
 GPS week: 1312   Day: 5   MJD: 53433                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.01     0.00     2.61     0.00      0
 cod |   288     0  25486     57    -0.02     0.01     0.04    27.20      0
 emr |   288     0  24315     14   -10.86    -0.33     0.05    25.31      0
 esa |   288     0  18251    699  1282.50    56.05     0.07    14.60      0
 iga |    96     0   2784      3     0.00     0.00     0.10     0.00      0
 igu |    96     0   2784      0     0.01     0.00     2.71     0.00      0
 jpl |   288     0  17765    107    -0.40    -0.41     0.08    12.76      0
 ngs |    96     0   2784      0     0.00     0.03     2.40     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34194   3207  1282.88    56.04     0.06    20.13      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4030   -71    -7   258   117 -5482   -86 -4886     -   -28 |
    2 |  -388    90   -37  -232  -105  -520   210  -436     -   -31 |
    3 | -1890   -75    36    23   -47 -1196    -4    -7     -    42 |
    4 | -1738     0    57   -91   -66  1949    69  -940     -   -50 |
    5 | -6885   -45    34   176   -31  -563    59 -5995     -  -143 |
    6 | -4321    79     7    95  -149 -7612   -20 -5671     -  -173 |
    7 |  -635    21    49   -64   -38  1124    60   184     -   -81 |
    8 |  1473   -71    10   208   -42  6413    57  1825     -  -102 |
    9 | -4251    35   -15   -72  -188-10272    63 -3928     -   -16 |
   10 |  2215   -33   187    31  -183  9861    35 -3316     -  -230 |
   11 |  3205   112  -155   -92   171  -302   125  3549     -    30 |
   13 |  2165    91  -165   168  -153  -114   104  -564     -  -104 |
   14 |  1335    32   -36    26     3  1219    16  1734     -   -27 |
   15 | -1083  -125    86   128    85  5144   -47-13567     -    -2 |
   16 |  4473   -26    34  -156  -149  1416   131  3990     -    25 |
   18 |  4146    64   -37   -49   -72   925    72  4568     -   -50 |
   19 |  2757   161  -359    82  1764  1936   165  3031     -    70 |
   20 |  4181    21   -95   153   229  -241   159  6632     -  -120 |
   21 |  2237    82   -96   -11    62   -72   119  3497     -   -58 |
   22 |   619    33   -81   -64  -117  3210    87  3747     -    48 |
   23 | -1247   152  -237    41   -53   368    23 -8596     -    49 |
   24 |   239  -124    81     9   -63  1837    35  4697     -    37 |
   25 | -2057   -15   -29   -61  -214 -7138   118  -127     -    28 |
   26 | -2065    67    62   -98  -190 -1756    31 -1553     -  -117 |
   27 | -3766   -93   -26   266  -144   -67   123 -2590     -  -112 |
   28 |  2182    86   -35  -242   -22  7909   184  3951     -   -17 |
   29 | -3579    53   -20   109  -154  1954    65 -3397     -  -167 |
   30 |  5880    26    24   -43  -119 -7443   130 12328     -  -117 |
   31 |   830    74  -126   233   -74 -2485    86  1841     -  -157 |
 -----+-------------------------------------------------------------+
 ALBH |     -    40   -53     -     -     -   -47     -     -    42 |
 ALGO |     -     -     -   250     -     -     -     -     -  -182 |
 AMC2 |     -  -110   143     -     -     -  -221     -     -   109 |
 ARTU |     -    26     -    70     -     -  -135     -     -     X |
 ASPA |     -     -     -     -     -     -   -56     -     -    35 |
 AUCK |     -    21     -     X     -     -     -     -     -   -28 |
 BAHR |     -     2    41     -     -     -     -     -     -   -54 |
 BAN2 |     -     -   -51     -     -     -  -216     -     -   201 |
 BILI |     -     8     -     -     -     -   -16     -     -     X |
 BOGT |     -    40     -    39     -     -   -92     -     -   -24 |
 BOR1 |     -   -47    52     -     -     -     -     -     -   -17 |
 BREW |     -     -   -45     -     -     -     -     -     -    56 |
 BRUS |     -  -131   101     -     -     -  -127     -     -   131 |
 CAGZ |     -    43     -     -     -     -     -     -     -   -58 |
 CAS1 |     -   -39     -   102     -     -     -     -     -   -22 |
 CEDU |     -     -     -  -355     -     -     -     -     -   258 |
 CHUR |     -    33   -32     -     -     -     -     -     -    -4 |
 COCO |     -   -77     -   164     -     -     -     -     -   -15 |
 DAEJ |     -     -   103     -     -     -     -     -     -  -129 |
 DAKA |     -    58     -     -     -     -  -124     -     -     - |
 DGAR |     -     -     -     -     -     -    20     -     -   -13 |
 DWH1 |     -    17    28     -     -     -     -     -     -   -58 |
 FAIR |     -   -37    45   -25     -     -    18     -     -     - |
 FORT |     -     -    -1   -73     -     -    86     -     -     X |
 GLPS |     -     3     -     -     -     -    -7     -     -     X |
 GODE |     -     -   110  -133     -     -     -     -     -   -41 |
 GOLD |     -    47     -   -78     -     -   -11     -     -     X |
 HERS |     -     -  -126     -     -     -     -     -     -   158 |
 HOB2 |     -   -30    -7     -     -     -     -     -     -    49 |
 HOLM |     -    82     -     -     -     -  -174     -     -     - |
 HRAO |     -     -     -     -     -     -    -3     -     -     2 |
 IENG |     -   -62    66     -     -     -     -     -     -     - |
 IISC |     -   -64     -   119     -     -     -     -     -     - |
 IRKT |     -     -    99  -172     -     -     -     -     -     - |
 JPLM |     -     -   -26     -     -     -     -     -     -    33 |
 KERG |     -     -   189  -185     -     -   -30     -     -   -85 |
 KGN0 |     -    40   -50     -     -     -     -     -     -     8 |
 KIRU |     -   -43     -    71     -     -   -76     -     -    54 |
 KIT3 |     -     -     -   -16     -     -  -149     -     -   106 |
 KOKB |     -   -77    58     -     -     -     -     -     -    31 |
 KOSG |     -    -7     -     -     -     -     -     -     -    10 |
 KOUR |     -    -6     -  -127     -     -     -     -     -    99 |
 LHAS |     -   -90     -     -     -     -     -     -     -   121 |
 LPGS |     -    49    27   -64     -     -     -     -     -   -58 |
 MAC1 |     -    30     -  -225     -     -     -     -     -   123 |
 MAD2 |     -     -    13     -     -     -     -     -     -   -17 |
 MAS1 |     -     -    -5     5     -     -   -26     -     -    18 |
 MATE |     -     -     -    -4     -     -     -     -     -     3 |
 MAW1 |     -   120     -     -     -     -     -     -     -  -162 |
 MBAR |     -   -24     -     -     -     -   -34     -     -    53 |
 MCM4 |     -   254  -273     -     -     -     -     -     -     - |
 MDO1 |     -   100  -128     -     -     -     -     -     -    26 |
 MEDI |     -     -   -70     -     -     -     -     -     -    88 |
 METS |     -   -99    44     -     -     -     -     -     -    79 |
 MIZU |     -     -   -31     X     -     -     -     -     -    39 |
 MKEA |     -     -     -   -54     -     -    62     -     -     X |
 NLIB |     -     -    44     -     -     -    22     -     -   -73 |
 NNOR |     -     -  -123    29     -     -     -     -     -   133 |
 NPLD |     -  -206    65     -     -     -     -     -     -   197 |
 NRC1 |     -     -    22     -     -     -     -     -     -   -28 |
 NRIL |     -     7     -     -     -     -   -15     -     -     X |
 NSSP |     -   -86     -     -     -     -     -     -     -   116 |
 NYA1 |     -     4     -     -     -     -     -     -     -    -6 |
 ONSA |     -     -     9   -16     -     -     -     -     -     X |
 PERT |     -     -   -32    28     -     -    62     -     -   -20 |
 PIE1 |     -     -    66    24     -     -  -226     -     -    54 |
 PIMO |     -     -     -    30     -     -     -     -     -   -22 |
 PRDS |     -   -89   -13     -     -     -     -     -     -   137 |
 PTBB |     -   -26     7     -     -     -     -     -     -    27 |
 RABT |     -    61     -     -     -     -  -129     -     -     X |
 RBAY |     -   -46     -     -     -     -     -     -     -    62 |
 REYK |     -   -47     -     -     -     -     -     -     -    63 |
 RIOG |     -     0   -14     -     -     -     -     -     -    18 |
 SCH2 |     -     -    11     -     -     -  -142     -     -    76 |
 SCUB |     -    68     -     -     -     -  -144     -     -     - |
 SHAO |     -     -     -     -     -     -  -106     -     -    67 |
 SPT0 |     -  -196   100     -     -     -     -     -     -   138 |
 STJO |     -     -     2     -     -     -    -3     -     -     X |
 STR1 |     -     -   -21     -     -     -     -     -     -    27 |
 SUTH |     -   -40     -     -     -     -     -     -     -    53 |
 THU3 |     -    18   169     -     -     -     -     -     -  -236 |
 TIDB |     -     -   107  -280     -     -     -     -     -    69 |
 TLSE |     -     -   -37     -     -     -     -     -     -    47 |
 TOW2 |     -    47     -     -     -     -     -     -     -   -64 |
 TRO1 |     -    42     -     -     -     -     -     -     -   -57 |
 TSKB |     -  -106    24    83     -     -     -     -     -    54 |
 TWTF |     -   -78   -40     -     -     -     -     -     -   157 |
 UNSA |     -     -     -   209     -     -     -     -     -  -152 |
 USN3 |     -    28     -     -     -     -    -3     -     -   -36 |
 USNO |     -    25   -18     -     -     -     -     -     -   -11 |
 USUD |     -     -    40    12     -     -   -93     -     -     X |
 VILL |     -     -     -   -99     -     -     -     -     -    72 |
 WHIT |     -     1     -     -     -     -     -     -     -    -1 |
 WILL |     -  -113    81     -     -     -     -     -     -    50 |
 WTZR |     -    -9   188   -55     -     -     -     -     -  -185 |
 WUHN |     -     -    -9     -     -     -     -     -     -    12 |
 YAR2 |     -   -27    24     -     -     -     -     -     -     6 |
 YEBE |     -     -   -34     -     -     -     -     -     -    42 |
 YELL |     -    84    58   -96     -     -     -     -     -  -117 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5684    55    43    72    24  5429    87  4758     -    72 |  288   3.88
    2 |   806    62    41    62    62   570   101  1153     -    79 |  288   0.45
    3 |  3598    61    51    35    52  1703   109  2672     -    72 |  288   1.43
    4 |   948    28    81    60    48  1544    99   586     -    67 |  288   0.46
    5 |  4849   133    77   105   179  2687   107  5025     -   115 |  288   3.29
    6 |   751    47    40    44    49  4510    69  2077     -    71 |  288   1.17
    7 |  1146    28    35   128    73   804    73  1001     -    65 |  288   0.89
    8 |  1964    43    52    49    67  3574    45  2327     -    96 |  288   1.84
    9 |  6514    49    63    72    47  5540    86  4012     -    66 |  288   2.57
   10 |  2721   101    72   115   216  5588   124  3030     -    73 |  288   1.86
   11 |   448    36    52   108   118   492    73  1021     -    58 |  288   0.32
   13 |   321    56    66    89    58   379    38  1260     -   103 |  288   0.23
   14 |   823    82    45    50    52   738   158   491     -    87 |  288   0.22
   15 |  6284    28    29    31    64  4704    53  4233     -    65 |  288   3.91
   16 |   552    51    61    54   104  1089    87   574     -   100 |  288   0.34
   18 |   719    75    37    59    74   814   125  1014     -   101 |  288   0.40
   19 |   414    54    49    56   126   664    59   989     -    77 |  288   0.19
   20 |   533    46    47    42    81   395   122  1125     -    48 |  288   0.37
   21 |   612    38    43    68    36   422    72   513     -    64 |  288   0.30
   22 |  1315    70    49    53   110  2016    99  2241     -    74 |  288   0.68
   23 |   527    55    99    65    81   354    85  2305     -    70 |  288   0.27
   24 |  2979    35   119    30   110  1745   110  2911     -    72 |  288   1.60
   25 |  2099    45    63    59    70  3966   118  1774     -    85 |  288   1.23
   26 |  1226    40    64    67    87   684   140  1072     -    74 |  288   0.39
   27 |   769    40    54    53    61   371    43   751     -    67 |  288   0.80
   28 |  1177    51    74   138   161  3726   103   727     -   107 |  288   0.89
   29 |  1304    52    77    48    82  1040   111   720     -    83 |  288   0.50
   30 |  3172   132    83   101   225  3300   114  4978     -    73 |  288   0.49
   31 |  1225    45    34   106    78  1414   120  1226     -   121 |  288   0.47
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    21    17     -     -     -    31     -     -    20 |  288   0.05
 ALGO |     -     -     -    10     -     -     -     -     -     7 |  288   0.03
 AMC2 |     -    26    37     -     -     -    29     -     -    76 |  288   0.03
 ARTU |     -    18     -    24     -     -    18     -     -     X |  288  10.92
 ASPA |     -     -     -     -     -     -    71     -     -    45 |  272    >>>
 AUCK |     -    45     -     X     -     -     -     -     -    61 |  264   7.41
 BAHR |     -    49    65     -     -     -     -     -     -    62 |  288   0.41
 BAN2 |     -     -    45     -     -     -    32     -     -    57 |  287  17.94
 BILI |     -    25     -     -     -     -    53     -     -     X |  287   6.04
 BOGT |     -    68     -    42     -     -    52     -     -    87 |  288  14.48
 BOR1 |     -    72    71     -     -     -     -     -     -    65 |  286  24.05
 BREW |     -     -     9     -     -     -     -     -     -    12 |  288   0.06
 BRUS |     -    14    12     -     -     -    25     -     -    11 |  288   0.04
 CAGZ |     -    17     -     -     -     -     -     -     -    23 |  285   1.20
 CAS1 |     -    43     -    38     -     -     -     -     -    52 |  288   8.03
 CEDU |     -     -     -    77     -     -     -     -     -    56 |  217  11.98
 CHUR |     -    19    17     -     -     -     -     -     -    28 |  288   0.03
 COCO |     -    36     -    47     -     -     -     -     -    65 |  288  10.30
 DAEJ |     -     -    16     -     -     -     -     -     -    20 |  286    >>>
 DAKA |     -    19     -     -     -     -    41     -     -     - |  288  16.46
 DGAR |     -     -     -     -     -     -    77     -     -    49 |  288  17.45
 DWH1 |     -    27    39     -     -     -     -     -     -    25 |  288   0.41
 FAIR |     -    24    12    32     -     -    41     -     -     - |  288   5.24
 FORT |     -     -    38    80     -     -    56     -     -     X |  288   0.10
 GLPS |     -    24     -     -     -     -    52     -     -     X |  287  15.38
 GODE |     -     -    15    27     -     -     -     -     -     9 |  288   0.15
 GOLD |     -    44     -    48     -     -    52     -     -     X |  288  10.42
 HERS |     -     -    18     -     -     -     -     -     -    23 |  241  10.53
 HOB2 |     -    31    28     -     -     -     -     -     -    28 |  288   0.04
 HOLM |     -     9     -     -     -     -    19     -     -     - |  288   7.12
 HRAO |     -     -     -     -     -     -    63     -     -    40 |  288   0.56
 IENG |     -    17    18     -     -     -     -     -     -     - |  288   0.77
 IISC |     -    18     -    33     -     -     -     -     -     - |  288  22.34
 IRKT |     -     -    40    69     -     -     -     -     -     - |  288   0.24
 JPLM |     -     -    26     -     -     -     -     -     -    33 |  288   6.01
 KERG |     -     -    47    93     -     -   109     -     -    83 |  288   2.35
 KGN0 |     -    24    14     -     -     -     -     -     -    25 |  287   0.45
 KIRU |     -    14     -    29     -     -    18     -     -    17 |  288   7.72
 KIT3 |     -     -     -    26     -     -    23     -     -    13 |  288  14.06
 KOKB |     -    30    35     -     -     -     -     -     -    52 |  288   0.04
 KOSG |     -    42     -     -     -     -     -     -     -    57 |  287 104.99
 KOUR |     -    31     -    37     -     -     -     -     -    39 |  288   2.31
 LHAS |     -    23     -     -     -     -     -     -     -    31 |  288   8.12
 LPGS |     -    45    50   197     -     -     -     -     -    86 |  288  19.47
 MAC1 |     -    40     -    86     -     -     -     -     -    53 |  288  16.65
 MAD2 |     -     -    10     -     -     -     -     -     -    12 |  288   0.03
 MAS1 |     -     -    38    39     -     -    42     -     -    57 |  288   1.89
 MATE |     -     -     -    68     -     -     -     -     -    49 |  288   0.11
 MAW1 |     -    43     -     -     -     -     -     -     -    57 |  288   7.85
 MBAR |     -    71     -     -     -     -   114     -     -    74 |  288  16.29
 MCM4 |     -    19    20     -     -     -     -     -     -     - |  288  42.50
 MDO1 |     -    35    27     -     -     -     -     -     -    69 |  288  31.06
 MEDI |     -     -     9     -     -     -     -     -     -    11 |  288   0.06
 METS |     -    15    21     -     -     -     -     -     -    16 |  287   7.40
 MIZU |     -     -    12     X     -     -     -     -     -    15 |  288   0.30
 MKEA |     -     -     -    59     -     -    68     -     -     X |  288  16.66
 NLIB |     -     -    81     -     -     -   115     -     -   103 |  280    >>>
 NNOR |     -     -    55    90     -     -     -     -     -    25 |  288  13.80
 NPLD |     -    28    25     -     -     -     -     -     -    15 |  287   0.03
 NRC1 |     -     -    20     -     -     -     -     -     -    26 |  288   0.05
 NRIL |     -    17     -     -     -     -    36     -     -     X |  288   6.55
 NSSP |     -    19     -     -     -     -     -     -     -    25 |  288   8.12
 NYA1 |     -    14     -     -     -     -     -     -     -    19 |  288   0.04
 ONSA |     -     -    15    26     -     -     -     -     -     X |  288   0.04
 PERT |     -     -    75    88     -     -   139     -     -    74 |  288   2.22
 PIE1 |     -     -    47    86     -     -    79     -     -    53 |  286   2.45
 PIMO |     -     -     -   116     -     -     -     -     -    84 |  205  13.65
 PRDS |     -    20    17     -     -     -     -     -     -    25 |  288   2.66
 PTBB |     -    14    22     -     -     -     -     -     -    23 |  288   0.16
 RABT |     -    15     -     -     -     -    31     -     -     X |  288  13.87
 RBAY |     -    29     -     -     -     -     -     -     -    39 |  282  55.39
 REYK |     -    15     -     -     -     -     -     -     -    20 |  283  16.46
 RIOG |     -    49    32     -     -     -     -     -     -    72 |  264   9.66
 SCH2 |     -     -    14     -     -     -    16     -     -    14 |  288  16.96
 SCUB |     -    11     -     -     -     -    24     -     -     - |  288  10.56
 SHAO |     -     -     -     -     -     -    67     -     -    42 |  262  17.78
 SPT0 |     -    30    27     -     -     -     -     -     -    10 |  288   0.04
 STJO |     -     -     7     -     -     -    14     -     -     X |  288   0.08
 STR1 |     -     -    37     -     -     -     -     -     -    46 |  288   0.62
 SUTH |     -    14     -     -     -     -     -     -     -    18 |  288  10.01
 THU3 |     -    20    14     -     -     -     -     -     -    23 |  288   7.15
 TIDB |     -     -    40    93     -     -     -     -     -    35 |  288   0.07
 TLSE |     -     -     7     -     -     -     -     -     -     9 |  288   0.45
 TOW2 |     -    41     -     -     -     -     -     -     -    55 |  287  12.70
 TRO1 |     -    22     -     -     -     -     -     -     -    29 |  288   9.63
 TSKB |     -    21    13    72     -     -     -     -     -    56 |  288   1.69
 TWTF |     -    27    37     -     -     -     -     -     -    38 |  288   0.11
 UNSA |     -     -     -    57     -     -     -     -     -    41 |  288  15.05
 USN3 |     -    18     -     -     -     -    29     -     -    16 |  288   0.03
 USNO |     -    31    20     -     -     -     -     -     -    56 |  288   0.02
 USUD |     -     -    52    70     -     -    32     -     -     X |  288   9.42
 VILL |     -     -     -    20     -     -     -     -     -    14 |  288  11.29
 WHIT |     -    16     -     -     -     -     -     -     -    21 |  288   4.94
 WILL |     -    24    27     -     -     -     -     -     -    19 |  288 127.96
 WTZR |     -    14    25    28     -     -     -     -     -    45 |  288   0.05
 WUHN |     -     -    29     -     -     -     -     -     -    37 |  287  10.52
 YAR2 |     -    26    30     -     -     -     -     -     -    31 |  288   4.92
 YEBE |     -     -     8     -     -     -     -     -     -    11 |  288   0.09
 YELL |     -    17    12    26     -     -     -     -     -    33 |  288   0.02
 -----+-------------------------------------------------------------+--------------
 TOT  |  2613    43    45    71   102  2709    80  2397     -    57 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.95   | 3.81e-14  5.66e-15  2.64e-15 |
 AMC2 |   288     0     0   288    9.95   | 4.51e-14  9.92e-15  2.68e-15 |
 ALGO |   288     1     0   287    9.92   | 2.84e-14  5.29e-15  2.04e-15 |
 NPLD |   287     0     0   286    9.88   | 3.79e-14  8.41e-15  4.38e-15 |
 ONSA |   288     0     0   288    8.49   | 3.43e-14  7.02e-15  3.32e-15 |
 SPT0 |   288     0     0   288    7.12   | 2.88e-14  4.51e-15  2.17e-15 |
 NRC1 |   288     0     0   288    6.94   | 6.77e-14  7.90e-15  2.68e-15 |
 USNO |   288     0     0   288    4.82   | 4.34e-14  7.32e-15  1.33e-15 |
 BREW |   288     0     0   288    4.63   | 4.05e-14  9.21e-15  4.68e-15 |
 STJO |   288     0     0   288    4.42   | 3.21e-14  8.24e-15  6.24e-15 |
 USN3 |   288     0     0   288    3.51   | 6.71e-14  8.76e-15  1.87e-15 |
 MAD2 |   288     0     0   288    2.79   | 4.02e-14  6.37e-15  3.49e-15 |
 KOKB |   288     0     0   288    2.61   | 5.68e-14  1.30e-14  4.53e-15 |
 WTZR |   288     0     0   288    2.06   | 5.45e-14  9.05e-15  3.23e-15 |
 ALBH |   288     0     0   288    2.03   | 3.83e-14  9.64e-15  4.37e-15 |
 NLIB |   280     1     0   275    1.62   | 7.07e-14  1.23e-14  6.26e-15 |
 YELL |   288     1     0   287    1.16   | 2.86e-14  6.68e-15  2.01e-15 |
 MATE |   288     0     0   288    1.10   | 2.51e-13  3.48e-14  8.91e-15 |
 TWTF |   288     0     0   288    0.98   | 4.23e-14  9.37e-15  1.36e-14 |
 CHUR |   288     0     0   288    0.86   | 4.28e-14  1.56e-14  2.15e-15 |
 TIDB |   288     0     0   288    0.74   | 1.82e-13  2.49e-14  5.66e-15 |
 HOB2 |   288     0     0   288    0.72   | 4.26e-14  1.21e-14  4.01e-15 |
 FORT |   288     0     0   288    0.53   | 8.59e-14  1.76e-14  1.15e-14 |
 MEDI |   288     1     0   287    0.53   | 4.02e-14  8.15e-15  7.38e-15 |
 GODE |   288     0     0   288    0.49   | 3.33e-14  7.81e-15  1.31e-14 |
 YEBE |   288     0     0   288    0.39   | 1.17e-13  1.69e-14  6.83e-15 |
 PTBB |   288     0     0   288    0.26   | 2.51e-13  5.88e-14  1.19e-14 |
 IRKT |   288     0     0   143    0.19   | 6.07e-14  1.35e-14  1.99e-14 |
 PIE1 |   286     4     0   281    0.14   | 2.25e-13  6.92e-14  2.68e-14 |
 NYA1 |   288     0     0   288    0.13   | 2.78e-14  8.04e-15  4.00e-15 |
 G06  |   288     0     0   288    0.11   | 3.42e-13  8.10e-14  5.99e-14 |
 G31  |   288     0     0   288    0.11   | 2.15e-13  7.38e-14  5.44e-14 |
 KGN0 |   287     0     0   286    0.08   | 4.13e-13  1.01e-13  3.49e-14 |
 TLSE |   288     0     0   288    0.07   | 4.27e-13  1.11e-13  4.50e-14 |
 G30  |   288     0     0   288    0.07   | 3.02e-13  1.23e-13  5.02e-14 |
 G29  |   288     0     0   288    0.07   | 4.08e-13  1.13e-13  6.06e-14 |
 MIZU |   288     0     0   288    0.06   | 3.85e-13  9.57e-14  3.09e-14 |
 G26  |   288     0     0   288    0.06   | 3.74e-13  1.13e-13  4.27e-14 |
 G16  |   288     0     0   288    0.05   | 4.64e-13  7.31e-14  2.65e-14 |
 BOR1 |   286     1     0   283    0.05   | 5.18e-13  1.62e-13  4.44e-14 |
 G04  |   288     0     0   288    0.04   | 3.87e-13  1.35e-13  3.68e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.45e-13  1.43e-13  2.96e-14 |
 IENG |   288     0     0   288    0.04   | 5.65e-13  1.48e-13  5.12e-14 |
 BAHR |   288     0     0   288    0.04   | 4.61e-13  1.47e-13  4.14e-14 |
 G27  |   288     0     0   288    0.03   | 3.43e-13  9.19e-14  1.06e-13 |
 STR1 |   288     0     0   288    0.03   | 6.19e-13  1.97e-13  4.80e-14 |
 G07  |   288     0     0   288    0.03   | 2.72e-13  9.27e-14  1.19e-13 |
 G02  |   288     0     4    15    0.02   | 5.10e-13  6.38e-14  3.18e-14 |
 G20  |   288     0     2    48    0.01   | 6.07e-13  8.73e-14  3.49e-14 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  3.38e-13  9.35e-14 |
 TSKB |   288     0     0   288    0.01   | 9.67e-13  2.95e-13  1.35e-13 |
 G25  |   288     0     0   288    0.01   | 1.39e-12  4.40e-13  1.24e-13 |
 KERG |   288     0     0   288    0.01   | 1.22e-12  4.47e-13  2.52e-13 |
 G09  |   288     0     0   288    0.01   | 1.30e-12  4.41e-13  2.74e-13 |
 KOUR |   288     0     0   288    0.00   | 1.39e-12  3.74e-13  2.69e-13 |
 G24  |   288     0     0   288    0.00   | 1.32e-12  5.28e-13  1.77e-13 |
 G15  |   288     0     0   288    0.00   | 1.54e-12  5.13e-13  2.73e-13 |
 PRDS |   288     0     0   288    0.00   | 1.45e-12  4.47e-13  1.87e-13 |
 G05  |   288     0     0   288    0.00   | 1.48e-12  4.37e-13  3.48e-13 |
 CAGZ |   285     0     0   139    0.00   | 9.76e-13  2.65e-13  1.10e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.82e-12  6.19e-13  1.51e-13 |
 HRAO |   288     0     0   288    0.00   | 2.14e-13  3.52e-14  5.97e-14 |
 GPST |   288     0     0     0    0.00   | 1.81e-14  3.53e-15  1.02e-15 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 GLPS |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   286     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     2     0    0.00   | 7.75e-13  1.00e-13  8.16e-14 |
 G23  |   288     0     5     0    0.00   | 5.88e-13  5.73e-14  2.15e-14 |
 G22  |   288     0     0     0    0.00   |        -         -         - |
 G21  |   288     0     6     0    0.00   | 1.01e-12  1.20e-13  2.65e-14 |
 G19  |   288     1     6     0    0.00   | 5.59e-13  8.55e-14  2.89e-14 |
 G18  |   288     0     6     0    0.00   | 1.13e-12  1.16e-13  3.67e-14 |
 G14  |   288     0     5     0    0.00   | 7.04e-13  8.00e-14  1.72e-14 |
 G13  |   288     0     2     0    0.00   | 5.21e-13  6.33e-14  2.02e-14 |
 G11  |   288     0     5     0    0.00   | 6.94e-13  7.30e-14  3.45e-14 |
 G10  |   288     0     0     0    0.00   | 1.24e-12  4.78e-13  1.86e-13 |
 G08  |   288     0     0     0    0.00   | 1.43e-12  4.76e-13  1.78e-13 |
 G01  |   288     0     0     0    0.00   | 1.54e-12  6.73e-13  4.41e-13 |
 YAR2 |   288     0     2     0    0.00   | 9.22e-13  1.46e-12  5.37e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.94e-13  4.14e-13  3.31e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   287     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SHAO |   262     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     3     0    0.00   | 6.33e-13  9.68e-13  1.76e-12 |
 RIOG |   264     0     0     0    0.00   |        -         -         - |
 REYK |   283     1     0     0    0.00   |        -         -         - |
 RBAY |   282     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   205     1     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.85e-12  4.69e-13  2.66e-13 |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   287     0     2     0    0.00   | 8.07e-13  1.14e-12  6.15e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.79e-13  2.61e-13  4.87e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   | 6.26e-13  2.93e-13  3.29e-13 |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.54e-13  1.00e-12  9.64e-13 |
 CEDU |   217     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   287     0     0     0    0.00   |        -         -         - |
 ASPA |   272     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.36e-17  2.84e-16  1.70e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      SPT0      USNO |
------------------------------------------+------------------------------+
