
 GPS week: 1364   Day: 3   MJD: 53795                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 cod |   288     0  18250    673    -0.14    -0.19     0.06     7.51      0
 emr |   287     0  24413     20  3562.41    42.35     0.04    13.13      0
 esa |   288     0  22918   2704     0.23     0.16     0.05     9.39      0
 gfz |   288     1  42552    938    17.19     0.14     0.03    23.74      0
 igr |   288     0  39128     35     3.11     0.13     0.03     0.00      0
 jpl |   288     0  27538    265    -0.74    -0.21     0.03    25.13      0
 mit |   288     0  38019    638    -0.77     0.33     0.03    21.10      0
 ngs |    96     0   2782      2     0.13     0.11     2.02     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs |
 -----+-------------------------------------------------+
    1 |    57   -82   -28    47    23    51   -70  -985 |
    2 |   -79   -26   152    55     3    21  -106 -2687 |
    3 |    27  -109    42   154    25   -19  -110 -4253 |
    4 |    16  -242   198    15   -63    43    -7 -3971 |
    5 |     5   -17    11    81    78     1   -84  2170 |
    6 |    30  -243    98   114    -5    25   -59  -860 |
    7 |     6    31   126   104    76  -190    38 -1056 |
    8 |   169   -72    43   113     0   -35  -120 -8345 |
    9 |   -39   -76     9   128    48   -11   -73   314 |
   10 |   -36   -47   -11   156    -7    -7  -120 -2586 |
   11 |    26   -10    60   -32   -22    40   -41  4682 |
   13 |   237  -242   -34    17   -84    59    -9  3881 |
   14 |    19   -35   -10   124    15   -11  -108  4773 |
   15 |    71   -50    23   158    57   -84   -81   250 |
   16 |    63  -112   -47    50     3     8     3  3902 |
   17 |    61  -245   246   -16    10    77   -47  -357 |
   18 |   -65  -165    11    54   -24    23    33  4571 |
   19 |   162   -58   -90   120     3    43  -169   215 |
   20 |    18    -7    97    77    63   -40   -81  4758 |
   21 |    56  -103   -60   117    -1     0   -62  3952 |
   22 |  -138   -25   -18    22   -22    71   -37 -4643 |
   23 |   101   -34    95    56   -22     8  -123  -914 |
   24 |   103   -54   102   -21     6   -33    17  -447 |
   25 |    86  -138   -55    70    -6    11   -13 -1542 |
   26 |    37  -223    62    67   -13    95   -89   -96 |
   27 |   127  -114    80    94     4   -19   -91  -852 |
   28 |     2    49   157   129    67   -36  -192  2407 |
   29 |   -69  -127    66    37     7    40   -14 -1819 |
   30 |   132  -196     -   -31    65     -   119  -469 |
 -----+-------------------------------------------------+
 ALBH |     -   -52     -  -132    -1     -   181     - |
 ALGO |     -    72     X  -190   -68   153   -14     - |
 ALIC |     -     -     -   -55    28     -    62     - |
 ALRT |     -     -     -   -53    50     1    58     - |
 AMC2 |     -   301    55  -260   117     -    82     - |
 ARTU |     -     -   155    -8   -64    16   -75     - |
 ASPA |     -     -     -   278    52  -262     -     - |
 AUCK |  -212     -     -   240   113  -163     -     - |
 BAHR |     -   169     -   -75   -23   112  -154     - |
 BILI |     -     -     -   -93    68    49    46     - |
 BJFS |     -     -     -   -32   149   199  -201     - |
 BOGT |     -     -     -   107    61  -132    37     - |
 BOR1 |     -    -2     -   -29   -31     -    34     - |
 BREW |     -   156     -     -   181     -   -97     - |
 BRMU |     -     -     -    76     5   -72     -     - |
 BRUS |     -    34     -   -76   -18     -    64     - |
 CAS1 |   -17     -   -20  -124   -57   117    14     - |
 CHAT |  -144     -     4   -64     4   141   -47     - |
 CHUR |    48   182     -   -73    87     -   -48     - |
 COCO |  -260     -    10   -75    10   168   -28     - |
 CORD |   -57     -     -    18     -     -     -     - |
 CRO1 |    68    12   -20    46   -61    30  -110     - |
 DAEJ |    86   -32     -     X   -79     -    -9     - |
 DAKA |    27     -     -    71    64   -75     -     - |
 DARW |    47  -123  -117   243  -128   -98   -48     - |
 DAV1 |     X     -     -    52   348     -   -59     - |
 DGAR |  -208     -     X   -65   -60     5   141     - |
 DRAO |  -191    45     X  -105   -95     -   158     - |
 DUBO |    69     -     -    27     -   -46     -     - |
 DWH1 |   271    42     -   283   -82  -190  -214     - |
 FAIR |     -    -2     -   -18     5     -    22     - |
 FLIN |   -80     -     -    25    62     -     -     - |
 GLPS |   117     -   -85    14    49    -2   -24     - |
 GMAS |     -   122     -     -    80     -   -76     - |
 GODE |   -69     6     X   -92   -51     -   124     - |
 GOLD |   -51     -    49    -2    26     -     -     - |
 GRAS |  -112     -     -    36   -28     -     -     - |
 GRAZ |  -363    62     -    26  -212     -    51     - |
 GUAM |   -15     -  -184    97    83     -   -27     - |
 GUAT |   -48     -     -  -160   -70   165     -     - |
 GUUG |     -     -     -   -58     -    55     -     - |
 HERS |  -126     -     -     -     -     -    45     - |
 HILO |     -     -     -    74     -     -   -83     - |
 HNLC |     -     -     -   139     -     -  -156     - |
 HOB2 |    21   127    13    18     8   -27   -80     - |
 HOLB |    -9     -     -     3     -     -     -     - |
 HYDE |  -125     -     -     -   -66     -    45     - |
 IISC |   -78     -  -174   -10   -77   104     X     - |
 INVK |   -84     -     -    27   -15     -     -     - |
 ISPA |    98     -  -174   -54   -39    81     -     - |
 JPLM |     -    77     -   -27    28     -   -17     - |
 KERG |     -   -84    -8   -45   -60   -12   120     - |
 KGN0 |     -    23     -   -13    23     -     -     - |
 KHAJ |     -   -52     -     -     -   -80   128     - |
 KIRU |     -     -   163   -39    26   101  -145     - |
 KIT3 |     -     -  -153    59   -11    60   -71     - |
 KOKB |     -     4  -123    41   -29     4    -4     - |
 KOUR |     -     -  -295   -60    48     -   187     - |
 KUNM |     -     -     -     X     -     4    -5     - |
 LHAS |     -     -   -53     2   -34   -19    42     - |
 LPGS |     -   -20   -45    73     0   -41    -3     - |
 LROC |     -     -     -     3     -    -3     -     - |
 MAC1 |     -     -     X   126   114   -56   -75     - |
 MALI |     -     -  -188    -4  -125     -    83     - |
 MAS1 |     -     7     X  -216   -30   102   116     - |
 MATE |     -     -   -65  -160  -128     -   205     - |
 MAUI |     -     -     -   104     -     -  -117     - |
 MAW1 |     -     -   -84    63   168     -   -35     - |
 MBAR |     X     -     -   -55   -55    52     -     - |
 MCM4 |     -     -     -  -450  -197   -54   568     - |
 MDO1 |     -   146     -   -81    25     -     -     - |
 MDVJ |     -     -     -     -     -  -455   542     - |
 MEDI |     -  -159     -     -  -122     -    99     - |
 METS |     -     -     -   -56     -     -    63     - |
 MIZU |    51   -65     -    20     -     -     -     - |
 MKEA |     -     -    -6   -42    23     -    49     - |
 MSKU |     -     -     -    28   -33     -   -32     - |
 NICO |     -     -     -   -41   -27    39     -     - |
 NISU |     -    31     -   -17  -329     -     -     - |
 NLIB |     -    64     -   -33     4     -    -3     - |
 NNOR |     -   -75    62     -    28     -    20     - |
 NOT1 |     -     -     -     -   -59    52   -62     - |
 NOUM |     -     -     -   185     -  -174     -     - |
 NRC1 |     -    47     X  -113   -73     -    98     - |
 NRIL |     -     -     -   -69   -58     5    71     - |
 NTUS |     -     -  -294   166     -     -   -63     - |
 NYA1 |     -     -     -  -112    20   -23   153     - |
 NYAL |     -   -58   104   -10   -25     -     3     - |
 OHI2 |     -     -     X   -46   -29    -5    57     - |
 ONSA |     -     -    22   -10   -88    -8    11     - |
 OPMT |     -   124     -   -69     -     -     -     - |
 PDEL |     -     -   131   -14     -   -32     -     - |
 PERT |     -   110   -50    58     -   -77   -13     - |
 PETS |     -     -     -   164     -  -155     -     - |
 PIE1 |     -   147     X     6    36     -   -98     - |
 PIMO |     -     -  -178    32    25   -35    80     - |
 POL2 |     -     -   -39     -   -28     -    17     - |
 POTS |     -     -  -111    44    79     -     -     - |
 PRDS |     -   186     -     X   195     -  -116     - |
 PTBB |     -     7     -     -    -9     -    -4     - |
 QAQ1 |     -   123     -   -86    91     -    21     - |
 RABT |     -     -     -   450     -  -350   -88     - |
 RBAY |     -     -   -12     5     -     X     -     - |
 REYK |     -     -     -   -22     -    21     -     - |
 RIOG |    31   -10    68    21    13   -37   -12     - |
 SANT |     -     -    32   -95   -81    42    44     - |
 SCH2 |     -    40     -  -103   -33    33    52     - |
 SCUB |     -     -   -65   -54   -20    72     X     - |
 SFER |     -     -     -  -147     -     -   166     - |
 SIO3 |     -     -     -  -106     -   100     -     - |
 STJO |     -    94   120   -81   -65     1   -16     - |
 STR1 |     -   126     -     -    50     -   -78     - |
 SUTH |     -     -     0  -107    23   124   -28     - |
 SUTM |     -     -     -    71     -     -   -80     - |
 SYOG |     -   157  -114    34    81    66  -179     - |
 THU3 |     -     -    82   -32  -188     -     -     - |
 TIDB |     -   155  -137    -7   -55     -   -31     - |
 TIXI |     -     -    25   -19   -90   -54    76     - |
 TLSE |     -     -     -  -605     -     -   681     - |
 TNML |     -   -24     -     -     -     -    15     - |
 TOW2 |    46     -  -215   -20    56    86    -6     - |
 TRO1 |     -     -     -   -70   -27     -    79     - |
 TSKB |     -    51    35    97   -36    36  -198     - |
 TWTF |    23    44     -  -115    57    20    69     - |
 USN3 |     -   -10     -     -    25     5     -     - |
 USNO |     -    -3     -     -   -27     -     2     - |
 USUD |     -   -36    15    30    -9     -   -18     - |
 VILL |     -     -   175    -6    58     -   -66     - |
 WES2 |     -   -10     -    61   -74     -   -62     - |
 WHIT |     -     -     -    -1   -12    -9    13     - |
 WILL |     -   308     -  -376   100     -   231     - |
 WSRT |     -    42     -   -83   -16     -    67     - |
 WUHN |     -     -     -   159   175     -  -179     - |
 YAKT |     -     -     -   -13   100    76   -76     - |
 YAR2 |     -    84     -   -47    31     -     -     - |
 YEBE |     -  -108     -     -     -     -    67     - |
 YELL |     -    99   -18  -213   -86   145    12     - |
 YSSK |     -     -     -   -43   -63     -    48     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    33    53    49    26    25    23    37  4034 |  288   4.17
    2 |    59    59    62    17    30    32    31   526 |  288   0.19
    3 |    29    58    60    25    30    19    35  3062 |  288   1.63
    4 |    68    51    34    28    19    27    47  1498 |  288   0.92
    5 |    85    57    59    30    36    51    30  1536 |  288   1.46
    6 |    49    61    38    21    28    20    36  1041 |  288   1.24
    7 |    49    59    38    24    29    19    38  1591 |  288   0.71
    8 |    65    46    66    17    29    32    20  2249 |  288   1.61
    9 |    41    46    40    21    36    21    21  2547 |  288   1.14
   10 |    92    54    64    35    35    25    18  2700 |  288   2.73
   11 |    36    65    46    15    31    26    41   628 |  288   0.33
   13 |    81    57    47    25    28    29    36  2234 |  288   0.25
   14 |    47    98    40    37    32    18    26  1021 |  288   0.20
   15 |    53    74    37    19    25    21    31  5265 |  288   2.45
   16 |    91    65    39    22    31    28    19   563 |  288   0.32
   17 |    25    82    25    26    44    29    22   894 |  288   0.23
   18 |   105    59    31    23    33    26    26   625 |  288   0.31
   19 |   117    50    47    19    51    31    35   546 |  288   0.23
   20 |    73    66    25    20    30    30    34   541 |  288   0.29
   21 |    57    61    39    22    57    21    33   542 |  288   0.35
   22 |    90    60    37    12    49    31    30  1975 |  288   0.26
   23 |    86    64    47    43    33    27    20   599 |  288   0.24
   24 |    48    58    84    22    28    23    45  2817 |  288   2.13
   25 |    43    48    35    28    24    25    14  1537 |  288   0.54
   26 |    27    42    74    29    36    19    25  2166 |  288   0.53
   27 |    86    48    52    19    31    28    32  2430 |  288   2.40
   28 |    74    46    25    24    39    29    32   779 |  288   0.78
   29 |    42    42    57    32    38    17    29  1683 |  288   0.57
   30 |    99    58     -    72    84     -   118  1297 |  283   0.55
 -----+-------------------------------------------------+--------------
 ALBH |     -    13     -    10    15     -    13     - |  287   7.71
 ALGO |     -    18     X    30    11    26    14     - |  287   0.08
 ALIC |     -     -     -    13    26     -    15     - |  287   6.49
 ALRT |     -     -     -    15    17    15    21     - |  288   4.99
 AMC2 |     -    31    41    23    16     -    30     - |  288   0.02
 ARTU |     -     -    61    23    24    13    35     - |  288   8.95
 ASPA |     -     -     -    30    32    28     -     - |  287    >>>
 AUCK |    43     -     -    28    45    17     -     - |  288    >>>
 BAHR |     -    15     -    21    16    14    23     - |  288   0.44
 BILI |     -     -     -    14     8    11    17     - |  287   6.86
 BJFS |     -     -     -    16    19    18    15     - |  287  10.09
 BOGT |     -     -     -    10    11    12    20     - |  288  14.99
 BOR1 |     -    27     -    21    15     -    18     - |  287   0.66
 BREW |     -    35     -     -    21     -    22     - |  287   0.05
 BRMU |     -     -     -    18    16    17     -     - |  287    >>>
 BRUS |     -    39     -    18    13     -    19     - |  287   0.02
 CAS1 |    51     -    61    22    25    17    13     - |  288   6.41
 CHAT |    20     -    39    22    47    18    30     - |  287   8.72
 CHUR |    37    21     -    13    11     -    23     - |  287   0.06
 COCO |   113     -    63    17    27    20    46     - |  288  11.07
 CORD |    20     -     -     6     -     -     -     - |  237  11.52
 CRO1 |    28    19    57    29    20    21    38     - |  287   0.05
 DAEJ |    19    25     -     X    14     -    16     - |  250   5.10
 DAKA |    79     -     -    15    32    17     -     - |  276  13.73
 DARW |    35    26    42    31    26    27    33     - |  288   3.95
 DAV1 |     X     -     -     9    43     -    10     - |  287   4.91
 DGAR |    24     -     X    56    23    35    46     - |  288  17.09
 DRAO |    32    18     X    10    12     -    17     - |  287   0.04
 DUBO |    21     -     -    16     -    13     -     - |  288  71.21
 DWH1 |    59    18     -    25    27    28    25     - |  288   0.33
 FAIR |     -    16     -     8    21     -    12     - |  287   8.74
 FLIN |    19     -     -     6    23     -     -     - |  287  21.62
 GLPS |    33     -    87    33    33    21    72     - |  288  15.19
 GMAS |     -    23     -     -    22     -    15     - |  287   1.57
 GODE |    50    16     X    10    20     -    23     - |  288   0.09
 GOLD |    24     -    62    19    14     -     -     - |  288  11.82
 GRAS |    46     -     -    15    23     -     -     - |  287   8.38
 GRAZ |    37    26     -    18    58     -    16     - |  262   3.98
 GUAM |   104     -    80    19    24     -    18     - |  288  12.72
 GUAT |    64     -     -    12    17    17     -     - |  288    >>>
 GUUG |     -     -     -    17     -    16     -     - |  287    >>>
 HERS |    38     -     -     -     -     -    14     - |  264  27.85
 HILO |     -     -     -    16     -     -    18     - |  263  15.63
 HNLC |     -     -     -    33     -     -    37     - |  287  14.66
 HOB2 |    37    21    43    10    32    11    22     - |  288   0.07
 HOLB |    26     -     -     8     -     -     -     - |  287  51.06
 HYDE |    23     -     -     -    26     -     8     - |  288  16.32
 IISC |    63     -    58    42    46    28     X     - |  288  21.92
 INVK |    30     -     -     9    15     -     -     - |  287   6.26
 ISPA |    37     -    64    20    28    24     -     - |  288  10.26
 JPLM |     -    37     -    16    29     -    31     - |  287  36.88
 KERG |     -    24    45    20    10    23    21     - |  288   1.73
 KGN0 |     -    15     -     8    19     -     -     - |  287   0.25
 KHAJ |     -    17     -     -     -     8    16     - |  288   0.08
 KIRU |     -     -    41    11    19    12    27     - |  288   7.84
 KIT3 |     -     -    46    22    21    16    26     - |  216  29.39
 KOKB |     -    17    47    18    36    29    17     - |  288   0.10
 KOUR |     -     -    39    13    13     -    18     - |  288  13.05
 KUNM |     -     -     -     X     -    13    16     - |  288  24.85
 LHAS |     -     -    27     8    11    13    14     - |  288   9.44
 LPGS |     -    37    42    23    13    21    26     - |  288  19.02
 LROC |     -     -     -    12     -    11     -     - |  287   7.50
 MAC1 |     -     -     X    22    34    33    23     - |  264   8.90
 MALI |     -     -    69    18    29     -    27     - |  287  20.37
 MAS1 |     -    25     X    19    15    17    20     - |  287  13.38
 MATE |     -     -    30    22    13     -    28     - |  288   0.10
 MAUI |     -     -     -    32     -     -    36     - |  264  15.13
 MAW1 |     -     -    28     8    35     -    14     - |  288   6.89
 MBAR |     X     -     -    65    46    62     -     - |  287  18.69
 MCM4 |     -     -     -    22    11    22    12     - |  181  16.73
 MDO1 |     -    14     -     8     9     -     -     - |  287   9.12
 MDVJ |     -     -     -     -     -    16    19     - |  288   0.04
 MEDI |     -    16     -     -    32     -    10     - |  155   0.03
 METS |     -     -     -    14     -     -    16     - |  287   5.80
 MIZU |    76    60     -    56     -     -     -     - |  287    >>>
 MKEA |     -     -    65    31    22     -    55     - |  288  15.73
 MSKU |     -     -     -    20    22     -    22     - |  287  13.67
 NICO |     -     -     -    16    20    15     -     - |  287  13.40
 NISU |     -    21     -    12    24     -     -     - |  287   0.03
 NLIB |     -    21     -    18    16     -    28     - |  287   0.05
 NNOR |     -    20    32     -    19     -    11     - |  288  12.26
 NOT1 |     -     -     -     -    20    17    20     - |  288   0.12
 NOUM |     -     -     -    19     -    18     -     - |  287    >>>
 NRC1 |     -    18     X    21    13     -    21     - |  287   0.03
 NRIL |     -     -     -    10    13    13    20     - |  288   6.32
 NTUS |     -     -    37    22     -     -    21     - |  288   8.81
 NYA1 |     -     -     -    14    15    13    28     - |  288   0.06
 NYAL |     -     9    29    14    12     -    14     - |  287   0.06
 OHI2 |     -     -     X    17    24    11    22     - |  288   6.89
 ONSA |     -     -    38    37    19    27    24     - |  288   0.03
 OPMT |     -    25     -    14     -     -     -     - |  287   0.03
 PDEL |     -     -    80    17     -    20     -     - |  288  57.16
 PERT |     -    24    45    11     -    46    45     - |  243   2.14
 PETS |     -     -     -    11     -    10     -     - |  287   8.54
 PIE1 |     -    43     X    65    42     -    99     - |  287   0.07
 PIMO |     -     -    56    82    40    67    36     - |  288  13.92
 POL2 |     -     -    34     -    34     -    15     - |  272  10.10
 POTS |     -     -   110    44    42     -     -     - |  261  11.69
 PRDS |     -    21     -     X    22     -    13     - |  287   1.02
 PTBB |     -    24     -     -    23     -    15     - |  287   0.20
 QAQ1 |     -    21     -    18    12     -    22     - |  287   5.41
 RABT |     -     -     -    33     -    24    32     - |  288  11.03
 RBAY |     -     -    83    33     -     X     -     - |  237  52.96
 REYK |     -     -     -     9     -     9     -     - |  287   6.62
 RIOG |    51    22    78    17    14    28    31     - |  288   9.35
 SANT |     -     -    26    12    31    30    31     - |  288   6.51
 SCH2 |     -    21     -    12    17    10    20     - |  287 114.97
 SCUB |     -     -    36    67    96    64     X     - |  264   8.66
 SFER |     -     -     -    26     -     -    29     - |  287   0.52
 SIO3 |     -     -     -    16     -    15     -     - |  261  12.95
 STJO |     -    26    25    16    24     9    25     - |  287   0.02
 STR1 |     -    22     -     -    15     -    14     - |  287   1.26
 SUTH |     -     -    79    19    20    18    18     - |  288   9.54
 SUTM |     -     -     -    20     -     -    22     - |   74   7.40
 SYOG |     -    28    54    20    15    30    20     - |  285   0.90
 THU3 |     -     -    36    14    15     -     -     - |  271   5.20
 TIDB |     -    25    39    11    18     -    15     - |  288   0.36
 TIXI |     -     -   105    27    11    15    15     - |  287   6.03
 TLSE |     -     -     -    13     -     -    15     - |  251   0.36
 TNML |     -    16     -     -     -     -    10     - |  287   1.64
 TOW2 |    49     -    57    29    35    24    17     - |  288   2.84
 TRO1 |     -     -     -    17    14     -    19     - |  287   7.45
 TSKB |     -    11    48    21    18    11    16     - |  288   0.89
 TWTF |    47    25     -    50    29    18    19     - |  288   0.04
 USN3 |     -    23     -     -    25    12     -     - |  287   0.03
 USNO |     -    15     -     -    18     -     9     - |  287   0.02
 USUD |     -    14    38    18    18     -    20     - |  288   0.07
 VILL |     -     -    46    11    10     -    21     - |  288  11.11
 WES2 |     -    20     -    19    24     -    16     - |  287   0.03
 WHIT |     -     -     -    17    15     9    18     - |  287  19.51
 WILL |     -    18     -    13    19     -    22     - |  287  43.31
 WSRT |     -    18     -    25    18     -    20     - |  287   0.02
 WUHN |     -     -     -    13    21     -    15     - |  287  14.96
 YAKT |     -     -     -    72    21    47    30     - |  288   6.26
 YAR2 |     -    15     -     9    20     -     -     - |  287   7.92
 YEBE |     -    43     -     -     -     -    27     - |  287   0.39
 YELL |     -    59    22    40    20    45    41     - |  287   0.03
 YSSK |     -     -     -     7    11     -     8     - |  287   7.45
 -----+-------------------------------------------------+--------------
 TOT  |    59    40    53    26    28    25    29  2018 |


 BEST CLOCK FIT: BRUS   287   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   287     0     0   286    9.89   | 4.67e-14  6.26e-15  2.76e-15 |
 BRUS |   287     0     0   286    9.89   | 3.75e-14  4.85e-15  1.18e-15 |
 WSRT |   287     0     0   286    9.87   | 2.71e-14  8.97e-15  2.21e-15 |
 OPMT |   287     0     0   286    9.78   | 4.48e-14  8.28e-15  2.18e-15 |
 ONSA |   288     0     0   288    9.39   | 3.58e-14  6.53e-15  2.68e-15 |
 BREW |   287     0     0   286    5.14   | 5.86e-14  7.39e-15  2.19e-15 |
 STJO |   287     0     0   286    4.99   | 3.07e-14  6.60e-15  1.61e-15 |
 AMC2 |   288     0     0   288    4.13   | 4.40e-14  8.69e-15  2.14e-15 |
 NRC1 |   287     0     0   286    3.56   | 3.13e-14  5.44e-15  2.73e-15 |
 NLIB |   287     0     0   286    3.55   | 3.52e-14  7.41e-15  3.18e-15 |
 TWTF |   288     0     0   288    3.33   | 3.68e-14  8.55e-15  4.55e-15 |
 NISU |   287     0     0   286    2.96   | 5.16e-14  1.01e-14  2.61e-15 |
 WES2 |   287     0     0   286    2.84   | 3.16e-14  5.98e-15  3.30e-15 |
 KOKB |   288     0     0   288    2.82   | 4.35e-14  8.97e-15  5.43e-15 |
 YELL |   287     0     0   286    2.80   | 3.09e-14  7.10e-15  1.60e-15 |
 ALGO |   287     0     0   286    2.17   | 3.31e-14  7.29e-15  5.07e-15 |
 CRO1 |   287     0     0   286    1.88   | 1.18e-13  1.70e-14  3.95e-15 |
 CHUR |   287     0     0   286    1.87   | 5.18e-14  1.36e-14  6.52e-15 |
 KHAJ |   288     0     0   288    1.59   | 6.17e-14  2.37e-14  5.94e-15 |
 NYAL |   287     0     0   286    0.98   | 3.00e-14  7.41e-15  6.22e-15 |
 USN3 |   287     0     1   112    0.85   | 9.04e-14  1.16e-14  2.26e-15 |
 HOB2 |   288     0     0   288    0.81   | 1.51e-13  1.52e-14  8.46e-15 |
 NYA1 |   288     0     0   288    0.79   | 3.39e-14  7.23e-15  6.47e-15 |
 DRAO |   287     0     0   286    0.70   | 3.43e-14  7.73e-15  2.79e-15 |
 MATE |   288     0     0   218    0.58   | 4.61e-14  1.84e-14  1.07e-14 |
 PIE1 |   287     0     0   286    0.45   | 6.28e-14  1.30e-14  5.22e-15 |
 YEBE |   287     0     0   286    0.37   | 5.40e-14  1.70e-14  3.48e-14 |
 NOT1 |   288     0     0   288    0.37   | 5.46e-14  1.74e-14  7.62e-15 |
 MDVJ |   288     0     0   143    0.26   | 5.64e-14  7.26e-15  3.13e-15 |
 GODE |   288     0     0   288    0.25   | 3.19e-14  6.91e-15  6.56e-15 |
 TIDB |   288     0     0   288    0.18   | 1.12e-13  4.89e-14  4.34e-14 |
 PTBB |   287     0     0   286    0.15   | 2.79e-13  6.02e-14  1.37e-14 |
 G25  |   288     0     0   288    0.10   | 2.31e-13  7.34e-14  5.01e-14 |
 BAHR |   288     0     0   288    0.08   | 3.78e-13  9.64e-14  2.83e-14 |
 G29  |   288     0     0   288    0.06   | 3.82e-13  1.29e-13  6.60e-14 |
 G26  |   288     0     0   288    0.06   | 3.59e-13  1.08e-13  3.26e-14 |
 SFER |   287     0     0   286    0.05   | 3.74e-13  1.29e-13  5.68e-14 |
 TLSE |   251     0     0   236    0.05   | 3.83e-13  1.16e-13         - |
 G06  |   288     0     0   288    0.04   | 3.77e-13  1.05e-13  8.80e-14 |
 G07  |   288     0     0   288    0.04   | 2.90e-13  8.02e-14  8.56e-14 |
 BOR1 |   287     0     0   286    0.04   | 4.34e-13  1.41e-13  6.62e-14 |
 G04  |   288     0     0   288    0.04   | 4.28e-13  1.27e-13  1.00e-13 |
 DWH1 |   288     0     0   143    0.04   | 3.41e-13  7.96e-14  3.49e-14 |
 G16  |   288     0     4    98    0.03   | 6.63e-13  7.23e-14  3.31e-14 |
 G30  |   283     0     0   136    0.03   | 3.00e-13  9.04e-14  6.21e-14 |
 G05  |   288     0     0   288    0.03   | 1.87e-13  7.62e-14  1.23e-13 |
 KGN0 |   287     0     0   142    0.03   | 3.53e-13  8.72e-14  1.67e-14 |
 STR1 |   287     0     0   286    0.02   | 6.68e-13  1.56e-13  1.22e-13 |
 PRDS |   287     0     0   286    0.02   | 4.42e-13  1.56e-13  7.85e-14 |
 SYOG |   285     0     0   282    0.02   | 7.46e-13  2.07e-13  9.26e-14 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  2.88e-13  9.23e-14 |
 MEDI |   155     0     0     7    0.01   | 6.06e-14  8.29e-15         - |
 G08  |   288     0     0   288    0.01   | 1.44e-12  3.10e-13  1.07e-13 |
 KERG |   288     0     0   288    0.01   | 1.15e-12  3.41e-13  2.03e-13 |
 GMAS |   287     0     0   286    0.00   | 1.21e-12  4.35e-13  1.08e-13 |
 G03  |   288     0     0   288    0.00   | 1.24e-12  3.33e-13  1.13e-13 |
 TNML |   287     0     0   142    0.00   | 4.01e-13  1.31e-13  1.24e-13 |
 G24  |   288     0     0   288    0.00   | 1.43e-12  4.42e-13  2.29e-13 |
 G09  |   288     0     5    47    0.00   | 1.42e-12  3.92e-13  9.91e-14 |
 TOW2 |   288     0     0   288    0.00   | 4.11e-13  4.45e-13  2.62e-13 |
 GPST |   288     0     0     0    0.00   | 2.85e-14  4.32e-15  8.61e-16 |
 KIT3 |   216     0     0     0    0.00   |        -         -         - |
 SIO3 |   261     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 YAR2 |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 WILL |   287     0     0     0    0.00   |        -         -         - |
 WHIT |   287     0     1     0    0.00   | 5.53e-13  3.88e-13  1.21e-12 |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 THU3 |   271     0     0     0    0.00   |        -         -         - |
 SUTM |    74     0     0     0    0.00   |        -         -         - |
 SCH2 |   287     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 RBAY |   237     0     0     0    0.00   |        -         -         - |
 QAQ1 |   287     0     0     0    0.00   |        -         -         - |
 POTS |   261     0     0     0    0.00   |        -         -         - |
 PETS |   287     0     0     0    0.00   |        -         -         - |
 NOUM |   287     0     0     0    0.00   |        -         -         - |
 NICO |   287     0     0     0    0.00   |        -         -         - |
 MSKU |   287     0     0     0    0.00   |        -         -         - |
 MIZU |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     1     0    0.00   | 7.43e-13  7.51e-13  8.83e-13 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAUI |   264     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   |        -         -         - |
 MALI |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 LROC |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   287     0     0     0    0.00   |        -         -         - |
 INVK |   287     0     0     0    0.00   |        -         -         - |
 HOLB |   287     0     0     0    0.00   |        -         -         - |
 HNLC |   287     0     0     0    0.00   |        -         -         - |
 HILO |   263     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 GUUG |   287     0     0     0    0.00   |        -         -         - |
 GRAZ |   262     0     0     0    0.00   |        -         -         - |
 GRAS |   287     0     0     0    0.00   |        -         -         - |
 FLIN |   287     0     0     0    0.00   |        -         -         - |
 FAIR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   287     0     0     0    0.00   | 1.94e-13  5.50e-13  5.24e-13 |
 DAEJ |   250     0     0     0    0.00   |        -         -         - |
 CORD |   237     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BRMU |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 ASPA |   287     0     0     0    0.00   |        -         -         - |
 ALIC |   287     0     0     0    0.00   |        -         -         - |
 ALBH |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.54e-13  7.58e-14  4.69e-14 |
 G27  |   288     0     0     0    0.00   | 1.21e-12  4.64e-13  3.18e-13 |
 G23  |   288     0     6     0    0.00   | 5.63e-13  5.62e-14  1.82e-14 |
 G22  |   288     0     6     0    0.00   | 6.23e-13  6.62e-14  2.55e-14 |
 G21  |   288     4     6     0    0.00   | 9.66e-13  1.51e-13  6.08e-14 |
 G20  |   288     0     6     0    0.00   | 6.22e-13  7.59e-14  2.33e-14 |
 G19  |   288     0     6     0    0.00   | 6.74e-13  6.65e-14  2.13e-14 |
 G18  |   288     0     6     0    0.00   | 9.23e-13  8.28e-14  3.34e-14 |
 G17  |   288     0     6     0    0.00   | 6.19e-13  6.41e-14  2.00e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.13e-13  2.05e-13 |
 G14  |   288     0     6     0    0.00   | 5.58e-13  6.05e-14  1.85e-14 |
 G13  |   288     0     6     0    0.00   | 5.78e-13  6.11e-14  2.60e-14 |
 G11  |   288     0     6     0    0.00   | 7.15e-13  6.57e-14  3.79e-14 |
 G10  |   288     0     0     0    0.00   | 1.18e-12  3.65e-13  3.51e-13 |
 G02  |   288     0     6     0    0.00   | 5.68e-13  5.96e-14  2.02e-14 |
 G01  |   288     0     1     0    0.00   | 1.90e-12  6.59e-13  5.08e-13 |
 YAKT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     6     0    0.00   | 2.69e-13  2.55e-14  6.38e-15 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   264     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   272     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   243     0     0     0    0.00   | 1.95e-12  4.42e-13         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   181     0     1     0    0.00   | 7.25e-13  5.66e-13         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.09e-13  4.43e-13  4.04e-13 |
 DAKA |   276     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.23e-13  5.90e-13  1.05e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.59e-17  4.31e-16  2.59e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      BRUS      BRUS |
------------------------------------------+------------------------------+
