
 GPS week: 1308   Day: 2   MJD: 53402                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2880      0    -0.13     0.58     3.19     0.00      0
 cod |   288     0  28145    288    -0.13     0.13     0.04    19.23      0
 emr |   288     0  22084    863  3742.55    54.91     0.05    15.34      0
 esa |   288     0  18249    928  3740.95    55.09     0.06    10.10      0
 gfz |   288     0  21810    306    -0.11    -0.15     0.03    26.87      0
 iga |    96     0   2880     13    -0.10     0.54     0.09     0.00      0
 igu |    96     0   2880      0    -0.12     0.54     2.43     0.00      0
 jpl |   288     0  18073     41    -6.16     2.91     0.04    14.83      0
 ngs |    96     0   2880      0    -0.13     0.59     2.83     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33485   2883  3742.44    54.99     0.05    13.63      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |    64    88   -15    81   -90    99  4500    26  -829     -   -18 |
    2 | -1329    -3   -20  -116    43  -101   389   124 -1038     -  -107 |
    3 | -5291   -15  -145    12    79    22 -8621    48 -4116     -   -32 |
    4 |  1391    46   -59    37   -62  -123  1623   189   543     -  -110 |
    5 | -2155    25   -16   -57    10     2 -4367    68 -2920     -   -68 |
    6 |  -409    30  -124  -196   204  -256 -4897    23  -752     -  -185 |
    7 | -2984   -38  -117  -158   123    -3    72   125 -2869     -   -84 |
    8 |  3121   -67   -74   148    82    62 -5009   -24  1740     -   -60 |
    9 | -6337    23    -8   -13   -66  -173 -3163   168 -5138     -   -68 |
   10 | -6330   -46    10   -79   121    40 -5664    24 -5374     -  -148 |
   11 |  2835    75   -29    35   -65     8  2727    12  3126     -    15 |
   13 |  4981   113     6    77   -49    43  2473    29  5092     -  -158 |
   14 |  3364    49   -49    33     5   -47   382   -10  3410     -   -38 |
   15 |   414    25   -61   -70    61   169  5866     2  -560     -   -37 |
   16 |  3558   -52   -51    38    79   -37   259   -10  3603     -   -41 |
   17 |  -945    82  -232    66   108   -28  5198    88  -301     -  -212 |
   18 |  3680    87    -5   -80    -5   -24  1312    -1  3587     -   -50 |
   19 |  3593    12  -307    60   149  1213  1821    62  3794     -   -77 |
   20 |  4305   -25  -110   -54   107    39  1154    50  4247     -   -58 |
   21 |  2521    16   -50   -20    88     5  1941   -17  3587     -  -105 |
   22 | -3880   -60   170    65   -73  -111 -2008    63 -3457     -   -85 |
   23 |  -648   -23    -8    55   -11   -81  1716   -76  -779     -   102 |
   24 | -2273     5   -30    11    -7   -91 -2541   102 -2987     -   -79 |
   25 | -3693     8  -101   -86   101  -135  3277   -13 -3356     -   -18 |
   26 |  -374    63   -67   -73    14   -66  5535   108  -635     -  -103 |
   27 | -3432  -106  -174   -35   207  -142 -1574    46 -3120     -   -86 |
   28 |  -350    20     X    21   -35   141  3456    12  -327     -    13 |
   29 | -2849    26    27    25     7  -467 -1755   -10 -3099     -   -89 |
   30 | -1021    74    42    35   -99   -51 -2206    86 -1618     -   -76 |
   31 | 10472  -154     X     -   101    72 -1897    19 10548     -     - |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -58     -     -     -     -    -8     -     -    74 |
 ALGO |     -     -  -135     X     -     -     -   220     -     -   -87 |
 AREQ |     -    26    65     -    22     -     -  -177     -     -    39 |
 ARTU |     -     X     -   179   -38     -     -   -54     -     -     X |
 ASPA |     -     -     -     -     9     -     -  -221     -     -   210 |
 AUCK |     -     -     -    80     -     -     -     -     -     -   -59 |
 BAHR |     -   -20   221     -   -70     -     -     -     -     -   -82 |
 BILI |     -    74     -     -   -53     -     -     -     -     -     X |
 BOGT |     -   168     -    15    25     -     -  -301     -     -    31 |
 BOR1 |     -   -76    97     -     -     -     -     -     -     -    -2 |
 BRMU |     -  -282     -     -    98     -     -     -     -     -   204 |
 BRUS |     -   -82    95     -     -     -     -   -71     -     -    86 |
 CAGZ |     -   125     -     -     -     -     -     -     -     -  -176 |
 CAS1 |     -    54     -    73   -86     -     -     -     -     -    40 |
 CEDU |     -  -209     -   269     -     -     -     -     -     -   117 |
 CHAT |     -    48     -     -   -89     -     -     -     -     -   109 |
 COCO |     -    36     -  -168   -23     -     -     -     -     -   119 |
 DGAR |     -   -42     -     -     -     -     -   105     -     -   -56 |
 DRAO |     -    70  -118   252     -     -     -   -85     -     -   -60 |
 DWH1 |     -   161  -112     -     -     -     -     -     -     -  -100 |
 FAIR |     -     -   128  -146   -43     -     -    46     -     -     - |
 GLPS |     -    40     -    67    23     -     -  -140     -     -     X |
 GODE |     -     -    69   -18     -     -     -     -     -     -   -65 |
 GOLD |     -   120     -   -21     -     -     -  -141     -     -     X |
 GRAS |     -   -27     -     -     -     -     -    35     -     -     X |
 GUAM |     -     -     -  -330   144     -     -  -170     -     -   147 |
 GUAT |     -     -     -     -   -66     -     -     -     -     -   131 |
 HOB2 |     -   -74   170     -     -     -     -     -     -     -   -87 |
 HOFN |     -     -     -     -   -88     -     -     -     -     -   174 |
 HOLM |     -   118     -     -     -     -     -  -153     -     -     - |
 HRAO |     -     -     -     -   -65     -     -   138     -     -   -22 |
 IENG |     -   -84   105     -     -     -     -     -     -     -     - |
 IISC |     -     -     -    72   -27     -     -     -     -     -     - |
 INVK |     -    13     -     -     -     -     -   -16     -     -     X |
 JPLM |     -     -    29     -   -35     -     -   -38     -     -    78 |
 KERG |     -  -121  -142   -34   114     -     -     -     -     -   131 |
 KGN0 |     -   -38    -4     -     -     -     -     -     -     -    58 |
 KIRU |     -   -55     -     -     -     -     -   159     -     -   -95 |
 KOKB |     -   -16    86     -   -23     -     -   -78     -     -    56 |
 KOUR |     -    20     -  -212    14     -     -     -     -     -   102 |
 MAC1 |     -  -113     -    -5    11     -     -     -     -     -   142 |
 MAD2 |     -     -    33     -     -     -     -     -     -     -   -37 |
 MADR |     -     -     -     -     -     -     -    10     -     -   -11 |
 MALI |     -     -     -   260     X     -     -     -     -     -  -193 |
 MAS1 |     -   -45    51   -23   -48     -     -    77     -     -    35 |
 MATE |     -     -     -  -577     -     -     -     -     -     -   427 |
 MAW1 |     -   108     -     -   -77     -     -     -     -     -    -2 |
 MBAR |     -    -3     -     -   -23     -     -    28     -     -    17 |
 MCM4 |     -   289  -108     -  -145     -     -     -     -     -     - |
 MDO1 |     -    67   -79     -     -     -     -     -     -     -    -5 |
 MEDI |     -     -   -60     -     -     -     -    77     -     -   -16 |
 METS |     -   -57    31     -     -     -     -     -     -     -    45 |
 MSKU |     -   -78     -     -    56     -     -     -     -     -     - |
 NISU |     -    20     -     -   -15     -     -     -     -     -     - |
 NLIB |     -   -26   132     -     -     -     -   -42     -     -   -67 |
 NNOR |     -     -   113  -170     -     -     -     -     -     -    -2 |
 NPLD |     -  -204   142     -     -     -     -     -     -     -   128 |
 NRC1 |     -     -    24     -   -57     -     -     -     -     -    84 |
 NRIL |     -    10     -     -    24     -     -   -58     -     -     X |
 NTUS |     -  -205     -   166     -     -     -     -     -     -   165 |
 NYA1 |     -    97     -     -  -104     -     -     -     -     -    68 |
 OHI2 |     -   178     -    29   -58     -     -     -     -     -  -157 |
 ONSA |     -    -1     X    77   -28     -     -     -     -     -     - |
 PERT |     -     -   174     X   -24     -     -   -65     -     -   -77 |
 PIE1 |     -     -   -19   -16     -     -     -     -     -     -    33 |
 PIMO |     -     -     -   -70     -     -     -     -     -     -    52 |
 POL2 |     -    73     -     -     -     -     -  -134     -     -    42 |
 POTS |     -   110     -     -   -79     -     -     -     -     -     X |
 PRDS |     -     -   -67     -     -     -     -     -     -     -    75 |
 PTBB |     -   -55    60     -     -     -     -     -     -     -    10 |
 REYK |     -   -48     -     -     -     -     -     -     -     -    68 |
 RIOG |     -   -50    63     -     -     -     -     -     -     -     - |
 SANT |     -     -     -     X   -33     -     -     -     -     -    65 |
 SCH2 |     -    78     1     -     -     -     -  -159     -     -    62 |
 SPT0 |     -  -197   138     -     -     -     -     -     -     -   123 |
 STJO |     -   104   -54     -     -     -     -   -79     -     -     X |
 STR1 |     -     -    15     -     -     -     -     -     -     -   -17 |
 SUTH |     -   -24     -     -     -     -     -     -     -     -    34 |
 THTI |     -     -    95  -128   -97     -     -     -     -     -   179 |
 THU3 |     -    32     -     -    61     -     -     -     -     -  -164 |
 TID1 |     -     -     -     -     -     -     -   -76     -     -    82 |
 TIDB |     -   -45    98    36     -     -     -     -     -     -   -72 |
 TLSE |     -     -   -18     -     -     -     -     -     -     -    20 |
 TOW2 |     -    32     -     -   -18     -     -     -     -     -    -9 |
 TRO1 |     -    71     -     -   -54     -     -     -     -     -     6 |
 TSKB |     -   -65   -10   213   -20     -     -     -     -     -   -15 |
 USN3 |     -    74     -     -     -     -     -   -41     -     -   -59 |
 USNO |     -   -25    22     -     -     -     -     -     -     -    11 |
 USUD |     -     -   -63    83   -36     -     -    73     -     -     X |
 VILL |     -     -     -   -41     -     -     -     -     -     -    30 |
 WHIT |     -    34     -     -     -     -     -     -     -     -   -48 |
 WILL |     -   -28    34     -     -     -     -     -     -     -     1 |
 WTZR |     -   -50   146   -60     -     -     -     -     -     -   -49 |
 WUHN |     -  -184   100     -    69     -     -     -     -     -    12 |
 YAR2 |     -   -85   167     -     -     -     -     -     -     -   -67 |
 YELL |     -   -45   -47   343  -103     -     -     -     -     -    63 |
 YSSK |     -    67     -     -   -48     -     -     -     -     -     - |
 ZIMM |     -   -52     -     -     -     -     -     -     -     -    74 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5750    36    59    51    36    45  3492    48  6144     -    51 |  288   4.58
    2 |  1053    55    55    76    20    71   468    45  1087     -    73 |  288   0.41
    3 |  3033    28    22    51    42    65  3386    38  2632     -    55 |  288   1.49
    4 |   921    28    41    41    18    49  1216    71  1456     -    65 |  288   0.83
    5 |  4863    41    26    51    19    82  3716    38  3970     -    46 |  288   1.85
    6 |   939    33    29    40    12    39  2761    60   902     -    54 |  288   1.13
    7 |   305    28    78    54    39    52   397    40   565     -    45 |  288   0.33
    8 |  4351    41    52    45    48    97  3976    56  4379     -    77 |  288   1.90
    9 |  8177    48    48    38    20   115  5135    31  5408     -    47 |  288   2.90
   10 |  2016    56    74    50    38    48  1649    35  1847     -    43 |  288   1.35
   11 |   838    49    46    66    30    43  1526    37   861     -    97 |  288   0.46
   13 |   854    45    33    94    31    86  1215    43   938     -    64 |  288   0.35
   14 |  1121    46    54    34    24    57   502    66   935     -    54 |  288   0.20
   15 |  4121    36    38    78    22    41  3691    29  3839     -    41 |  288   3.70
   16 |   788    58    62    63    30    48   916    64   859     -    65 |  288   0.44
   17 |  3732    43    35    39    16    46  5211    50  3392     -    36 |  288   2.12
   18 |   584    51    37   100    21    61  1074    46   494     -    49 |  288   0.37
   19 |   714    68    62   136    46   181   630    53   747     -    54 |  288   0.20
   20 |   481    66    55    39    21    57   636    40   765     -    86 |  288   0.25
   21 |  3693    46    35    48    26    56  2662    40  3360     -    60 |  288   0.86
   22 |   638    66    41    70    17   100   812    60   661     -    73 |  288   0.33
   23 |  1081    48    53   118    29    44  1385   147   808     -    78 |  288   0.20
   24 |  4065    30    37    31    21    94  2372    87  2720     -   108 |  288   2.25
   25 |  3833    49    78    31    34    89  1769    50  3422     -    80 |  288   2.09
   26 |  1254    24    49    33    30   104  3068    38  1161     -    48 |  288   0.61
   27 |   990    51    40    73    36    64   974    62  1068     -    68 |  288   0.90
   28 |  1019    48     X    54    72   122  3052    61  1767     -    95 |  288   0.87
   29 |   851    48   117    23    69   196   525    67   815     -    67 |  288   0.71
   30 |  1708    45    35    37    14    91   538    51  1056     -    48 |  288   0.97
   31 |  7859    45     X     -    33   175  1039    72  7516     -     - |  288   0.50
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    23     -     -     -     -    18     -     -    23 |  288   0.09
 ALGO |     -     -    17     X     -     -     -    12     -     -    15 |  288   0.01
 AREQ |     -    22    25     -    23     -     -    21     -     -    55 |  288  16.24
 ARTU |     -     X     -    22     7     -     -    12     -     -     X |  288   7.54
 ASPA |     -     -     -     -    17     -     -    31     -     -    22 |  288    >>>
 AUCK |     -     -     -   122     -     -     -     -     -     -    91 |  163   8.90
 BAHR |     -    24    40     -    19     -     -     -     -     -    35 |  288   0.99
 BILI |     -    23     -     -    16     -     -     -     -     -     X |  287   7.42
 BOGT |     -    34     -    56    28     -     -    20     -     -    37 |  288  17.17
 BOR1 |     -    21    31     -     -     -     -     -     -     -    18 |  288   0.65
 BRMU |     -    27     -     -    22     -     -     -     -     -    38 |  288    >>>
 BRUS |     -    22    23     -     -     -     -    12     -     -    37 |  288   0.02
 CAGZ |     -    18     -     -     -     -     -     -     -     -    26 |  285   0.57
 CAS1 |     -    38     -    79    29     -     -     -     -     -    70 |  288   7.58
 CEDU |     -    20     -    62     -     -     -     -     -     -    31 |  287  11.35
 CHAT |     -    34     -     -    28     -     -     -     -     -    44 |  287  10.30
 COCO |     -    38     -    34    36     -     -     -     -     -    44 |  288  16.73
 DGAR |     -    36     -     -     -     -     -    31     -     -    34 |  288  14.41
 DRAO |     -    29    28    29     -     -     -    13     -     -    59 |  288   0.07
 DWH1 |     -    34    41     -     -     -     -     -     -     -    30 |  288   0.66
 FAIR |     -     -    19    52    12     -     -     9     -     -     - |  288   0.17
 GLPS |     -    29     -    36    19     -     -    20     -     -     X |  288  19.54
 GODE |     -     -    21   117     -     -     -     -     -     -    76 |  288   0.18
 GOLD |     -    34     -    36     -     -     -    38     -     -     X |  288  10.60
 GRAS |     -    18     -     -     -     -     -    23     -     -     X |  288   6.23
 GUAM |     -     -     -    81    22     -     -    50     -     -    56 |  288  12.19
 GUAT |     -     -     -     -    12     -     -     -     -     -    23 |  288    >>>
 HOB2 |     -    30    48     -     -     -     -     -     -     -    22 |  288   0.06
 HOFN |     -     -     -     -     9     -     -     -     -     -    18 |  287    >>>
 HOLM |     -    11     -     -     -     -     -    14     -     -     - |  288   5.63
 HRAO |     -     -     -     -    23     -     -    35     -     -    44 |  287   0.25
 IENG |     -    76    95     -     -     -     -     -     -     -     - |  244   0.69
 IISC |     -     -     -    63    24     -     -     -     -     -     - |  288  22.02
 INVK |     -    24     -     -     -     -     -    31     -     -     X |  288   8.31
 JPLM |     -     -    60     -    25     -     -    28     -     -    14 |  288  15.24
 KERG |     -    43    45    67    22     -     -     -     -     -    70 |  288   1.28
 KGN0 |     -    35    44     -     -     -     -     -     -     -    22 |  287   0.40
 KIRU |     -    19     -     -     -     -     -    18     -     -    23 |  287   8.05
 KOKB |     -    62    29     -    55     -     -    40     -     -    29 |  288  37.35
 KOUR |     -    21     -    43    25     -     -     -     -     -    33 |  288   2.35
 MAC1 |     -    77     -    45    27     -     -     -     -     -    76 |  288  16.29
 MAD2 |     -     -    28     -     -     -     -     -     -     -    31 |  288   0.05
 MADR |     -     -     -     -     -     -     -    20     -     -    22 |  288   8.40
 MALI |     -     -     -    58     X     -     -     -     -     -    43 |  288  14.45
 MAS1 |     -    17    15    47    28     -     -    26     -     -    46 |  288   1.77
 MATE |     -     -     -    25     -     -     -     -     -     -    19 |  240   0.15
 MAW1 |     -    28     -     -    21     -     -     -     -     -    50 |  288   7.21
 MBAR |     -    65     -     -    39     -     -    50     -     -   125 |  287  10.70
 MCM4 |     -    53    77     -    19     -     -     -     -     -     - |  287  33.12
 MDO1 |     -    43   116     -     -     -     -     -     -     -    80 |  288  13.88
 MEDI |     -     -    17     -     -     -     -    15     -     -    21 |  288   0.04
 METS |     -    13    19     -     -     -     -     -     -     -    26 |  287   5.11
 MSKU |     -    27     -     -    19     -     -     -     -     -     - |  278   7.66
 NISU |     -    21     -     -    15     -     -     -     -     -     - |  287   0.02
 NLIB |     -    28    66     -     -     -     -    17     -     -    39 |  288   0.03
 NNOR |     -     -    25    52     -     -     -     -     -     -    22 |  288  13.50
 NPLD |     -    22    44     -     -     -     -     -     -     -    26 |  287   0.02
 NRC1 |     -     -    18     -    11     -     -     -     -     -    12 |  288   0.03
 NRIL |     -    22     -     -    12     -     -    12     -     -     X |  288   7.65
 NTUS |     -    23     -    60     -     -     -     -     -     -    43 |  288   8.48
 NYA1 |     -    14     -     -    10     -     -     -     -     -    13 |  288   0.05
 OHI2 |     -    43     -   110    27     -     -     -     -     -    87 |  288   7.97
 ONSA |     -    35     X    31    24     -     -     -     -     -     - |  288   0.03
 PERT |     -     -    36     X    18     -     -    61     -     -    45 |  288   3.12
 PIE1 |     -     -    45    16     -     -     -     -     -     -    46 |  288   0.03
 PIMO |     -     -     -    36     -     -     -     -     -     -    26 |  284  15.18
 POL2 |     -    20     -     -     -     -     -    17     -     -    22 |  288   7.60
 POTS |     -    18     -     -    13     -     -     -     -     -     X |  288  16.18
 PRDS |     -     -    18     -     -     -     -     -     -     -    20 |  288   2.52
 PTBB |     -    25    35     -     -     -     -     -     -     -    40 |  288   0.39
 REYK |     -    11     -     -     -     -     -     -     -     -    16 |  288   6.41
 RIOG |     -    51    64     -     -     -     -     -     -     -     - |  288   6.66
 SANT |     -     -     -     X    25     -     -     -     -     -    50 |  287  16.81
 SCH2 |     -    22    26     -     -     -     -    12     -     -    24 |  288   7.49
 SPT0 |     -    15    20     -     -     -     -     -     -     -    36 |  288   0.03
 STJO |     -    17    15     -     -     -     -    14     -     -     X |  288   0.04
 STR1 |     -     -    21     -     -     -     -     -     -     -    23 |  288   0.97
 SUTH |     -    26     -     -     -     -     -     -     -     -    37 |  288   9.47
 THTI |     -     -    25    67    27     -     -     -     -     -    34 |  288  12.63
 THU3 |     -    16     -     -    12     -     -     -     -     -    24 |  288   6.60
 TID1 |     -     -     -     -     -     -     -    30     -     -    33 |  288   0.08
 TIDB |     -    29    40    68     -     -     -     -     -     -    49 |  288   0.12
 TLSE |     -     -    25     -     -     -     -     -     -     -    28 |  288   0.47
 TOW2 |     -    52     -     -    37     -     -     -     -     -    21 |  288  10.96
 TRO1 |     -    21     -     -    23     -     -     -     -     -    39 |  288   9.22
 TSKB |     -    46    23    44    24     -     -     -     -     -    35 |  288   1.33
 USN3 |     -    16     -     -     -     -     -    17     -     -    15 |  288   0.03
 USNO |     -    29    34     -     -     -     -     -     -     -    26 |  285   0.02
 USUD |     -     -    25    36    17     -     -    31     -     -     X |  288   9.54
 VILL |     -     -     -    17     -     -     -     -     -     -    13 |  288   8.43
 WHIT |     -    17     -     -     -     -     -     -     -     -    24 |  288   4.46
 WILL |     -    34    41     -     -     -     -     -     -     -    23 |  288  57.70
 WTZR |     -    15    20    35     -     -     -     -     -     -    28 |  288   0.03
 WUHN |     -    23    22     -    32     -     -     -     -     -    42 |  287  12.59
 YAR2 |     -    25    24     -     -     -     -     -     -     -    29 |  288   5.20
 YELL |     -    40    17    36    10     -     -     -     -     -    25 |  288   0.04
 YSSK |     -    26     -     -    19     -     -     -     -     -     - |  287   7.87
 ZIMM |     -    29     -     -     -     -     -     -     -     -    41 |  288    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3195    37    45    60    28    90  2431    44  2831     -    49 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 YELL |   288     0     0   288   10.37   | 2.97e-14  6.46e-15  1.99e-15 |
 SPT0 |   288     0     0   288   10.37   | 3.23e-14  6.16e-15  2.08e-15 |
 BRUS |   288     0     0   288   10.37   | 3.60e-14  6.36e-15  2.21e-15 |
 ONSA |   288     0     0   288    8.13   | 3.03e-14  5.78e-15  2.58e-15 |
 STJO |   288     0     0   288    6.84   | 2.66e-14  6.37e-15  3.79e-15 |
 ALBH |   288     0     0   288    6.15   | 3.92e-14  9.15e-15  5.88e-15 |
 WTZR |   288     0     0   288    5.84   | 4.10e-14  8.69e-15  3.29e-15 |
 NISU |   287     0     0   141    5.08   | 4.38e-14  7.16e-15  2.38e-15 |
 USNO |   285     0     0   284    4.28   | 3.72e-14  7.87e-15  1.21e-15 |
 NLIB |   288     0     0   288    4.08   | 2.99e-14  5.94e-15  3.21e-15 |
 ALGO |   288     1     0   287    3.94   | 3.20e-14  5.88e-15  1.69e-15 |
 USN3 |   288     0     0   288    3.59   | 6.56e-14  1.10e-14  3.57e-15 |
 HOB2 |   288     0     0   287    3.38   | 4.30e-14  1.17e-14  4.27e-15 |
 DRAO |   288     0     0   288    3.03   | 6.55e-14  1.43e-14  5.02e-15 |
 NRC1 |   288     0     0   288    2.78   | 2.45e-14  6.46e-15  2.95e-15 |
 MAD2 |   288     0     0   288    2.72   | 4.19e-14  7.43e-15  4.88e-15 |
 NPLD |   287     0     0   286    2.43   | 3.77e-14  6.36e-15  1.44e-15 |
 TID1 |   288     0     0   288    1.62   | 9.05e-14  2.77e-14  5.29e-15 |
 GODE |   288     0     0   288    0.63   | 3.96e-14  1.01e-14  1.60e-14 |
 TIDB |   288     0     0   208    0.63   | 1.90e-13  3.05e-14  8.09e-15 |
 PIE1 |   288     0     0   288    0.61   | 4.11e-14  6.61e-15  2.59e-15 |
 MATE |   240     0     0   234    0.54   | 7.24e-14  1.30e-14         - |
 NYA1 |   288     0     0   288    0.36   | 2.50e-14  7.07e-15  6.05e-15 |
 FAIR |   288     0     0   288    0.33   | 1.73e-13  5.12e-14  1.36e-14 |
 G31  |   288     0     1   145    0.22   | 2.01e-13  6.82e-14  3.47e-14 |
 MEDI |   288     0     0   143    0.18   | 4.21e-14  7.83e-15  3.52e-15 |
 G23  |   288     0     0   152    0.18   | 5.16e-13  6.05e-14  2.03e-14 |
 HRAO |   287     0     0   286    0.16   | 1.11e-13  2.97e-14  2.84e-14 |
 PTBB |   288     0     0   143    0.16   | 2.50e-13  5.67e-14  3.90e-14 |
 G07  |   288     0     0   288    0.12   | 2.87e-13  8.36e-14  2.65e-14 |
 KGN0 |   287     0     0   286    0.11   | 4.02e-13  1.06e-13  3.27e-14 |
 G16  |   288     0     0   288    0.10   | 4.99e-13  6.81e-14  5.17e-14 |
 G26  |   288     0     0   288    0.09   | 3.75e-13  1.02e-13  6.57e-14 |
 CAGZ |   285     0     0   284    0.08   | 4.00e-13  1.16e-13  5.81e-14 |
 G06  |   288     0     0   288    0.06   | 4.01e-13  1.31e-13  6.80e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.83e-13  1.71e-13  6.02e-14 |
 TLSE |   288     0     0   143    0.04   | 3.66e-13  1.29e-13  4.09e-14 |
 G29  |   288     0     0   288    0.04   | 3.97e-13  1.38e-13  8.88e-14 |
 G27  |   288     0     0   288    0.04   | 3.09e-13  1.05e-13  1.11e-13 |
 DWH1 |   288     0     0   288    0.04   | 5.31e-13  1.58e-13  5.30e-14 |
 G04  |   288     0     0   288    0.04   | 4.46e-13  1.30e-13  9.99e-14 |
 BAHR |   288     0     2   110    0.04   | 3.77e-13  2.91e-13  1.02e-13 |
 G30  |   288     0     0   288    0.03   | 3.21e-13  1.32e-13  1.25e-13 |
 G17  |   288     0     0   288    0.03   | 7.83e-13  2.41e-13  1.33e-13 |
 STR1 |   288     0     0   143    0.02   | 5.75e-13  1.62e-13  1.10e-13 |
 IENG |   244     0     0   143    0.01   | 5.43e-13  1.60e-13         - |
 TSKB |   288     0     0   288    0.01   | 9.29e-13  3.07e-13  1.00e-13 |
 G10  |   288     0     0   288    0.01   | 1.15e-12  2.90e-13  1.51e-13 |
 KERG |   288     0     0   288    0.01   | 1.28e-12  3.78e-13  1.41e-13 |
 G03  |   288     0     0   288    0.01   | 1.41e-12  3.57e-13  1.16e-13 |
 G05  |   288     0     0   288    0.01   | 1.39e-12  3.12e-13  2.23e-13 |
 KOUR |   288     0     0   288    0.01   | 1.47e-12  4.41e-13  2.56e-13 |
 G08  |   288     0     0   288    0.01   | 1.37e-12  3.84e-13  2.02e-13 |
 PRDS |   288     0     0   288    0.01   | 1.45e-12  3.58e-13  2.75e-13 |
 G24  |   288     0     0   288    0.00   | 1.32e-12  3.66e-13  2.87e-13 |
 G25  |   288     0     0   152    0.00   | 1.44e-12  4.17e-13  2.23e-13 |
 GPST |   288     0     0     0    0.00   | 1.70e-14  4.88e-15  1.13e-15 |
 MSKU |   278     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   163     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.54e-13  6.71e-14  5.16e-14 |
 G22  |   288     0     5     0    0.00   | 7.51e-13  8.71e-14  2.81e-14 |
 G21  |   288     0     6     0    0.00   | 8.04e-13  1.08e-13  6.55e-14 |
 G20  |   288     0     5     0    0.00   | 6.74e-13  8.57e-14  1.96e-14 |
 G19  |   288     0     6     0    0.00   | 7.29e-13  7.45e-14  2.13e-14 |
 G18  |   288     0     6     0    0.00   | 1.43e-12  1.39e-13  3.08e-14 |
 G15  |   288     0     0     0    0.00   | 1.51e-12  4.85e-13  4.91e-13 |
 G14  |   288     0     6     0    0.00   | 6.52e-13  7.19e-14  1.80e-14 |
 G13  |   288     0     5     0    0.00   | 5.00e-13  5.94e-14  2.71e-14 |
 G11  |   288     0     5     0    0.00   | 7.41e-13  8.16e-14  3.94e-14 |
 G09  |   288     0     0     0    0.00   | 1.33e-12  4.61e-13  3.07e-13 |
 G02  |   288     0     6     0    0.00   | 4.54e-13  4.23e-14  2.65e-14 |
 G01  |   288     0     0     0    0.00   | 1.50e-12  6.60e-13  5.30e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 8.57e-13  1.10e-12  3.26e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.36e-13  4.13e-13  4.19e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.12e-13  3.90e-13  1.03e-12 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     1     0     0    0.00   | 5.91e-13  5.35e-13  6.62e-13 |
 SANT |   287     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   284     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.82e-12  6.17e-13  2.47e-13 |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   287     0     1     0    0.00   | 6.98e-13  6.81e-13  2.43e-12 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.77e-12  4.30e-13  1.80e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 KOKB |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 4.97e-13  4.75e-13  1.50e-12 |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     2     0    0.00   | 2.51e-13  1.24e-12  1.58e-12 |
 CEDU |   287     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.42e-17  2.90e-16  1.74e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      ONSA      USNO |
------------------------------------------+------------------------------+
