
 GPS week: 1379   Day: 2   MJD: 53899                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.11    -0.40     2.42     0.00      0
 cod |   288     0  28632      1    -0.04    -0.97     0.05    14.66      0
 emr |   288     0  25402      2  3050.50    56.00     0.03    27.43      0
 esa |   288     0  18893    660     2.39    -2.00     0.08     7.10      0
 gfz |   288     0  31503   2059     0.28    -0.76     0.05    13.28      0
 iga |    96     0   2784      0     0.10    -0.39     0.12     0.00      0
 igu |    96     0   2784      0     0.12    -0.45     3.20     0.00      0
 jpl |   288     0  19532     75     0.50    -1.96     0.04    17.81      0
 ngs |    96     0   2784      0     0.11    -0.40     2.37     0.00      0
 usn |   288     0  39561    322     0.47    -1.91     0.04    19.72      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |   198    26   -61    19    15    57 -2787    97   966   -39 |
    2 | -1364   -57   -84   -66   121     5  3065   163 -1597   -43 |
    3 |  1184   -22  -177    27    90     0  7466   101   239   101 |
    4 | -2004   151   -81   125   104   145   252   161 -2180  -266 |
    5 | -2009   -84   -26   -93   129    -4-13433   -59 -2026    99 |
    6 | -5012   128  -228    -9   215   -44 -4011   124 -4669   -31 |
    7 |  -236  -107  -156    76    28   -90   716    94  -732   165 |
    8 |-12278  -105   -40   130    40   -27-10989   -28 -8245    85 |
    9 | -2249   -59   -19    89   103   -26  6239    46 -2154   -71 |
   10 |  2401  -182   -24    -9   -38  -109  3816   -74  1471   265 |
   11 |  3120    92   -13   -63    59     0  2819   120  3324  -175 |
   13 |  3410   226   -24    83    80   174  1166   232  3249  -429 |
   14 |  4421    66    -4    28    20   -13  2193    83  4317  -141 |
   15 |    65  -112   -73    62    67     1  8741   -12  -434   131 |
   16 |  4430   -41  -111    70   -48    10  2063    89  4288   112 |
   17 |  1050   139  -114   -43    44   -51  4902   224   122  -161 |
   18 |  3567   -23   -47    40   104   -72  2903   126  3685  -115 |
   19 |  -543   -80  -173   121   -49  -109  2650   -87  -577   368 |
   20 |  4651   -57   -69   134   -62   -79  2344    -8  4308   140 |
   21 |  4389   -44   -62     8   170    50  1829    31  4548   -20 |
   22 | -2457   -23   -23   -25   174   -13  -134   180 -2315  -222 |
   23 |  -843    97   -40    80    73    22  2085    11  -825  -104 |
   24 |     2    25  -100   135    72    43   698   -16   301    36 |
   25 | -4702    61   -37  -113     3    45-14209   162 -4251  -101 |
   26 | -3812    38   -35   162    59   -22  1026   178 -3656  -237 |
   27 |   928   -41   -77   233   -18   -19  4492   -70    53   111 |
   28 |  1566    -4   -10   -68    63    42 -1848     7  1842    -7 |
   29 |  2699    11   -49   126    85   -65 -1187   134  1665  -163 |
   30 |  -572   147    61    58     X   150-12867   227  -719  -420 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -28     -     -     -     -    57     -   -13 |
 ALGO |     -   136     7  -264   -88     -     -    77     -   -25 |
 ALIC |     -   -63     -     -    70     -     -     -     -     - |
 ALRT |     -  -218     -     -  -158     -     -     -     -   268 |
 AMC2 |     -  -116   128   -16     -     -     -  -233     -   125 |
 AREQ |     -     -    -3     -    27     -     -     -     -   -13 |
 ARTU |     -    93     -   135    57     -     -     -     -  -152 |
 ASPA |     -     -     -     -   282     -     -     -     -  -190 |
 AUCK |     -  -166     -     X     -     -     -     -     -   123 |
 BAHR |     -     6   -13     -    34     -     -    20     -   -26 |
 BILI |     -   -38     -     -   -10     -     -     -     -    35 |
 BOGT |     -     -     -    35   245     -     -     -     -  -139 |
 BOR1 |     -    -4     -     -  -137     -     -   145     -   -28 |
 BREW |     -     -    -9     -     -     -     -     -     -    12 |
 BRFT |     -   125     -     -     X     -     -     -     -   -93 |
 BRMU |     -     -     -     -    34     -     -     -     -   -23 |
 BRUS |     -   -65    76     -     -     -     -     -     -   -58 |
 CAS1 |     -   126     -    82    22     -     -   -46     -   -97 |
 CHAT |     -     -     -     -    88     -     -     -     -   -59 |
 CHUR |     -     -    35     -  -172     -     -     -     -    68 |
 COCO |     -     5     -  -157   -38     -     -   -35     -   100 |
 CRO1 |     -     -    50  -255   128     -     -     -     -   -64 |
 DAEJ |     -    52     -     -     -     -     -     -     -   -39 |
 DAKA |     -   -87     -     -    96     -     -     -     -     - |
 DARW |     -     -    -3     -     X     -     -   -55     -    54 |
 DAV1 |     -    -9     -     -    10     -     -     -     -     - |
 DGAR |     -     -     -     -    21     -     -     -     -   -14 |
 DRAO |     -   173   -60     -  -102     -     -    21     -     5 |
 DWH1 |     -   231    82     -     -     -     -     -     -  -284 |
 FAIR |     -     -    92  -174    31     -     -  -140     -    40 |
 FLIN |     -    51     -     -   -56     -     -     -     -     - |
 GLPS |     -    20     -     -    82     -     -   -99     -    20 |
 GMAS |     -     -    76     -     -     -     -     -     -  -105 |
 GODE |     -     -    11     -     -     -     -     -     -   -15 |
 GOLD |     -    48     -  -131  -130     -     -  -105     -   194 |
 GRAS |     -    -3     -     -   238     -     -     -     -  -146 |
 GRAZ |     -     -    73     -     -     -     -     -     -  -102 |
 GUAM |     -     -     -  -239    66     -     -     -     -    41 |
 GUAT |     -     -     -     -    33     -     -     -     -   -22 |
 HLFX |     -     -   -72     -     -     -     -     -     -   100 |
 HOB2 |     -    85   171     -  -184     -     -   -59     -  -129 |
 HOFN |     -     -     -     -   119     -     -     -     -   -80 |
 HRAO |     -     -     -     -  -102     -     -     -     -    68 |
 HYDE |     -  -121     -     -     -     -     -     -     -    90 |
 IISC |     -     -     -  -135    72     -     -     -     -     X |
 IRKT |     -     -    92   -77  -138     -     -     -     -    -7 |
 ISPA |     -    68     -     -    15     -     -  -114     -    43 |
 JPLM |     -     -    77     -  -220     -     -     -     -    42 |
 KARR |     -  -107     -     -   118     -     -     -     -     - |
 KERG |     -     -   -71   -29    62     -     -    25     -    48 |
 KIRU |     -    12     -     -     -     -     -     -     -    -9 |
 KOKB |     -     -   102     -  -120     -     -   -22     -   -41 |
 KOUR |     -   145     -  -101  -294     -     -   -75     -   196 |
 LPGS |     -   -28    45    52   140     -     -  -147     -   -22 |
 MAC1 |     -    40     -    61  -258     -     -     -     -    87 |
 MAD2 |     -     -   126     -     -     -     -  -257     -    57 |
 MALI |     -    89     -     -   -72     -     -     -     -   -15 |
 MAS1 |     -     -    63   -15   -54     -     -   -35     -   -17 |
 MAW1 |     -    70     -     -   -37     -     -     -     -   -29 |
 MBAR |     -   -14     -     -   -49     -     -     -     -    43 |
 MCM4 |     -    85  -113   202   -57     -     -   -46     -   102 |
 MDO1 |     -     -     -     -  -267     -     -     -     -   180 |
 MEDI |     -     -    76     -     -     -     -     -     -  -105 |
 MIZU |     -     -    65     -     -     -     -     -     -   -90 |
 MKEA |     -     -     -    50  -132     -     -     -     -    69 |
 NICO |     -   102     -     -   -28     -     -   -64     -     - |
 NISU |     -    96     -     -     -     -     -     -     -   -71 |
 NKLG |     -     -     -     -    54     -     -     -     -   -36 |
 NLIB |     -    92     -     -   -84     -     -   -22     -     8 |
 NNOR |     -     -    42   136     -     -     -  -151     -    29 |
 NOUM |     -     -     -     -   512     -     -  -382     -     - |
 NPLD |     -  -215    69     -     -     -     -     -     -    64 |
 NRC1 |     -   124   -12     -  -146     -     -    14     -    11 |
 NRIL |     -  -120     -     -    -7     -     -     -     -    94 |
 NTUS |     -     -     -  -353     -     -     -   -58     -   179 |
 NYA1 |     -    64     -     -     -     -     -   -41     -   -11 |
 NYAL |     -     -     -     -   -16     -     -     -     -    11 |
 OHI2 |     -   166     -     X    16     -     -     -     -  -134 |
 ONSA |     -  -126    44    88     3     -     -     -     -     - |
 PDEL |     -    15     -     -   -17     -     -     -     -     - |
 PERT |     -     -   -60   -20   244     -     -     -     -   -39 |
 PIE1 |     -   -86    -7  -126     -     -     -     -     -   119 |
 PIMO |     -     -     -   -38    56     -     -     -     -   -24 |
 POL2 |     -     -     -     -    16     -     -     -     -   -11 |
 POTS |     -     0     -     -     3     -     -     -     -    -2 |
 PRDS |     -     -    19     -     -     -     -   -44     -    13 |
 PTBB |     -   -66    31     -     -     -     -     -     -     6 |
 QAQ1 |     -     -    -6     -     -     -     -     -     -     8 |
 RABT |     -  -139     -     -     -     -     -     -     -   103 |
 RESO |     -    29     -     -   -32     -     -     -     -     - |
 RIOG |     -     2    71   -17  -165     -     -    53     -   -32 |
 SANT |     -   -64     -    12    36     -     -     -     -    19 |
 SCH2 |     -     -    40     -  -142     -     -     -     -    40 |
 SCUB |     -   -44     -     -     -     -     -     -     -    33 |
 SPT0 |     -  -151    81     -     -     -     -     -     -     - |
 STJO |     -    57   -35     -   -54     -     -   -33     -    73 |
 STR1 |     -     -    18     -     -     -     -     -     -   -25 |
 SUTH |     -  -124     -     -     -     -     -     -     -    92 |
 SUTM |     -     -    -3     -    20     -     -   -72     -    58 |
 SYOG |     -     -    -9     -  -159     -     -    25     -    98 |
 THTI |     -     -   -65   -43    66     -     -     -     -    62 |
 THU3 |     -   -38     3     -    35     -     -     -     -     - |
 TID1 |     -     -     -     -     -     -     -   -68     -    61 |
 TIDB |     -    20   -51   206     X     -     -     -     -   -17 |
 TIXI |     -   -11     -    72   117     -     -     -     -   -95 |
 TLSE |     -     -    37     -     -     -     -     -     -   -52 |
 TOW2 |     -    56     -     -    30     -     -   -60     -    -7 |
 TRO1 |     -  -110     -     -     -     -     -     -     -    82 |
 TROM |     -     -     -     -     1     -     -     -     -    -1 |
 TSKB |     -  -108   157   -46     6     -     -  -111     -   -25 |
 TWTF |     -  -114    31     -     -     -     -     -     -    41 |
 USN3 |     -   -59    -1     -     -     -     -   -20     -    61 |
 USNO |     -    63    13     -     -     -     -   -44     -   -26 |
 USUD |     -     -     4    28     -     -     -     -     -   -15 |
 VILL |     -     -     -  -240  -245     -     -     -     -   239 |
 WES2 |     -     -   -78     -     -     -     -     -     -   108 |
 WHIT |     -    47     -     -     -     -     -     -     -   -35 |
 WILL |     -   -25   127     -     -     -     -     -     -  -158 |
 WSRT |     -    52    53     -   -54     -     -    -7     -   -71 |
 WTZA |     -  -137     -     -     -     -     -     -     -   102 |
 WTZR |     -   -78   123   -37  -153     -     -     -     -     - |
 WUHN |     -     -    13     -     X     -     -     -     -   -17 |
 YAR2 |     -   -34   150     -  -452     -     -     -     -    54 |
 YELL |     -    84    42  -117     X     -     -  -218     -   118 |
 YSSK |     -     5     -     -    -6     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5734    74    33    82    43   140  2878    33  6097    29 |  288   5.31
    2 |   392    61    21    86    18   126  1747    43   431    30 |  288   0.24
    3 |  2828    45    21    30    18    89  2005    21  3528    30 |  288   2.03
    4 |  1044    69    19    84    22   125   605    80   918    27 |  288   0.90
    5 |   721    55    19    37    42   108  8375    23   663    17 |  288   1.13
    6 |  1086    41    18    52    36   100  2004    12   925    29 |  288   1.08
    7 |  1182    29    24    30    19    77   473    23  1004    37 |  288   0.51
    8 |  4758    84    23    46    31    96  3883    31  4470    16 |  288   1.81
    9 |  1394    65    35    63    38   117  3791    35  1532    24 |  288   1.40
   10 |  2391    55    30   118    35    77  2106    36  1725    22 |  288   2.10
   11 |  1287    68    75    66    66   122  2180    52  1206    40 |  288   0.66
   13 |   662    30    25    81    43    92   877    46   564    64 |  288   0.34
   14 |   394    65    35    38    60    70  1250    53   376    33 |  288   0.25
   15 |  6362   106    51   135   125   182  6021   149  5437    66 |  288   3.70
   16 |   428    75    19    46    28    69  1283    22   391    65 |  288   0.28
   17 |  2018    32    24    40    34    91  2603    32  1449    18 |  288   0.43
   18 |   802    70    27    29    25   104  1487    46   671    44 |  288   0.32
   19 |   525    43    29    61    35   114  1502    35   411    32 |  288   0.21
   20 |   552    49    17    74    22    42  1408    51   543    20 |  288   0.25
   21 |   337    65    44    39    98   104  1098    27   358    56 |  288   0.28
   22 |  1209    72    32    25    19    74   333    39  1014    28 |  288   0.27
   23 |   609    45    36    36    37    95  1170    76   417    64 |  288   0.30
   24 |  3709    84    26    94    42   193  2340    91  3592    31 |  288   3.09
   25 |  3216    83    28   122    71   125  8155    38  3661    37 |  288   0.89
   26 |   822    55    27   147    20   134   617    30   813    64 |  288   0.59
   27 |  2880   104    19    43    30    94  2618    34  2937    47 |  288   2.61
   28 |  1453    68    61    78    40    70  1239    63  1232    29 |  288   0.35
   29 |  2229    73    18   139    17   308  1549    25  2745    22 |  288   0.73
   30 |  2444    62    43    65     X   122  5742    29  2391    77 |  288   2.21
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    10     -     -     -     -    20     -    23 |  285   8.66
 ALGO |     -    15    10    38    52     -     -    11     -    23 |  288   0.03
 ALIC |     -    21     -     -    23     -     -     -     -     - |  219   6.84
 ALRT |     -    36     -     -    58     -     -     -     -    16 |  288   5.59
 AMC2 |     -    15    12    42     -     -     -    16     -    26 |  288   0.05
 AREQ |     -     -    27     -    31     -     -     -     -    23 |  288   9.90
 ARTU |     -    41     -    50    68     -     -     -     -    37 |  288   8.86
 ASPA |     -     -     -     -    24     -     -     -     -    16 |  288    >>>
 AUCK |     -    32     -     X     -     -     -     -     -    23 |  288    >>>
 BAHR |     -    31    26     -    24     -     -    13     -    21 |  288   0.55
 BILI |     -    28     -     -    34     -     -     -     -    15 |  286   8.02
 BOGT |     -     -     -    66    25     -     -     -     -    21 |  288   9.85
 BOR1 |     -    26     -     -   120     -     -    71     -    26 |  285  13.60
 BREW |     -     -    30     -     -     -     -     -     -    42 |  288   0.07
 BRFT |     -    54     -     -     X     -     -     -     -    40 |  210   0.14
 BRMU |     -     -     -     -    81     -     -     -     -    55 |  280    >>>
 BRUS |     -    28    14     -     -     -     -     -     -    23 |  288   0.05
 CAS1 |     -    30     -    62    30     -     -    24     -    16 |  288   6.49
 CHAT |     -     -     -     -    95     -     -     -     -    64 |  178  12.94
 CHUR |     -     -     8     -    16     -     -     -     -     9 |  283   0.07
 COCO |     -    32     -    61    36     -     -    32     -    19 |  282   5.66
 CRO1 |     -     -    15    45    47     -     -     -     -    21 |  288   0.10
 DAEJ |     -    34     -     -     -     -     -     -     -    25 |  288   5.65
 DAKA |     -    29     -     -    32     -     -     -     -     - |  278   7.61
 DARW |     -     -    31     -     X     -     -    26     -    50 |  288   2.83
 DAV1 |     -    26     -     -    29     -     -     -     -     - |  249   2.91
 DGAR |     -     -     -     -    46     -     -     -     -    31 |  288  11.94
 DRAO |     -    30    11     -    33     -     -    27     -    30 |  288   0.06
 DWH1 |     -    35    15     -     -     -     -     -     -    22 |  288   0.38
 FAIR |     -     -    22    33    38     -     -    18     -    17 |  288   7.95
 FLIN |     -    19     -     -    21     -     -     -     -     - |  281   9.35
 GLPS |     -    25     -     -    26     -     -    16     -    12 |  288   8.83
 GMAS |     -     -    30     -     -     -     -     -     -    42 |  288  14.46
 GODE |     -     -    11     -     -     -     -     -     -    15 |  288   0.07
 GOLD |     -    29     -    73    50     -     -    25     -    25 |  288  11.11
 GRAS |     -    33     -     -    47     -     -     -     -    26 |  288   6.47
 GRAZ |     -     -    10     -     -     -     -     -     -    14 |  288   4.68
 GUAM |     -     -     -    55    58     -     -     -     -    39 |  288  10.24
 GUAT |     -     -     -     -    29     -     -     -     -    19 |  233    >>>
 HLFX |     -     -    19     -     -     -     -     -     -    27 |  286  48.67
 HOB2 |     -    51    29     -    56     -     -    24     -    46 |  288   0.09
 HOFN |     -     -     -     -    42     -     -     -     -    29 |  278    >>>
 HRAO |     -     -     -     -    24     -     -     -     -    16 |  282   0.61
 HYDE |     -    24     -     -     -     -     -     -     -    18 |  286  13.79
 IISC |     -     -     -    45    24     -     -     -     -     X |  285  10.58
 IRKT |     -     -    32   112    84     -     -     -     -    52 |  287  13.98
 ISPA |     -    68     -     -   125     -     -    69     -    30 |  288   9.08
 JPLM |     -     -    55     -    81     -     -     -     -    43 |  285  12.99
 KARR |     -    44     -     -    49     -     -     -     -     - |  237   6.66
 KERG |     -     -    14    54    74     -     -    19     -    30 |  288   1.58
 KIRU |     -    29     -     -     -     -     -     -     -    22 |  288   9.36
 KOKB |     -     -    30     -    31     -     -    29     -    60 |  288   0.06
 KOUR |     -    31     -    33    29     -     -    23     -    26 |  288  10.49
 LPGS |     -    28    27    76    63     -     -    21     -    18 |  288  16.34
 MAC1 |     -    23     -    93    48     -     -     -     -    27 |  288   6.15
 MAD2 |     -     -    23     -     -     -     -    31     -    14 |  288   0.10
 MALI |     -    56     -     -    68     -     -     -     -    55 |  288  21.72
 MAS1 |     -     -    26    44    41     -     -    20     -    28 |  288  10.16
 MAW1 |     -    44     -     -    15     -     -     -     -    30 |  240   6.39
 MBAR |     -    79     -     -   130     -     -     -     -   144 |  287  23.46
 MCM4 |     -    47    19    69    24     -     -    23     -    28 |  288  11.66
 MDO1 |     -     -     -     -    24     -     -     -     -    16 |  288  10.17
 MEDI |     -     -    10     -     -     -     -     -     -    14 |  288   0.24
 MIZU |     -     -    81     -     -     -     -     -     -   112 |  172    >>>
 MKEA |     -     -     -    39    70     -     -     -     -    51 |  288  26.40
 NICO |     -    22     -     -    34     -     -    16     -     - |  288  61.61
 NISU |     -    35     -     -     -     -     -     -     -    26 |  222   0.04
 NKLG |     -     -     -     -    30     -     -     -     -    20 |  279    >>>
 NLIB |     -    38     -     -    24     -     -    14     -    39 |  288   0.03
 NNOR |     -     -    17   109     -     -     -    15     -    27 |  288  12.06
 NOUM |     -     -     -     -    21     -     -    16     -     - |  154    >>>
 NPLD |     -    23    12     -     -     -     -     -     -    22 |  287   0.06
 NRC1 |     -    14    11     -    53     -     -    12     -    21 |  288   0.04
 NRIL |     -    34     -     -    54     -     -     -     -    38 |  288   5.78
 NTUS |     -     -     -    38     -     -     -    25     -    29 |  196   9.56
 NYA1 |     -    25     -     -     -     -     -    17     -    11 |  288   0.12
 NYAL |     -     -     -     -    47     -     -     -     -    32 |  288   0.05
 OHI2 |     -   114     -     X    75     -     -     -     -    66 |  288   6.75
 ONSA |     -    61    58    70    42     -     -     -     -     - |  287   0.09
 PDEL |     -    51     -     -    57     -     -     -     -     - |  263  54.07
 PERT |     -     -    30   125    23     -     -     -     -    12 |  288   1.41
 PIE1 |     -    25    17    79     -     -     -     -     -    26 |  287   0.07
 PIMO |     -     -     -    93    26     -     -     -     -    38 |  288   9.86
 POL2 |     -     -     -     -    53     -     -     -     -    36 |  283   7.85
 POTS |     -    38     -     -    51     -     -     -     -    27 |  288  13.65
 PRDS |     -     -    11     -     -     -     -    14     -    18 |  288  10.03
 PTBB |     -    21    10     -     -     -     -     -     -    13 |  288   0.38
 QAQ1 |     -     -    18     -     -     -     -     -     -    25 |  288   6.47
 RABT |     -    40     -     -     -     -     -     -     -    29 |  288  13.88
 RESO |     -    29     -     -    32     -     -     -     -     - |  288   6.92
 RIOG |     -    41    30   108    48     -     -    34     -    23 |  288   8.84
 SANT |     -   101     -   172    92     -     -     -     -    74 |  285   6.04
 SCH2 |     -     -    14     -    43     -     -     -     -    12 |  288   6.70
 SCUB |     -    24     -     -     -     -     -     -     -    18 |  286   9.60
 SPT0 |     -    19    10     -     -     -     -     -     -     - |  288   0.03
 STJO |     -    32    14     -    51     -     -    17     -    21 |  288   0.07
 STR1 |     -     -    11     -     -     -     -     -     -    15 |  288   4.06
 SUTH |     -    25     -     -     -     -     -     -     -    18 |  288   6.47
 SUTM |     -     -    20     -    27     -     -    28     -    30 |  288  14.89
 SYOG |     -     -    13     -    22     -     -    21     -    21 |  288   0.81
 THTI |     -     -    30    64    70     -     -     -     -    25 |  288   1.46
 THU3 |     -    34    12     -    18     -     -     -     -     - |  288   7.91
 TID1 |     -     -     -     -     -     -     -    37     -    33 |  288   6.06
 TIDB |     -    19    22   119     X     -     -     -     -    27 |  288   0.38
 TIXI |     -    33     -    35    26     -     -     -     -    14 |  287   5.98
 TLSE |     -     -    12     -     -     -     -     -     -    17 |  288   0.52
 TOW2 |     -    35     -     -   109     -     -    20     -    40 |  288   3.11
 TRO1 |     -    20     -     -     -     -     -     -     -    15 |  287   7.19
 TROM |     -     -     -     -    68     -     -     -     -    46 |  267   8.32
 TSKB |     -    29    13    51    20     -     -    13     -    25 |  288   1.33
 TWTF |     -    33    15     -     -     -     -     -     -    15 |  288   0.06
 USN3 |     -    11     8     -     -     -     -    15     -    10 |  288   0.02
 USNO |     -    33     8     -     -     -     -    10     -    20 |  288   0.02
 USUD |     -     -     8    51     -     -     -     -     -    19 |  288   0.08
 VILL |     -     -     -    42    20     -     -     -     -    18 |  288  10.85
 WES2 |     -     -     9     -     -     -     -     -     -    13 |  286   0.09
 WHIT |     -    22     -     -     -     -     -     -     -    16 |  288   9.28
 WILL |     -    18    12     -     -     -     -     -     -    16 |  288 117.55
 WSRT |     -    29    31     -    31     -     -    12     -    18 |  288   0.06
 WTZA |     -    28     -     -     -     -     -     -     -    21 |  276   0.42
 WTZR |     -    44    41    72    46     -     -     -     -     - |  288   0.08
 WUHN |     -     -    12     -     X     -     -     -     -    16 |  287   9.32
 YAR2 |     -    54    19     -    39     -     -     -     -    16 |  288  13.71
 YELL |     -    40    12    37     X     -     -    22     -    13 |  288   0.02
 YSSK |     -    19     -     -    21     -     -     -     -     - |  287   7.90
 -----+-------------------------------------------------------------+--------------
 TOT  |  2421    48    27    75    51   122  3205    39  2370    35 |


 BEST CLOCK FIT: USN3   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 SPT0 |   288     0     0   288    9.96   | 3.76e-14  6.78e-15  2.61e-15 |
 NRC1 |   288     0     0   288    8.50   | 3.25e-14  6.60e-15  3.56e-15 |
 BREW |   288     0     0   288    7.82   | 6.15e-14  1.16e-14  3.55e-15 |
 BRUS |   288     0     0   288    7.55   | 4.20e-14  1.38e-14  2.05e-15 |
 NPLD |   287     0     0   286    7.52   | 4.25e-14  1.22e-14  4.91e-15 |
 USNO |   288     0     0   288    6.17   | 3.84e-14  7.79e-15  2.22e-15 |
 KOKB |   288     0     0   288    5.05   | 4.75e-14  1.08e-14  6.50e-15 |
 AMC2 |   288     0     0   288    4.81   | 4.63e-14  1.08e-14  1.86e-15 |
 WSRT |   288     0     0   288    3.59   | 3.48e-14  6.88e-15  3.32e-15 |
 ONSA |   287     0     0   286    3.51   | 4.26e-14  1.35e-14  7.97e-15 |
 YELL |   288     0     0   288    3.42   | 3.31e-14  5.16e-15  1.92e-15 |
 WES2 |   286     0     0   285    3.25   | 4.17e-14  9.28e-15  6.02e-15 |
 GODE |   288     0     0   288    3.24   | 4.73e-14  7.23e-15  4.03e-15 |
 NLIB |   288     0     0   288    3.15   | 3.36e-14  7.74e-15  2.22e-15 |
 NISU |   222     0     0   218    2.90   | 8.02e-14  1.25e-14         - |
 USN3 |   288     0     1   190    2.67   | 7.60e-14  1.20e-14  2.02e-15 |
 MAD2 |   288     0     0   288    2.20   | 4.28e-14  8.97e-15  5.71e-15 |
 TWTF |   288     0     0   288    2.07   | 4.89e-14  1.20e-14  6.77e-15 |
 CRO1 |   288     0     0   288    1.74   | 1.40e-13  3.07e-14  9.30e-15 |
 STJO |   288     0     0   288    1.73   | 3.14e-14  8.93e-15  5.72e-15 |
 WTZR |   288     0     0   288    1.23   | 4.89e-14  1.29e-14  7.14e-15 |
 PIE1 |   287     0     0   286    1.13   | 6.57e-14  1.06e-14  2.84e-15 |
 DRAO |   288     0     0   288    1.04   | 4.26e-14  1.07e-14  6.79e-15 |
 CHUR |   283     0     0   280    1.04   | 5.05e-14  1.33e-14  6.79e-15 |
 NYA1 |   288     0     0   288    0.98   | 3.91e-14  1.86e-14  1.19e-14 |
 NYAL |   288     0     0   288    0.76   | 4.00e-14  9.49e-15  5.18e-15 |
 IRKT |   287     0     0   286    0.58   | 5.49e-14  1.71e-14  2.08e-14 |
 HOB2 |   288     0     0   288    0.51   | 1.91e-13  2.44e-14  8.36e-15 |
 BRFT |   210     0     0   209    0.35   | 4.81e-14  1.40e-14         - |
 ALGO |   288     0     0   288    0.31   | 3.17e-14  8.17e-15  4.85e-15 |
 TIDB |   288     0     0   288    0.19   | 1.54e-13  4.73e-14  3.80e-14 |
 G26  |   288     0     0   288    0.15   | 3.79e-13  1.03e-13  4.93e-14 |
 PTBB |   288     0     0   288    0.12   | 3.46e-13  9.16e-14  3.21e-14 |
 G05  |   288     0     0   288    0.11   | 1.72e-13  5.64e-14  8.41e-14 |
 DWH1 |   288     0     0   288    0.10   | 3.40e-13  8.76e-14  3.32e-14 |
 WTZA |   276     0     0   275    0.07   | 4.57e-13  1.24e-13  3.62e-14 |
 BAHR |   288     0     0   288    0.06   | 3.65e-13  1.29e-13  3.19e-14 |
 G07  |   288     0     0   288    0.06   | 3.08e-13  7.78e-14  6.51e-14 |
 BOR1 |   285     0     0   284    0.05   | 4.73e-13  1.20e-13  3.21e-14 |
 G29  |   288     0     0   288    0.04   | 4.20e-13  1.29e-13  7.49e-14 |
 G25  |   288     0     0   288    0.04   | 2.22e-13  8.14e-14  1.20e-13 |
 HRAO |   282     0     0   281    0.04   | 1.22e-13  4.53e-14  6.35e-14 |
 G04  |   288     0     0   288    0.03   | 4.61e-13  1.17e-13  1.15e-13 |
 TLSE |   288     0     0   143    0.02   | 3.91e-13  1.22e-13  4.21e-14 |
 G06  |   288     0     0   288    0.02   | 5.72e-13  2.02e-13  6.50e-14 |
 G11  |   288     0     4    27    0.02   | 6.31e-13  6.87e-14  5.12e-14 |
 G23  |   288     0     4    17    0.01   | 5.51e-13  6.65e-14  2.52e-14 |
 SYOG |   288     0     0   288    0.01   | 7.79e-13  2.24e-13  6.94e-14 |
 TSKB |   288     0     0   288    0.01   | 1.02e-12  3.11e-13  1.08e-13 |
 G03  |   288     0     0   288    0.01   | 1.21e-12  4.52e-13  1.27e-13 |
 KERG |   288     0     0   288    0.01   | 1.27e-12  3.65e-13  1.52e-13 |
 G16  |   288     0     5     8    0.01   | 5.81e-13  6.08e-14  2.79e-14 |
 G09  |   288     0     2   121    0.01   | 1.29e-12  3.73e-13  1.25e-13 |
 MEDI |   288     0     0   288    0.00   | 4.89e-14  1.17e-14  2.01e-14 |
 TOW2 |   288     0     1   277    0.00   | 4.64e-13  2.06e-13  2.17e-13 |
 G10  |   288     0     0   288    0.00   | 1.23e-12  3.86e-13  2.07e-13 |
 G14  |   288     0     4     7    0.00   | 5.61e-13  6.49e-14  1.66e-14 |
 PERT |   288     0     0   288    0.00   | 1.95e-12  5.97e-13  1.28e-13 |
 DARW |   288     0     0   288    0.00   | 2.74e-13  5.87e-13  2.44e-13 |
 GMAS |   288     0     2    95    0.00   | 1.10e-12  8.50e-13  8.61e-13 |
 JPLM |   285     0     2    93    0.00   | 7.38e-13  4.45e-13  1.46e-12 |
 GPST |   288     0     0     0    0.00   | 3.43e-14  6.65e-15  2.22e-15 |
 ALIC |   219     0     0     0    0.00   |        -         -         - |
 CHAT |   178     0     0     0    0.00   |        -         -         - |
 KARR |   237     0     0     0    0.00   |        -         -         - |
 DAV1 |   249     0     0     0    0.00   | 2.68e-13  6.26e-13         - |
 NOUM |   154     0     0     0    0.00   |        -         -         - |
 IISC |   285     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   279     2     0     0    0.00   |        -         -         - |
 MIZU |   172     0     0     0    0.00   |        -         -         - |
 HOFN |   278     0     0     0    0.00   |        -         -         - |
 COCO |   282     0     0     0    0.00   | 2.12e-13  4.38e-13  4.75e-13 |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G30  |   288     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.35e-13  6.80e-14  2.81e-14 |
 G27  |   288     0     0     0    0.00   | 1.25e-12  4.23e-13  2.70e-13 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  4.98e-13  3.63e-13 |
 G22  |   288     0     6     0    0.00   | 5.50e-13  5.38e-14  2.41e-14 |
 G21  |   288     0     6     0    0.00   | 1.12e-12  1.14e-13  2.39e-14 |
 G20  |   288     0     6     0    0.00   | 6.82e-13  7.66e-14  2.65e-14 |
 G19  |   288     0     6     0    0.00   | 7.04e-13  6.93e-14  1.74e-14 |
 G18  |   288     0     6     0    0.00   | 7.95e-13  8.39e-14  3.61e-14 |
 G17  |   288     0     6     0    0.00   | 6.22e-13  6.58e-14  2.99e-14 |
 G15  |   288     0     0     0    0.00   | 1.59e-12  5.36e-13  4.79e-13 |
 G13  |   288     0     6     0    0.00   | 5.42e-13  5.91e-14  3.23e-14 |
 G08  |   288     0     0     0    0.00   | 1.35e-12  4.73e-13  1.01e-13 |
 G02  |   288     0     6     0    0.00   | 5.54e-13  5.50e-14  2.60e-14 |
 G01  |   288     0     0     0    0.00   | 1.46e-12  7.24e-13  5.69e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     1     0    0.00   | 5.43e-13  6.34e-13  9.76e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     6     0    0.00   | 2.80e-13  2.90e-14  6.08e-15 |
 TROM |   267     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TID1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.00e-13  1.71e-13  1.12e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 STR1 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 5.98e-13  2.76e-13  5.68e-13 |
 SANT |   285     2     1     0    0.00   | 2.01e-12  7.93e-13  6.49e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   283     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   263     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   196     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 8.34e-13  1.18e-12  8.82e-13 |
 MCM4 |   288     0     1     0    0.00   | 8.84e-13  5.11e-13  7.85e-13 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   240     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   286     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     0     0    0.00   |        -         -         - |
 GUAT |   233     1     0     0    0.00   |        -         -         - |
 GUAM |   288     1     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   281     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   278     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   280     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   285     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.51e-17  3.01e-16  1.80e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     STJO      YELL      AMC2 |
------------------------------------------+------------------------------+
