
 GPS week: 1364   Day: 6   MJD: 53798                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      6    -0.41     0.53     1.96     0.00      0
 cod |   288     0  29400    279    -0.78     0.92     0.04    22.59      0
 emr |   288     0  23782    840    17.45     0.04     0.04    18.15      0
 esa |   288     1  18482   1126  1058.39    39.76     0.06    10.89      0
 gfz |   288     0  30152    341    -0.27     0.09     0.03    25.53      0
 iga |    96     0   2688     27    -0.44     0.57     0.09     0.00      0
 igu |    96     0   2688     71    -1.82    -1.06     2.35     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  37688    537     0.70     0.77     0.04    22.84      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   sio   usn |
 -----+-------------------------------------------------------+
    1 | -6788     7   -40   -62    57   -11 -7447     -   -10 |
    2 |  -973  -110   -14   133   117    52  2822     -   -73 |
    3 | -2407     5  -124   -81    83   -30 -2152     -    31 |
    4 | -7388    29  -111   130   114    66 -1499     -  -129 |
    5 |   939  -128    24   -21     0    -2 -9899     -   118 |
    6 |   722    50  -123    -7   118   132 -1574     -   -81 |
    7 |    76   -63    80     7    -6    29  -924     -     1 |
    8 |  1799   -76    19    59    83   -48 -1536     -   -61 |
    9 | -1294    17   -90    82    58    32 -1312     -   -49 |
   10 |  -318  -229    70   104    23    37  5159     -    96 |
   11 |  2843    66   -47  -150   138   -18   480     -  -110 |
   13 |  4607   132  -101    -5   230   200   767     -  -305 |
   14 |  6336   141  -207    10    69    65  3003     -   -97 |
   15 | -5496  -104   -26  -212    68  -102 -2723     -   147 |
   16 |  4914   -72     4   -69    54   -58   705     -    40 |
   17 | -3711    48  -389   184   161   -21 -1153     -    -5 |
   18 |  4833    73   -69    48    55    15   307     -  -108 |
   19 | -1260  -115   237   138   -81  -329  1312     -   -17 |
   20 |  7200   -53     9  -216    66     -     -     -    75 |
   21 |  4543   -79   -23   -15    89  -106 13955     -     4 |
   22 | -5348   -43     X  -102    85    -5   552     -     X |
   23 |   470   -15    -1  -162    85   -30  1016     -    -2 |
   24 |  -152   -68   -67    91    13  -117  -542     -    62 |
   25 | -4987    85   -89  -131   127   -60 -5504     -   -94 |
   26 |   924    56   -71   150    98   146  6231     -  -181 |
   27 |  1838   -58   -20   -77    96  -125  4065     -     2 |
   28 |  2786   -29    23  -166    42   130  6241     -    43 |
   29 | -1013    13   -70    35    97   -16   358     -   -89 |
   30 | -4125   149  -176   121   163   168  -283     -  -264 |
 -----+-------------------------------------------------------+
 ALBH |     -     -   -14     -     -     -     -     -    11 |
 ALGO |     -     -   -22   204   -34     -     -     -   -34 |
 ALRT |     -     -     -     -  -189     -     -     -   211 |
 AMC2 |     -     -    -4     -     -     -     -     -     3 |
 ARTU |     -     -     -   206   115     -     -     -  -226 |
 ASPA |     -     -     -     -   110     -     -     -  -123 |
 AUCK |     -     -     -     X    40     -     -     -   -45 |
 BAHR |     -     -    -1     -    77     -     -     -   -85 |
 BILI |     -    16     -     -   -82     -     -     -    76 |
 BJFS |     -   -84     -     -   -64     -     -     -   155 |
 BOGT |     -    52     -  -122   101     -     -     -  -106 |
 BOR1 |     -    21    27     -   -97     -     -     -    67 |
 BREW |     -     -   -31     -     -     -     -     -    25 |
 BRFT |     -    99     -     -   -88     -     -     -     - |
 BRMU |     -     -     -     -    23     -     -     -   -26 |
 BRUS |     -   -23   100     -     -     -     -     -   -56 |
 CAS1 |     -    60     -    85   -52     -     -     -   -42 |
 CHAT |     -    -9     -     -     X     -     -     -     9 |
 CHUR |     -    34    85     -  -143     -     -     -    57 |
 COCO |     -    97     -   121     -     -     -     -  -153 |
 CRO1 |     -    18   149   -75    92     -     -     -  -204 |
 DAEJ |     -   209    -9     -     -     -     -     -  -200 |
 DAKA |     -    37     -     -   -33     -     -     -     - |
 DARW |     -   239   280     -  -633     -     -     -   243 |
 DAV1 |     -     X     -     -   -36     -     -     -    40 |
 DGAR |     -     -     -   -22   -41     -     -     -    56 |
 DRAO |     -   190   -37     -  -145     -     -     -     4 |
 DWH1 |     -   200    61     -     -     -     -     -  -248 |
 FAIR |     -   -38    -1  -124   -15     -     -     -   115 |
 FLIN |     -    63     -     -   -56     -     -     -     - |
 FORT |     -     -  -233     -     -     -     -     -   185 |
 GLPS |     -   -38     -     -    27     -     -     -     8 |
 GMAS |     -     -    26     -     -     -     -     -   -21 |
 GODE |     -    18    99     -     -     -     -     -   -97 |
 GOLD |     -   140     -  -197   -85     -     -     -    51 |
 GRAZ |     -  -177   205     -     -     -     -     -    12 |
 GUAM |     -   -84     -  -119    17     -     -     -   121 |
 GUAT |     -     -     -     -  -117     -     -     -   131 |
 HLFX |     -     -    -2     -     -     -     -     -     2 |
 HOB2 |     -    51    59     -   -52     -     -     -   -39 |
 HOFN |     -     -     -     -    55     -     -     -   -61 |
 IISC |     -   -14     -     X    13     -     -     -     X |
 INVK |     -  -130     -     -     -     -     -     -   128 |
 ISPA |     -   -73     -     -     5     -     -     -    67 |
 JPLM |     -     -   -69     -   -93     -     -     -   145 |
 KARR |     -    77     -     -   -68     -     -     -     - |
 KGN0 |     -   -72    -6     -     -     -     -     -    76 |
 KIRU |     -  -116     -    73     -     -     -     -    80 |
 KOKB |     -   -96     6     -    19     -     -     -    70 |
 KOUR |     -   144     -  -104   -93     -     -     -    11 |
 LAMA |     -   -68     -     -    60     -     -     -     - |
 LHAS |     -     -     -     -   -84     -     -     -    94 |
 LPGS |     -   -34   128   -36    34     -     -     -   -88 |
 MAC1 |     -    -8     -     X   -41     -     -     -    53 |
 MAD2 |     -     -     6     -     -     -     -     -    -4 |
 MALI |     -   -43     -   102    64     -     -     -   -78 |
 MAS1 |     -     -   211   -90  -174     -     -     -    70 |
 MATE |     -    98     -    66  -129     -     -     -    17 |
 MAW1 |     -   117     -     -   -19     -     -     -   -94 |
 MBAR |     -   -31     -     -   -54     -     -     -    91 |
 MCM4 |     -   130  -319   -88   331     -     -     -  -204 |
 MDO1 |     -     -     X     -  -211     -     -     -   236 |
 MEDI |     -     -    34     -     -     -     -     -   -27 |
 MIZU |     -  -124   -40     -     -     -     -     -   154 |
 MKEA |     -   -23     -     8  -149     -     -     -   185 |
 MSKU |     -    78     -     -   -69     -     -     -     - |
 NLIB |     -     -   166     -  -140     -     -     -    25 |
 NNOR |     -     -   -46   -74     -     -     -     -    72 |
 NRC1 |     -     -    83     -   -79     -     -     -    23 |
 NRIL |     -     -     -     -     9     -     -     -   -10 |
 NTUS |     -     -     -   -63    -9     -     -     -    40 |
 NYAL |     -     -     -     -    -3     -     -     -     3 |
 OHI2 |     -    89     -   203     6     -     -     -  -231 |
 ONSA |     -   -30     -    51     4     -     -     -     - |
 OPMT |     -   -69    86     -     -     -     -     -     - |
 PDEL |     -   -22     -     -    20     -     -     -     - |
 PERT |     -     -   -71   -73     -     -     -     -    91 |
 PETP |     -    26     -     -   -23     -     -     -     - |
 PIE1 |     -   -19    12     0     -     -     -     -     9 |
 PIMO |     -     -     -   -58    59     -     -     -   -39 |
 POL2 |     -   -13     -     -   -18     -     -     -    33 |
 POTS |     -     -     -     -   -51     -     -     -    57 |
 PRDS |     -   -76    14     -     -     -     -     -    64 |
 PTBB |     -    -1     8     -     -     -     -     -    -5 |
 QAQ1 |     -  -143   128     -     -     -     -     -    40 |
 QUIN |     -   -83     -     -     -     -     -     -    82 |
 RIOG |     -   -52     -    60     3     -     -     -    22 |
 SANT |     -   -42     -   163   -18     -     -     -   -16 |
 SCH2 |     -    63   102     -   -95     -     -     -   -37 |
 SCUB |     -   -25     -     -     -     -     -     -    25 |
 STJO |     -   151    68     -  -159     -     -     -   -26 |
 STR1 |     -     -   -10     -     -     -     -     -     8 |
 SUTH |     -   -80     -     -   -90     -     -     -   179 |
 SUTM |     -     -     -     -   -29     -     -     -    33 |
 THU3 |     -  -141     -     -   125     -     -     -     - |
 TIDB |     -    93  -119    57    -4     -     -     -   -19 |
 TIXI |     -   -44     -    53   113     -     -     -  -108 |
 TOW2 |     -    46     -     -     8     -     -     -   -54 |
 TRO1 |     -  -132     -     -     -     -     -     -   131 |
 TROM |     -     -     -     -   -84     -     -     -    94 |
 TSKB |     -  -101   -15  -138    79     -     -     -    89 |
 TWTF |     -   -76     4     -     -     -     -     -    72 |
 USN3 |     -   -32    80     -     -     -     -     -   -32 |
 USNO |     -    82    72     -     -     -     -     -  -139 |
 USUD |     -   -51   -18    42     -     -     -     -    45 |
 VILL |     -     -     -    88   -62     -     -     -    27 |
 WES2 |     -     -   -90     -     -     -     -     -    72 |
 WHIT |     -    -2     -     -     -     -     -     -     2 |
 WILL |     -   101   126     -     -     -     -     -  -200 |
 WSRT |     -    58    85     -  -116     -     -     -     5 |
 WUHN |     -     -     -     -   148     -     -     -  -165 |
 YAR2 |     -     -   -73     -   126     -     -     -   -83 |
 YEBE |     -     -    30     -     -     -     -     -   -24 |
 YELL |     -     -    38     X   -71     -     -     -    49 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6375    33    51    33    26    48  3358     -    26 |  288   4.60
    2 |   387    35    48    55    17    85  1314     -    20 |  288   0.23
    3 |  1620    56    57    79    31    64  1354     -    74 |  288   1.20
    4 |  2111    34    46    63    27   102   832     -    29 |  288   0.67
    5 |  1075    49    40    53    11    69  5831     -    24 |  288   1.67
    6 |  1319    45    25    27    24    62  1720     -    30 |  288   0.77
    7 |  1724    45    39    24    36    76  1346     -    15 |  288   0.99
    8 |  3265    35    38    56    22    62  3386     -    55 |  288   3.08
    9 |  1841    29    29    77    34    66  2251     -    20 |  288   1.68
   10 |  2210    60    87    57    28    95  3858     -    34 |  288   2.24
   11 |   827    24    58    24    20    89   656     -    49 |  288   0.23
   13 |   653    53    57    45    39    80   379     -    37 |  288   0.19
   14 |   658    69    66    44    35    73  1190     -    30 |  288   0.15
   15 |  2528    42    55    65    24    50  2423     -    25 |  288   2.50
   16 |  1009    51    51    52    25    90   432     -    34 |  288   0.31
   17 |   710    50    27    57    21    60   785     -    31 |  288   0.26
   18 |   834    70    46    66    30    76   501     -    34 |  288   0.41
   19 |   662    45    59   120    28    90  1172     -    54 |  288   0.28
   20 |   983    34    61    41    19     -     -     -    58 |  288   0.21
   21 |   439    49    38    96    53   157  6483     -    33 |  288   0.35
   22 |  1848    45     X   106    26    99   305     -     X |  288   0.36
   23 |   408    45    74    65    32    61   629     -    42 |  288   0.19
   24 |  2599    28    22    55    23    62  2095     -    41 |  288   1.93
   25 |  1230    31    51    51    17   106  3926     -    24 |  288   1.57
   26 |  1580    44    68    69    33    79  2608     -    20 |  288   0.59
   27 |  1668    55    47    40    37    57  1751     -    46 |  288   1.87
   28 |  2605    64    78    70    20    90  3904     -    46 |  288   0.24
   29 |   794    47   109   112    34   250   427     -    29 |  288   0.67
   30 |  2397    55    50    54    23    75   581     -    38 |  288   0.49
 -----+-------------------------------------------------------+--------------
 ALBH |     -     -    26     -     -     -     -     -    21 |  266   7.74
 ALGO |     -     -    58    63    68     -     -     -    44 |  274   0.24
 ALRT |     -     -     -     -    10     -     -     -    11 |  288   7.98
 AMC2 |     -     -    28     -     -     -     -     -    22 |  288   0.03
 ARTU |     -     -     -    40    39     -     -     -    59 |  288   8.89
 ASPA |     -     -     -     -    37     -     -     -    42 |  288    >>>
 AUCK |     -     -     -     X    37     -     -     -    42 |  288    >>>
 BAHR |     -     -    75     -    59     -     -     -    19 |  263    >>>
 BILI |     -    17     -     -    16     -     -     -    17 |  287   6.54
 BJFS |     -    11     -     -    12     -     -     -    14 |  287   9.93
 BOGT |     -    22     -    58    20     -     -     -    24 |  288  13.30
 BOR1 |     -    19    32     -    20     -     -     -    13 |  288   0.57
 BREW |     -     -    27     -     -     -     -     -    21 |  288   0.04
 BRFT |     -    24     -     -    22     -     -     -     - |  287   0.06
 BRMU |     -     -     -     -    17     -     -     -    19 |  288    >>>
 BRUS |     -    28    42     -     -     -     -     -    16 |  288   0.03
 CAS1 |     -    24     -    69    23     -     -     -    21 |  288   7.54
 CHAT |     -    36     -     -     X     -     -     -    36 |  287   9.18
 CHUR |     -    29    29     -    16     -     -     -    30 |  288   0.09
 COCO |     -    27     -    76     -     -     -     -    30 |  288   5.81
 CRO1 |     -    19    34    64    23     -     -     -    24 |  288   0.07
 DAEJ |     -    35    14     -     -     -     -     -    34 |  288   7.11
 DAKA |     -    23     -     -    21     -     -     -     - |  262  11.03
 DARW |     -    44    42     -    36     -     -     -    22 |  288   4.69
 DAV1 |     -     X     -     -   106     -     -     -   118 |  288   9.53
 DGAR |     -     -     -    63    36     -     -     -    33 |  287  17.73
 DRAO |     -    23    33     -    23     -     -     -    17 |  288   0.05
 DWH1 |     -    53    61     -     -     -     -     -    92 |  288   0.43
 FAIR |     -    28    16    40    13     -     -     -    18 |  288   7.06
 FLIN |     -    36     -     -    32     -     -     -     - |  280    >>>
 FORT |     -     -    51     -     -     -     -     -    40 |  288   0.07
 GLPS |     -    29     -     -    26     -     -     -    21 |  288  15.42
 GMAS |     -     -    25     -     -     -     -     -    20 |  288   2.15
 GODE |     -    32    15     -     -     -     -     -    25 |  288   0.17
 GOLD |     -    14     -   120    20     -     -     -    77 |  288  14.05
 GRAZ |     -    31    40     -     -     -     -     -     7 |  288   4.53
 GUAM |     -    30     -    56    35     -     -     -    34 |  288  12.16
 GUAT |     -     -     -     -    18     -     -     -    21 |  288    >>>
 HLFX |     -     -    24     -     -     -     -     -    19 |  286   8.54
 HOB2 |     -    45    39     -    30     -     -     -    25 |  288   0.07
 HOFN |     -     -     -     -    13     -     -     -    15 |  287    >>>
 IISC |     -    15     -     X    14     -     -     -     X |  188  15.61
 INVK |     -    32     -     -     -     -     -     -    32 |  288   7.06
 ISPA |     -    31     -     -    58     -     -     -    55 |  288  14.10
 JPLM |     -     -    72     -    23     -     -     -    39 |  279  59.89
 KARR |     -    31     -     -    27     -     -     -     - |  288  10.82
 KGN0 |     -    27    27     -     -     -     -     -    18 |  287   0.51
 KIRU |     -    14     -    22     -     -     -     -    17 |  288   6.01
 KOKB |     -    35    80     -    74     -     -     -    28 |  288   0.06
 KOUR |     -    31     -    37    22     -     -     -    20 |  288  10.86
 LAMA |     -    11     -     -    10     -     -     -     - |  288   8.08
 LHAS |     -     -     -     -    14     -     -     -    15 |  288   9.28
 LPGS |     -    34    51    38    20     -     -     -    18 |  288  20.82
 MAC1 |     -    27     -     X    34     -     -     -    41 |  264  10.15
 MAD2 |     -     -    41     -     -     -     -     -    33 |  288   0.05
 MALI |     -    56     -    59    54     -     -     -    90 |  288  21.07
 MAS1 |     -     -    65    39    15     -     -     -    31 |  288  12.36
 MATE |     -    21     -    27    20     -     -     -    12 |  288   0.14
 MAW1 |     -    15     -     -    12     -     -     -    19 |  288   7.85
 MBAR |     -    55     -     -    65     -     -     -    59 |  288  18.55
 MCM4 |     -    22    38    45    20     -     -     -    34 |  288 106.37
 MDO1 |     -     -     X     -    99     -     -     -   110 |  286 168.79
 MEDI |     -     -    24     -     -     -     -     -    19 |  288   0.20
 MIZU |     -    23    23     -     -     -     -     -    26 |  288    >>>
 MKEA |     -    42     -    63    41     -     -     -    21 |  288  15.17
 MSKU |     -    42     -     -    37     -     -     -     - |  286  14.34
 NLIB |     -     -    20     -    15     -     -     -    17 |  288   0.03
 NNOR |     -     -    19    37     -     -     -     -    13 |  288  11.81
 NRC1 |     -     -    12     -    11     -     -     -    10 |  288   0.02
 NRIL |     -     -     -     -    36     -     -     -    40 |  288   6.98
 NTUS |     -     -     -    37    16     -     -     -    18 |  288   9.10
 NYAL |     -     -     -     -     9     -     -     -    10 |  288   0.13
 OHI2 |     -    46     -    89    52     -     -     -   130 |  288   6.89
 ONSA |     -    22     -    17    17     -     -     -     - |  288   0.04
 OPMT |     -    32    40     -     -     -     -     -     - |  287   0.03
 PDEL |     -    25     -     -    22     -     -     -     - |  288  52.23
 PERT |     -     -    20    70     -     -     -     -    32 |  288   2.49
 PETP |     -   101     -     -    89     -     -     -     - |  252   7.23
 PIE1 |     -    17    48    26     -     -     -     -    28 |  288   0.06
 PIMO |     -     -     -    50    29     -     -     -    22 |  288  13.41
 POL2 |     -    11     -     -    11     -     -     -    10 |  288   8.94
 POTS |     -     -     -     -    10     -     -     -    11 |  286  13.42
 PRDS |     -    17    23     -     -     -     -     -    11 |  288   0.80
 PTBB |     -    24    42     -     -     -     -     -    30 |  288   0.40
 QAQ1 |     -    17    15     -     -     -     -     -    11 |  288   5.84
 QUIN |     -    29     -     -     -     -     -     -    28 |  288   7.57
 RIOG |     -    23     -    80    21     -     -     -    35 |  262   8.41
 SANT |     -    26     -    46    21     -     -     -    23 |  288   8.30
 SCH2 |     -    28    16     -    18     -     -     -    16 |  288  63.09
 SCUB |     -    25     -     -     -     -     -     -    25 |  286   8.51
 STJO |     -    25    45     -    12     -     -     -    18 |  288   0.03
 STR1 |     -     -    27     -     -     -     -     -    21 |  288   0.50
 SUTH |     -    40     -     -    23     -     -     -    20 |  288   9.67
 SUTM |     -     -     -     -    15     -     -     -    17 |  216  12.46
 THU3 |     -    16     -     -    14     -     -     -     - |  288   6.09
 TIDB |     -    27    50    50    30     -     -     -    15 |  288   0.20
 TIXI |     -    30     -    22     9     -     -     -    25 |  287   6.14
 TOW2 |     -    39     -     -    41     -     -     -    52 |  288   2.47
 TRO1 |     -    22     -     -     -     -     -     -    22 |  288   6.59
 TROM |     -     -     -     -    14     -     -     -    15 |  288   7.71
 TSKB |     -    29    33    71    16     -     -     -    18 |  288   1.92
 TWTF |     -    28    31     -     -     -     -     -    24 |  288   0.08
 USN3 |     -    21    17     -     -     -     -     -    12 |  288   0.02
 USNO |     -    14    17     -     -     -     -     -    13 |  288   0.03
 USUD |     -    22    25    52     -     -     -     -    26 |  288   0.07
 VILL |     -     -     -    40    17     -     -     -    23 |  288  11.09
 WES2 |     -     -    10     -     -     -     -     -     8 |  286   0.03
 WHIT |     -    13     -     -     -     -     -     -    13 |  288   1.01
 WILL |     -    23    20     -     -     -     -     -    20 |  288  95.22
 WSRT |     -    29    44     -    21     -     -     -    15 |  288   0.03
 WUHN |     -     -     -     -    18     -     -     -    20 |  287  13.86
 YAR2 |     -     -    25     -    28     -     -     -    21 |  288   8.63
 YEBE |     -     -    43     -     -     -     -     -    34 |  288   0.05
 YELL |     -     -    18     X    15     -     -     -    15 |  288   0.06
 -----+-------------------------------------------------------+--------------
 TOT  |  1958    36    44    60    33    90  2353     -    36 |


 BEST CLOCK FIT: USN3   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 WSRT |   288     0     0   288    9.96   | 2.26e-14  6.28e-15  1.69e-15 |
 ONSA |   288     0     0   288    9.96   | 2.37e-14  4.81e-15  2.55e-15 |
 BRUS |   288     0     0   288    9.96   | 3.60e-14  5.00e-15  9.75e-16 |
 USNO |   288     0     0   287    8.16   | 3.21e-14  5.27e-15  1.87e-15 |
 BREW |   288     0     0   288    7.55   | 4.22e-14  6.81e-15  1.71e-15 |
 WES2 |   286     0     0   285    7.24   | 3.43e-14  5.85e-15  1.64e-15 |
 NLIB |   288     0     0   288    6.70   | 2.95e-14  6.23e-15  1.97e-15 |
 AMC2 |   288     0     0   288    5.84   | 3.80e-14  7.06e-15  2.15e-15 |
 NRC1 |   288     1     0   287    4.72   | 3.49e-14  8.44e-15  3.05e-15 |
 KOKB |   288     0     0   288    4.07   | 4.33e-14  9.99e-15  3.84e-15 |
 OPMT |   287     0     0   139    3.73   | 4.13e-14  7.70e-15  2.33e-15 |
 MAD2 |   288     0     0   288    2.63   | 4.99e-14  1.38e-14  3.69e-15 |
 STJO |   288     0     0   288    2.40   | 2.95e-14  8.16e-15  2.60e-15 |
 CHUR |   288     1     0   287    2.14   | 4.62e-14  1.10e-14  2.86e-15 |
 TWTF |   288     0     0   288    1.88   | 5.21e-14  1.53e-14  5.11e-15 |
 CRO1 |   288     0     0   288    1.81   | 9.89e-14  2.04e-14  5.14e-15 |
 NYAL |   288     1     0   287    1.78   | 3.19e-14  6.50e-15  1.08e-14 |
 ALGO |   274     2     0   270    1.50   | 8.56e-14  1.88e-14  4.88e-15 |
 DRAO |   288     0     0   288    1.24   | 2.51e-14  7.48e-15  3.52e-15 |
 USN3 |   288     0     1   151    1.19   | 1.05e-13  1.22e-14  2.69e-15 |
 PIE1 |   288     0     0   288    1.01   | 5.67e-14  1.11e-14  3.53e-15 |
 HOB2 |   288     0     0   288    0.87   | 1.65e-13  1.92e-14  5.66e-15 |
 MATE |   288     0     0   288    0.57   | 4.09e-14  1.64e-14  1.59e-14 |
 YELL |   288     0     0   288    0.57   | 3.69e-14  8.34e-15  3.85e-15 |
 FORT |   288     0     0   288    0.39   | 7.81e-14  2.25e-14  5.49e-15 |
 GODE |   288     0     0   288    0.34   | 3.07e-14  7.79e-15  1.44e-14 |
 BRFT |   287     0     0   141    0.27   | 6.07e-14  1.83e-14  3.69e-15 |
 MEDI |   288     0     0   288    0.26   | 4.59e-14  9.88e-15  1.29e-14 |
 TIDB |   288     0     0   288    0.21   | 1.09e-13  3.11e-14  1.83e-14 |
 PTBB |   288     0     0   288    0.17   | 2.59e-13  7.59e-14  2.77e-14 |
 G26  |   288     0     0   288    0.11   | 3.63e-13  1.14e-13  4.01e-14 |
 DWH1 |   288     0     0   288    0.09   | 3.45e-13  1.07e-13  3.47e-14 |
 YEBE |   288     0     0   288    0.09   | 5.16e-14  1.53e-14  3.98e-15 |
 KGN0 |   287     0     0   286    0.08   | 3.56e-13  9.04e-14  3.09e-14 |
 G30  |   288     0     0   288    0.07   | 2.66e-13  1.01e-13  6.12e-14 |
 BAHR |   263     0     0   262    0.06   | 3.28e-13  8.90e-14  2.32e-14 |
 G06  |   288     0     2   183    0.05   | 3.80e-13  1.26e-13  5.32e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.65e-13  1.23e-13  4.14e-14 |
 G25  |   288     0     0   288    0.04   | 2.21e-13  8.61e-14  1.04e-13 |
 G05  |   288     0     0   288    0.04   | 1.85e-13  7.94e-14  1.42e-13 |
 G29  |   288     0     0   288    0.03   | 4.25e-13  9.89e-14  8.72e-14 |
 G07  |   288     0     0   288    0.03   | 3.00e-13  9.33e-14  1.20e-13 |
 STR1 |   288     0     0   288    0.02   | 7.05e-13  1.70e-13  4.68e-14 |
 G04  |   288     0     0   288    0.02   | 4.59e-13  1.17e-13  8.39e-14 |
 PRDS |   288     0     0   288    0.02   | 4.01e-13  1.25e-13  8.60e-14 |
 G16  |   288     0     2    79    0.02   | 6.05e-13  7.58e-14  3.07e-14 |
 G22  |   288     0     2    48    0.02   | 5.29e-13  6.80e-14  3.85e-14 |
 TSKB |   288     0     0   288    0.01   | 9.83e-13  2.87e-13  1.96e-13 |
 G03  |   288     0     0   288    0.01   | 1.34e-12  4.46e-13  9.83e-14 |
 G27  |   288     0     0   288    0.01   | 1.28e-12  3.37e-13  2.22e-13 |
 G08  |   288     0     1   152    0.01   | 1.25e-12  3.42e-13  1.83e-13 |
 GMAS |   288     0     0   288    0.00   | 1.11e-12  3.85e-13  2.04e-13 |
 G24  |   288     0     0   288    0.00   | 1.32e-12  3.60e-13  2.12e-13 |
 G15  |   288     0     0   288    0.00   | 1.54e-12  4.82e-13  2.00e-13 |
 G10  |   288     0     0   288    0.00   | 1.20e-12  4.70e-13  2.03e-13 |
 G09  |   288     0     0   288    0.00   | 1.51e-12  4.60e-13  1.75e-13 |
 HLFX |   286     0     0   285    0.00   | 2.15e-13  1.38e-13  4.78e-13 |
 GPST |   288     0     0     0    0.00   | 3.55e-14  6.14e-15  2.21e-15 |
 SUTM |   216     0     0     0    0.00   |        -         -         - |
 IISC |   188     0     0     0    0.00   |        -         -         - |
 RIOG |   262     0     0     0    0.00   |        -         -         - |
 PETP |   252     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.12e-13  6.83e-14  3.14e-14 |
 G23  |   288     0     5     0    0.00   | 5.53e-13  5.45e-14  1.66e-14 |
 G21  |   288     1     6     0    0.00   | 1.07e-12  1.33e-13  4.94e-14 |
 G20  |   288     0     5     0    0.00   | 6.48e-13  7.33e-14  2.13e-14 |
 G19  |   288     0     5     0    0.00   | 5.22e-13  6.17e-14  2.75e-14 |
 G18  |   288     0     6     0    0.00   | 8.41e-13  9.08e-14  3.82e-14 |
 G17  |   288     0     6     0    0.00   | 6.17e-13  6.58e-14  1.64e-14 |
 G14  |   288     0     6     0    0.00   | 5.65e-13  5.46e-14  1.03e-14 |
 G13  |   288     0     5     0    0.00   | 5.31e-13  5.78e-14  1.88e-14 |
 G11  |   288     0     5     0    0.00   | 6.02e-13  5.85e-14  2.54e-14 |
 G02  |   288     0     6     0    0.00   | 5.36e-13  5.81e-14  2.11e-14 |
 G01  |   288     0     1     0    0.00   | 2.04e-12  8.22e-13  6.01e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.32e-13  1.97e-13  1.15e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     5     0    0.00   | 2.74e-13  3.14e-14  5.30e-15 |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   | 4.21e-13  4.88e-13  2.28e-13 |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     1     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   286     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 2.00e-12  4.57e-13  2.93e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   286     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MIZU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   286     1     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 LAMA |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   279     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   280     2     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   | 1.93e-13  5.61e-13  1.01e-12 |
 DARW |   288     0     0     0    0.00   | 2.41e-13  3.90e-13  4.31e-13 |
 DAKA |   262     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.10e-13  5.60e-13  5.13e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   266     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.77e-17  3.32e-16  1.99e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      ONSA      BRUS |
------------------------------------------+------------------------------+
