIDB |     -    21    40    54     -     -     -     -     -     -    16 |  288   0.08
 TLSE |     -     -    15     -     -     -     -     -     -     -    15 |  288   0.51
 TRO1 |     -    17     -     -    27     -     -     -     -     -    46 |  288   7.43
 TSKB |     -    21    50     X    18     -     -     -     -     -    50 |  288   0.78
 TWTF |     -    41    39     -     -     -     -     -     -     -    30 |  288   0.03
 UNSA |     -     -     -    61    38     -     -     -     -     -    85 |  288  18.61
 URUM |     -    24     -     -     -     -     -     -     -     -    29 |  288  20.44
 USN3 |     -    31     -     -     -     -     -    26     -     -    53 |  288   0.03
 USUD |     -     -    33    31     -     -     -    34     -     -     X |  288   9.38
 VILL |     -     -     -    22     -     -     -     -     -     -    15 |  288   7.10
 WHIT |     -    26     -     -     -     -     -    11     -     -    27 |  288   5.21
 WILL |     -    34    37     -     -     -     -     -     -     -    25 |  288 154.92
 WROC |     -     -    17     -     -     -     -    22     -     -     - |  288  16.07
 WTZR |     -    16    23    28     -     -     -     -     -     -    39 |  288   0.03
 WUHN |     -     -    38     -    17     -     -     -     -     -    33 |  287  12.12
 YAR2 |     -     -    19     -     -     -     -     -     -     -    18 |  288  13.08
 YEBE |     -     -    20     -     -     -     -     -     -     -    19 |  288   0.05
 YELL |     -    16    19    42    17     -     -     -     -     -    37 |  288   0.06
 ZIMM |     -    14     -     -     -     -     -     -     -     -    16 |  288    >>>
 ZWE2 |     -    17     -     -    13     -     -     -     -     -     - |  288  10.14
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2584    39    45    57    30    70  3136    52  2416     -    44 |


 BEST CLOCK FIT: NPLD   287   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.98   | 3.23e-14  7.49e-15  1.41e-15 |
 NPLD |   287     0     0   286    9.91   | 3.40e-14  4.65e-15  1.25e-15 |
 NRC1 |   288     0     0   288    9.18   | 2.76e-14  6.83e-15  2.91e-15 |
 NISU |   288     0     1   224    7.76   | 4.96e-14  6.14e-15  2.06e-15 |
 BRUS |   288     0     0   288    7.54   | 3.55e-14  5.52e-15  1.41e-15 |
 SPT0 |   288     0     0   288    6.87   | 3.75e-14  5.48e-15  3.61e-15 |
 ONSA |   288     0     0   288    6.11   | 3.21e-14  6.60e-15  5.53e-15 |
 USN3 |   288     0     0   288    5.06   | 6.44e-14  1.13e-14  2.08e-15 |
 ALBH |   288     0     0   288    4.42   | 3.99e-14  1.10e-14  3.61e-15 |
 MAD2 |   288     0     0   288    3.67   | 3.86e-14  7.63e-15  2.16e-15 |
 FORT |   287     0     0   286    3.45   | 7.47e-14  1.52e-14  3.88e-15 |
 TID1 |   288     0     0   288    3.13   | 5.61e-14  1.72e-14  3.34e-15 |
 ALGO |   288     1     0   287    2.71   | 2.97e-14  5.55e-15  3.47e-15 |
 TWTF |   288     0     0   288    2.30   | 4.53e-14  8.35e-15  2.27e-15 |
 YELL |   288     0     0   288    2.29   | 3.61e-14  8.39e-15  3.21e-15 |
 NLIB |   288     0     0   288    2.26   | 5.30e-14  7.76e-15  3.36e-15 |
 MATE |   288     0     0   288    2.24   | 6.07e-14  1.38e-14  8.46e-15 |
 HOB2 |   288     0     0   288    1.90   | 4.33e-14  1.09e-14  5.54e-15 |
 DRAO |   288     0     0   288    1.83   | 6.94e-14  1.90e-14  5.81e-15 |
 WTZR |   288     0     0   288    1.72   | 4.86e-14  8.71e-15  2.82e-15 |
 MEDI |   288     0     0   288    1.05   | 3.36e-14  9.46e-15  1.47e-14 |
 TIDB |   288     0     0   288    1.02   | 1.81e-13  2.35e-14  7.04e-15 |
 PIE1 |   288     0     0   288    0.51   | 4.03e-14  8.99e-15  1.60e-15 |
 FAIR |   288     0     0   288    0.37   | 2.03e-13  7.04e-14  1.56e-14 |
 GODE |   288     0     0   288    0.34   | 7.00e-14  9.39e-15  5.17e-15 |
 PTBB |   288     0     0   288    0.33   | 2.42e-13  5.51e-14  1.80e-14 |
 G07  |   288     0     0   288    0.24   | 2.58e-13  7.97e-14  3.91e-14 |
 HRAO |   288     0     0   288    0.17   | 1.09e-13  3.25e-14  4.92e-14 |
 G16  |   288     0     0   288    0.16   | 4.79e-13  6.81e-14  3.75e-14 |
 G04  |   288     0     0   288    0.12   | 4.81e-13  9.62e-14  3.83e-14 |
 BAHR |   288     0     0   288    0.12   | 3.63e-13  9.41e-14  3.19e-14 |
 NYA1 |   288     1     0   287    0.12   | 3.79e-14  2.03e-14  2.03e-14 |
 MIZU |   288     0     0   288    0.11   | 3.81e-13  1.02e-13  4.06e-14 |
 G23  |   288     0     2   118    0.10   | 5.47e-13  6.36e-14  2.80e-14 |
 TLSE |   288     0     0   288    0.10   | 3.72e-13  1.06e-13  5.94e-14 |
 KOKB |   288     0     0   288    0.09   | 4.51e-14  9.13e-15  2.24e-14 |
 YEBE |   288     0     4    12    0.07   | 1.38e-13  1.56e-14  4.95e-15 |
 G29  |   288     0     0   288    0.06   | 4.51e-13  1.33e-13  6.97e-14 |
 SFER |   287     0     0   286    0.06   | 3.89e-13  8.52e-14  4.21e-14 |
 DWH1 |   287     0     0   286    0.06   | 5.03e-13  1.29e-13  8.06e-14 |
 KGN0 |   287     0     0   138    0.05   | 3.85e-13  1.24e-13  3.38e-14 |
 IENG |   286     0     0   285    0.05   | 5.55e-13  1.48e-13  6.03e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.82e-13  1.53e-13  5.91e-14 |
 G27  |   288     0     0   288    0.04   | 3.16e-13  1.09e-13  1.14e-13 |
 G22  |   288     1     5    71    0.04   | 8.15e-13  1.12e-13  2.87e-14 |
 G26  |   288     0     0   288    0.04   | 3.64e-13  1.07e-13  1.34e-13 |
 G06  |   288     0     0   288    0.04   | 4.12e-13  1.36e-13  1.50e-13 |
 G30  |   288     0     0   288    0.03   | 3.36e-13  1.28e-13  1.00e-13 |
 G17  |   288     0     0   288    0.03   | 5.20e-13  1.55e-13  1.32e-13 |
 STR1 |   288     0     0   288    0.03   | 6.88e-13  2.10e-13  7.29e-14 |
 G11  |   288     0     4    23    0.02   | 6.43e-13  6.55e-14  4.41e-14 |
 TSKB |   288     0     0   288    0.01   | 9.55e-13  2.72e-13  6.96e-14 |
 KERG |   288     0     0   288    0.01   | 1.21e-12  3.78e-13  1.80e-13 |
 G03  |   288     0     0   288    0.01   | 1.26e-12  4.35e-13  2.09e-13 |
 G08  |   288     0     0   288    0.01   | 1.57e-12  4.25e-13  1.82e-13 |
 G25  |   288     0     0   288    0.01   | 1.42e-12  4.01e-13  1.53e-13 |
 G10  |   288     0     0   288    0.01   | 1.17e-12  3.14e-13  2.79e-13 |
 KOUR |   288     0     0   288    0.00   | 1.41e-12  3.77e-13  2.46e-13 |
 PRDS |   288     0     0   288    0.00   | 1.36e-12  5.23e-13  1.33e-13 |
 G21  |   288     0     2    17    0.00   | 9.11e-13  1.29e-13  1.14e-13 |
 GMAS |   288     0     0   143    0.00   | 1.10e-12  3.62e-13  1.44e-13 |
 CAGZ |   288     0     3     1    0.00   | 6.97e-13  1.17e-13  2.57e-14 |
 GPST |   288     0     0     0    0.00   | 1.80e-14  3.78e-15  1.27e-15 |
 SANT |   101     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   263     0     0     0    0.00   |        -         -         - |
 G28  |   288     2     6     0    0.00   | 6.73e-13  9.73e-14  8.91e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  4.19e-13  2.78e-13 |
 G20  |   288     0     5     0    0.00   | 6.69e-13  7.76e-14  1.46e-14 |
 G19  |   288     0     6     0    0.00   | 7.25e-13  7.47e-14  1.77e-14 |
 G18  |   288     3     6     0    0.00   | 1.57e-12  1.79e-13  5.35e-14 |
 G15  |   288     0     0     0    0.00   | 1.47e-12  4.81e-13  2.89e-13 |
 G14  |   288     0     6     0    0.00   | 6.45e-13  7.07e-14  2.32e-14 |
 G13  |   288     0     5     0    0.00   | 5.44e-13  5.52e-14  1.90e-14 |
 G09  |   288     0     0     0    0.00   | 1.24e-12  4.35e-13  1.45e-13 |
 G05  |   288     0     0     0    0.00   | 1.26e-12  3.51e-13  3.23e-13 |
 G02  |   288     0     6     0    0.00   | 4.91e-13  4.87e-14  2.27e-14 |
 G01  |   288     0     0     0    0.00   | 1.52e-12  6.78e-13  5.54e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.91e-13  2.85e-13  3.00e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.98e-13  2.79e-13  8.15e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   287     0     0     0    0.00   | 1.92e-12  6.58e-13  3.48e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   285     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.99e-13  6.27e-13  2.66e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   285     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.85e-12  5.21e-13  1.00e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   284     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     2     0    0.00   | 7.23e-13  7.67e-13  1.01e-12 |
 KIT3 |   285     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.73e-13  3.49e-13  7.72e-13 |
 ISPA |   272     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     1     0    0.00   | 1.80e-13  2.15e-13  1.11e-12 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.49e-13  9.32e-13  9.11e-13 |
 CEDU |   277     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   262     0     0     0    0.00   |        -         -         - |
 AREQ |   288     2     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.61e-17  1.93e-16  1.16e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NPLD      NPLD |
------------------------------------------+------------------------------+
