
 cls-file Version 2.0
 GPS week: 1695   Day: 0   MJD: 56109                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2945     12       0    -238   2033   2033      0   4712   4712      0    0.00
 cod |   288     0  19289      0    -852     139    159    114    188    194    149    225    0.00
 emr |   288     0  16704      0   -1142    1279     18     17     18     83     89     74   37.93
 gfz |   288     0  24616    529     683    -779     24     13     28     75     81     72   33.00
 iga |    96     0   2931      0    -186     -91    104    104      0    172    172      0    0.00
 igu |    96     0   2753      1    -161    -146   1425   1425      0   2368   2368      0    0.00
 jpl |   288     0  22154    576    5974   -1586     26     17     30     73     72     74   29.08
 usn |   288     0  16522    288   -1424     615    105    140     43    186    212    153    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   usn |
 -----+-------------------------------------------------+
    1 |  1688    83    -8   -27    48  -434    41   319 |
    2 |  -987    75   -31    50   169   508   -15   153 |
    3 |  -307   -17   -45    97   -13  4903   -51   -17 |
    4 | -4742    48   -27    23    66 -3727     8    67 |
    5 |   118   141  -132   107    91   465    51   141 |
    6 |  -877   -33   -92   152   -27  2556   -53   -17 |
    7 |  -510    43   -53    28    -3 -1112    38   -64 |
    8 | -3768    41    71    -3  -135  1099   -89  -149 |
    9 | -6639   -97   -75    63   -32  1700    26   -97 |
   10 |-10337   169    93   -34   158 -3125   -84   194 |
   11 |  9555   -98    49   -28   -75  4157   -33  -134 |
   12 |    22   -97    45   -28   278  -565   -27    50 |
   13 |  4316    64   -13    31   101   166   -18   190 |
   14 |  4612   -10   -55    39   -16     6    28    88 |
   15 |   824   -21  -121   122   109  -369    20   114 |
   16 |  4268  -131   -67    98  -249   440   -23    69 |
   17 |  1643   108   -61   -35    35   790   118   -90 |
   18 |  5118   -13   -51     6   -22    20    60   206 |
   19 |  1104   -50     7    50  -270   167   -65  -393 |
   20 |  4869    79   -32   -11  -233  -154    54    37 |
   21 |  -281  -160    -3    -1  -166  -587     5    24 |
   22 | -3760   -44    12    47  -168 -4183   -69   -37 |
   23 |  1264    59    30   -27   159  -351    -9   230 |
   25 |  2578   121   267  -227   127    87   -90   323 |
   26 |  -657   154   -44     X   143   714    58    15 |
   27 | -4881     5   -47   117   -85     -   -71  -127 |
   28 |  5670    11    77   -49    70 -1982   -45  -110 |
   29 | -1557   -54  -215    89   156  -132   179   143 |
   30 | -6429   -84     6    62   -58     -   -65  -107 |
   31 |  2311   -55    32  -125    45 -1081   100    49 |
   32 | -5264   132   -27     2  -139   307    32   133 |
 -----+-------------------------------------------------+
 ABMF |     -     -     -    85     -     -   -97     - |
 ABPO |     -     -     -   -61     -     -    69     - |
 ADIS |     -     -     -    67     -     -   -76     - |
 ALGO |     -     -   -20    23     -     -     -    46 |
 ALIC |     -    87     -    -7     -     -     8     - |
 AMC2 |     -    -6    32     -     -     -   -41   -90 |
 ASPA |     -     -     -    12     -     -   -14     - |
 BOGT |     -   -57     -   -21     -     -    24     - |
 BRFT |     -   -78     -   -28     -     -    32     - |
 CAS1 |     -    78     -    36     -     -   -41    43 |
 CHPI |     -     -     -   -30     -     -    34   -25 |
 CHUR |     -     6     -   -22     -     -    25     - |
 COCO |     -    15     -   -85     -     -    96    65 |
 CONT |     -     -   -34     -     -     -    44     - |
 CONZ |     -     -    68   -78     -     -     -     - |
 DARW |     -    16     -   117     -     -  -133  -152 |
 DGAR |     -   -79     -     3     -     -    -3     - |
 GOLD |     -    19     -    24     -     -   -28   -19 |
 HARB |     -    89  -133   153     -     -     -     - |
 HOB2 |     -   185   -81    64     -     -    33   148 |
 HOFN |     -   -63     -    -2     -     -     2  -176 |
 HRAO |     -   310   -27    31     -     -     -   412 |
 KIRU |     -     -    29   -34     -     -     -     - |
 KOKB |     -     -    54     -     -     -   -71  -110 |
 MAC1 |     -    87     -    22     -     -   -25    26 |
 MAL2 |     -     -     -   -45     -     -    51     - |
 MAS1 |     -  -335    73   -84     -     -     X     X |
 MATE |     -     -    93  -107     -     -     -  -242 |
 MDO1 |     -     -     -  -137     -     -   156    53 |
 METS |     -    -9    89  -102     -     -     -   -87 |
 NICO |     -   -86     -    55     -     -   -63     - |
 NRC1 |     -     -    63   -73     -     -     -   -57 |
 NRIL |     -    57     -   -70     -     -    79     - |
 OHI2 |     -     -     -    62     -     -   -70     - |
 ONSA |     -  -152    43   -50     -     -     -  -264 |
 PDEL |     -   -49     -    11     -     -   -12     - |
 PETS |     -     -     -   -36     -     -    41     - |
 PIE1 |     -     -     2    -3     -     -     -     - |
 PIMO |     -     -     -    11     -     -   -12     - |
 PRDS |     -  -118   -56     -     -     -    73  -142 |
 QAQ1 |     -     -    30     -     -     -   -39     - |
 SCH2 |     -  -120     -    72     -     -   -82     - |
 SEY1 |     -     -     -    -6     -     -     7    61 |
 SHAO |     -    13     -   -49     -     -    56    36 |
 STHL |     -   100     -   -58     -     -    66     - |
 STJO |     -     -     -   -27     -     -    30   -76 |
 SYOG |     -    74    40   -46     -     -     -     - |
 THU3 |     -   -31   -29    81     -     -   -54  -231 |
 TIDB |     -     -   -19     X     -     -    24   -21 |
 TIXI |     -     -     -   -26     -     -    30     - |
 TOW2 |     -   -49     -   -45     -     -    51     - |
 ULAB |     -     -     -    28     -     -   -32     - |
 VILL |     -     -   -49   139     -     -   -96  -221 |
 WES2 |     -   -21    -2     2     -     -     -     - |
 WHIT |     -    -9   187   -84     -     -  -149   -85 |
 WSRT |     -     7    31   -35     -     -     -   -45 |
 WTZR |     -  -120   130  -150     -     -     -     - |
 YAKT |     -    21   -24     -     -     -    31     - |
 YAR2 |     -   208    26   -30     -     -     -    56 |
 YELL |     -  -289   -78    89     -     -     X     - |
 YSSK |     -    88     -    11     -     -   -13     - |
 ZAMB |     -   -64     -   -46     -     -    52     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   usn | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 |   639    68    19    12    62   396    20   144 |  288    143
    2 |   745   104    10     9   117   285     9   145 |  288    272
    3 |  3262    77    23    12    92  4480    19   147 |  288   2250
    4 |   786    96    11    12   115  1112    10   157 |  288    705
    5 |   940   121    12     9    98   275    16   125 |  288    229
    6 |  1857    67    18    10    88  1774    15   168 |  288    657
    7 |  1220   119    15    13    82  1104    10   152 |  288    203
    8 |  2665   112    11    14    91  2182     9   130 |  288   2374
    9 |  5100   106    18    10   124  3314    16   148 |  288   4081
   10 |  2401   100    18     9    93  1783    19   118 |  288   1184
   11 |  1641    69    21    16    61  1800    28   144 |  288    397
   12 |   783   171    22    16    74   267    14   132 |  288    312
   13 |   416   118    14    11    76   372    16   173 |  288    263
   14 |   481   127    16    15   134   252    15   161 |  288    215
   15 |   574    90    13    10    92   471    10   127 |  288    200
   16 |   691    84    17    14    77   265    10   134 |  288    391
   17 |   639   106    18    21   161   654    16   102 |  288    342
   18 |   511   130    17    11   141   179    14   131 |  288    252
   19 |   653    79    22     9   109   367    24   126 |  288    233
   20 |   558   159    15    15    86   245    12   146 |  288    217
   21 |  1689   106    14    13    93   349    13   155 |  288    263
   22 |  2793   148    27    25    65  2336    11   124 |  288    263
   23 |   397   137    11    10   123   221    11   130 |  288    154
   25 |   581   133    15    11    86   166    14   135 |  288    203
   26 |  1061    72    46     X    63   720    59   112 |  197    368
   27 |  4174   113    20    11   113     -    18   146 |  288   4012
   28 |   515   118    17    15   164  1358    11   164 |  288    520
   29 |  1106   163     9    10   100   576    10   145 |  288    274
   30 |  5661    71    12    18   107     -    23   127 |  288   3587
   31 |  1951    91    16    10   135  1057    15   132 |  288    287
   32 |  1497   173    13    14   115   665    10   139 |  288   1029
 -----+-------------------------------------------------+-------------
 ABMF |     -     -     -    31     -     -    35     - |  163   5986
 ABPO |     -     -     -    17     -     -    19     - |  288  12962
 ADIS |     -     -     -    18     -     -    20     - |  288    >>>
 ALGO |     -     -    24    28     -     -     -    63 |  288     61
 ALIC |     -   200     -     9     -     -    10     - |  288   4308
 AMC2 |     -   115     7     -     -     -     9    52 |  288     24
 ASPA |     -     -     -    53     -     -    60     - |  288  16582
 BOGT |     -   214     -    19     -     -    21     - |  288  13121
 BRFT |     -   418     -    56     -     -    63     - |  276   3608
 CAS1 |     -   152     -    36     -     -    40    58 |  288   4135
 CHPI |     -     -     -    27     -     -    30    42 |  288  10967
 CHUR |     -    33     -    17     -     -    19     - |  286  18423
 COCO |     -   251     -    48     -     -    55    62 |  267  13255
 CONT |     -     -    12     -     -     -    16     - |  288     71
 CONZ |     -     -    23    26     -     -     -     - |  288     44
 DARW |     -   281     -    19     -     -    21    49 |  288   3829
 DGAR |     -   391     -    42     -     -    48     - |  288  17290
 GOLD |     -    36     -    15     -     -    17    34 |  288   2662
 HARB |     -    61    27    31     -     -     -     - |  153  13672
 HOB2 |     -    76    27    41     -     -    16    44 |  288    195
 HOFN |     -    26     -    22     -     -    25    21 |  287    >>>
 HRAO |     -   200    25    28     -     -     -    45 |  282  12998
 KIRU |     -     -    10    11     -     -     -     - |  287   1904
 KOKB |     -     -    13     -     -     -    18    55 |  288     59
 MAC1 |     -    74     -    28     -     -    32    56 |  288   4311
 MAL2 |     -     -     -    44     -     -    50     - |  288    >>>
 MAS1 |     -   294    25    28     -     -     X     X |  288   5413
 MATE |     -     -    14    16     -     -     -    21 |  288     97
 MDO1 |     -     -     -     9     -     -    11    24 |  288  20852
 METS |     -   147    16    19     -     -     -    38 |  286    229
 NICO |     -    36     -    13     -     -    14     - |  288   3843
 NRC1 |     -     -    20    23     -     -     -    36 |  288     34
 NRIL |     -    61     -    11     -     -    12     - |  288   7484
 OHI2 |     -     -     -    43     -     -    49     - |  276    >>>
 ONSA |     -    79    21    24     -     -     -    40 |  288     28
 PDEL |     -   276     -    37     -     -    42     - |  288   4039
 PETS |     -     -     -    47     -     -    54     - |  284  11009
 PIE1 |     -     -    12    14     -     -     -     - |  288     40
 PIMO |     -     -     -    31     -     -    35     - |  288  15050
 PRDS |     -    54     9     -     -     -    11    26 |  287     62
 QAQ1 |     -     -     9     -     -     -    12     - |  265   5856
 SCH2 |     -    44     -    19     -     -    21     - |  288  19625
 SEY1 |     -     -     -    42     -     -    47    74 |  288  17433
 SHAO |     -    71     -    26     -     -    29    34 |  288  10440
 STHL |     -   137     -    32     -     -    36     - |  287  13982
 STJO |     -     -     -    27     -     -    30    37 |  286     64
 SYOG |     -   203    31    35     -     -     -     - |  287    841
 THU3 |     -   260    13    13     -     -    17    19 |  288   6177
 TIDB |     -     -    12     X     -     -    15    30 |  288     40
 TIXI |     -     -     -    25     -     -    28     - |  288    >>>
 TOW2 |     -   302     -    26     -     -    30     - |  288   3755
 ULAB |     -     -     -    10     -     -    11     - |  288    >>>
 VILL |     -     -    18    25     -     -    17    29 |  288   7670
 WES2 |     -    48    29    33     -     -     -     - |  288    131
 WHIT |     -    51    17    23     -     -    15    37 |  287  40302
 WSRT |     -    32    16    18     -     -     -    22 |  287     26
 WTZR |     -    73    23    26     -     -     -     - |  288     45
 YAKT |     -    33    10     -     -     -    13     - |  284   8118
 YAR2 |     -    76    22    25     -     -     -    53 |  284   7847
 YELL |     -   240    16    18     -     -     X     - |  288     39
 YSSK |     -   293     -    28     -     -    31     - |  278  11688
 ZAMB |     -   274     -    20     -     -    22     - |  288  12498
 -----+-------------------------------------------------+-------------
 TOT  |  2034   159    18    24   105  1426    26   106 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   288     0   288     7.17     7.20     7.18     7.18   | 3.81e-14  8.64e-15  2.97e-15 |
 NRC1 |   288   287     1   288     6.39     7.20     7.18     7.18   | 5.56e-14  1.19e-14  2.35e-15 |
 ONSA |   288   285     1   288     7.17     7.20     7.18     7.18   | 5.70e-14  1.30e-14  4.17e-15 |
 PIE1 |   288   288     0   288     7.00     7.20     7.18     7.18   | 4.81e-14  7.58e-15  2.91e-15 |
 WTZR |   288   282     2   288     6.45     7.20     5.48     5.48   | 8.84e-14  1.72e-14  4.56e-15 |
 YELL |   288   285     1   288     7.17     7.20     7.18     7.18   | 4.53e-14  9.84e-15  1.90e-15 |
 WES2 |   288   288     0   288     5.20     7.20     1.83     1.83   | 5.24e-14  1.65e-14  1.21e-14 |
 ALGO |   288   285     1   288     4.61     7.18     2.17     2.17   | 5.99e-14  8.66e-15  4.35e-15 |
 PRDS |   287   287     0   287     6.84     7.17     1.72     1.72   | 4.86e-14  1.19e-14  2.72e-15 |
 WSRT |   287   287     1   287     7.14     7.17     7.16     7.16   | 3.89e-14  9.16e-15  2.06e-15 |
 STJO |   286   285     0   286     4.93     7.13     6.03     6.03   | 6.10e-14  1.74e-14  4.73e-15 |
 CONT |   288   285     1   288     4.15     6.37     1.65     1.65   | 6.26e-14  2.97e-14  5.67e-15 |
 KOKB |   288   285     1   288     3.90     5.63     5.09     5.09   | 1.02e-13  1.24e-14  4.55e-15 |
 TIDB |   288   285     1   288     3.53     4.62     7.18     7.18   | 1.12e-13  1.69e-14  4.23e-15 |
 G25  |   288   288     0   288     3.72     1.19     3.81     3.81   | 5.85e-14  1.75e-14  2.63e-14 |
 MATE |   288   288     0   288     1.70     1.08     0.21     0.21   | 4.58e-14  1.07e-14  8.37e-15 |
 G01  |   288   288     0   288     1.39     0.35     0.67     0.67   | 8.44e-14  2.50e-14  1.36e-14 |
 G18  |   288   288     0   288     0.68     0.21     0.29     0.29   | 7.63e-13  7.59e-14  3.37e-14 |
 G26  |   197   197     0   197     0.78     0.17     0.18     0.18   | 1.04e-11  3.72e-12         - |
 G06  |   288   287     0   288     0.80     0.13     0.68     0.68   | 3.56e-13  1.05e-13  9.62e-14 |
 G22  |   288   288     0   288     0.67     0.11     0.11     0.11   | 6.73e-13  6.02e-14  2.47e-14 |
 G04  |   288   288     0   288     0.65     0.11     0.14     0.14   | 4.74e-13  1.15e-13  5.28e-14 |
 G23  |   288   288     0   288     0.67     0.10     2.34     2.34   | 5.58e-13  6.20e-14  1.10e-14 |
 G19  |   288   288     0   288     0.65     0.09     0.65     0.65   | 5.32e-13  6.38e-14  1.74e-14 |
 G02  |   288   288     0   288     0.63     0.09     1.78     1.78   | 6.60e-13  6.70e-14  3.02e-14 |
 G07  |   288   288     0   288     0.61     0.08     0.56     0.56   | 6.11e-13  6.02e-14  2.49e-14 |
 G14  |   288   288     0   288     0.60     0.08     7.18     7.18   | 6.38e-13  6.28e-14  1.18e-14 |
 G05  |   288   288     0   288     0.59     0.08     0.90     0.90   | 6.52e-13  6.87e-14  2.12e-14 |
 G16  |   288   288     0   288     0.59     0.08     1.07     1.07   | 6.04e-13  6.92e-14  4.37e-14 |
 G29  |   288   288     0   288     0.58     0.08     0.19     0.19   | 8.47e-13  6.75e-14  2.24e-14 |
 G15  |   288   288     0   288     0.56     0.07     1.56     1.56   | 6.94e-13  6.60e-14  2.53e-14 |
 G12  |   288   288     0   288     0.56     0.07     2.33     2.33   | 6.82e-13  6.81e-14  4.11e-14 |
 G11  |   288   288     0   288     0.55     0.07     0.31     0.31   | 6.59e-13  6.08e-14  4.68e-14 |
 G28  |   288   288     0   288     0.55     0.07     0.49     0.49   | 6.93e-13  7.15e-14  2.87e-14 |
 G32  |   288   288     0   288     0.83     0.03     0.34     0.34   | 2.25e-13  5.22e-14  1.53e-13 |
 BRFT |   276     0     0     0     0.00     0.00     0.00     0.00   | 4.50e-27  3.75e-28  6.25e-29 |
 CHUR |   286   286     2     0     0.00     0.00     0.00     0.00   | 1.91e-12  9.08e-13  6.97e-13 |
 G03  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.41e-12  3.12e-13  2.28e-13 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.54e-12  4.85e-13  3.15e-13 |
 G09  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.33e-12  4.00e-13  5.86e-13 |
 G10  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.26e-12  3.89e-13  7.82e-14 |
 G13  |   288   287     0     0     0.00     0.00     0.00     0.00   | 8.91e-13  1.06e-13  1.77e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.81e-13  9.25e-14  2.83e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.89e-13  9.53e-14  2.45e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.41e-13  1.11e-13  2.84e-14 |
 G27  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.40e-12  4.95e-13  5.96e-13 |
 G30  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.89e-13  1.32e-13  1.32e-13 |
 G31  |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.75e-13  6.00e-14  2.97e-14 |
 HOB2 |   288   274     5     0     0.00     0.00     0.00     0.00   | 1.17e-13  3.52e-14  1.72e-14 |
 KIRU |   287   287     0     0     0.00     0.00     0.00     0.00   | 1.84e-13  1.74e-13  2.10e-13 |
 METS |   286   286     0     0     0.00     0.00     0.00     0.00   | 1.54e-13  1.69e-14  2.26e-14 |
 GPST |   288   285     1     0     0.00     0.00     0.00     0.00   | 5.10e-14  9.21e-15  2.71e-15 |
 CONZ |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.61e-14  1.46e-14  2.19e-15 |
 GOLD |   288   286     1     0     0.00     0.00     0.00     0.00   | 1.47e-12  1.10e-12  2.02e-13 |
 SYOG |   287   287     0     0     0.00     0.00     0.00     0.00   | 6.85e-13  1.65e-13  9.71e-14 |
 SCH2 |   288   272    14     0     0.00     0.00     0.00     0.00   | 3.30e-12  1.06e-12  1.12e-12 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 7.55e-22  1.06e-19  3.43e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     BRFT      BRFT      BRFT |
----------------------------------------------------------------------+------------------------------+
