
 GPS week: 1309   Day: 6   MJD: 53413                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  33280     68    -0.68     0.98     0.04    17.16      0
 emr |   288     0  27469    104   178.71    55.56     0.03    18.87      0
 esa |   288     0  21338   1972   178.78    55.71     0.06     7.43      0
 gfz |   288     0  29704    659    -0.26     0.39     0.03    21.54      0
 igr |   288     0  35461    719     7.73     0.29     0.03     0.00      0
 jpl |   288     0  25404     51     1.02     0.92     0.04    16.59      0
 mit |   288     0  36483   1232    -0.47     0.42     0.03    18.41      0
 ngs |    96     0   2880      8    -0.47     0.80     2.64     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |    76   -68    83    56   -30     0   -94 -1560     - |
    2 |    65   -70   -92   127    25    -9   -91  -590     - |
    3 |     5   -43   -32    57   -43   -32    12 -3369     - |
    4 |     7   -63   145    32     2    31   -57 -1018     - |
    5 |     7   -44   -65   115   -68   -52   -23  2983     - |
    6 |    35   -98    70     4   -75   -79   106  -228     - |
    7 |    -1   -61    43   105    16   -98    12  1825     - |
    8 |    19  -125   147   105     4   -13   -59 -7767     - |
    9 |    24    12    30    55    -8   -28   -85 -5771     - |
   10 |   -69    -3    75    83    -5   -57    -8 -3193     - |
   11 |    89   -89    71    29   -21    26   -79  4427     - |
   13 |   221   -48  -186   116    85    42  -260  5358     - |
   14 |    61   -94    81   183     5   -36  -175  3462     - |
   15 |   -28   -37   273    70    70  -129     X -4827     - |
   16 |    30   -79   114   -14     9    58   -28  5022     - |
   17 |   -37   -25   297    21   -45  -121    28 -3993     - |
   18 |   -10   -91     X    51   -33    56    -5  4180     - |
   19 |   139  -175     X    45   -52    16   -17  5795     - |
   20 |    57  -124   -32    -4   -18    20    73  5069     - |
   21 |    87  -123   132    58    49   -24   -54  3243     - |
   22 |    14   -77    65   133   138    70  -173 -3005     - |
   23 |   110   -98   -38    96    90    48  -142   193     - |
   24 |   -21   -59     6    10   -18    -5    93 -8408     - |
   25 |   123   -53   -15   -13    51   -20   -20 -6513     - |
   26 |    -9    17   109     8    -1    31   -90 -1430     - |
   27 |    48  -156   -38   180    43   -20   -61  2077     - |
   28 |   184  -104   -40    39   144    28  -140  3395     - |
   29 |    51   -13     X    87    16   -35  -105  2078     - |
   30 |    72    -9   107    -8   -34   -37   -58  -562     - |
   31 |   173    16     -     0     2   -46  -139  2533     - |
 -----+-------------------------------------------------------+
 ALBH |   -24  -142     -     -   -39     -   167     -     - |
 ALGO |  -129    83   -91   -45   -17  -131   243     -     - |
 ALIC |    12     -     -     -  -187   -28    14     -     - |
 ALRT |   -30     -     -   -18     -     -    50     -     - |
 AMC2 |  -156   127     -     -    54    86   -62     -     - |
 ARTU |   117     -    37  -145   -41    93   -38     -     - |
 ASPA |     -     -     -   118    36  -153     -     -     - |
 AUCK |   -18     -     X     -    14    -9    25     -     - |
 BAHR |   -66   121     -    33    47    61  -157     -     - |
 BAN2 |     -    37     -     X    17   -43     X     -     - |
 BJFS |    15     -     -    17    23   134  -155     -     - |
 BOGT |     -     -     -    57   -58  -118    40     -     - |
 BOR1 |    40   -16     -     -   -26     -   -21     -     - |
 BREW |     -    31     -     -     -     -   -32     -     - |
 BRMU |     -     -     -    70    94   -91     -     -     - |
 BRUS |   -44    50     -     -    17     -   -10     -     - |
 CAS1 |   -43     -   -16  -142   -72   176    54     -     - |
 CEDU |     -     -   106     -     -     -   -43     -     - |
 CHAT |    50     -     -   -22   -21   -50    24     -     - |
 CHUR |    25     -     -     -     -     -   -23     -     - |
 COCO |  -110     -  -106    35   -57   -84   202     -     - |
 DAKA |  -108     -     -   198    16  -146     -     -     - |
 DARW |     -    27     -     -     -     -   -27     -     - |
 DAV1 |  -238     -     -  -124  -130     -   368     -     - |
 DGAR |   -83     -     -   -34     1    64    59     -     - |
 DRAO |   -68     9    22  -146   -76     -   215     -     - |
 DUBO |   158     -     -     -     -  -164     -     -     - |
 FAIR |   -50    41  -120   -31    55     4    85     -     - |
 FORT |     -     -  -292    22    39    54    36     -     - |
 GLPS |    78     -  -108    35    19     4   -73     -     - |
 GMAS |     -   147     -     -     -     -  -151     -     - |
 GODE |     -   -29  -202     -  -114     -   111     -     - |
 GOLD |     -     -     1     0     X     -     -     -     - |
 GUAT |   -95     -     -     -    56    99     -     -     - |
 HARB |     -     -     -    88   163     -  -103     -     - |
 HERS |   -66    37     -     -    -1     -    34     -     - |
 HOB2 |   -13   174    44   -95    36   117  -179     -     - |
 HRAO |   -39     -   -49     -    24    46    14     -     - |
 IENG |   -62    57     -     -    59     -     -     -     - |
 IISC |  -197     -   276   -34     -     -    62     -     - |
 INVK |   -66     -     -    53  -115     -     -     -     - |
 IRKT |     -    58     -   -79     -     -    32     -     - |
 JAB1 |   -45     -     X     -     -     -    42     -     - |
 JPLM |     -    27     -   -54    69     -    36     -     - |
 KARR |  -105     -     -     -  -102   236  -115     -     - |
 KERG |   -97   -69   120   -45  -158   -89   257     -     - |
 KGN0 |   -58    53     -     -    -4     -     -     -     - |
 KHAJ |     -   -34     -     -     -   -65    94     -     - |
 KIRU |   112     -  -151     -  -113     -   -43     -     - |
 KIT3 |     -     -    76    -1    23    39   -64     -     - |
 KOKB |   -33     1     -   -35   -47   -13    82     -     - |
 KOUR |   128     -   -58   -81    20     -     X     -     - |
 LAE1 |   -51     -     -   -21     -   116   -32     -     - |
 LPGS |    -6   132  -112     X    13   189  -255     -     - |
 MAC1 |   -96     -  -106  -115   351   215    72     -     - |
 MALI |    35     -   -11  -101   -84     -    91     -     - |
 MAS1 |     -    77   -41  -126   -43    59    32     -     - |
 MATE |   -17     -   -63   -94   -42     -   151     -     - |
 MAW1 |   173     -  -153     -    43    46  -140     -     - |
 MBAR |   -48     -     -   -38   -15   118     -     -     - |
 MCM4 |   -13  -273    83   325  -161  -327   174     -     - |
 MDO1 |   200    49     -  -203    -2     -     -     -     - |
 MDVJ |   -79     -     -     -     -     -    74     -     - |
 MEDI |   -27   -68     -     -   -31     -    95     -     - |
 METS |   -24    61     -  -115   105     -    95     -     - |
 MIZU |     -    10     X  -249   -18     -   282     -     - |
 MSKU |     3     -     -    11     -   -39    19     -     - |
 NISU |   -22    42     -   -19     -     -     -     -     - |
 NLIB |     -    41     -  -110    32     2    85     -     - |
 NNOR |     -    -3  -132     -   -69     -    56     -     - |
 NOT1 |     -     -     -     -     -     7    -6     -     - |
 NOUM |     -     -     -    98     -  -127     -     -     - |
 NPLD |   -55    50     -     -    47     -     -     -     - |
 NRC1 |     8    50     -   -81    10     -    37     -     - |
 NTUS |  -224     -   186    84     X    44    -5     -     - |
 NYA1 |    77     -     -   -78   -20   -37    54     -     - |
 NYAL |     -    19     -     -   -31     -   -20     -     - |
 ONSA |     7    34  -109  -141   -53    64   109     -     - |
 OPMT |     -   -25     -    22     -     -     -     -     - |
 OUS2 |     -     -     -   -73     -    95     -     -     - |
 PERT |   -63    66   -81     -    20   -26    47     -     - |
 PIE1 |     -    42   -37     -    68     -   -28     -     - |
 PIMO |     -     -   155    -7     9   -61     X     -     - |
 POL2 |    57     -    36     -     -     -   -67     -     - |
 POTS |    59     -     -   -47   -20     -     -     -     - |
 PRDS |   -25    39     -     -    88     -   -16     -     - |
 PTBB |   -13    27     -     -    18     -   -16     -     - |
 RESO |    38     -     -   -30   -83     -     -     -     - |
 RIOG |     -    38    67    98    42   -23  -160     -     - |
 SANT |   -34     -    92   -21   -60     -    23     -     - |
 SCH2 |     -    27     -     -   -36   -76    41     -     - |
 SFER |    55   -39     -     -   -18     -   -12     -     - |
 SPT0 |   -55    85     -     -    52     -   -36     -     - |
 STJO |    31   108     -   -97   -40   -35     6     -     - |
 STR1 |     -   163     -     -   103     -  -167     -     - |
 SUTH |    -7     -     -     -     9   138  -118     -     - |
 SUWN |  -170   154     -     -     -     -     -     -     - |
 SYOG |   144   -63   -96   -33     -   -49    53     -     - |
 THTI |     -   -30   -36    95   -16   -46   -21     -     - |
 THU3 |  -111   -68     -   149   -50     -     -     -     - |
 TIDB |    18    47   -36     -    -5     -   -50     -     - |
 TLSE |     -     3     -     -    42     -    -3     -     - |
 TNML |     -    34     -     -     -     -   -35     -     - |
 TOW2 |   -38     -     -   -39   -43    53    33     -     - |
 TRO1 |   175     -     -  -132    48     -    -9     -     - |
 TSKB |   -79    46    -9    75   -54   -34   -27     -     - |
 TWTF |   -55    52     -    -3    -8     1     -     -     - |
 ULAB |     -     -     -     2     -    -3     -     -     - |
 UNSA |     -     -  -292   -29    12    62    96     -     - |
 URUM |    90     -     -   -72     -     -     -     -     - |
 USN3 |    36     -     -     -   -15   -37     -     -     - |
 USNO |     6    21     -     -    71     -   -27     -     - |
 USUD |    -4   -63   187     -    49     -    -7     -     - |
 VILL |     5     -    38   -48   -13     -    37     -     - |
 WHIT |   -24     -     -     -     -     -    22     -     - |
 WILL |   -77    28     -     -     0     -    43     -     - |
 WROC |     -    17     -     -     -     -   -17     -     - |
 WSRT |     1    40     -  -116     -     -    93     -     - |
 WTZR |   -82   106  -108   -59    33   103   -13     -     - |
 WUHN |     -    31     -   173     -     -  -234     -     - |
 YAR2 |     6   100     -   -93    42     -     -     -     - |
 YEBE |     -   -73     -     -    -8     -    75     -     - |
 YELL |   -65    66   -83  -107   -61     5   147     -     - |
 ZWE2 |    58     -     -   -46     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    32    40    53    36    23    50    28  5586     - |  288   5.13
    2 |    37    49    58    23    33    25    17   964     - |  288   0.35
    3 |    28    59   111    26    45    61    67  4135     - |  288   3.29
    4 |    42    46    89    33    28    32    43   905     - |  288   0.72
    5 |    34    36    36    19    35    41    37  5016     - |  288   2.66
    6 |    18    36    36    20    31    32    37  1130     - |  288   1.20
    7 |    25    45    85    25    30    27    18  1608     - |  288   0.47
    8 |    49    39    87    18    32    57    30  4762     - |  288   2.30
    9 |    57    50    54    24    21    46    55  2853     - |  288   1.94
   10 |    57    56    59    28    35    60    62  2199     - |  288   2.04
   11 |    51    45    53    31    60    42    21   668     - |  288   0.55
   13 |    38    38    92    28    44    33    30   438     - |  288   0.18
   14 |    34    57    41    18    35    48    37   389     - |  288   0.21
   15 |    52    45    47    21   122    61     X  4429     - |  287   3.43
   16 |    47    41    73    23    27    28    43   741     - |  288   0.36
   17 |    55    57    35    26    29    41    26  3778     - |  288   1.53
   18 |    65    41     X    26    24    50    51   975     - |  288   0.36
   19 |    21    43     X    18    52    40    82   616     - |  288   0.28
   20 |    64    49    46    26    45    48    43   973     - |  288   0.23
   21 |    47    51    49    16    14    35    29   519     - |  288   0.27
   22 |    64    42    98    28    29    43    49   982     - |  288   0.64
   23 |    39    40    87    32    55    29    35   630     - |  288   0.15
   24 |    42    50    81    20    32    34    20  3087     - |  288   2.41
   25 |    53    45   102    42    26    53    34  5758     - |  288   1.84
   26 |    48    38    57    19    29    32    44   853     - |  288   0.56
   27 |    53    44   105    28    40    55    30  2207     - |  288   0.89
   28 |    56    77    79    38    42    43    35   526     - |  288   0.50
   29 |    54    55     X    34    39    28    50  1582     - |  288   1.14
   30 |    38    34    36    19    21    36    37  2219     - |  288   0.57
   31 |    77    69     -    48    36    42    92  1454     - |  288   0.56
 -----+-------------------------------------------------------+--------------
 ALBH |    42    15     -     -    28     -    40     -     - |  288   0.04
 ALGO |    12    14    48    33    13    18    29     -     - |  288   0.03
 ALIC |    18     -     -     -    28    30    16     -     - |  288  12.53
 ALRT |    26     -     -    18     -     -    35     -     - |  288   7.02
 AMC2 |    16    12     -     -    17    11    22     -     - |  288   0.02
 ARTU |    50     -    52    13    14    12    29     -     - |  288  10.47
 ASPA |     -     -     -    49    26    63     -     -     - |  273    >>>
 AUCK |    31     -     X     -    45    23    25     -     - |  264   8.18
 BAHR |    24    14     -    29    59    19    16     -     - |  288   0.37
 BAN2 |     -    22     -     X    46    25     X     -     - |  275  18.24
 BJFS |    12     -     -    12     8    15    16     -     - |  287   8.73
 BOGT |     -     -     -    23    18    21    22     -     - |  288  21.85
 BOR1 |    17    20     -     -    31     -    30     -     - |  288   0.40
 BREW |     -    12     -     -     -     -    13     -     - |  287  10.13
 BRMU |     -     -     -    14    22    18     -     -     - |  288    >>>
 BRUS |    23    19     -     -    31     -    22     -     - |  288   0.03
 CAS1 |    43     -    93    10    22    17    23     -     - |  288   8.19
 CEDU |     -     -    38     -     -     -    15     -     - |  155  13.32
 CHAT |    56     -     -    51    34    40    42     -     - |  287  10.28
 CHUR |    19     -     -     -     -     -    18     -     - |  288   0.05
 COCO |    43     -    79    61    19    42    18     -     - |  285    >>>
 DAKA |    35     -     -    35    21    23     -     -     - |  287  22.33
 DARW |     -    24     -     -     -     -    24     -     - |  288  19.68
 DAV1 |    26     -     -    15    10     -    28     -     - |  288   5.12
 DGAR |    45     -     -    41    21    48    54     -     - |  288  17.39
 DRAO |    46    14    43    32    11     -    55     -     - |  288   0.11
 DUBO |    11     -     -     -     -    11     -     -     - |  288  66.90
 FAIR |    37    19    26    13    21    19    54     -     - |  288   0.16
 FORT |     -     -    74    27    19    31    20     -     - |  287   0.19
 GLPS |    23     -    42    29    11    17    15     -     - |  288  24.11
 GMAS |     -    16     -     -     -     -    16     -     - |  288   1.20
 GODE |     -    21    36     -    27     -    15     -     - |  288   0.09
 GOLD |     -     -    37    13     X     -     -     -     - |  284  13.08
 GUAT |    21     -     -     -    26    22     -     -     - |  288    >>>
 HARB |     -     -     -    25    26     -    29     -     - |  287  29.34
 HERS |    28    20     -     -    21     -    27     -     - |  264  32.61
 HOB2 |    38    27    60    24    24    27    36     -     - |  288   0.06
 HRAO |    28     -    69     -    43    19    23     -     - |  288   0.17
 IENG |    24    21     -     -    15     -     -     -     - |  288   0.65
 IISC |    32     -    57    22     -     -    19     -     - |  288  24.48
 INVK |    39     -     -    31    12     -     -     -     - |  288   8.10
 IRKT |     -    13     -    14     -     -    16     -     - |  288   0.45
 JAB1 |    15     -     X     -     -     -    14     -     - |  264  22.06
 JPLM |     -    15     -    19    11     -    35     -     - |  288  10.43
 KARR |    25     -     -     -    43    30    37     -     - |  288  12.95
 KERG |    36    16    66    30    25    20    31     -     - |  288   1.42
 KGN0 |    15    14     -     -    22     -     -     -     - |  287   0.51
 KHAJ |     -    17     -     -     -    28    20     -     - |  288   0.16
 KIRU |    34     -    81     -    29     -    22     -     - |  288   7.68
 KIT3 |     -     -    64    12    21    22    25     -     - |  272  67.11
 KOKB |    32    20     -    31    28    19    42     -     - |  288   0.09
 KOUR |    33     -    42    24    18     -     X     -     - |  288   1.31
 LAE1 |    43     -     -    39     -    34    23     -     - |  287  16.56
 LPGS |    23    23    41     X    21    24    32     -     - |  288  16.65
 MAC1 |    71     -    54    27    16    42    32     -     - |  288  14.79
 MALI |    21     -    51    31    52     -    25     -     - |  288  22.22
 MAS1 |     -    12    30    13     9    18    15     -     - |  288   1.74
 MATE |    13     -    27    13    31     -    19     -     - |  288   0.09
 MAW1 |    30     -    50     -    27    27    24     -     - |  288   9.82
 MBAR |    28     -     -    30    14    18     -     -     - |  287  17.88
 MCM4 |    37    27    53    36    10    17    51     -     - |  288  15.56
 MDO1 |    17    19     -    22    14     -     -     -     - |  288   7.77
 MDVJ |    15     -     -     -     -     -    14     -     - |  287   0.09
 MEDI |    23    21     -     -    16     -    14     -     - |  288   0.12
 METS |    13    17     -    18    20     -    31     -     - |  287  14.28
 MIZU |     -    16     X    18    30     -    27     -     - |  288   0.67
 MSKU |    39     -     -    41     -    26    25     -     - |  288  13.47
 NISU |    11    14     -    11     -     -     -     -     - |  287   0.03
 NLIB |     -    13     -    23    11    14    26     -     - |  288   0.04
 NNOR |     -    18    75     -    38     -    20     -     - |  288  11.82
 NOT1 |     -     -     -     -     -    25    23     -     - |  288   0.09
 NOUM |     -     -     -    61     -    79     -     -     - |  280    >>>
 NPLD |    18    16     -     -    29     -     -     -     - |  287   0.05
 NRC1 |    16    14     -    22    13     -    16     -     - |  288   0.03
 NTUS |    25     -    59    31     X    36    33     -     - |  288   8.82
 NYA1 |    18     -     -    25    21    18    42     -     - |  288   0.09
 NYAL |     -    26     -     -    25     -    27     -     - |  288   0.09
 ONSA |    16    40    54    23    12    28    34     -     - |  288   0.04
 OPMT |     -    28     -    25     -     -     -     -     - |  287   0.05
 OUS2 |     -     -     -    17     -    23     -     -     - |  232  32.51
 PERT |    28    19    71     -    24    33    15     -     - |  288   2.27
 PIE1 |     -    15    22     -    22     -    12     -     - |  288   0.07
 PIMO |     -     -    55    60    52    84     X     -     - |  266  18.59
 POL2 |    14     -    22     -     -     -    16     -     - |  287  11.57
 POTS |    36     -     -    29    15     -     -     -     - |  288  17.16
 PRDS |    23    12     -     -    26     -    25     -     - |  288   1.31
 PTBB |    38    19     -     -    20     -    31     -     - |  288   0.38
 RESO |    30     -     -    24    18     -     -     -     - |  288   7.23
 RIOG |     -    17    61    32    18    33    31     -     - |  288   9.54
 SANT |    49     -    66    21    17     -    43     -     - |  281  15.10
 SCH2 |     -    18     -     -    19    20    30     -     - |  288 114.06
 SFER |    25    16     -     -    35     -    20     -     - |  287   0.39
 SPT0 |    24    18     -     -    27     -    24     -     - |  288   0.02
 STJO |    30    17     -    46    18    24    48     -     - |  288   0.05
 STR1 |     -    21     -     -    26     -    22     -     - |  288   0.52
 SUTH |    33     -     -     -    21    15    31     -     - |  288  14.73
 SUWN |    17    15     -     -     -     -     -     -     - |  288   7.90
 SYOG |    41    14    44    26     -    12    20     -     - |  288   0.86
 THTI |     -    34    74    55    33    37    51     -     - |  288    >>>
 THU3 |    15    12     -    14    11     -     -     -     - |  288   7.63
 TIDB |    27    13    54     -    21     -    19     -     - |  288   0.09
 TLSE |     -   109     -     -    97     -   112     -     - |  282   0.48
 TNML |     -     8     -     -     -     -     8     -     - |  288   0.91
 TOW2 |    36     -     -    26    32    43    18     -     - |  288  17.36
 TRO1 |    21     -     -    16    19     -    34     -     - |  288   8.66
 TSKB |    16    19    66    22    13    25    24     -     - |  288   1.08
 TWTF |    16    32     -    35    24    26     -     -     - |  288   0.08
 ULAB |     -     -     -    65     -    84     -     -     - |  249  15.00
 UNSA |     -     -    27    15    37    14    22     -     - |  288  19.88
 URUM |    21     -     -    17     -     -     -     -     - |  288  22.37
 USN3 |    19     -     -     -    14    20     -     -     - |  287   0.02
 USNO |    13    14     -     -    12     -    15     -     - |  288   0.03
 USUD |    14    22    57     -    17     -    16     -     - |  288  13.33
 VILL |    17     -    46    18    12     -    25     -     - |  288   8.99
 WHIT |    35     -     -     -     -     -    33     -     - |  288 107.56
 WILL |    41    28     -     -    28     -    31     -     - |  288  53.91
 WROC |     -    20     -     -     -     -    20     -     - |  204  15.11
 WSRT |    24    23     -    45     -     -    40     -     - |  288   0.04
 WTZR |    22    14    53    32    13    24    35     -     - |  288   0.05
 WUHN |     -    28     -    26     -     -    45     -     - |  287  11.40
 YAR2 |    28    18     -    27    18     -     -     -     - |  288  10.12
 YEBE |     -    13     -     -    24     -    13     -     - |  288   0.14
 YELL |    31    11    56    31     9    18    37     -     - |  288   0.02
 ZWE2 |    12     -     -     9     -     -     -     -     - |  288   9.91
 -----+-------------------------------------------------------+--------------
 TOT  |    35    33    62    29    30    36    34  2643     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 SPT0 |   288     0     0   288    9.89   | 3.17e-14  6.94e-15  1.90e-15 |
 WSRT |   288     0     0   288    9.64   | 3.27e-14  1.25e-14  2.73e-15 |
 ONSA |   288     0     0   288    9.57   | 3.32e-14  6.06e-15  2.78e-15 |
 AMC2 |   288     0     0   288    9.22   | 3.56e-14  6.02e-15  1.85e-15 |
 BRUS |   288     0     0   288    7.80   | 5.51e-14  1.64e-14  2.96e-15 |
 OPMT |   287     0     0   286    5.69   | 6.17e-14  1.90e-14  3.99e-15 |
 YELL |   288     0     0   288    5.39   | 2.95e-14  6.82e-15  2.17e-15 |
 NPLD |   287     0     0   286    5.27   | 4.44e-14  1.63e-14  4.08e-15 |
 NISU |   287     0     0   286    4.43   | 4.71e-14  6.81e-15  2.00e-15 |
 USN3 |   287     0     0   286    3.44   | 6.79e-14  1.20e-14  1.78e-15 |
 USNO |   288     0     0   288    3.39   | 3.86e-14  6.77e-15  2.75e-15 |
 PIE1 |   288     0     0   288    2.80   | 4.06e-14  8.76e-15  4.57e-15 |
 ALGO |   288     1     0   287    2.73   | 2.83e-14  5.59e-15  2.51e-15 |
 MDVJ |   287     1     0   285    2.46   | 5.37e-14  8.85e-15  6.05e-15 |
 WTZR |   288     0     0   288    2.11   | 3.95e-14  1.95e-14  2.60e-15 |
 STJO |   288     0     0   288    1.91   | 5.91e-14  1.86e-14  4.85e-15 |
 TWTF |   288     0     0   288    1.65   | 3.42e-14  7.43e-15  9.01e-15 |
 NLIB |   288     0     0   288    1.50   | 2.91e-14  5.84e-15  3.41e-15 |
 CHUR |   288     0     0   143    1.41   | 4.96e-14  1.00e-14  4.81e-15 |
 ALBH |   288     0     0   288    1.31   | 3.76e-14  1.21e-14  3.99e-15 |
 KOKB |   288     0     0   288    1.29   | 4.46e-14  1.51e-14  6.01e-15 |
 DRAO |   288     0     0   288    1.08   | 6.10e-14  1.85e-14  8.65e-15 |
 NRC1 |   288     0     0   288    0.86   | 5.59e-14  8.92e-15  2.72e-15 |
 NOT1 |   288     1     0   287    0.83   | 4.74e-14  1.35e-14  6.49e-15 |
 HOB2 |   288     0     0   288    0.71   | 4.38e-14  1.36e-14  3.87e-15 |
 FORT |   287     1     0   285    0.55   | 8.52e-14  1.49e-14  6.65e-15 |
 MATE |   288     0     0   288    0.53   | 3.50e-14  9.50e-15  9.02e-15 |
 GODE |   288     0     0   288    0.42   | 4.05e-14  1.04e-14  7.83e-15 |
 MEDI |   288     0     0   288    0.36   | 4.28e-14  1.10e-14  8.18e-15 |
 KHAJ |   288     0     0   143    0.28   | 1.01e-13  3.32e-14  8.57e-15 |
 PTBB |   288     0     0   288    0.18   | 2.41e-13  5.11e-14  3.27e-14 |
 NYAL |   288     1     0   287    0.13   | 3.96e-14  8.13e-15  9.96e-15 |
 HRAO |   288     0     0   288    0.13   | 9.30e-14  2.19e-14  1.77e-14 |
 IRKT |   288     0     0   288    0.12   | 4.79e-14  5.05e-14  3.59e-14 |
 FAIR |   288     0     0   288    0.10   | 1.52e-13  3.73e-14  1.50e-14 |
 NYA1 |   288     0     0   288    0.09   | 3.02e-14  8.60e-15  1.01e-14 |
 G30  |   288     0     0   288    0.06   | 3.08e-13  1.06e-13  5.49e-14 |
 G06  |   288     0     0   288    0.06   | 4.09e-13  1.17e-13  7.22e-14 |
 G23  |   288     0     6    39    0.05   | 4.69e-13  5.74e-14  1.00e-14 |
 TLSE |   282     0     0   278    0.05   | 3.77e-13  1.33e-13  4.01e-14 |
 KGN0 |   287     0     0   286    0.05   | 3.82e-13  8.56e-14  3.74e-14 |
 G07  |   288     0     0   288    0.05   | 3.23e-13  9.81e-14  3.81e-14 |
 G31  |   288     0     0   288    0.04   | 2.31e-13  8.21e-14  3.90e-14 |
 SFER |   287     0     0   286    0.04   | 4.05e-13  1.05e-13  3.25e-14 |
 G04  |   288     0     0   288    0.03   | 4.27e-13  1.10e-13  7.76e-14 |
 G16  |   288     0     0   288    0.03   | 4.88e-13  8.09e-14  3.01e-14 |
 MIZU |   288     0     0   288    0.03   | 4.14e-13  1.23e-13  5.12e-14 |
 IENG |   288     0     0   288    0.03   | 5.48e-13  1.48e-13  6.42e-14 |
 BOR1 |   288     0     0   288    0.03   | 4.28e-13  1.08e-13  1.86e-14 |
 G26  |   288     0     0   288    0.02   | 3.90e-13  1.13e-13  6.17e-14 |
 G27  |   288     0     0   288    0.02   | 3.15e-13  1.00e-13  1.13e-13 |
 TIDB |   288     0     0   288    0.02   | 1.78e-13  2.48e-14  7.47e-15 |
 STR1 |   288     0     0   288    0.02   | 6.20e-13  1.53e-13  5.87e-14 |
 G11  |   288     0     2    75    0.02   | 6.35e-13  7.88e-14  5.40e-14 |
 G29  |   288     0     0   288    0.01   | 4.21e-13  1.31e-13  1.39e-13 |
 G17  |   288     0     0   288    0.01   | 8.95e-13  2.92e-13  1.15e-13 |
 SYOG |   288     0     0   288    0.01   | 7.37e-13  1.82e-13  5.46e-14 |
 BAHR |   288     0     0   288    0.01   | 3.41e-13  1.27e-13  2.71e-14 |
 TSKB |   288     0     0   288    0.01   | 9.29e-13  3.39e-13  9.56e-14 |
 GMAS |   288     0     0   288    0.01   | 1.11e-12  3.03e-13  9.21e-14 |
 KERG |   288     0     0   288    0.00   | 1.25e-12  3.38e-13  1.42e-13 |
 TNML |   288     0     0   143    0.00   | 3.92e-13  1.16e-13  8.92e-14 |
 G20  |   288     0     6    10    0.00   | 7.46e-13  8.34e-14  1.60e-14 |
 G09  |   288     0     0   288    0.00   | 1.25e-12  4.33e-13  1.70e-13 |
 G25  |   288     0     0   288    0.00   | 1.43e-12  3.60e-13  2.17e-13 |
 KOUR |   288     0     0   288    0.00   | 1.45e-12  3.54e-13  1.26e-13 |
 PRDS |   288     0     0   288    0.00   | 1.55e-12  4.37e-13  1.24e-13 |
 G08  |   288     0     0   288    0.00   | 1.29e-12  4.81e-13  2.20e-13 |
 G10  |   288     0     0   288    0.00   | 1.31e-12  3.63e-13  2.39e-13 |
 G03  |   288     0     0   288    0.00   | 1.28e-12  3.71e-13  3.55e-13 |
 G24  |   288     0     0   288    0.00   | 1.19e-12  5.08e-13  2.32e-13 |
 GPST |   288     0     0     0    0.00   | 1.91e-14  3.81e-15  1.05e-15 |
 CEDU |   155     0     0     0    0.00   |        -         -         - |
 OUS2 |   232     0     0     0    0.00   |        -         -         - |
 KIT3 |   272     1     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     2     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 JAB1 |   264     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BREW |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.72e-13  6.99e-14  3.28e-14 |
 G22  |   288     0     5     0    0.00   | 1.24e-12  1.45e-13  4.03e-14 |
 G21  |   288     0     6     0    0.00   | 9.01e-13  1.07e-13  2.41e-14 |
 G19  |   288     0     5     0    0.00   | 5.75e-13  5.93e-14  2.73e-14 |
 G18  |   288     0     6     0    0.00   | 1.12e-12  1.06e-13  3.41e-14 |
 G15  |   287     0     0     0    0.00   | 1.56e-12  5.29e-13  2.90e-13 |
 G14  |   288     0     6     0    0.00   | 5.16e-13  6.21e-14  1.90e-14 |
 G13  |   288     0     6     0    0.00   | 4.92e-13  6.23e-14  1.56e-14 |
 G05  |   288     0     0     0    0.00   | 1.37e-12  5.58e-13  2.99e-13 |
 G02  |   288     0     6     0    0.00   | 4.82e-13  5.63e-14  2.53e-14 |
 G01  |   288     1     2     0    0.00   | 2.16e-12  6.76e-13  6.64e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 YEBE |   288     0     6     0    0.00   | 1.99e-13  1.53e-14  1.58e-14 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WROC |   204     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   249     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 3.97e-13  2.29e-13  3.28e-13 |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   281     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   287     0     0     0    0.00   |        -         -         - |
 PIMO |   266     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 2.05e-12  5.46e-13  1.59e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NOUM |   280     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 7.76e-13  5.69e-13  4.33e-13 |
 MCM4 |   288     0     1     0    0.00   | 6.81e-13  4.89e-13  1.10e-12 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.87e-12  5.25e-13  1.55e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.93e-13  3.75e-13  7.05e-13 |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   | 2.09e-13  4.32e-13  4.14e-13 |
 DARW |   288     1     0     0    0.00   |        -         -         - |
 DAKA |   287     0     0     0    0.00   |        -         -         - |
 COCO |   285     0     0     0    0.00   | 4.50e-13  6.29e-13  9.32e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   275     0     0     0    0.00   |        -         -         - |
 ASPA |   273     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.34e-17  4.00e-16  2.40e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      ALGO      USN3 |
------------------------------------------+------------------------------+
