
 GPS week: 1356   Day: 3   MJD: 53739                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  34277    206     0.37     0.71     0.04    14.13      0
 emr |   288     0  14591      3  1198.29    38.65     0.04    13.54      0
 esa |   288     0  21210    697  1198.36    38.61     0.05    10.06      0
 gfz |   288     0  29408    728    -0.41     0.71     0.03    25.05      0
 igr |   288     0  31751    400    -1.51     0.90     0.03     0.00      0
 jpl |   288     0  27011    593    -0.43     1.34     0.03    19.14      0
 mit |   288     0  34871   2207    -0.01     1.29     0.03    18.08      0
 ngs |    96     0   2688      0    -0.47     0.87     2.79     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   135  -107   -41    96    23    17  -153  3300     - |
    2 |   -52     1    26   225    49   -82  -199 -1468     - |
    3 |     6  -122   139    64   -26   -58   -17 -3985     - |
    4 |    93  -125   131  -107   -84    98    -7 -3612     - |
    5 |    12    94    27    38    50    -4  -144 -3421     - |
    6 |    27  -119   -54    36   -85   -33    83 -1066     - |
    7 |   -36   -45  -116   127     6    21   -72 -1972     - |
    8 |    15  -112   222    90    43   -56  -135 -1021     - |
    9 |    37   -46    23    -9    13    35   -28  4520     - |
   10 |    -7    65    12    53     0    -5  -118 -5007     - |
   11 |    61  -133    -5   102     2   -68   -15  5317     - |
   13 |   276  -259    28   -28     5    -6     9  3918     - |
   14 |   158   -10    31   134    20   -98  -216   896     - |
   15 |    89   108   -36   -22   104   -48   -49 -1674     - |
   16 |   -27   -66    41    92    53   -93    19  3883     - |
   17 |    48  -296    20    57     8   171   -88  3528     - |
   18 |     9    16   -81    34   -67   -25     6  3163     - |
   19 |   -35    45   -64   250    29  -130  -180  -637     - |
   20 |    17   -12   -63    50   100     9   -49  3749     - |
   21 |   102   103   -36    25     9   -71   -96  3622     - |
   22 |   -25    65   116   149    14   -59  -238 -4692     - |
   23 |    58   -36  -140   191    78   -57  -144 -1114     - |
   24 |    -9  -145   217   -37   -38    -6    52  -596     - |
   25 |   178  -177    55    25     8   -33   -52     -     - |
   26 |   147  -112    10   -40    10    74   -59 -4419     - |
   27 |    73  -166    77    24    61    10   -22 -3351     - |
   28 |    73   -26   -39   164   105  -107  -131  5885     - |
   29 |   132    35    91   -56    20   -22   -76 -1538     - |
   30 |    55  -152   113   -65  -117    15    81 -2212     - |
 -----+-------------------------------------------------------+
 ALBH |    -9     -     -     -   -27     -     7     -     - |
 ALGO |  -144   157    10   -96    31    69    49     -     - |
 ALIC |    28     -     -     -     -     -   -22     -     - |
 ALRT |   -97     -     -    24    97    -6    48     -     - |
 AMC2 |   -56     -     -     -    29   139  -103     -     - |
 ANKR |   -16     -     -     -     -    11     -     -     - |
 ARTU |   -67     -    39  -109    13   114    62     -     - |
 ASPA |     -     -     -   190     -  -249     -     -     - |
 BAHR |  -162    80     -    42   -54    47   -41     -     - |
 BILI |   -17     -     -   -51    78   105   -27     -     - |
 BJFS |     -     -     -   447     X     X  -619     -     - |
 BOR1 |    47     -     -     -    54     -   -37     -     - |
 BRFT |   201     -     -  -113   -21     -     -     -     - |
 BRMU |     -     -     -    84   -28  -109     -     -     - |
 BRUS |    12     -     -     -   104     -   -10     -     - |
 CAS1 |    35     -   -29  -102     -   109    15     -     - |
 CEDU |     -     -   -38     -     -    20     X     -     - |
 CHAT |   -28     -     -    -9    12    61   -31     -     - |
 CHUR |    20     -     -     -   103     -   -15     -     - |
 COCO |  -147     -   -82    12     -    56    85     -     - |
 CRO1 |     -    53    49     -   -39   -86    24     -     - |
 DAEJ |    40     -     -     -   -65     -   -31     -     - |
 DARW |     -     -     -     -     -    49   -52     -     - |
 DAV1 |     -     -     -  -427     -     -   592     -     - |
 DGAR |   -93     -   -77    76    -2   -16    27     -     - |
 DRAO |    15    93    29  -134   -22     -    88     -     - |
 DUBO |   -21     -     -     -   -85    15     -     -     - |
 FAIR |   -15   105     -   -26   -26     -   -30     -     - |
 FORT |     -   185  -314  -195   -78   202    68     -     - |
 GLPS |     -     -     -   -43   103    57     -     -     - |
 GODE |    62     -  -204     -  -132     -    62     -     - |
 GOLD |    21     -   -74    18   177     -     -     -     - |
 GRAZ |  -349     -     -     -   -17   256     2     -     - |
 GUAM |     -     -  -122     -   -46     -    68     -     - |
 HARB |    -2     -     -     1   -68     -     -     -     - |
 HERS |   -80     -     -     -     -     -    63     -     - |
 HOB2 |   -28     -   -41   -25     -   125   -55     -     - |
 HRAO |   -10     -   -19     -   -44     X    18     -     - |
 HYDE |   -43     -     -     -     -     -    34     -     - |
 IISC |    18     -  -160   -53  -128    65    80     -     - |
 INVK |  -104     -     -    58    58     -     -     -     - |
 IRKT |   273     -   -51  -190     -     -    79     -     - |
 ISPA |   -10     -   -21    67   -72   -69     -     -     - |
 JAB1 |   -64     -     -     -     -     -    50     -     - |
 JPLM |     -     -     -  -222  -168     -   308     -     - |
 KARR |  -123     -     -     -     -    84     7     -     - |
 KERG |  -219   -91   199   -10   -43   -21   164     -     - |
 KGN0 |    42     -     -     -   -10   -31     -     -     - |
 KHAJ |     -     -     -     -     -  -127   134     -     - |
 KIRU |   -82     -   116     -     -     -     X     -     - |
 KOKB |    31    72     -  -141    -4    77    35     -     - |
 KOUR |    48     -    77   -13   -46  -150    97     -     - |
 LHAS |   -35     -     -   -80   -82    70    65     -     - |
 LPGS |    11    38   -21    80    -4   -59   -72     -     - |
 MAC1 |   195     -     X   -56     -    -9   -65     -     - |
 MALI |     -     -   -28   -65  -100     -   106     -     - |
 MAS1 |     -     -  -131     7     -    60     X     -     - |
 MAW1 |    48     -    98     -     -     -   -92     -     - |
 MBAR |   -83     -     -   -24   -15    92     -     -     - |
 MCM4 |   188    14    94     X   -18  -198     X     -     - |
 MDO1 |    92   140     -  -127    17     -     -     -     - |
 MDVJ |   184     -     -     -     -  -357   234     -     - |
 METS |  -142     -     -    42   -29     -    53     -     - |
 MKEA |     -     -   -71     -   -87     -    40     -     - |
 NISU |    64     -     -   -36     -     -     -     -     - |
 NKLG |     -     -     -    -7    50     9     X     -     - |
 NLIB |   -46     -     -    24    72     -     2     -     - |
 NNOR |     -    84  -261     -    21     -    82     -     - |
 NRC1 |     -   129     -  -117    10     -    65     -     - |
 NRIL |   -23     -     -   -72     6    -9   128     -     - |
 NTUS |   -94     -  -208   178   -29    21   -80     -     - |
 NYA1 |    24     -     -   -68   -49    24    50     -     - |
 NYAL |     -   150     -     -   101     -  -113     -     - |
 ONSA |  -146     -   147     0    -4    37    -8     -     - |
 OPMT |   -42     -     -    24     -     -     -     -     - |
 OUS2 |     -     -     -    49     -   -64     -     -     - |
 PDEL |    -8     -   -30    -5    51    29     -     -     - |
 PERT |     -     -  -154     -   -41    73     9     -     - |
 PETP |   -34     -     -   -20   -80    52     -     -     - |
 PIE1 |   -57     -    80     -    38     -     X     -     - |
 PIMO |     -     -   158  -184    79   157     X     -     - |
 POL2 |    49     -    -9     -   -26     -   -33     -     - |
 POTS |   -48     -     X    27    44     -     -     -     - |
 PRDS |    11     -     -     -     -     -    -8     -     - |
 PTBB |   108     -     -     -   118     -   -84     -     - |
 QAQ1 |     -     -     -   141     -  -185     -     -     - |
 RABT |    -8     -     -     -    -6     -     6     -     - |
 RAMO |   -58     -     -     -     -    47    -4     -     - |
 RESO |   -47     -     -    26     -     1     -     -     - |
 REYK |     9     -     -    -5   -82     -     -     -     - |
 RIOG |    46     -     -    11    24  -100    58     -     - |
 SANT |    24     -   165    13    88   -87   -29     -     - |
 SCH2 |   -99     -     -     -    23   -29   108     -     - |
 SCUB |    42     -     -   -65     5    88   -38     -     - |
 SFER |   -70     -     -     -     -     -    54     -     - |
 SPT0 |    14     -     -     -     -     -   -11     -     - |
 STJO |     -   181     -  -115   -50    86   -68     -     - |
 SUTM |     -     -     -    -3    78     -     4     -     - |
 SUWN |  -135     -     -     -     -   100     -     -     - |
 SYOG |     -    22   -91  -114     -    70   118     -     - |
 THTI |     -   153  -104   -27   161   -18     X     -     - |
 THU3 |  -128   -48     -    98     -     -     -     -     - |
 TIDB |   -72    44   -77     -   -85     -    66     -     - |
 TIXI |   -87     -   165    44   -40   -83     3     -     - |
 TOW2 |   -11     -   -24   -47     -    37    49     -     - |
 TRO1 |    70     -     -   -98  -130    21    59     -     - |
 TSKB |   -80    28    30    30   -35   -52    38     -     - |
 TWTF |   -89     -     -    77   -61     -   -37     -     - |
 UNSA |     -     -     -   -29   -96     -    39     -     - |
 USN3 |    58     -     -     -    19   -43     -     -     - |
 USNO |    29    55     -     -    22     -   -64     -     - |
 USUD |   -42     -    49     -   110     -     6     -     - |
 VILL |     -     -   175  -126   124     -    77     -     - |
 WHIT |   -19     -     -     -     -    -4    19     -     - |
 WILL |   -20     -     -     -  -137     -    16     -     - |
 WSRT |     8     -     -   -86    26     -   113     -     - |
 WUHN |    27     -     -     X     -   -10   -11     -     - |
 YELL |    -9    61    27    -4   -20    -1   -48     -     - |
 YSSK |   -21     -     -   -19     -     -    43     -     - |
 ZWE2 |  -138     -     -    78     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    38    27    74    31    38    24    16  6126     - |  288   3.91
    2 |    47    34    34    15    36    38    29   766     - |  288   0.25
    3 |    32    22    45    17    30    41    33  2641     - |  288   2.00
    4 |    50    29    36    14    20    24    25  1385     - |  288   0.84
    5 |    25    20    35    16    29    34    17  1798     - |  288   1.71
    6 |    23    20    45    10    31    41    18  2449     - |  288   0.74
    7 |    22    25    28    21    25    35    43   608     - |  288   0.37
    8 |   127    40   152    48    49    36   154  6136     - |  288   2.15
    9 |   120    65    80    82    33    88    79  3396     - |  288   2.51
   10 |    51    30    38    26    26    47    36  2405     - |  288   2.00
   11 |    51    54    70    18    76    38    40  3211     - |  288   0.40
   13 |    41    13    45    12    66    35    29   763     - |  288   0.22
   14 |    36    47    31    18    44    47    29  1445     - |  288   0.35
   15 |    56    27    58    14    50    43    26  4054     - |  288   2.41
   16 |    29    17    34    17    34    37    26   866     - |  288   0.22
   17 |    24    43    28    14    32    39    37  3395     - |  288   0.34
   18 |    47    25    26    16    32    43    29   687     - |  288   0.27
   19 |    25    24    37    25    48    38    43   568     - |  288   0.23
   20 |    54    43   113    20    39    30    43   834     - |  288   0.32
   21 |    57    32    21    13    54    38    30   656     - |  288   0.38
   22 |    43    48    20    27    36    49    30  1943     - |  288   0.24
   23 |    43    47    35    12    21    30    27   939     - |  288   0.18
   24 |    56    39    33    27    35    29    36  4362     - |  288   3.10
   25 |    79   121    88    37    88   105    72     -     - |  288   8.14
   26 |    39    29    37    14    46    39    18  1203     - |  288   0.63
   27 |   101    93    80    64    66    34    94  2451     - |  288   2.35
   28 |    66    20    34    16    54    68    24  5611     - |  288   0.51
   29 |    99    37    37    19    46    41    30  1419     - |  288   1.12
   30 |    21    21    43    14    39    43    28  1035     - |  288   0.56
 -----+-------------------------------------------------------+--------------
 ALBH |    26     -     -     -    20     -    20     -     - |  288   0.04
 ALGO |    23    12    22    22     8    11    15     -     - |  288   0.03
 ALIC |    15     -     -     -     -     -    11     -     - |  288  10.78
 ALRT |    23     -     -    15     8    13    12     -     - |  288   6.51
 AMC2 |    13     -     -     -    11    14    11     -     - |  288   0.02
 ANKR |    11     -     -     -     -     8     -     -     - |  288  12.60
 ARTU |    46     -    42    13    19    16    56     -     - |  287  10.40
 ASPA |     -     -     -    24     -    31     -     -     - |  192    >>>
 BAHR |    22    28     -    23    18    16    20     -     - |  288   0.86
 BILI |    27     -     -    10    13     9    21     -     - |  287   8.23
 BJFS |     -     -     -    12     X     X    16     -     - |  287  12.90
 BOR1 |    13     -     -     -    32     -    10     -     - |  275   0.59
 BRFT |    29     -     -    17    17     -     -     -     - |  288   0.10
 BRMU |     -     -     -    35    17    46     -     -     - |  288    >>>
 BRUS |    35     -     -     -    22     -    28     -     - |  276   0.03
 CAS1 |    25     -    29    18     -    26    21     -     - |  288   8.16
 CEDU |     -     -   101     -     -    53     X     -     - |  132   1.68
 CHAT |    28     -     -    43    37    24    28     -     - |  287  12.55
 CHUR |    22     -     -     -    29     -    17     -     - |  287   0.05
 COCO |    19     -    26    19     -    25    24     -     - |  288   8.35
 CRO1 |     -    14    38     -    13    15    22     -     - |  288   0.27
 DAEJ |    13     -     -     -    15     -    10     -     - |  287   7.07
 DARW |     -     -     -     -     -    19    20     -     - |  288  68.96
 DAV1 |     -     -     -    12     -     -    16     -     - |  287   7.43
 DGAR |    44     -    40    37    28    22    30     -     - |  288  13.36
 DRAO |    41    11    27    15     8     -    32     -     - |  288   0.05
 DUBO |    13     -     -     -    19    10     -     -     - |  287  27.23
 FAIR |    53    12     -    14    24     -    32     -     - |  288  14.75
 FORT |     -    33    47    25    25    27    30     -     - |  288   0.09
 GLPS |     -     -     -    71    27    92     -     -     - |  160    >>>
 GODE |    19     -    24     -    23     -    19     -     - |  284   0.06
 GOLD |    32     -    28    18    36     -     -     -     - |  288  11.22
 GRAZ |    20     -     -     -    10    18    12     -     - |  288   4.30
 GUAM |     -     -    53     -    78     -    29     -     - |  285  15.37
 HARB |    23     -     -    13    28     -     -     -     - |  287  42.68
 HERS |    11     -     -     -     -     -     9     -     - |  253  23.69
 HOB2 |    32     -    38    24     -    19    18     -     - |  288   0.05
 HRAO |    72     -    40     -    24     X    65     -     - |  287   0.32
 HYDE |    17     -     -     -     -     -    13     -     - |  287  11.40
 IISC |    19     -    33    24    19    16    19     -     - |  288  16.10
 INVK |    44     -     -    25     9     -     -     -     - |  288   6.61
 IRKT |    23     -    22    19     -     -    31     -     - |  288   0.13
 ISPA |    32     -    72    31    19    22     -     -     - |  288   9.75
 JAB1 |   118     -     -     -     -     -    92     -     - |  257  18.97
 JPLM |     -     -     -    14    11     -    19     -     - |  252  27.75
 KARR |    26     -     -     -     -    20    18     -     - |  288  11.49
 KERG |    50    15    29    26    16    25    42     -     - |  288   2.02
 KGN0 |    27     -     -     -    23    20     -     -     - |  287   0.42
 KHAJ |     -     -     -     -     -    14    15     -     - |  288   0.04
 KIRU |    23     -    32     -     -     -     X     -     - |  275   7.44
 KOKB |    39    12     -    23    36    20    37     -     - |  288   0.10
 KOUR |    60     -    52    36    21    21    26     -     - |  288  14.49
 LHAS |    27     -     -    17    13    29    12     -     - |  286   9.83
 LPGS |    37    28    61    45    34    33    22     -     - |  288  17.34
 MAC1 |    34     -     X    25     -    17    19     -     - |  264  11.31
 MALI |     -     -    39    26    16     -    24     -     - |  288  18.04
 MAS1 |     -     -    87    31     -    19     X     -     - |  264   8.39
 MAW1 |    49     -    27     -     -     -    28     -     - |  288   8.59
 MBAR |    70     -     -    27    38    44     -     -     - |  288  13.05
 MCM4 |    68    74    55     X    62    26     X     -     - |  286    >>>
 MDO1 |    90    40     -    33    69     -     -     -     - |  287  87.03
 MDVJ |    17     -     -     -     -     8    18     -     - |  287   0.09
 METS |     9     -     -    11    15     -    15     -     - |  287   4.69
 MKEA |     -     -    23     -    38     -    13     -     - |  288  14.34
 NISU |    27     -     -    15     -     -     -     -     - |  288   0.04
 NKLG |     -     -     -    15    64    19     X     -     - |  284    >>>
 NLIB |    22     -     -    23    16     -    19     -     - |  288   0.04
 NNOR |     -    19    41     -    38     -    16     -     - |  288  10.56
 NRC1 |     -    13     -    17    13     -    18     -     - |  288   0.04
 NRIL |    14     -     -    12    17    13    17     -     - |  288   7.47
 NTUS |    36     -    34    35    12    17    30     -     - |  288  11.34
 NYA1 |    13     -     -    16    13    15    28     -     - |  288   0.06
 NYAL |     -    16     -     -    16     -    12     -     - |  287   0.06
 ONSA |    12     -    18    17    23    14    22     -     - |  216   0.02
 OPMT |    36     -     -    21     -     -     -     -     - |  287   0.03
 OUS2 |     -     -     -    20     -    26     -     -     - |  288  13.06
 PDEL |    31     -    70    18    13    28     -     -     - |  288  56.19
 PERT |     -     -    37     -    21    22    17     -     - |  264   2.50
 PETP |    38     -     -    18    19    13     -     -     - |  287   9.05
 PIE1 |    17     -    24     -    37     -     X     -     - |  282   0.31
 PIMO |     -     -    50    29    26    30     X     -     - |  288  15.92
 POL2 |    20     -    20     -    18     -    14     -     - |  288  10.12
 POTS |    27     -     X    15    10     -     -     -     - |  276  25.39
 PRDS |    13     -     -     -     -     -    11     -     - |  288   0.39
 PTBB |    28     -     -     -    19     -    22     -     - |  288   0.20
 QAQ1 |     -     -     -     7     -     9     -     -     - |  288    >>>
 RABT |    13     -     -     -    27     -    10     -     - |  287  12.06
 RAMO |    22     -     -     -     -    24    19     -     - |  288  12.40
 RESO |    30     -     -    13     -    10     -     -     - |  288   6.81
 REYK |    30     -     -    17    17     -     -     -     - |  276   6.63
 RIOG |    36     -     -    45    21    29    21     -     - |  288  10.45
 SANT |    25     -    88    15    17    18    55     -     - |  288   8.88
 SCH2 |    31     -     -     -    19    16    19     -     - |  288  70.14
 SCUB |    17     -     -    24    26    15    28     -     - |  288  15.22
 SFER |    42     -     -     -     -     -    33     -     - |  287   0.50
 SPT0 |    18     -     -     -     -     -    14     -     - |  288   0.05
 STJO |     -     9     -    16    14    16    17     -     - |  288   0.03
 SUTM |     -     -     -    34    24     -    47     -     - |  276  12.39
 SUWN |    21     -     -     -     -    16     -     -     - |  288   5.99
 SYOG |     -    16    29    10     -    12    26     -     - |  288   1.12
 THTI |     -   108    74    78    91    64     X     -     - |  276   4.04
 THU3 |    28    17     -    11     -     -     -     -     - |  288   6.85
 TIDB |    23    18    43     -    34     -    20     -     - |  288   0.20
 TIXI |    26     -    26     7    24    11    26     -     - |  287   8.78
 TOW2 |    41     -    69    28     -    24    29     -     - |  288   3.54
 TRO1 |    19     -     -    24    20    17    18     -     - |  288   9.21
 TSKB |    18    10    34    15    15    27    17     -     - |  288   1.77
 TWTF |    27     -     -    33    36     -    30     -     - |  288   0.10
 UNSA |     -     -     -    21    37     -    29     -     - |  276  20.40
 USN3 |    15     -     -     -    10    11     -     -     - |  288   0.05
 USNO |    21    14     -     -    15     -    15     -     - |  288   0.03
 USUD |    30     -    34     -    16     -    21     -     - |  288   0.10
 VILL |     -     -    29    18    19     -    25     -     - |  288   9.97
 WHIT |    14     -     -     -     -    11     9     -     - |  288   2.13
 WILL |    11     -     -     -    14     -     9     -     - |  287  13.26
 WSRT |    26     -     -    18    22     -    19     -     - |  288   0.03
 WUHN |    31     -     -     X     -    17    17     -     - |  287  16.03
 YELL |    53    13    35    13     8    14    28     -     - |  288   0.02
 YSSK |    19     -     -    14     -     -    12     -     - |  287  10.52
 ZWE2 |    24     -     -    13     -     -     -     -     - |  276   7.48
 -----+-------------------------------------------------------+--------------
 TOT  |    41    39    50    26    33    32    32  2794     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.65   | 3.90e-14  7.16e-15  2.92e-15 |
 AMC2 |   288     0     0   288    8.85   | 3.41e-14  6.23e-15  1.82e-15 |
 OPMT |   287     0     0   286    8.10   | 4.59e-14  1.07e-14  2.26e-15 |
 NLIB |   288     0     0   288    7.58   | 3.61e-14  1.26e-14  2.84e-15 |
 SPT0 |   288     0     0   288    7.47   | 4.03e-14  6.04e-15  3.40e-15 |
 ONSA |   216     0     0   216    7.41   | 3.22e-14  4.76e-15         - |
 WSRT |   288     0     0   288    5.33   | 2.22e-14  6.41e-15  1.70e-15 |
 BRUS |   276     0     0   276    5.30   | 3.69e-14  6.19e-15  2.30e-15 |
 STJO |   288     0     0   288    4.99   | 3.02e-14  6.92e-15  2.43e-15 |
 MDVJ |   287     1     0   285    4.78   | 5.30e-14  6.77e-15  5.53e-15 |
 ALBH |   288     0     0   288    4.42   | 4.69e-14  1.26e-14  4.20e-15 |
 DRAO |   288     0     0   288    4.33   | 3.09e-14  7.45e-15  2.65e-15 |
 ALGO |   288     0     0   288    3.04   | 3.15e-14  6.26e-15  2.58e-15 |
 YELL |   288     0     0   288    2.77   | 3.33e-14  5.18e-15  1.22e-15 |
 TWTF |   288     0     0   288    2.11   | 5.01e-14  1.29e-14  5.93e-15 |
 KOKB |   288     0     0   288    1.95   | 6.60e-14  1.43e-14  5.50e-15 |
 CHUR |   287     0     0   286    1.92   | 4.21e-14  1.30e-14  4.02e-15 |
 NISU |   288     0     0   288    1.61   | 5.94e-14  8.86e-15  2.83e-15 |
 KHAJ |   288     0     0   288    1.41   | 5.15e-14  7.61e-15  2.42e-15 |
 PIE1 |   282     0     0   279    0.94   | 6.94e-14  1.75e-14  6.87e-15 |
 NRC1 |   288     0     0   288    0.84   | 3.28e-14  8.83e-15  3.27e-15 |
 NYA1 |   288     0     0   288    0.83   | 3.19e-14  9.10e-15  3.83e-15 |
 FORT |   288     0     0   288    0.79   | 6.92e-14  1.73e-14  9.54e-15 |
 NYAL |   287     0     0   286    0.77   | 3.61e-14  9.65e-15  4.64e-15 |
 GODE |   284     0     0   281    0.55   | 4.09e-14  8.31e-15  4.04e-15 |
 HOB2 |   288     0     0   288    0.53   | 1.73e-13  1.94e-14  4.92e-15 |
 IRKT |   288     0     0   288    0.38   | 3.84e-14  1.82e-14  1.46e-14 |
 TIDB |   288     0     0   288    0.31   | 1.24e-13  3.79e-14  1.64e-14 |
 CRO1 |   288     0     0   288    0.22   | 1.70e-13  4.19e-14  3.17e-14 |
 PTBB |   288     0     0   288    0.13   | 3.26e-13  6.70e-14  1.77e-14 |
 G07  |   288     0     0   288    0.11   | 2.81e-13  8.59e-14  3.99e-14 |
 G30  |   288     0     0   288    0.09   | 2.81e-13  7.83e-14  3.99e-14 |
 G06  |   288     0     0   288    0.08   | 3.57e-13  9.06e-14  7.64e-14 |
 SFER |   287     0     0   286    0.05   | 3.72e-13  1.02e-13  3.30e-14 |
 BAHR |   288     0     0   288    0.04   | 3.79e-13  9.81e-14  8.25e-14 |
 HRAO |   287     0     0   286    0.03   | 1.32e-13  4.18e-14  2.57e-14 |
 G26  |   288     0     0   288    0.03   | 3.33e-13  1.24e-13  8.68e-14 |
 G04  |   288     0     0   288    0.03   | 4.62e-13  1.41e-13  8.82e-14 |
 KGN0 |   287     0     0   141    0.03   | 3.68e-13  8.87e-14  2.36e-14 |
 BOR1 |   275     0     0   274    0.03   | 4.33e-13  1.49e-13  4.84e-14 |
 USUD |   288     0     3    22    0.03   | 2.53e-13  4.09e-14  9.31e-15 |
 G05  |   288     0     0   288    0.03   | 1.96e-13  7.98e-14  1.23e-13 |
 PRDS |   288     0     0   288    0.02   | 3.61e-13  1.30e-13  4.56e-14 |
 BRFT |   288     0     0   143    0.02   | 5.41e-14  1.98e-14  1.01e-14 |
 SYOG |   288     0     0   288    0.01   | 7.23e-13  1.75e-13  1.37e-13 |
 G29  |   288     0     0   288    0.01   | 4.20e-13  1.24e-13  1.51e-13 |
 TSKB |   288     0     0   288    0.01   | 1.03e-12  3.41e-13  1.29e-13 |
 KERG |   288     0     0   288    0.00   | 1.21e-12  3.90e-13  1.77e-13 |
 G25  |   288     0     0   288    0.00   | 4.53e-13  4.39e-13  4.50e-13 |
 G24  |   288     0     0   288    0.00   | 1.37e-12  4.03e-13  2.81e-13 |
 G03  |   288     0     0   288    0.00   | 1.31e-12  4.45e-13  1.77e-13 |
 G08  |   288     0     0   288    0.00   | 1.54e-12  4.62e-13  2.49e-13 |
 G17  |   288     0     4     7    0.00   | 6.04e-13  7.07e-14  2.32e-14 |
 WHIT |   288     0     0   288    0.00   | 5.10e-13  4.00e-13  1.87e-13 |
 CEDU |   132     0     0    44    0.00   | 2.04e-13  7.93e-14         - |
 GPST |   288     0     0     0    0.00   | 2.82e-14  5.04e-15  1.12e-15 |
 JPLM |   252     0     1     0    0.00   | 6.73e-13  7.22e-13         - |
 PERT |   264     0     0     0    0.00   | 1.87e-12  4.36e-13  2.10e-13 |
 JAB1 |   257     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 WILL |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 RABT |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 HYDE |   287     0     0     0    0.00   |        -         -         - |
 HERS |   253     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 GLPS |   160     1     0     0    0.00   |        -         -         - |
 DAV1 |   287     0     0     0    0.00   | 2.49e-13  1.14e-12  6.85e-13 |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 7.04e-13  7.79e-14  4.09e-14 |
 G27  |   288     0     0     0    0.00   | 1.41e-12  4.77e-13  2.04e-13 |
 G23  |   288     0     6     0    0.00   | 5.51e-13  6.03e-14  1.63e-14 |
 G22  |   288     0     6     0    0.00   | 5.90e-13  5.84e-14  2.51e-14 |
 G21  |   288     0     6     0    0.00   | 1.01e-12  1.11e-13  3.08e-14 |
 G20  |   288     0     6     0    0.00   | 6.33e-13  6.90e-14  3.14e-14 |
 G19  |   288     0     6     0    0.00   | 6.27e-13  6.44e-14  2.12e-14 |
 G18  |   288     1     6     0    0.00   | 8.98e-13  9.48e-14  2.52e-14 |
 G16  |   288     0     6     0    0.00   | 5.72e-13  5.76e-14  1.92e-14 |
 G15  |   288     0     0     0    0.00   | 1.39e-12  5.97e-13  2.62e-13 |
 G14  |   288     0     6     0    0.00   | 5.88e-13  6.06e-14  2.32e-14 |
 G13  |   288     0     6     0    0.00   | 4.77e-13  5.85e-14  2.18e-14 |
 G11  |   288     0     5     0    0.00   | 5.87e-13  5.90e-14  5.23e-14 |
 G10  |   288     0     0     0    0.00   | 1.25e-12  3.88e-13  1.81e-13 |
 G09  |   288     0     0     0    0.00   | 1.55e-12  5.05e-13  3.10e-13 |
 G02  |   288     0     6     0    0.00   | 5.63e-13  4.90e-14  2.44e-14 |
 G01  |   288     0     0     0    0.00   | 1.46e-12  6.50e-13  4.57e-13 |
 ZWE2 |   276     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USN3 |   288     0     5     0    0.00   | 1.15e-13  1.35e-14  5.45e-15 |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   | 4.33e-13  5.90e-13  2.79e-13 |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 4.17e-13  1.58e-13  3.42e-13 |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   276     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   276     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RAMO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   276     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OUS2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NKLG |   284     2     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   264     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   286     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   275     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   285     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     2     0     0    0.00   |        -         -         - |
 DUBO |   287     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.22e-13  6.62e-13  8.31e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   192     0     0     0    0.00   |        -         -         - |
 ARTU |   287     0     0     0    0.00   |        -         -         - |
 ANKR |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.89e-17  4.67e-16  2.80e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      ONSA      YELL |
------------------------------------------+------------------------------+
