
 GPS week: 1354   Day: 1   MJD: 53723                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  33387    122     0.35    -0.74     0.05    14.41      0
 emr |   288     0  25465     84   -47.79    -3.23     0.07     8.23      0
 esa |   288     0  20443    535 -2147.14    -8.45     0.07     8.36      0
 gfz |   288     0  31274    861     0.32    -0.94     0.04    21.25      0
 igr |   288     0  32793     11     4.54    -2.04     0.04     0.00      0
 jpl |   288     0  26106   8593    -1.60    -1.73     0.03    24.35      0
 mit |   288     0  35989   1838     4.01   -14.91     0.03    23.40      0
 ngs |    96     0   2770     20     0.25    -1.15     2.50     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   156    -9   -58    85    71     X  -149 -1939     - |
    2 |    -2   -37   -96   119    47     X   -56 -2107     - |
    3 |  -126  -117   190    44   -18     X    11 -1422     - |
    4 |   123  -211   115   -45    52     X    -6   238     - |
    5 |   -40   -23   136    53    19     X   -64  -397     - |
    6 |   -81  -206    77    27   -59     X    71   132     - |
    7 |   -37   -31   188    28    32     X   -72 -1127     - |
    8 |    93  -223   119    50    17     X   -67 -5681     - |
    9 |   191  -184    58   -83    37     X     X -8108     - |
   10 |    11    19    61    73    37     X  -102  -672     - |
   11 |   117  -156   -66    35    -9     X   -25  4352     - |
   13 |   268  -239   107    27    42     X  -144  2953     - |
   14 |   126    35   -76   126    17     X  -177  4790     - |
   15 |  -147     7   107    31    18     X    28 -2396     - |
   16 |   -96  -135    20    24   -34     X    78  3755     - |
   17 |    92  -208   136   130    19     X  -150 -1412     - |
   18 |   -84   -72    32    85   -46     X   -11  3340     - |
   19 |   -49   -65  -105   259    -2     X  -145   -92     - |
   20 |    99   -46   -80    90    55     X   -98  3500     - |
   21 |   -15   -36    78    97    -4     X   -90  3320     - |
   22 |   -22    34     9   205    81     X  -188 -2400     - |
   23 |   187    10   -36   150   154     X  -242  -628     - |
   24 |    15  -143   129    11   -22     X   -20 -3978     - |
   25 |    84  -132   124    42     3     X   -87  3896     - |
   26 |   149  -176    89    13    50     X   -73 -1872     - |
   27 |    47  -135   127    73    90     X   -87  1340     - |
   28 |   107  -152   -49   144   168     X  -125  5305     - |
   29 |   167  -191   138    -6    12     X   -72 -2790     - |
   30 |    19  -176   182   -29   -12     X    12 -2795     - |
 -----+-------------------------------------------------------+
 ALBH |    38   -34     -     -    11  -125   115     -     - |
 ALGO |  -222    36    87  -172    31   303   -52     -     - |
 ALIC |    58     -     -     -     -     -   -36     -     - |
 ALRT |   -69     -     -    46   133     -     1     -     - |
 AMC2 |  -109   160     -     -   -90   119  -109     -     - |
 AREQ |     -     3     -    54   -18   -49     X     -     - |
 ARTU |     -     -   101    13    28   -47     -     -     - |
 ASPA |     -     -     -   159     -  -139     -     -     - |
 AUCK |    56     -     -     -   158   -33     -     -     - |
 BAHR |  -115   -24     -     2   -11    33    44     -     - |
 BILI |     -     -     -     X     -  -377   392     -     - |
 BJFS |    83     -     -    18     -     -   -68     -     - |
 BOGT |   123     -     -    75   -73  -117   -25     -     - |
 BOR1 |  -250  -320     -     -  -279     -   279     -     - |
 BREW |     -    91     -     -     -     -   -32     -     - |
 BRFT |   153     -     -  -104   -92     -     -     -     - |
 BRMU |     -     -     -   149     -  -130     -     -     - |
 BRUS |  -287  -238     -     -  -202     -   271     -     - |
 CAS1 |   -97     -   148   -57   -56   111   -54     -     - |
 CEDU |     -     -  -207     -  -267    58    15     -     - |
 CHAT |    23     -     -   -64  -105    75   -32     -     - |
 CHUR |   -27     7     -     -     3     -    14     -     - |
 COCO |  -183     -  -107   -73  -138    85   132     -     - |
 CRO1 |    19   -58    29     -   -10    20   -22     -     - |
 DAEJ |    98  -100     -     -     9     -   -26     -     - |
 DAV1 |     -     -     -  -635     -     -   577     -     - |
 DGAR |  -216     -     4    75   -40   -43   107     -     - |
 DRAO |   -67    39   117  -106   -34     -    82     -     - |
 FAIR |     2   -15     -     2     4     2     X     -     - |
 GLPS |     -     -   -50  -117     -     -   129     -     - |
 GMAS |     -   124     -     -   105     -   -43     -     - |
 GODE |    28   -48   -15     -  -152     -     5     -     - |
 GOLD |    13     -    61   -32   147     -     -     -     - |
 GOUG |     -     -     -   110     -   -96     -     -     - |
 GUAM |   -14     -  -184    83  -244     -    -1     -     - |
 HARB |   139     -     -   -62   -43     -   -29     -     - |
 HERS |     7    47     -     -     -     -   -15     -     - |
 HNLC |     -     -     -     -     -   -27    28     -     - |
 HOB2 |   -33   253  -110  -169   -15   139   -17     -     - |
 HRAO |     -     -   -54     -   -37    36   -17     -     - |
 HYDE |    61     -     -     -     -     -   -38     -     - |
 IENG |   -49    87     -     -     -     -     -     -     - |
 IISC |    41     -   -48  -116   -52    95     1     -     - |
 INVK |    13     -     -    -9   108     -     -     -     - |
 IRKT |     -   166  -171  -203     -   141    44     -     - |
 ISPA |     -     -    34     1   -90   -13     -     -     - |
 JAB1 |     -     -     -     -     -   -52    54     -     - |
 JPLM |     -   111     -  -156  -130     -   102     -     - |
 KGN0 |    29    53     -     -   -47   -36     -     -     - |
 KHAJ |     -  -104     -     -     -   -88   125     -     - |
 KIRU |     -     -  -717     -     -     -   256     -     - |
 KIT3 |     -     -    -9   123    97  -109     3     -     - |
 KOUR |     -     -   140  -159   -14   136   -44     -     - |
 LHAS |     -     -     -   -91     -    80     X     -     - |
 LPGS |     3  -121  -220   -21  -260   103   -17     -     - |
 MAC1 |    99     -     X   147   159   -48  -146     -     - |
 MALI |     -     -   -38    42     -     -   -25     -     - |
 MAS1 |     -    81  -136  -218     -   -41   298     -     - |
 MATE |     -     -   177   -90    26     -    17     -     - |
 MAW1 |    68     -   -20     -   -27    91  -127     -     - |
 MBAR |    38     -     -   -78   -33    47     -     -     - |
 MCM4 |   340   -85   111     X   611   -41  -173     -     - |
 MDO1 |   180   235     -  -213    12     -     -     -     - |
 MDVJ |  -112     -     -     -     -     -    69     -     - |
 MIZU |    26     7     -   -21   -53     -     -     -     - |
 MKEA |   -23     -  -134     -  -131     -    60     -     - |
 MSKU |   -70     -     -    14   -22     -    30     -     - |
 NISU |    27    69     -   -45     -     -     -     -     - |
 NKLG |     -     -     -    24    67   -21     X     -     - |
 NLIB |   -97   295     -   -38    85     -    -9     -     - |
 NNOR |     -    37   -11     -    21     -    -9     -     - |
 NOT1 |  -196     -     -     -  -261  -187   311     -     - |
 NOUM |     -     -     -   183     -  -160     -     -     - |
 NPLD |   -62   109     -     -     -     -     -     -     - |
 NRC1 |   -54   141     -   -85    39     -    61     -     - |
 NRIL |    -4     -     -    -2    37     4     -     -     - |
 NTUS |   -89     -     -    71   -48    82   -93     -     - |
 NYA1 |   118     -     -   -96     -  -105   120     -     - |
 NYAL |     -  -115     -     -     -     -    40     -     - |
 OHI2 |  -175     -  -234   -48    -3   332  -106     -     - |
 ONSA |   -15   -32     -   -86   -63   -21   120     -     - |
 OPMT |    49    75     -   -63     -     -     -     -     - |
 PDEL |    -2     -   -87    44    49   -16     -     -     - |
 PERT |     -   456   118     -   189   365  -570     -     - |
 PETP |   -71     -     -    48    -6     -     -     -     - |
 PIE1 |   -55   193  -103     -  -209     -     X     -     - |
 PIMO |   -38     -  -288   200    88   -91    37     -     - |
 POTS |     -     -  -266   105     1     -     -     -     - |
 PRDS |    18    94     -     -    51     -   -44     -     - |
 PTBB |    36     4     -     -    19     -   -23     -     - |
 QAQ1 |     -   246     -   137     -  -208     -     -     - |
 RABT |    28     -     -     -     -   -16     -     -     - |
 RAMO |   -37     -     -     -     -   181  -161     -     - |
 RESO |    46     -     -   -31     -     -     -     -     - |
 REYK |    22     -     -   -15     -     -     -     -     - |
 RIOG |    60    10   -55    -2    49   -19     X     -     - |
 SANT |     1     -   193   -68    27   -18    11     -     - |
 SCH2 |  -139    66     -     -    69    52    10     -     - |
 SCUB |   -43     -     -  -191  -201  -139   355     -     - |
 SFER |  -176     -     -     -     -     -   109     -     - |
 SPT0 |   -39     -     -     -     -     -    24     -     - |
 STJO |   -21     6     -   -86   -10    59    29     -     - |
 STR1 |     -   145     -     -     -     -   -51     -     - |
 SUTH |   -34     -     -     -   -68     -    21     -     - |
 SUTM |     -   127     -   -44   -64     -    -5     -     - |
 SUWN |  -150     -     -     -     -    89     -     -     - |
 SYOG |    81   100     -  -157     -     -    58     -     - |
 THTI |     -   123  -186   -39   -13    12    47     -     - |
 THU3 |   -79     -     -   134   -64   -73     -     -     - |
 TIDB |   -85   102    51     -     7     -    -4     -     - |
 TIXI |     -     -     -   -18     -   -27    43     -     - |
 TNML |     -    -1     -     -     -     -     0     -     - |
 TOW2 |   -43     -   -25   -66   -28    68    27     -     - |
 TRO1 |   165     -     -   -40     -     -   -65     -     - |
 TSKB |   -50     6     4     6   -82    18     4     -     - |
 TWTF |    32    62     -   -72   -73     -    24     -     - |
 UNSA |     -     -    41    90    42     -   -96     -     - |
 USN3 |    -7    12     -     -    58     -     -     -     - |
 USNO |    32    61     -     -   113     -   -41     -     - |
 USUD |     -   -80   -33     -    19     -    40     -     - |
 VILL |     -     -  -128   -98   -38     -   134     -     - |
 WES2 |     -    43     -     X     -     -   -15     -     - |
 WHIT |     3     -     -     -   109     -    -2     -     - |
 WILL |   -80    15     -     -   -39     -    44     -     - |
 WSRT |     2    -4     -  -128    95     -   117     -     - |
 WTZR |   -81    77     -    26    48     -     -     -     - |
 WUHN |     -    -8     -    34    11    38   -67     -     - |
 YAR2 |    51   174     -  -102    17     -     -     -     - |
 YELL |   -28   -25    72    49     7   -43     0     -     - |
 YSSK |     -     -     -   358     -     -  -325     -     - |
 ZWE2 |    25     -     -   -17     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    53   100    52    16    29     X    21  4953     - |  288   3.26
    2 |    57   121    49    13    24     X    24   488     - |  288   0.17
    3 |    29   127    60    49    47     X    39  1342     - |  288   1.24
    4 |   139   115    73    56    48     X    45  2092     - |  288   1.02
    5 |    28    97    35    18    55     X    16   885     - |  288   1.51
    6 |    28    99    26    14    34     X    14  1564     - |  288   0.92
    7 |    38   107    53    16    26     X    40  2544     - |  288   0.80
    8 |    46    79    51    43    48     X    36  5187     - |  288   2.35
    9 |    89   151    84    84    47     X     X  6363     - |  246    >>>
   10 |    47   113    98    20    51     X    30  2074     - |  288   2.01
   11 |    39   125    33    27    27     X    52   721     - |  288   0.38
   13 |    50   113    28    19    55     X    29   435     - |  288   0.27
   14 |    46   113    50    15    25     X    38  1405     - |  288   0.37
   15 |   128    80   112    63    90     X    55  4043     - |  288   2.72
   16 |    24   108    82    32    35     X    24   466     - |  288   0.24
   17 |    38    99    72    27    59     X    33  1348     - |  288   0.26
   18 |    41   104    99    21    27     X    19   624     - |  288   0.29
   19 |    74   134    85    22    72     X    99   932     - |  288   0.20
   20 |    59   100    75    20    17     X    26   599     - |  288   0.20
   21 |    62   136    40    17    35     X    30   527     - |  288   0.34
   22 |    46   108    71    38    42     X    65  3113     - |  288   2.19
   23 |    58    97    32    16    63     X    36   381     - |  288   0.28
   24 |   110   109   131    84    71     X    39  2654     - |  288   2.60
   25 |   142   118   125    47    56     X    63  3979     - |  288   2.39
   26 |    60   145    46    17    45     X    28   985     - |  288   1.03
   27 |   145   104   177    61    49     X    73  2987     - |  288   1.86
   28 |    41   101    65    16    29     X    35  3743     - |  288   0.39
   29 |   156   135    46    34    54     X    37  1004     - |  288   0.52
   30 |    27    94    47    23    68     X    17  1343     - |  288   0.57
 -----+-------------------------------------------------------+--------------
 ALBH |    67    16     -     -    28    16    38     -     - |  287   0.05
 ALGO |    22    13    40    11    21    15    18     -     - |  287   0.04
 ALIC |    22     -     -     -     -     -    14     -     - |  288  11.93
 ALRT |    21     -     -    16    15     -    17     -     - |  288   5.65
 AMC2 |    26    15     -     -    16    14    11     -     - |  288   0.02
 AREQ |     -    69     -    77    58    88     X     -     - |  285  11.74
 ARTU |     -     -    77    50    44    41     -     -     - |  277    >>>
 ASPA |     -     -     -    36     -    32     -     -     - |  282    >>>
 AUCK |    27     -     -     -    76    16     -     -     - |  285    >>>
 BAHR |    41    20     -    31    18    20    35     -     - |  288   0.40
 BILI |     -     -     -     X     -    16    17     -     - |  275  19.26
 BJFS |    16     -     -    16     -     -    14     -     - |  287  10.56
 BOGT |    28     -     -    16    24    20    15     -     - |  288  10.22
 BOR1 |    40    25     -     -    66     -    29     -     - |  288   0.84
 BREW |     -    23     -     -     -     -     8     -     - |  288   0.03
 BRFT |    33     -     -    22    27     -     -     -     - |  288   0.06
 BRMU |     -     -     -    30     -    26     -     -     - |  282    >>>
 BRUS |    28    27     -     -    58     -    18     -     - |  288   0.03
 CAS1 |    24     -    38    17    28    10    15     -     - |  288   6.59
 CEDU |     -     -    30     -    22    17    12     -     - |  288   0.57
 CHAT |    30     -     -    27    44    18    26     -     - |  287  11.99
 CHUR |    43    14     -     -    35     -    24     -     - |  288   0.06
 COCO |    36     -    63    26    18    19    20     -     - |  288  16.41
 CRO1 |    41    17    52     -    10    23    23     -     - |  288   0.18
 DAEJ |    18    17     -     -    55     -     7     -     - |  288   5.78
 DAV1 |     -     -     -    17     -     -    15     -     - |  263  11.93
 DGAR |    33     -    74    44    25    41    39     -     - |  287  14.06
 DRAO |    81    20    59    22    26     -    31     -     - |  288   0.03
 FAIR |    27    19     -    46    17    48     X     -     - |  284   0.02
 GLPS |     -     -   132    65     -     -    55     -     - |  239  17.68
 GMAS |     -    40     -     -    28     -    14     -     - |  288   2.04
 GODE |    54    25    46     -    28     -    30     -     - |  288   0.10
 GOLD |    52     -    77    18    26     -     -     -     - |  288  12.05
 GOUG |     -     -     -    74     -    65     -     -     - |  285    >>>
 GUAM |    56     -    50    36    24     -    48     -     - |  288  16.13
 HARB |    33     -     -    33    13     -    37     -     - |  287  29.06
 HERS |    18   108     -     -     -     -    25     -     - |  264   8.91
 HNLC |     -     -     -     -     -    22    23     -     - |  285  16.74
 HOB2 |    25    30    44    31    38    16    18     -     - |  288   0.07
 HRAO |     -     -    65     -    45    23    15     -     - |  288   0.60
 HYDE |    25     -     -     -     -     -    16     -     - |  288  13.31
 IENG |    25    44     -     -     -     -     -     -     - |  276   0.38
 IISC |    29     -    33    23    22    12    23     -     - |  288  18.25
 INVK |    27     -     -    18    24     -     -     -     - |  288   7.87
 IRKT |     -    17    29    24     -    20    19     -     - |  288   0.09
 ISPA |     -     -    78    55    34    32     -     -     - |  288  11.77
 JAB1 |     -     -     -     -     -    33    34     -     - |  258  17.50
 JPLM |     -    43     -    22    16     -    13     -     - |  288  21.20
 KGN0 |    32    18     -     -    49    22     -     -     - |  287   0.33
 KHAJ |     -    27     -     -     -    21    19     -     - |  288 714.85
 KIRU |     -     -    72     -     -     -    26     -     - |  121   8.81
 KIT3 |     -     -    75    67    40    53    22     -     - |  285  13.55
 KOUR |     -     -    42    25    17    18    27     -     - |  288  10.69
 LHAS |     -     -     -    21     -    19     X     -     - |  134   8.64
 LPGS |    44    37    75    38    27    26    20     -     - |  288  21.48
 MAC1 |    38     -     X    41    60    30    47     -     - |  264   9.75
 MALI |     -     -   115    22     -     -    48     -     - |  276  15.63
 MAS1 |     -    48    55    80     -    80    38     -     - |  276  11.48
 MATE |     -     -   136    40    31     -    69     -     - |  245   0.13
 MAW1 |    49     -    96     -    28    65    26     -     - |  288   8.46
 MBAR |    61     -     -    67    57    79     -     -     - |  288  13.19
 MCM4 |    22    22    24     X    29    24    27     -     - |  288  21.99
 MDO1 |    31    19     -    26    12     -     -     -     - |  288  24.50
 MDVJ |    11     -     -     -     -     -     7     -     - |  288   0.06
 MIZU |    66    56     -    64    91     -     -     -     - |  288    >>>
 MKEA |    83     -    56     -    23     -    36     -     - |  288  17.83
 MSKU |    34     -     -    32    22     -    26     -     - |  288  14.62
 NISU |    39    29     -    23     -     -     -     -     - |  287   0.03
 NKLG |     -     -     -    24    32    21     X     -     - |  205    >>>
 NLIB |    15    14     -    19    32     -    14     -     - |  288   0.02
 NNOR |     -    48    42     -    52     -    13     -     - |  288  11.68
 NOT1 |    32     -     -     -    22    27    12     -     - |  276   0.15
 NOUM |     -     -     -    21     -    18     -     -     - |  288    >>>
 NPLD |    15    26     -     -     -     -     -     -     - |  287   0.03
 NRC1 |    19    15     -    21    22     -    14     -     - |  288   0.02
 NRIL |    38     -     -    30    27    24     -     -     - |  267   5.40
 NTUS |    39     -     -    21    17    18    30     -     - |  288  10.20
 NYA1 |    18     -     -    10     -    12    15     -     - |  288   0.04
 NYAL |     -    26     -     -     -     -     9     -     - |  287   0.05
 OHI2 |    27     -    83    46    49    22    43     -     - |  288   9.38
 ONSA |    15   101     -    25    26    25    20     -     - |  288   0.03
 OPMT |    36    18     -    23     -     -     -     -     - |  287   0.04
 PDEL |    24     -    76    18    25    18     -     -     - |  288  53.74
 PERT |     -   132   139     -    59    19    21     -     - |  247   2.17
 PETP |    36     -     -    24    28     -     -     -     - |  287   5.86
 PIE1 |    49    38    65     -    59     -     X     -     - |  278   0.35
 PIMO |    31     -    36    25    15    14    28     -     - |  288  15.88
 POTS |     -     -    53    21    52     -     -     -     - |  111  10.03
 PRDS |    36    22     -     -    23     -    29     -     - |  288   1.44
 PTBB |    17    19     -     -    21     -    14     -     - |  288   0.17
 QAQ1 |     -    19     -    13     -    10     -     -     - |  288    >>>
 RABT |    83     -     -     -     -    49     -     -     - |  279  22.81
 RAMO |    28     -     -     -     -    17    24     -     - |  288  11.10
 RESO |    30     -     -    20     -     -     -     -     - |  288   8.56
 REYK |    17     -     -    12     -     -     -     -     - |  288   8.53
 RIOG |   107    73    69    72    55    67     X     -     - |  245   8.71
 SANT |    20     -    25    27    16    20    21     -     - |  288   5.14
 SCH2 |    17    32     -     -    25    21    16     -     - |  288  96.12
 SCUB |    50     -     -    48    35    24    30     -     - |  288  12.58
 SFER |    52     -     -     -     -     -    32     -     - |  287   0.58
 SPT0 |    44     -     -     -     -     -    27     -     - |  288   0.03
 STJO |    22    24     -    14    21    16    16     -     - |  288   0.02
 STR1 |     -    30     -     -     -     -    10     -     - |  286   0.49
 SUTH |    30     -     -     -    22     -    18     -     - |  288  11.43
 SUTM |     -    37     -    20    23     -    16     -     - |  288  11.29
 SUWN |    32     -     -     -     -    19     -     -     - |  281   5.01
 SYOG |    41    18     -    29     -     -    21     -     - |  288   0.54
 THTI |     -    33    64    26    39    23    24     -     - |  288   2.23
 THU3 |    41     -     -    21    19    16     -     -     - |  272   6.79
 TIDB |    55    31    39     -    45     -    21     -     - |  288   0.32
 TIXI |     -     -     -    54     -    18    38     -     - |  286    >>>
 TNML |     -    19     -     -     -     -     7     -     - |  288   1.32
 TOW2 |    19     -    65    26    40    17    26     -     - |  288   2.30
 TRO1 |    24     -     -    12     -     -    21     -     - |  288  10.30
 TSKB |    30    13    54    14    41    33    15     -     - |  288   1.88
 TWTF |    31    21     -    34    32     -    19     -     - |  288   0.07
 UNSA |     -     -    48    42    27     -    33     -     - |  288  16.71
 USN3 |     9    17     -     -    25     -     -     -     - |  288   0.04
 USNO |    22    18     -     -    21     -    16     -     - |  288   0.03
 USUD |     -    17    39     -    27     -    13     -     - |  288   0.08
 VILL |     -     -    49    18    36     -    20     -     - |  288  11.04
 WES2 |     -    34     -     X     -     -    12     -     - |  287   0.05
 WHIT |    58     -     -     -    92     -    36     -     - |  288   2.36
 WILL |    32    19     -     -    25     -    23     -     - |  288  24.15
 WSRT |    16    21     -    19    28     -    18     -     - |  288   0.03
 WTZR |    23    23     -    12    40     -     -     -     - |  288    >>>
 WUHN |     -    11     -    18    35     9    18     -     - |  287  16.32
 YAR2 |    24    25     -    22    12     -     -     -     - |  288   8.70
 YELL |    76    22    49    26    40    27    27     -     - |  288   0.02
 YSSK |     -     -     -    13     -     -    12     -     - |  287   8.30
 ZWE2 |    26     -     -    18     -     -     -     -     - |  288   8.10
 -----+-------------------------------------------------------+--------------
 TOT  |    50    70    70    35    40    32    30  2495     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.92   | 3.12e-14  5.60e-15  1.43e-15 |
 NRC1 |   288     0     0   288    8.82   | 2.28e-14  6.71e-15  2.20e-15 |
 NLIB |   288     0     0   288    8.49   | 2.82e-14  5.69e-15  2.27e-15 |
 OPMT |   287     0     0   286    8.34   | 4.22e-14  8.87e-15  3.57e-15 |
 BREW |   288     0     0   288    6.46   | 5.46e-14  9.32e-15  1.89e-15 |
 SPT0 |   288     0     0   288    5.81   | 4.07e-14  6.79e-15  2.49e-15 |
 NPLD |   287     0     0   142    4.90   | 3.33e-14  6.51e-15  1.42e-15 |
 WSRT |   288     0     0   288    4.41   | 2.86e-14  9.35e-15  2.83e-15 |
 NISU |   287     0     0   286    4.29   | 4.90e-14  1.04e-14  2.01e-15 |
 USNO |   288     0     0   288    4.18   | 4.22e-14  6.98e-15  1.45e-15 |
 WES2 |   287     0     0   286    3.79   | 3.58e-14  8.99e-15  3.99e-15 |
 BRUS |   288     0     0   288    3.01   | 4.17e-14  8.36e-15  1.82e-15 |
 MDVJ |   288     0     0   143    2.93   | 5.15e-14  6.58e-15  6.02e-15 |
 ONSA |   288     0     0   143    2.82   | 3.40e-14  7.43e-15  3.83e-15 |
 BRFT |   288     0     0   288    2.78   | 4.47e-14  8.57e-15  5.93e-15 |
 FAIR |   284     0     0   283    2.38   | 5.43e-14  7.63e-15  2.04e-15 |
 ALBH |   287     0     0   286    2.03   | 4.37e-14  1.21e-14  3.60e-15 |
 KHAJ |   288     2     0   286    1.92   | 4.93e-14  8.30e-15  3.85e-15 |
 TWTF |   288     0     0   288    1.75   | 3.87e-14  1.02e-14  4.26e-15 |
 ALGO |   287     1     0   285    1.62   | 2.68e-14  6.95e-15  2.76e-15 |
 IRKT |   288     0     0   288    1.60   | 4.51e-14  1.39e-14  9.80e-15 |
 CHUR |   288     0     0   288    1.16   | 4.76e-14  1.04e-14  6.44e-15 |
 PIE1 |   278     1     0   274    0.86   | 1.49e-13  3.04e-14  1.44e-14 |
 NYAL |   287     0     0   286    0.86   | 4.40e-14  7.44e-15  4.28e-15 |
 NYA1 |   288     0     0   288    0.68   | 3.08e-14  5.69e-15  4.56e-15 |
 NOT1 |   276     0     0   276    0.64   | 4.60e-14  1.22e-14  1.52e-14 |
 HOB2 |   288     0     0   288    0.57   | 1.57e-13  2.01e-14  4.74e-15 |
 YELL |   288     0     0   288    0.56   | 3.25e-14  6.45e-15  2.81e-15 |
 MATE |   245     0     0   242    0.34   | 4.77e-14  1.83e-14         - |
 GODE |   288     0     0   288    0.32   | 3.57e-14  8.40e-15  7.73e-15 |
 TIDB |   288     0     0   288    0.22   | 1.14e-13  4.59e-14  2.64e-14 |
 CRO1 |   288     0     0   288    0.19   | 1.70e-13  3.95e-14  1.76e-14 |
 PTBB |   288     0     0   288    0.17   | 2.58e-13  4.48e-14  9.88e-15 |
 DRAO |   288     0     0   288    0.16   | 2.81e-14  9.32e-15  1.69e-15 |
 G07  |   288     0     0   288    0.13   | 2.90e-13  7.78e-14  5.30e-14 |
 USUD |   288     0     4    72    0.09   | 2.52e-13  2.41e-14  7.13e-15 |
 KGN0 |   287     0     0   286    0.08   | 3.32e-13  1.04e-13  2.84e-14 |
 IENG |   276     0     0   274    0.08   | 3.32e-13  8.00e-14  3.34e-14 |
 G30  |   288     0     0   288    0.07   | 2.92e-13  9.29e-14  6.71e-14 |
 G29  |   288     0     0   288    0.06   | 3.61e-13  1.19e-13  6.90e-14 |
 G26  |   288     0     0   288    0.05   | 3.43e-13  9.88e-14  8.07e-14 |
 BAHR |   288     0     0   288    0.05   | 3.83e-13  1.18e-13  3.05e-14 |
 G11  |   288     0     1   135    0.05   | 5.79e-13  6.15e-14  3.99e-14 |
 G19  |   288     0     1   143    0.05   | 5.61e-13  7.09e-14  1.17e-14 |
 G06  |   288     1     1   263    0.05   | 4.65e-13  1.34e-13  8.21e-14 |
 HRAO |   288     0     0   288    0.05   | 1.33e-13  5.86e-14  4.61e-14 |
 G05  |   288     0     0   288    0.04   | 1.98e-13  8.07e-14  9.83e-14 |
 BOR1 |   288     0     0   288    0.03   | 4.03e-13  1.08e-13  7.27e-14 |
 STR1 |   286     0     0   285    0.02   | 7.07e-13  1.55e-13  4.18e-14 |
 SYOG |   288     0     0   288    0.02   | 7.75e-13  2.09e-13  4.54e-14 |
 G04  |   288     0     0   288    0.02   | 4.32e-13  1.32e-13  1.21e-13 |
 G28  |   288     0     4    43    0.01   | 6.12e-13  7.19e-14  3.60e-14 |
 G22  |   288     0     1   143    0.01   | 5.36e-13  8.57e-14  1.57e-13 |
 SFER |   287     0     0   142    0.01   | 3.91e-13  9.26e-14  5.15e-14 |
 PRDS |   288     0     0   191    0.01   | 5.97e-13  2.26e-13  1.36e-13 |
 TSKB |   288     0     0   288    0.01   | 9.78e-13  2.90e-13  1.77e-13 |
 GMAS |   288     0     0   288    0.01   | 9.08e-13  3.33e-13  2.27e-13 |
 G03  |   288     0     0   288    0.01   | 1.31e-12  4.58e-13  9.02e-14 |
 G10  |   288     0     0   288    0.01   | 1.17e-12  4.08e-13  1.81e-13 |
 G27  |   288     0     0   288    0.01   | 1.28e-12  3.90e-13  2.14e-13 |
 STJO |   288     0     0   288    0.00   | 4.00e-14  8.15e-15  2.35e-15 |
 G25  |   288     0     0   288    0.00   | 1.51e-12  4.96e-13  2.08e-13 |
 TNML |   288     0     0   288    0.00   | 4.33e-13  1.32e-13  8.16e-14 |
 PERT |   247     0     0   246    0.00   | 1.85e-12  4.86e-13         - |
 WHIT |   288     0     0   288    0.00   | 5.08e-13  2.56e-13  2.29e-13 |
 THTI |   288     0     0   288    0.00   | 3.82e-13  1.67e-13  2.64e-13 |
 GPST |   288     0     0     0    0.00   | 1.64e-14  3.15e-15  1.06e-15 |
 LHAS |   134     0     0     0    0.00   |        -         -         - |
 POTS |   111     0     0     0    0.00   |        -         -         - |
 KIRU |   121     0     0     0    0.00   |        -         -         - |
 GLPS |   239     0     0     0    0.00   |        -         -         - |
 NKLG |   205     1     0     0    0.00   |        -         -         - |
 SUWN |   281     1     0     0    0.00   |        -         -         - |
 JAB1 |   258     0     0     0    0.00   |        -         -         - |
 BRMU |   282     0     0     0    0.00   |        -         -         - |
 BILI |   275     1     0     0    0.00   |        -         -         - |
 ASPA |   282     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     1     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 HNLC |   285     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 GOUG |   285     0     0     0    0.00   |        -         -         - |
 DAV1 |   263     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   285     0     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.35e-12  3.84e-13  3.05e-13 |
 G23  |   288     0     4     0    0.00   | 5.57e-13  5.99e-14  3.10e-14 |
 G21  |   288     0     6     0    0.00   | 1.01e-12  1.24e-13  2.59e-14 |
 G20  |   288     0     6     0    0.00   | 6.13e-13  7.01e-14  1.86e-14 |
 G18  |   288     0     6     0    0.00   | 8.40e-13  7.78e-14  2.99e-14 |
 G17  |   288     0     6     0    0.00   | 6.27e-13  6.34e-14  1.76e-14 |
 G16  |   288     0     6     0    0.00   | 5.69e-13  6.26e-14  2.41e-14 |
 G15  |   288     0     0     0    0.00   | 1.58e-12  5.62e-13  3.03e-13 |
 G14  |   288     0     6     0    0.00   | 5.44e-13  5.98e-14  3.35e-14 |
 G13  |   288     0     6     0    0.00   | 5.77e-13  6.82e-14  2.59e-14 |
 G09  |   246     0     0     0    0.00   |        -         -         - |
 G08  |   288     0     0     0    0.00   | 1.60e-12  5.03e-13  1.84e-13 |
 G02  |   288     0     6     0    0.00   | 6.17e-13  5.66e-14  1.79e-14 |
 G01  |   288     0     0     0    0.00   | 2.16e-12  6.24e-13  3.97e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WTZR |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USN3 |   288     0     5     0    0.00   | 1.20e-13  1.61e-14  3.88e-15 |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   | 4.47e-13  5.34e-13  1.04e-13 |
 THU3 |   272     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   245     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   279     2     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   267     0     0     0    0.00   |        -         -         - |
 NOUM |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MIZU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.57e-13  4.96e-13  1.66e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   276     0     0     0    0.00   |        -         -         - |
 MALI |   276     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     1     0     0    0.00   |        -         -         - |
 KIT3 |   285     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     2     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.34e-13  9.23e-13  1.41e-12 |
 CEDU |   288     0     0     0    0.00   | 2.15e-13  5.66e-14  5.84e-14 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   277     3     0     0    0.00   |        -         -         - |
 AREQ |   285     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.43e-17  4.11e-16  2.47e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      AMC2      NPLD |
------------------------------------------+------------------------------+
